Journal of Chemistry

Volume 2013 (2013), Article ID 586136, 13 pages

http://dx.doi.org/10.1155/2013/586136

Research Article

Sorption of Uranium(VI) and Thorium(IV) by Jordanian Bentonite

Fawwaz I. Khalili, Najla'a H. Salameh, and Mona M. Shaybe

Chemistry Department, University of Jordan, Amman 11942, Jordan

Received 26 June 2012; Revised 16 August 2012; Accepted 26 August 2012

Academic Editor: Demeter Tzeli

Copyright © 2013 Fawwaz I. Khalili et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purification of raw bentonite was done to remove quartz. This includes mixing the raw bentonite with water and then centrifuge it at 750 rpm; this process is repeated until white purified bentonite is obtained. XRD, XRF, FTIR, and SEM techniques will be used for the characterization of purified bentonite. The sorption behavior of purified Jordanian bentonite towards and Th⁴⁺ metal ions in aqueous solutions was studied by batch experiment as a function of pH, contact time, temperature, and column techniques at 25.0∘C and . The highest rate of metal ions uptake was observed after 18 h of shaking, and the uptake has increased with increasing pH and reached a maximum at . Bentonite has shown high metal ion uptake capacity toward uranium(VI) than thorium(IV). Sorption data were evaluated according to the pseudo- second-order reaction kinetic. Sorption isotherms were studied at temperatures 25.0∘C, 35.0∘C, and 45.0∘C. The Langmuir, Freundlich, and Dubinin-Radushkevich (D-R) sorption models equations were applied and the proper constants were derived. It was found that the sorption process is enthalpy driven for uranium(VI) and thorium(IV). Recovery of uranium(VI) and thorium(IV) ions after sorption was carried out by treatment of the loaded bentonite with different concentrations of HNO₃ 1.0 M, 0.5 M, 0.1 M, and 0.01 M. The best percent recovery for uranium(VI) and thorium(IV) was obtained when 1.0 M HNO₃ was used.

1. Introduction

Jordan is rich in industrial rocks and minerals. The main two areas containing bentonite deposits in Jordan are Al Yamaniyya and Al Azraq areas. Al Yamaniyya is located about 10 km south of Aqaba, while Al Azraq area is divided into two parts: Q’a Al Azraq and Ein Al Bayda areas.

Bentonite is suitable to isolate nuclear wastes and groundwater because of its low hydraulic conductivity, high swelling property, good self-sealing capacities, and so forth [1], Bentonite is also used as buffer material or backfill material according to its function and location in the nuclear waste disposal field [2].

The presence of uranium and thorium in the environment not only originates from the nuclear industry but also from other anthropogenic activities such as lignite burning in power stations, ore processing, and the use of fertilizers [3]. Uranium is enriched in the Phosphorite and Chalk Marl Units of central Jordan (Daba-Siwaqa area 60 km south of Amman). The area is currently under investigation by Areva Co. and huge reserves are expected. concentrations range between 140 and 2200 ppm in central Jordan. Thorium is associated with the Dubaydib sandstone formation, southern Jordan, where the level of thorium oxide reaches 400 ppm [4].

Wyoming montmorillonite, <2-/xm particle size, saturated with Na, K, Mg, Ca, and Ba ions, was studied with uranyl nitrate solutions in the concentration range 1–300 ppm uranium. With constant amounts of clay and solution volume, the adsorption isotherms of uranyl ions on the clay followed Langmuir-type curves with increasing concentration of uranium. The maximum adsorption derived from linear Langmuir plots corresponds to the exchange capacity of the clay. Experiments with solutions of constant volume and constant ionicity, but with variable proportions of uranyl and other cations, showed that uranyl ions were strongly preferred by the clay to Na⁺ and K⁺, but less strongly than Mg²⁺, Ca²⁺, and Ba²⁺ [5]. Adsorption of uranyl ions to SWy-1 montmorillonite was evaluated experimentally and the results were modeled to identify likely surface complexation reactions responsible for the removal of uranyl ions from solution. Uranyl ions were contacted with SWy-1 montmorillonite in an NaC1O₄ electrolyte solution at three ionic strengths (), at pH 4 to 8.5, in an N₂ atmosphere. At low ionic strength, adsorption decreased from 95% at pH 4 to 75% at pH 6.8, while at higher ionic strength, adsorption increased with pH from initial values less than 75%; adsorption edges for all ionic strengths coalesced above a pH of 7. A site-binding model was applied that treated SWy-1 as an aggregate of fixed-charge sites and edge sites analogous to gibbsite and silica. The concentration of fixed-charge sites was estimated as the cation exchange capacity, and nonpreference exchange was assumed in calculating the contribution of fixed-charge sites to total uranyl ions adsorption. The concentration of edge sites was estimated by image analysis of transmission electron photomicrographs. Adsorption constants for uranyl ions binding to gibbsite and silica were determined by fitting to experimental data, and these adsorption constants were then used to simulate SWy-1 adsorption results. The best simulations were obtained with an ionization model in which was the dominant aluminol surface species throughout the experimental range in pH [6].

Sorption interactions with SAz-1 montmorillonite of U(6+) is potentially important to understand the mechanisms and the mobility of U(6+) and other radionuclides at pHs typical of natural waters (pH 6 to 9) through the subsurface environment. The results showed that U(6+) sorption on montmorillonite is a strong function of pH, reaching a maximum at near-neutral pH (6 to 6.5) and decreasing sharply towards more acidic or more alkaline conditions. At pH and carbonate concentrations typical of natural waters, sorption of  U(6+) on montmorillonite can vary by four orders of magnitude and can become negligible at high pH. A Diffuse-Layer model (DLM) assuming aluminol (>AlOH°) and silanol (>SiOH°) edge sites and two U(6+) surface complexation reactions per site effectively simulates the complex sorption behavior observed in the U(6+)—H₂O—CO₂-montmorillonite system at an ionic strength of 0.1 M and [7].

