Journal of Chemistry

Volume 2014 (2014), Article ID 436485, 5 pages

http://dx.doi.org/10.1155/2014/436485

Research Article

Different Surfactants-Assisted Hydrothermal Fabrication and Photocatalytic Properties of Bi₂MoO₆ for Methylene Blue Degradation under Simulated Sunlight Irradiation

Wenfeng Guo,1,2 Heping Li,¹ Haisheng Ma,¹ and Weixiu Teng¹

¹Hebei Key Laboratory of Applied Chemistry, School of Environmental and Chemical Engineering, Yanshan University, Qinhuangdao 066004, China

²State Key Laboratory of Metastable Materials Science and Technology, Yanshan University, Qinhuangdao 066004, China

Received 8 November 2013; Accepted 16 December 2013; Published 19 February 2014

Academic Editor: Xinqing Chen

Copyright © 2014 Wenfeng Guo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Bi₂MoO₆ single-crystallites were synthesized by a simple hydrothermal method in the presence of surfactant sodium dodecyl sulfate (SDS), polyvinyl pyrrolidone (PVP), or cetyl trimethyl ammonium bromide (CTAB). The samples were characterized by X-ray diffraction (XRD), transmission electron microscopy (TEM), and ultraviolet-visible diffuse reflectance spectra (UV-vis DRS) techniques. The photocatalytic activities of the as-fabricated Bi₂MoO₆ samples were measured for the degradation of methylene blue (MB) under the Xe light illumination. It is shown that the introduction of surfactant have a crucial influence on the size and morphology of the Bi₂MoO₆ product. Among the as-fabricated Bi₂MoO₆ samples, the ones derived hydrothermally with CTAB showed outstanding photocatalytic activities for the addressed reaction under simulated sunlight irradiation, attributed to the ultrafine nanocrystals and the higher surface areas.

1. Introduction

Recently, many Aurivillius-based compounds [1] have been reported which exhibit interesting properties suitable for photocatalytic applications. Bismuth molybdates have the general chemical formula Bi₂O₃· MoO₃ where , 2 or 1, corresponding to the α-Bi₂Mo₃O₁₂, β-Bi₂Mo₂O₉, and γ-Bi₂MoO₆. Among this family, γ-Bi₂MoO₆ with Aurivillius structure is the simplest and probably the most studied example.

It was well known that the microstructure and morphology of photocatalysts are important factors affecting photocatalytic properties [2]. Various synthesis methods of γ-Bi₂MoO₆ have been reported, including hard template method [3], solution combustion method [4], ultrasonic-assisted synthesis [5], citrate complex method [6], coprecipitation method [7], and hydrothermal synthesis [8, 9] Within them, the hydrothermal route is one of the most effective methods for synthesizing γ-Bi₂MoO₆ nanostructures. This process can be described as a reaction of precursors in a close system in the presence of a solvent. It is possible to control the shape and size of products by adjusting the processing parameters, such as different solvents and reactants, surfactants, reaction temperature, and time [10–12]. Different surfactants used in this approach were effective to fabricate nanoparticles with controllable phases and morphologies, and thus to affect the property of the product. In this paper, γ-Bi₂MoO₆ is synthesized by a simple hydrothermal method, the influence of surfactants SDS, PVP and CTAB on the microstructure, morphology, and photocatalytic activities of the catalysts is investigated. It is found that the γ-Bi₂MoO₆ synthesized in the presence of surfactant CTAB exhibits an excellent photocatalytic activity in the decomposition of MB under simulated sunlight irradiation (500-W Xe light illumination).

2. Experimental

2.1. Materials

Bismuth nitrate, sodium molybdate, MB, sodium hydroxide, nitric acid, absolute alcohol, SDS, PVP, and CTAB were provided by Sinopharm Chemical Reagent Co., Ltd. (Shanghai, China). All chemicals were of analytic grade and used without treating further for purification.

2.2. Preparation of the Bi₂MoO₆ Sample

γ-Bi₂MoO₆ were prepared by a simple hydrothermal synthesis. Briefly, while stirring, Bi(NO₃)₃·5H₂O (1.947 g) was dissolved in 10 mL nitric acid solution (2 mol/L) to form solution A. Then, 0.483 g Na₂MoO₄ was dissolved in 10 mL sodium hydroxide solution (4 mol/L) under stirring to form solution B. Thirdly, solution B was dropwised into solution A to form homogeneous solution C. 0.189 g of SDS, PVP, and CTAB was added into solution C, respectively. The pH = 5 values of the solution were then adjusted with concentrated sodium hydroxide under stirring. After being vigorously stirred for 30 min, the resulting precursor suspension was transferred into a 50 mL capacity Teflon-lined stainless steel autoclave, which was subsequently heated to 180°C and maintained for 22 h. Subsequently, the autoclave was cooled to room temperature naturally. The obtained samples were filtered, washed with deionized water for several times, and dried at 80°C in air. The sample obtained without surfactant was denoted as S1, and the samples obtained by adding SDS, PVP, and CTAB were denoted as S2, S3, and S4, respectively.