The adsorption of uranium and thorium on surface-modified bentonite under hydrothermal conditions was studied using bentonite isolated from southern clay (USA). They found changes in the speciation of uranium(VI) and thorium(IV) ions which have been observed in exchanged clays as a function of hydrothermal conditioning and/or surface modification. There are indications of aggregation of both of these ions within the interlayer spacing of the clay [8].

The adsorption and thermodynamic behavior of uranium(VI) onto bentonite composite adsorbent, isolated from Aegean Sea in Izmir Bay (Turky) composite adsorbent, was investigated. It was found that bentonite composite adsorbent is an economical and effective sorbent for uranium(VI) ions and the composite adsorbent exhibited excellent sorption selectivity for uranium(VI) [9]. Extended X-ray absorption fine structure (EXAFS) spectroscopy has been used to investigate the adsorption of uranyl () onto Wyoming montmorillonite. At low pH (4) and low ionic strength (10⁻³ M), uranyl has an EXAFS spectrum indistinguishable from the aqueous uranyl cation, indicating binding via cation exchange. At near-neutral pH (7) and high ionic strength (1 M), the equatorial oxygen shell of uranyl is split, indicating inner-sphere binding to edge sites. Linear-combination fitting of the spectra of samples reacted under conditions where both types of binding are possible reveals that cation exchange at low ionic strengths on SWy-2 may be more important than predicted by past surface complexation models of U(VI) adsorption on related montmorillonites. Analysis of the binding site on the edges of montmorillonite suggests that U(VI) sorbs preferentially to [Fe(O,OH)₆] octahedral sites over [Al(O,OH)₆] sites [10].

The adsorption of Th(IV) on MX-80 bentonite as a function of pH, ionic strength, Th(IV) concentration, and temperature was studied by using batch technique. The results indicated that the adsorption of Th(IV) on bentonite depended on pH, ionic strength, and temperature. The adsorption of Th(IV) decreased with increasing temperature, indicating that the adsorption process of Th(IV) on bentonite was exothermic. The sorption isotherms were obtained at , 303, 313, and 323K and were analyzed with the Langmuir and Freundlich models, showing that the Langmuir model fitted the adsorption data better than the Freundlich model [11].

Recently, we reported the sorption of some heavy metals by Jordanian bentonite [12] and the sorption of uranium and thorium by Jordanian zeolitic tuff Tulul al-Shabba [13].

The primary objective of this study is the sorption of uranium and thorium by purified Jordanian bentonite from Al-Azraq at different pH = 1.0, 2.0, and 3.0, at different temperature 25.0°C, 35.0°C, and 45.0°C, and different contact time. The purification of raw bentonite will be done by the removal of quartz. This includes mixing the raw bentonite with water and then centrifugation at 750 rpm, this process is repeated until white purified bentonite is obtained.

XRD, XRF, FTIR, and SEM techniques will be used for the characterization of bentonite.

The sorption properties of the bentonite toward uranium and thorium in aqueous solutions will be examined under various experimental conditions (batch and column experiment).

The data will be analyzed based on sorption models such as: Langmuir, Freundlich, and Dubinin-Radushkevich (D-R) sorption isotherms. In order to determine the nature and characteristic of the sorption process, thermodynamic and kinetic functions will be determined during this work.

2. Methodology

2.1. Materials and Instrumentation

All reagents used in this study were of analytical grad reagents. Th(NO₃)₄·5H₂O is from Riedel DeHäen, UO₂(NO₃)₃·H₂O, sodium perchlorate, sodium acetate, 65% Nitric acid are from Merck, 35% Hydrochloric acid from analytical Rasayan, Arsenazo (III) Indicator from BDH Chemicals Ltd. Samples of Jordanian bentonite from Azraq were obtained from Natural Resources Authority (NRA-Amman-Jordan). These natural bentonite rocks were grounded gently using glass rod, and they were then sieved to remove particles greater than 120 mesh (<250 µm). The bentonite portions of particle size less than 120 mesh were used in further purification to be used in this investigation.

Infrared spectra were recorded using a Thermonicollet Nexus 870 FTIR. The thermal gravimetric analysis (TGA) was recorded using NETZSCH STA 409 PC. The main components and minor components present in bentonite were studied by X-ray powdered diffraction (Shimadzu PXRD-6000). The XRF measurements were carried out by a sequential wavelength dispersive X-Ray Fluorescence spectrometer (Shimadzu XRF-1800). Cyberscan waterproof PC 300 meter was used for pH measurements. The shape and surface morphology of bentonite samples were also studied with (Shimadzu-SEM SUPER SCAN SSX Series). The analytical balance that was used is Shimadzu and its type is AW120 (0.1 mg). Shaking of samples was done using Clifton Shaker equipped with a thermostat. UV-VIS Spectrophotometer was from Spectroscan model 80DV with software UV Win5 v5.0.5.

2.2. Purification of Al-Azraq Bentonite

The main aim of this purification is to remove quartz. This process was done using the following steps: firstly, the bentonite samples of particle size less than 250 m were mixed with distilled water and then the suspension was centrifuged at 750 rpm to obtain particles less than 2 m. These particles were carefully separated in large bottles. The centrifugation was repeated for further five times [14]. The centrifuged (pure) bentonite samples were dried in an oven at 105°C for 4 hours and stored in polyethylene bottles.

2.3. Spectrophotometric Procedure for Th(IV) and U(VI)

2.3.1. Preparation of Arsenazo (III) Indicator Solution

A 0.10% aqueous solution of Arsenazo (III) (Figure 1) was used as a spectrophotometric reagent in the determination of thorium(IV) and uranium(VI) ion concentration [15].

Figure 1

The spectrophotometric determination of uranium(VI) and thorium(IV) ions in the aqueous solution was carried out as mentioned in our previous work [16].

2.4. Sorption Experiments

2.4.1. Metal Ion-Uptake by Bentonite Using Batch Sorption

Batch sorption was carried out using Pyrex glass flasks. Experiments were performed for determination of the equilibrium time for the sorption process involving 0.05 g ± 0.1 mg of the bentonite with 50.0 mL of metal ion solution added; the mixed solutions were mechanically shaken. The contact time was varied from 0.15 hour to 72 hours at 25°C, the concentration of the metal ion remaining in solution was determined with UV-VIS. Similar experiments were also carried out at different pH 1.0, 2.0, and 3.0.

The mass of the sorbed metal per unit mass of the bentonite was calculated [12, 13] using the following equation:

metal ion uptake by bentonite in (mg M/g bentonite), : initial metal concentration (ppm), : the residual concentration of metal ion in solution at equilibrium in (ppm), and : mass of bentonite (g). The percentage of metal ion loading by bentonite expressed as percentage uptake was calculated (2) where

Distribution Coefficient () is a standard parameter in the assessment of the physiochemical behavior of metal ion between solid and liquid phase. It can be used to evaluate the sorption and retention of the metal ion in bentonite.

is calculated using the following equation:

The values of and were calculated from the slopes and intercepts of the plot of versus

This relationship assumes that is independent on , where is the absolute temperature (Kelvin).

Change in Gibbs-free energy () was calculated using the following equation:

2.4.2. Sorption Isotherm Studies

An accurate mass of 0.05 g of bentonite measured to the nearest 0.1 mg was shaken with 50.0 mL of metal ion solution at different concentrations, in thermostatic shaker for 24 h (which had been found sufficient to ensure equilibrium) at 25.0°C, 35.0°C, and 45.0°C. The sorption isotherms were studied using similar conditions at different , 2.0, and 3.0.

2.4.3. Metal Ion-Uptake by Bentonite Using Column Experiment

Glass column of 150 mm length and 10 mm inner diameter was used in this experiment. The column was packed with 1.00 g ± 0.0001 g of bentonite; a sample volume of 50.0 mL containing either uranium(VI) or thorium(IV) of 2000 ppm was passed through the column at a flow rate of 1.0 mL/1.5 min. The eluate was collected in a 50 mL volumetric flask, and concentration of the metal ion was then determined by using UV-VIS.

2.4.4. Desorption Studies

Desorption of the uranium(VI) or thorium(IV) was carried out under column condition, where bentonite was loaded with each metal ion as described. A 50.0 mL of the following four different concentration from the same eluting agent, 1 M, 0.5 M, 0.1 M and 0.01 M HNO₃, were used for metal ion recovery from sorbed bentonite, keeping the flow rate of elution at 1 mL/1.5 min. The concentration of metal ion in the eluate was collected in ten −5 mL portions, and then determined by using UV-VIS.

3. Results and Discussion

3.1. Characterization and Analysis of Bentonite Samples

Bentonite samples were characterized using X-ray diffraction (XRD), XRF analysis, Scanning Electron Microscope (SEM) and Fourier Transform Infrared (FTIR) spectroscopy.

3.2. The XRD Characterization

X-ray diffraction is a nondestructive analytical technique, which reveals information about crystallographic structure. This technique is widely used in the characterization of clays. The XRD patterns for raw bentonite are shown in Figure 2. The characteristic XRD peaks for the minerals in raw bentonite are presented in Table 1. Raw Jordanian bentonite consists of montmorillonite (M) as major clay mineral, whereas quartz (Q) and calcite are present as impurities. Also, anorthite is present as minor constituent.

Table 1: The major XRD peaks for raw bentonite.

Mineral

(Å)

Montmorillonite (bentonite) (M)
19.89
4.457

35.36
2.536

40.30
2.236

61.84
1.499

Quartz (Q)
20.88
4.251

26.67
3.340

50.18
1.817

Anorthite
13.71
6.452

21.98
4.041

28.43
3.137

Calcite
29.84
2.991

Figure 2: XRD patterns for (I) raw bentonite and (II) purified bentonite, M: montmorillonite, Q: Quartz, and C: calcite.

A comparison between raw bentonite and purified bentonite is illustrated in Figure 2. This figure shows that the percent of SiO₂ decreases significantly after purification process while the montmorillonite content remains unchanged; as a result, the percent of montmorillonite in purified bentonite is increased.

The XRD patterns for raw bentonite and purified bentonite (stirring with distilled water) are shown in Figure 2. Although stirring process reduces the base line due to the removal of dusts and soluble impurities, the percent of quartz and montmorillonite did not change. The major peaks in Jordanian bentonite disagree alot with those of commercial untreated bentonite from Saudi Arabia, which contains mainly montmorillonite and kaolinite [17].

3.3. XRF

The XRF analysis for Jordanian bentonite (Table 2) shows that this type of clays consists mainly for aluminum silicate, with Na and Ca as exchangeable cations, so it is considered as intermediate bentonite with moderate swelling capacity. Upon purification the percentage of SiO₂ decreased due to the removal of quartz, since quartz is not the only source of SiO₂ in bentonite, while the percentages of other metal oxides increased. Jordanian bentonite contains more SiO₂, less Al₂O₃, less Fe₂O₃, and less CaO than Saudi bentonite [17].

Table 2: The XRF for raw bentonite and pure bentonite.

Compound (%)
Raw bentonite
Pure bentonite

SiO₂
60.86
45.72

Al₂O₃
13.03
13.57

Fe₂O₃
6.51
8.54

TiO₂
1.10
0.88

P₂O₅
0.12
0.09

CaO
1.24
2.78

MgO
3.08
4.76

K₂O
2.98
3.11

Na₂O
2.85
3.61

3.4. FTIR Spectra

Bentonite was characterized by FTIR. This technique could be used to identify the major functional groups present in bentonite. From the various wave numbers of the molecular vibrations modes, a good explanation of the chemical structure could be obtained. As illustrated in Figure 3, the characteristic IR band of montmorillonite appeared at 3468 cm⁻¹. This band represents the fundamental stretching vibrations of different –OH groups present in Mg–OH–Al, Al–OH–Al, and Fe–OH–Al units in the octahedral layer [18]. The strong peak appearing at 1035 cm⁻¹ is related to the stretching vibrations of Si–O groups, while the bands at 533 cm⁻¹ and 476 cm⁻¹ are due to Al–O–Si and Si–O–Si bending vibrations, respectively [19]. The peak at 848 cm⁻¹ is assigned to O–Si–O asymmetric stretching, while the peak at 450 cm⁻¹ is due to O–Si–O bending mode. On the other hand, the peak at 1647 cm⁻¹ is for H–O–H bending whereas the peak at 890 cm⁻¹ is due to OH bending bounded to Fe³⁺ and Al³⁺ [19].