2.3. Characterization

X-ray powder diffraction (XRD) patterns were recorded on a Shimadzu XRD-6000 X-ray diffractometer (Cu Kα source) at a scan rate of 4°/min with the 2θ range from 20° to 80°. The crystal size was estimated from the Scherrer equation, , where is the crystal size, is the wavelength of the X-ray radiation, and is usually taken as 0.9, FWHM is the full width at half maximum in radian of the sample. Transmission electron microscopy (TEM) images were recorded on a JEOL JEM-2010 transmission electron microscope at an accelerating voltage of 200 kV. UV-visible absorption spectra and diffuse reflectance spectra (DRS) were recorded on a Lambda 2500 UV-visible spectrophotometer (Japan island ferry).

2.4. Photocatalytic Degradation of MB Experiment

MB was used as a convenient photostable organic molecule to assay photochemical activity of γ-Bi₂MoO₆. The prepared γ-Bi₂MoO₆ samples (50 mg) were dispersed into an aqueous solution (100 mL) of MB (10 mg/L⁻¹). The suspension was sonicated for 30 min, followed by stirring in the dark for 120 min to ensure adsorption-desorption equilibrium prior to irradiation. The suspension was then irradiated while stirring by using a 500-W Xe lamp (MAX-302, Asahi Spectra, USA). The initial and final reaction temperatures for MB solution were measured as 25 ± 3°C, respectively. Samples for analysis were taken from the reaction suspension after different reaction time and centrifuged at 3500 rpm for 10 min to remove the particles. The MB concentration from the upper clear solution was analyzed according to the absorption intensity at 664 nm in the measured UV-vis spectra.

3. Results and Discussion

3.1. XRD Analysis

The XRD technique was used to identify the crystalline phases of the as-prepared γ-Bi₂MoO₆ samples, and the XRD patterns are shown in Figure 1. By comparing the XRD pattern of the standard γ-Bi₂MoO₆ sample (JCPDS PDF# 72-1524 or 71-2086), it can be realized that all of the Bragg diffraction peaks of each as-fabricated bismuth molybdate sample in the 2θ range of 10–80° could be well indexed, as indicated in Figure 1 (S1–S4). In other words, all of the γ-Bi₂MoO₆ samples were single-phase and possessed an orthogonal crystal structure, in good consistency with the results reported by other researchers [7, 8, 13]. For four Bi₂MoO₆ samples, there were some discrepancies in peak intensity, indicating that the γ-Bi₂MoO₆ crystallinity was a little different from sample to sample, depending upon the fabrication conditions adopted.

Figure 1: XRD patterns of S1–S4 samples.

3.2. TEM Analysis

Figure 2 shows the TEM images of the as-prepared γ-Bi₂MoO₆ without or with surfactants. The TEM image in Figure 2(a) shows that bigger γ-Bi₂MoO₆ aggregated particles are composed of sheet-like nanocrystals without any surfactant. In Figure 2(b), the as-prepared γ-Bi₂MoO₆ with SDS is self-organized into a bigger branch-like architecture with irregular morphology. The TEM image in Figure 2(c) shows that the γ-Bi₂MoO₆ is composed of nanosheets with different sizes when adding PVP surfactant. Figure 2(d) shows that the TEM images of the γ-Bi₂MoO₆ assisted by CTAB are composed of smaller nanocrystals with thinner sheet-like and regular morphology. It is concluded that surfactants affect the morphology and the particle size of γ-Bi₂MoO₆ during the hydrothermal process.

(a)

(b)

(c)

(d)

Figure 2: TEM images of the various photocatalysts: (a) S1, (b) S2, (c) S3, and (d) S4, respectively.

3.3. Photocatalytic Activities

To demonstrate the photocatalytic activity, MB was chosen as photodegradation target under simulated sunlight irradiation. Figure 3 showed the time-dependent absorption spectra of MB solution during the photodegradation process in the presence of different γ-Bi₂MoO₆ samples (S1–S4). The absorption peaks at 664 nm corresponding to MB diminished gradually as the irradiation time extended. Compared with the absorption peaks in S2 and S1, those in S3 and S4 dramatically decreased and completely disappeared after about 90 min, in particular that in S4. It suggested that S4 exhibited the highest photocatalytic activity among all the γ-Bi₂MoO₆ samples. The variation of MB concentrations (C/C ₀) with irradiation time over the different γ-Bi₂MoO₆ samples was shown in Figure 4, where C ₀ and C are the concentrations of MB solution before irradiation and after the irradiation. For comparison, direct photolysis of MB in the absence of γ-Bi₂MoO₆ was performed under the same conditions. It was clearly seen that MB concentration in the absence of the catalysts hardly changed with the increase of irradiation time. The as-synthesized γ-Bi₂MoO₆ products with different surfactants exhibited remarkable variation in photocatalytic activities for MB degradation. Under Xe lamp irradiation within 90 min, the MB photocatalytic degradation ratio (98% and 96.1%) is achieved by S4 and S3 samples, noticeably better photocatalytic activities than the S2 and S1. Among γ-Bi₂MoO₆ products, S4 exhibited superior photocatalytic activity than other products. It was mainly because photocatalytic activities increased with the decrease of the particle size. The probable mechanism is that the surface area of small particle size provides more active sites during the photocatalytic process [14, 15]. The superior activity of S4 might be ascribed to its relatively small particle size by CTAB assisted growth.