Figure 3: FTIR spectrum for raw bentonite.

The comparison between raw bentonite and purified bentonite using FTIR spectra is illustrated in Figure 4.

Figure 4: FTIR for raw and purified bentonite.

Figure 4 gives strong indication that the aim of purification process is achieved. According to this figure, the intensity of absorbance at 1035 cm⁻¹ peak, which relates to Si–O groups, decreased after purification. This can be explained by the fact that the amount of SiO₂ decreases after purification process.

3.5. SEM Observations

To observe the surface morphology of raw bentonite, Scanning Electron Microscope (SEM) of gold-coated samples were taken under liquid nitrogen. Figure 5 clearly illustrates the presence of cavities in the raw bentonite. The images indicate that there are abundant pores distributed on the surface. The existence of these pores would provide convenient diffusion channels for metal ions into the interior of bentonite when it is immersed with metal ions from aqueous solutions.

(a) Raw bentonite

(b) Purified bentonite

Figure 5: The SEM images for Raw bentonite and Purified bentonite. Magnification = 300 times.

Scanning electron microscope is used to study bentonite shape. Figure 5 gives good indication about the purification process and the shape of bentonite crystal. It is clearly that the quartz crystals are reduced. Bentonite appears as corn flake like crystals with fluffy appearance revealing its extremely fine platy structure [18, 20].

3.6. Rate of Metal Ion Sorption by Bentonite

The rate of metal ions uptake by bentonite was determined at different times (0.15, 0.25, 0.5, 1.0, 2.0, 4.0, 6.0, 18.0, 22, 24, 48 and 72 h), with a concentration of 50 ppm at 25°C to find the effect of time of the percentage of uptake other experiments were also conducted varying the pH values (1.0, 2.0, and 3.0). The results are of these experiments are shown in plots are shown in Figures 6 and 7.

Figure 6: Uranium(VI) percentage uptake by bentonite at pH 1.0, 2.0 and 3.0 at 25°C and concentration 50 ppm.

Figure 7: Thorium(IV) percentage uptake by bentonite at pH 1.0, 2.0 and 3.0 at 25°C and concentration 50 ppm.

It can be noticed from Figures 6 and 7, that saturation takes place after 6 h, because of this we choose 24 h to be sure that we have reached equilibrium since it is a slow one. Also the % uptake increased as the pH increased, which is due to the increase on the surface negative charge or decrease in its positive charge. The idea for using low acidic pH is to avoid hydrolysis of thorium(IV) and uranium(VI) ions and to simulate the removal or purification of both from their ores.

3.7. Kinetics of Sorption

Sorption kinetics is used in order to explain the sorption mechanism and sorption characteristics.

3.8. Pseudo-First-Order Reaction Kinetic

Pseudo-first-order reaction kinetic data were calculated using the following equation:

where is the rate constant for the first-order sorption, is the amount of heavy metal sorbed at time (mg/g), and is the amount of heavy metal sorbed at saturation (mg/g). Rate constants () were calculated from the slopes of the curves (Tables 3 and 4).

Table 3: Comparison of sorption rate constants, experimental and calculated values for the pseudo-first- and -second-order reaction kinetics of removal for thorium(IV) by bentonite.

First order
Second order

pH

exp

1
0.957
0.0027
3.3221
27.718
0.995
35.088

32.964

2
0.961
0.0029
3.4685
32.089
0.994
43.290

41.000

3
0.937
0.0024
3.4405
31.203
0.991
44.248

43.679

Table 4: Comparison of sorption rate constants, experimental, and calculated values for the pseudo- first- and second-order reaction kinetics of removal for uranium (VI) by bentonite.

First order

Second order

pH

exp

1
0.938
0.0024
2.5637
12.984
0.996
23.810

23.655

2
0.948
0.0019
2.2241
9.245
0.999
29.674

30.076

3
0.968
0.0019
2.5257
12.500
0.999
42.373

42.891

3.9. Pseudo-Second-Order Reaction Kinetic

Sorption data was also evaluated according to the pseudo-second-order reaction kinetic proposed by following equation:

The plot of against time for each metal ion gives a linear relationship, where the values of and are obtained from the slope and intercept of against time plots (Tables 3 and 4).

As the difference between calculated and experimental values is considered, it is seen that the removal of thorium(IV) and uranium(VI) with bentonite is well described by the second-order reaction kinetic. Moreover, all the correlation coefficients of second-order reaction kinetic are higher than that of the first-order reaction kinetic [17, 21].

3.10. Metal Sorption Studies on Bentonite

The sorption of thorium(IV) and uranium(VI) on bentonite were studied in order to determine the effect of concentration variation from 10 to 100 ppm and pH on the isotherms of uranium(VI) and thorium(IV). The sorption isotherms were determined for thorium(IV) and uranium(VI) at different pH values (1.0, 2.0, and 3.0) and different temperatures (25°C, 35°C, and 45°C). The following linearized Langmuir, Freundlich isotherm forms, analyzed the sorption isotherms results

Therefore, a plot of versus gives a straight line of slope () and intercept , a plot of versus gives a straight line with a slope and intercept log . Where parameter is related to the strength of the sorbed ion adsorbent binding (i.e., Thorium(IV) ions-bentonite), is the saturation sorption capacity, is a parameter related to the sorption capacity, and n is a measure of the sorption intensity [22, 23].

The estimated parameters of the sorption isotherms, calculated from the intercepts and slopes of the corresponding linear plots of linearized Langmuir and Freundlich for Thorium(IV) and Uranium(VI), sorption onto bentonite at different temperatures, together with their correlation coefficients (), are given in Tables 5 and 6 at different pH values (1.0, 2.0, and 3.0). Example plots are shown in Figures 8 and 9.

Table 5: The , , , , , and values obtained from Langmuir and Freundlich plots for Thorium(IV).

Freundlich model
Langmuir model
(°C)

 ppm

(L/mg)
(mg/g)

0.504
2.133
5.384
0.958
0.082
40.161
0.995
pH = 1.0

25

0.440
2.099
4.338
0.979
0.063
36.631
0.994
35

0.399
2.100
3.762
0.995
0.047
35.971
0.968
45

1.881
1.502
7.271
0.963
0.066
95.238
0.989
pH = 2.0

25

1.703
1.476
6.561
0.975
0.058
95.238
0.976
35

1.541
1.437
5.299
0.992
0.043
101.01
0.983
45

4.138
1.606
12.526
0.997
0.112
108.696
0.951
pH = 3.0

25

3.811
1.437
11.153
0.984
0.090
123.457
0.981
35

3.636
1.352
9.513
0.982
0.069
135.135
0.982
45

Table 6: The , , , , and values obtained from Langmuir and Freundlich plots for Uranium(VI).

Freundlich model
Langmuir model
(°C)

 ppm

(L/mg)
(mg/g)

0.179
1.604
0.982
0.995
0.021
22.989
0.988
pH = 1.0

25

0.149
1.787
1.126
0.980
0.028
17.986
0.970
35

0.141
1.714
0.931
0.992
0.023
17.825
0.960
45

0.411
1.865
2.860
0.990
0.036
37.594
0.943
pH = 2.0

25

0.354
1.655
1.912
0.998
0.024
38.760
0.952
35

0.339
1.592
1.706
0.999
0.022
39.216
0.973
45

0.652
1.517
2.643
0.998
0.026
62.118
0.964
pH = 3.0

25

0.596
1.572
2.919
0.985
0.032
55.866
0.988
35

0.568
1.579
2.889
0.976
0.033
53.476
0.994
45

(a)

(b)

(c)

Figure 8: Plot of (a) sorption isotherm of Th(IV), (b) linearized Langmuir (III), and (c) linearized Freundlich at and 45°C.

(a)

(b)

(c)

Figure 9: Plot of (a) sorption isotherm of U(VI), (b) linearized Langmuir (III), and (c) linearized Freundlich at and 25°C.

In case of Langmuir, some deviation from linearity is shown; the proposed explanation of this deviation is that when all of the available monolayer sites are saturated, some fresh internal sites can be created. The creation of the additional surface arises from the pressure of metal ions being forced into the macropore and micropore structures [24].

Since the values for Freundlich and Langmuir models are above 0.95, the surface of bentonite is a mixture of homogeneous and heterogeneous sites and this agrees very well with SEM results.

In Freundlich isotherm, the value of denotes the type of sorption whether it is favorable or not. A value of ranging from 2 to 10 is considered favorable, a value ranging from 1 to 2 is considered moderately difficult, while a value of 0.5 or less indicates very poor sorption [25]. Therefore, based on the values from Tables 5 and 6, sorption of thorium and uranium are moderately difficult. Based on the values of in Tables 5 and 6, sorption of thorium(IV) is greater than uranium(VI) metal ions on bentonite.

This observation can be explained in terms of the following three factors.

  Hydration Energy. The adsorptivity of metal ions () on bentonite was found to be directly proportional to the ionic radius. This is due to the decrease in enthalpy hydration () as the ionic radius increases [26]. Increasing the hydration energy due to increase in the hydration shell makes it more difficult for metal ion to discharge the water of hydration. The formation of aqua complex takes place (where is larger than six, perhaps eight or nine), the aqua complex, having H₂O molecules surrounding the central ion, has a definite structure, and the cloud of water molecules (hydration shell) has another geometry than the rest of the water. Thus, when say salt is dissolved in water, there will be very little attraction between and the solvated ion. Unless the other ions or ligands have a strong structure breaking influence, the sheath of water molecule will protect the metals ions from the influence of other anions or ligands. When complexes are formed, the approach of a ligand will interfere with the hydration shell and the ordered geometry will break down [27]. A stronger hydration shell will surround small metal ion, which has smaller radius than the metal ion with larger radius; the adsorptivity of ion of large radius is larger than small radius.

When it depends on the charge-to-size ratio, a large ratio results in an increase in hydration energy, which means that the hydrated ion prefers the solution phase, where it may satisfy its hydration requirements. Ions with lower hydration energy prefer the bentonite phase. Table 7 shows that thorium has lower hydration energy than uranium. This means that thorium can exchange easily at the bentonite surface.

Table 7: Chemical properties of Thorium(IV) and Uranium(VI).

U(VI)
Th(IV)
Metals

0.97
1.19
Ionic radius (Å)

4.69
4.00
Hydrolysis constant at 0.1 M NaClO₄ ()

−3958
−3332
Hydration energy (kJ/mol)

  Hydrolysis Reaction. Hydrolysis reaction can be represented by a hydrolysis constant ()

From the value of in Table 5, the following sequence was observed:

This indicates that at lower value the metal ion can diffuse easily and has a stronger binding strength at bentonite surface. Thorium(IV) has a lower , so a lower resistance to reach the active sites.

  Deprotonating the SiOH and AlOH Groups. As the pH increase, the amount of deprotonated SiOH and AlOH groups increases, so the negative charge on the surface and edge sites increases. This will increase the interaction between the metal ions and the bentonite (Tables 5 and 6). The higher the metal charge causes a stronger interaction. This agrees very well with previous studies [5, 6, 11].

The correlation coefficient is a mathematical expression, which reveals the favorability of the sorption process, since the values of for Langmuir isotherm and Freundlich are very good.

As mentioned before, the maximum sorption capacity () is determined form Langmuir sorption isotherm. In bentonite, the metal ions seem to reach saturation which means that the metal ion had filled the possible available sites, so the sorption efficiency increases to a certain level and then remained constant with concentration.