(a)

(b)

(c)

(d)

Figure 3: UV-vis absorption spectra of the MB solution in the presence of various photocatalysts under simulated sunlight irradiation: (a) S1, (b) S2, (c) S3, and (d) S4, respectively.

Figure 4: Photocatalytic degradation ratio of MB versus irradiation time by using various photocatalysts.

4. Conclusion

In conclusion, γ-Bi₂MoO₆ was synthesized by a simple hydrothermal method in the presence of surfactants SDS, PVP, and CTAB. The surfactants can affect the particle size, surface area, morphology, and the photocatalytic activity of γ-Bi₂MoO₆. It is also found that surfactant CTAB has a promotive effect on the photocatalytic activity of γ-Bi₂MoO₆ sample, due to the surface area of small particle size providing more active sites during the photocatalytic process. Under a 500 W Xe lamp irradiation, the γ-Bi₂MoO₆ obtained by using CTAB as surfactant can degrade MB 98% in 90 min.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

A. Kubacka, M. Fernández-García, and G. Colón, “Advanced nanoarchitectures for solar photocatalytic applications,” Chemical Reviews, vol. 112, no. 3, pp. 1555–1614, 2012.

Y. Huang, J. Wu, M. Huang, J. Lin, and Y. Huang, “Influence of surfactants on the morphology and photocatalytic activity of Bi₂WO₆ by hydrothermal synthesis,” Science China Chemistry, vol. 54, no. 1, pp. 211–216, 2011.

W. Yin, W. Wang, and S. Sun, “Photocatalytic degradation of phenol over cage-like Bi₂MoO₆ hollow spheres under visible-light irradiation,” Catalysis Communications, vol. 11, no. 7, pp. 647–650, 2010.

D. Saha, G. Madras, and T. N. Guru Row, “Solution combustion synthesis of γ(L)-Bi2MoO₆ and photocatalytic activity under solar radiation,” Materials Research Bulletin, vol. 46, no. 8, pp. 1252–1256, 2011.

L. Zhou, W. Wang, and L. Zhang, “Ultrasonic-assisted synthesis of visible-light-induced Bi₂MO₆ (M = W, Mo) photocatalysts,” Journal of Molecular Catalysis A, vol. 268, no. 1-2, pp. 195–200, 2007.

C. Belver, C. Adán, and M. Fernández-García, “Photocatalytic behaviour of Bi₂MO₆ polymetalates for rhodamine B degradation,” Catalysis Today, vol. 143, no. 3-4, pp. 274–281, 2009.

A. Martínez-de la Cruz and S. Obregón Alfaro, “Synthesis and characterization of γ-Bi₂MoO₆ prepared by co-precipitation: photoassisted degradation of organic dyes under vis-irradiation,” Journal of Molecular Catalysis A, vol. 320, no. 1-2, pp. 85–91, 2010.

L. Zhang, T. Xu, X. Zhao, and Y. Zhu, “Controllable synthesis of Bi₂MoO₆ and effect of morphology and variation in local structure on photocatalytic activities,” Applied Catalysis B, vol. 98, no. 3-4, pp. 138–146, 2010.

H. Li, K. Li, and H. Wang, “Hydrothermal synthesis and photocatalytic properties of bismuth molybdate materials,” Materials Chemistry and Physics, vol. 116, no. 1, pp. 134–142, 2009.

X. Lin, H. Li, L. Yu et al., “Efficient removal rhodamine B over hydrothermally synthesized fishbone like BiVO₄,” Materials Research Bulletin, vol. 48, no. 10, pp. 4424–4429, 2013.

L. Zhang, H. Wang, Z. Chen, P. K. Wong, and J. Liu, “Bi₂WO₆ micro/nano-structures: synthesis, modifications and visible-light-driven photocatalytic applications,” Applied Catalysis B, vol. 106, no. 1-2, pp. 1–13, 2011.

T. Yang, D. Xia, G. Chen, and Y. Chen, “Influence of the surfactant and temperature on the morphology and physico-chemical properties of hydrothermally synthesized composite oxide BiVO₄,” Materials Chemistry and Physics, vol. 114, no. 1, pp. 69–72, 2009.

X. Zhao, T. Xu, W. Yao, and Y. Zhu, “Photodegradation of dye pollutants catalyzed by γ-Bi₂MoO₆ nanoplate under visible light irradiation,” Applied Surface Science, vol. 255, no. 18, pp. 8036–8040, 2009.

L. Zhang, W. Wang, L. Zhou, and H. Xu, “Bi₂WO₆ nano- and microstructures: shape control and associated visible-light-driven photocatalytic activities,” Small, vol. 3, no. 9, pp. 1618–1625, 2007.

C. Zhang and Y. Zhu, “Synthesis of square Bi₂WO₆ nanoplates as high-activity visible-light-driven photocatalysts,” Chemistry of Materials, vol. 17, no. 13, pp. 3537–3545, 2005.