3.11. Dubinin-Radushkevich

The linear form for Dubinin-Radushkevich (D-R) isotherm has the following expression:

where is the ideal gas constant (8.3145 J · mol⁻¹ · K⁻¹) and is the absolute temperature (Kelvin). The values of and are evaluated from the slope and intercept of the linear plot of lnq versus , where is related to the sorption capacity and is the constant related to the sorption energy.

The sorption-free energy () is defined as the free energy change required for transferring one mole of ions from solution to solid surface; this energy is calculated as following:

The value of gives information about the physical and chemical features of the sorption. Low values of sorption energy () show that the sorption has a physical nature.

The results of the Dubinin-Radushkevich concentration variation isotherms of Thorium(IV) and Uranium(VI) are shown in Table 8. The D-R isotherm model is more general than Langmuir isotherm as it rejects the homogenous surface or constant sorption potential. As illustrated in Table 8, the values of are less than 8.00 kJ/mol, this indicates that physical forces affect the sorption [28]. It is interesting to note that the difference of derived from the Langmuir and derived from D-R models is quite large. The difference may be attributed to the different definition of in the two models. In Langmuir model, represents the maximum sorption of metal ions at monolayer coverage, whereas in D-R model it represents the maximum sorption of metal ions at the total specific micropore volume of the sorbent. Thereby, the value of derived from D-R model is lower than that derived from Langmuir model [29]. The values of β, , and for thorium(IV) and uranium(VI) are summarized in Table 8.

Table 8: Dubinin-Radushkevich (D-R) isotherm parameters for Thorium(IV) and Uranium(VI) at pH = 1.0, 2.0, and 3.0 at °C.

pH

(mol²/kJ²)
(mg/g)
(kJ/mol)

Thorium(IV)

1
0.901
1.816
20.884
0.525

2
0.859
0.985
31.785
0.712

3
0.844
0.261
32.201
1.384

Uranium(VI)

1
0.874
9.573
8.593
0.229

2
0.842
3.511
15.120
0.377

3
0.867
3.283
17.708
0.390

3.12. Thermodynamics of Sorption on Bentonite

In order to understand the possible sorption mechanism involved in the removal process, thermodynamic functions for the system, including changes in Gibbs-free energy (), change in enthalpy of sorption (), and changes in entropy of sorption (), were calculated using the following equation:

where is the equilibrium constant, is the gas constant, and is the temperature in Kelvin.

The plot of against for each metal ion (Figures 10 and 11) gives a linear relationship, where the values of enthalpy () and entropy () are obtained from the slope and intercept of versus plots. was calculated at each temperature using the following equation:

From the Vant Hoff equation , and were calculated for Th(IV) and U(VI) as shown in Table 9. The adsorptive process is enthalpy driven for thorium(IV) and uranium(VI). The negative values of enthalpy show that the sorption of thorium(IV) and uranium(VI). on bentonite is an exothermic process. This exothermic effect can be explained by the forces of interaction between the bentonite and metal, which are stronger than those existing in both bentonite and metal alone, which means that it would prefer the product than reactant [30]. The almost zero values of suggests that the entropy of the system is decreased or stayed constant. On the other hand, these almost zero values of entropy indicate that the sorption process is irreversible and favors the stability of sorption. During the sorption process, the metal ions become associated with the surface of the bentonite resulting in the loss of a degree of freedom while releasing water of hydration increases the value of this function in a more or less equal value [29]. The low to negative values for indicate that the sorption process is more energy favorable at higher pH values, since we are talking about a heterogeneous and not a homogeneous system.

Table 9: Thermodynamic functions for Thorium(IV) and Uranium(VI).

Metal ion
pH

(kJ/mol·K)

(kJ/mol)

(kJ/mol) 298 (K)

1
−0.027
−6.355
1.691

Th(IV)
2
−0.009
−4.086
−1.404

3
−0.0003
−3.551
−3.462

1
−0.037
−6.753
4.273

U(VI)
2
−0.026
−5.529
2.219

3
−0.017
−3.813
1.253

Figure 10: Plots of versus   for Thorium (IV) at , , and .

Figure 11: Plots of versus for Uranium(VI) at , , and .

4. Column Experiments

4.1. Metal Ion Uptake by Bentonite

The investigation of metal ion uptake by bentonite using column experiments for thorium(IV) and uranium(VI) was determined at the optimum pH for each metal ion with initial concentration of 2000 ppm at 25°C and flow rate of 1 mL/2 min. The results are expressed as percent metal uptake by the column and are presented in Table 10.

Table 10: Metal ion uptake using column experiment at pH = 3, 25°C.

Metal ion (II)
(ppm)
Final concentration (ppm)
Loaded concentration (ppm)
% Uptake

Thorium(IV)
2000
445.5
1554.5
77.7

Uranium(VI)
2000
481.4
1518.6
75.9

It can be seen that the uptake capacities of the metal ions fall in the order Th(IV)>U(VI).

It is observed that the % uptake in column experiment is smaller than those obtained in batch experiment, because in order to achieve complete saturation, long time of contact is required. On the other hand, the shaking process in batch technique is a fundamental factor in addition to the large contact time, which increases the % uptake of metal ions compared to column technique.

4.2. Desorption Studies

The main aim of this study is to determine the capability of bentonite to be regenerated for further uses. 50 mL of 1.0 M HNO₃, 0.5 M HNO₃, 0.1 M HNO₃, and 0.01 M HNO₃ were used for the removal of metal ions and regeneration of bentonite, keeping flow rate of elution 1 mL/2 min. The elute was collected in ten portions, 5 mL for each portion; the results are expressed as percent recovery and represented in Table 11.

Table 11: Desorption of U(VI) and Th(IV) ions from bentonite.

Eluting agent

% Recovery
1.0 M
0.5 M
0.1 M
0.01 M

HNO₃
HNO₃
HNO₃
HNO₃

U(VI)/Th(IV)
U(VI)/Th(IV)
U(VI)/Th(IV)
U(VI)/Th(IV)

First portion
4.793
12.651
3.925
9.072
3.141
7.180
2.439
10.257

Second portion
4.410
9.156
3.801
9.010
2.781
6.743
2.227
9.837

Third portion
4.406
9.125
3.208
8.789
2.675
6.403
2.215
6.282

Fourth portion
3.856
7.524
3.164
8.589
2.675
6.055
2.162
5.316

Fifth portion
3.845
6.527
2.661
8.544
2.663
4.819
2.161
2.283

Sixth portion
3.836
6.251
2.573
4.636
2.663
4.484
1.623
2.277

Seventh portion
3.695
6.141
2.549
3.430
2.593
3.878
1.576
2.272

Eighth portion
3.559
5.872
1.996
3.353
2.546
3.464
1.270
2.219

Ninth portion
3.535
5.861
1.994
2.638
1.993
2.645
0.853
2.005

Tenth Portion
2.971
5.827
1.773
2.007
1.748
2.557
0.829
1.950

% Cumulative recovery
38.905
69.109
27.594
60.069
25.479
48.227
17.354
44.699

Depending on the values of percentage of cumulative recovery, in Table 11, the following trends were observed for eluting agents of Th(IV) and U(VI) from bentonite:

Table 11 shows desorption yields of uranium and thorium after ten desorption stages. Desorption yield for bentonite decreased with increasing the desorption stages. Thorium recovery decreases with decreasing acidity. When concentration of HNO₃ is increased, desorption of uranium(VI) and thorium(IV) is increased due to cation exchange mechanism. It is clearly observed that the efficiency of Jordanian bentonite to adsorb metal ions for the second time is expected to decrease significantly when desorption of the first time is done; this fact indicated that the washing of bentonite with HNO₃ regenerates bentonite but the regeneration is not complete, since bentonite loses significant efficiency to adsorb metal ions for the second sorption process.

There are other studies showing the effectiveness of bentonite sorption of heavy metals from aqueous solution Table 12; the heavy metals which have been studied are Pb(II), Cr(III), Zn(II), and Mn(II). The sorption of these heavy metals on purified bentonite was studied as a function of contact time, pH, temperature, and concentration variation [31]. The estimated parameters, and , of the sorption isotherms for the three forms of linearized Langmuir equations were calculated from the intercept and slopes of the corresponding linear plots for Zn(II), Pb(II), Cr(III), and Mn(II) sorption onto bentonite at different temperatures and pH values. The values of these parameters for Langmuir Model form (II) with their correlation coefficients () at 140 ppm are given in Table 12.

Table 12: , and , values obtained for heavy metals from Langmuir form (II) plots.

M(II)

= 25°C

pH = 4.0
(L/mg)
(mg/g)

Zn(II)
1.2657
9.05
0.9991

Pb(II)
0.0912
76.34
0.9994

Cr(III)
1.0114
37.31
0.9997

Mn(II)
0.4837
6.05
0.9966

From the following Tables 5, 6, and 12, it is clear that the sorption capacity of thorium and uranium in bentonite is slightly greater than the capacity of bentonite to sorb heavy metals except for Pb(II).

Accordingly, values for Th(IV) and U(VI) at as well as Pb(II), Zn(II), Cr(III), and Mn(II) at are decreasing generally in the following order:

5. Conclusion and Recommendations

The present work has focused on the purification of Jordanian bentonite and then studying its sorption characteristics toward Th(IV) and U(VI). Raw and purified bentonites were characterized by XRD, XRF, and SEM. The sorption characteristics for Th(IV) and U(VI) ions from aqueous solutions were examined under various experimental conditions using both batch and column techniques. The effective desorption of the metal ions was also studied and the coefficients of recovery of sorption ability were also investigated.

The following remarks are concluded.

(1) Jordanian bentonite showed a relatively high uptake for thorium(IV) and lower uptake for uranium(VI).(2) The influence of different pH on metals uptake showed that the metal ion uptake by bentonite increased with pH and reached a maximum at for and .(3) The maximum sorption capacity () of bentonite was high for and the extent of metal ions uptake followed the order: at and 25°C.(4) The equilibrium for each metal ion on the surface of bentonite occurs at 18 hours to achieve maximum uptake level.(5) The adsorptive process is enthalpy driven for uranium(VI) and thorium(IV).(6) A glass column was packed with bentonite and exhibits good sorption properties toward metal ions. The regeneration process of bentonite was done using different concentration of and the results show that this process is effective for environmental applications.(7) The best percent recovery for thorium(IV) and uranium(VI) was obtained when 1.0 M was used.(8) Thorium (IV) and uranium (VI) removal with bentonite is well described by the second-order reaction kinetic.(9) This study strongly recommends the use of Jordanian bentonite to remove radioactive wastes; such wastes arise from technologies producing uranium and from laboratories working with radioactive materials.

References

D. Sun, H. Cui, and W. Sun, “Swelling of compacted sand-bentonite mixtures,” Applied Clay Science, vol. 43, no. 3-4, pp. 485–492, 2009.

L. H. Mollins, D. I. Stewart, and T. W. Cousens, “Predicting the properties of bentonite-sand mixtures,” Clay Minerals, vol. 31, no. 2, pp. 243–252, 1996.

P. Misaelides, A. Godelitsas, A. Filippidis, D. Charistos, and I. Anousis, “Thorium and uranium uptake by natural zeolitic materials,” Science of the Total Environment, vol. 173-174, pp. 237–246, 1995.

H. Khoury, Industrial Rocks and Minerals in Jordan, University of Jordan, Amman, Jordan, 2nd edition, 2006.

A. Tsunashima, G. W. Brindley, and M. Bastovanov, “Adsorption of uranium from solutions by montmorillonite; compositions and properties of uranyl montmorillonites,” Clays & Clay Minerals, vol. 29, no. 1, pp. 10–16, 1981.

J. P. McKinley, J. M. Zachara, S. C. Smith, and G. D. Turner, “The influence of uranyl hydrolysis and multiple site-binding reactions on adsorption of U(VI) to montmorillonite,” Clays & Clay Minerals, vol. 43, no. 5, pp. 586–598, 1995.

R. T. Pabalan and D. R. Turner, “Uranium(6+) sorption on montmorillonite: experimental and surface complexation modeling study,” Aquatic Geochemistry, vol. 2, no. 3, pp. 203–226, 1996.

D. M. Giaquinta, L. Soderholm, S. E. Yuchs, and S. R. Wasserman, “Hydrolysis of uranium and thorium in surface-modified bentonite under hydrothermal conditions,” Journal of Alloys and Compounds, vol. 249, no. 1, pp. 142–145, 1997.

R. Donat and S. Aytas, “Adsorption and thermodynamic behavior of uranium(VI) on Ulva sp.-Na bentonite composite adsorbent,” Journal of Radioanalytical and Nuclear Chemistry, vol. 265, no. 1, pp. 107–114, 2005.

J. G. Catalano and G. E. Brown, “Uranyl adsorption onto montmorillonite: evaluation of binding sites and carbonate complexation,” Geochimica et Cosmochimica Acta, vol. 69, no. 12, pp. 2995–3005, 2005.

D. L. Zhao, S. J. Feng, C. L. Chen, S. H. Chen, D. Xu, and X. K. Wang, “Adsorption of thorium(IV) on MX-80 bentonite: effect of pH, ionic strength and temperature,” Applied Clay Science, vol. 41, no. 1-2, pp. 17–23, 2008.

J. S. Al-Jariri and F. Khalili, “Adsorption of Zn(II), Pb(II), Cr(III) and Mn(II) from water by Jordanian bentonite,” Desalination and Water Treatment, vol. 21, no. 1–3, pp. 308–322, 2010.

M. Al-Shaybe and F. Khalili, “Adsorption of thorium (IV) and uranium (VI) by tulul al- shabba zeolitic tuff, Jordan,” Jordan Journal of Earth and Environmental Sciences, vol. 2, no. 1, pp. 108–109, 2009.

M. Salman, B. El-Eswed, and F. Khalili, “Adsorption of humic acid on bentonite,” Applied Clay Science, vol. 38, no. 1-2, pp. 51–56, 2007.

S. B. Savvin, “Analytical use of arsenazo III. Determination of thorium, zirconium, uranium and rare earth elements,” Talanta, vol. 8, no. 9, pp. 673–685, 1961.

F. Khalili, S. A. Al-Taweel, Y. Y. Yousef, and S. A. Al-Tarawneh, “Synthesiss characterization and solvent extrachion properties of new Thiophene based trifluoromethyl-substituted B-diketones for Thorium(IV) and uranium(VI) Ions,” Journal of Saudi Chemical Society, vol. 12, no. 2, pp. 165–176, 2008.

W. K. Mekhemera, J. A. Hefneb, N. M. Alandisa, O. A. Aldayel, and S. Al-Raddadi, “Thermodynamics and kinetics of Co (II) adsorption onto natural and treated bentonite,” Jordan Journal of Chemistry, vol. 3, no. 4, pp. 409–423, 2008.

D. M. Manohar, B. F. Noeline, and T. S. Anirudhan, “Adsorption performance of Al-pillared bentonite clay for the removal of cobalt(II) from aqueous phase,” Applied Clay Science, vol. 31, no. 3-4, pp. 194–206, 2006.

A. Tabak, B. Afsin, B. Caglar, and E. Koksal, “Characterization and pillaring of a Turkish bentonite (Resadiye),” Journal of Colloid and Interface Science, vol. 313, no. 1, pp. 5–11, 2007.

National Resources Authority, Bentonite, National Resources Authority, Amman, Jordan, 2006.

S. Veli and B. Alyüz, “Adsorption of copper and zinc from aqueous solutions by using natural clay,” Journal of Hazardous Materials, vol. 149, no. 1, pp. 226–233, 2007.

C. Paduraru, D. Bilba, I. Sarghie, and L. Tofan, “A sorption study of Pd(II) on aminomethylphosphonic purolite resin S-940,” Journal of the Serbian Chemical Society, vol. 70, no. 10, pp. 1205–1212, 2005.

G. Mckay and F. Porter, “Equilibrium parameters for the sorption of copper, cadmium and zinc ions onto peat,” Journal of Chemical Technology & Biotechnology, vol. 69, pp. 309–320, 1997.

S. J. Allen, G. McKay, and K. Y. H. Khader, “Multi-component sorption isotherms of basic dyes onto peat,” Environmental Pollution, vol. 52, no. 1, pp. 39–53, 1988.

W. Helbig, “Adsorption liquid phase processes are important,” Journal of Chemical Engineering, vol. 59, pp. 153–158, 1952.

J. P. Hunt, Metal Ions in Aqueous Solutions, Benjamin Inc., New York, NY, USA, 2nd edition, 1965.

S. P. Sinha, Complexes of the Rare Earths, Pergamon Press, London, UK, 1st edition, 1966.

R. Donat, A. Akdogan, E. Erdem, and H. Cetisli, “Thermodynamics of Pb²⁺ and Ni²⁺ adsorption onto natural bentonite from aqueous solutions,” Journal of Colloid and Interface Science, vol. 286, no. 1, pp. 43–52, 2005.

D. Xu, X. L. Tan, C. L. Chen, and X. K. Wang, “Adsorption of Pb(II) from aqueous solution to MX-80 bentonite: effect of pH, ionic strength, foreign ions and temperature,” Applied Clay Science, vol. 41, no. 1-2, pp. 37–46, 2008.

S. E. Fendorf and G. Li, “Kinetics of chromate reduction by ferrous iron,” Environmental Science and Technology, vol. 30, no. 5, pp. 1614–1617, 1996.

D. C. Lee, C. J. Park, J. E. Yang, Y. H. Jeong, and H. I. Rhee, “Screening of hexavalent chromium biosorbent from marine algae,” Applied Microbiology and Biotechnology, vol. 54, no. 3, pp. 445–448, 2000.