Journal of Chemistry
Volume 2015 (2015), Article ID 752089, 5 pages
http://dx.doi.org/10.1155/2015/752089

Research Article

The Optical Properties of Crystalline Zn₃Nb₂O₈ Nanomaterials Obtained by Hydrothermal Method

Mihaela Birdeanu,1,2 Mirela Vaida,¹ and Eugenia Fagadar-Cosma³

¹Politehnica University of Timisoara, Vasile Parvan Avenue 6, 300223 Timisoara, Romania
²National Institute for Research and Development in Electrochemistry and Condensed Matter, 1 Plautius Andronescu Street, 300224 Timisoara, Romania
³Institute of Chemistry Timisoara of Romanian Academy, 24 M. Viteazu Avenue, 300223 Timisoara, Romania

Received 28 September 2015; Accepted 17 December 2015

Academic Editor: Jean-Marie Nedelec

Copyright © 2015 Mihaela Birdeanu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The present study is focused on the obtaining of the Zn₃Nb₂O8 nanomaterial using the hydrothermal method and its characterization through different techniques. X-ray diffraction at room temperature revealed that a novel crystalline form of the nanomaterial forms at 1100°C belonging to monoclinic space group C2/c. Field-emission scanning electron microscopy evidenced the columnar morphology of the particle’s agglomeration and the high resolution electron transmission microscopy confirms the measured interplanar distances calculated from the X-ray diffraction experiments. Using the UV-VIS spectrum and Kubelka-Munk equations, the absorbance and the band gap for the Zn₃Nb₂O8 nanomaterial were calculated. PL spectrum reveals a single peak at 465 nm corresponding to the blue color fluorescence. The novel crystalline nanomaterial might find applications in fluorescence covering of technical devices, due to its capacity to preserve blue fluorescence both in acrylic based paint and after embedding in isopropyl alcohol.

1. Introduction

Considerable attention was gained in the latest years by the light-emitting materials and the lighting technology and the researches were focused to produce low cost inorganic, organic, or hybrid materials capable of exhibiting fluorescence in different colors [1–5].

Zn₃Nb₂O₈ has been reported as being an excellent dielectric [6–8] and a good microwave material due to its high quality factor [9, 10] and it can be used for applications in the high frequency domains [6–8]. Its demanded properties consist of resonance frequency in narrow temperature range [6], a high dielectric quality factor [11], and high dielectric constant [6]. The dielectric properties strongly depend on the microstructure organization and of the chemical composition of the material. The density and the particle sizes of the materials should be taken into account in order to obtain the maximum of the dielectric properties [10].

Zn₃Nb₂O₈ represents one of the three phases of the ZnO-N₂O₅ system beside ZnN₂O₆ and Zn₂Nb₃₄O₈₇ [6, 7, 12, 13]. The reported literature methods for obtaining Zn₃Nb₂O₈ refer only to solid state mixed oxide method [6, 10, 14–17] using as precursors ZnO and N₂O₅ and the coprecipitation method performed simultaneously with Eu³⁺/Dy³⁺ doping [18]. This pseudobinary oxide was also obtained as a secondary phase of the ZnO phase (when trying to obtain ZnO ceramics doped with Nb) and affected the thermoelectric properties of the material (increasing the electrical conductivity and decreasing the Seebeck coefficient) [1].

The main aim of this paper is to present the results regarding the obtaining of the Zn₃Nb₂O₈ nanomaterial using the hydrothermal method that allows for the first time generating crystalline self-assembled columnar nanomaterials. The structural and optical properties of the nanomaterial were investigated through different techniques and its blue fluorescence was demonstrated to be preserved both in isopropyl alcohol and in acrylic based paint, starting the possibilities of novel applications in fluorescence coatings.

2. Experimental

The Zn₃Nb₂O₈ nanomaterial was obtained by the hydrothermal method. The starting materials used during the synthesis of Zn₃Nb₂O8 were as follows: niobium (V) oxide, Nb₂O₅ (99%, Merck), and zinc oxide, ZnO (99%, Merck), in a molar ratio of 1 : 3. The pH of the obtained mixture was adjusted by using sodium hydroxide (NaOH) solution of 10 M concentration. The pH value for the synthesis was fixed at 9. The resulting suspension was transferred into a Teflon-lined stainless steel autoclave and then was introduced in an oven at 240°C for 24 h. The filling degree of the used autoclave was set at 80%. The resulting white precipitate was filtrated and then washed six times with distilled water and, finally, washed for four times with ethylic alcohol. In the next stage, the precipitate was dried in the oven at 100°C for 4 h.

The characterizations using the room temperature and 1100°C have been performed on well-crystallized powder samples of Zn₃Nb₂O₈. The phase identification of the synthesized powders was performed using X-ray diffraction (XRD) with monochromatic Cu Kα (λ = 1.5418 ) incident radiation on an X’pert Pro MPD X-ray diffractometer equipped with the X’celerator detector and a high temperature attachment HTK 2000 MSW chamber. Diffraction data were obtained for the angular range 2θ = 10–80° using a 0.02° step and the counting time was 5 s. After identifying the phases, the mixture of oxides was afterwards thermally treated at 1100°C for 6 h soaking time. The heating and cooling rate of the heated furnace was set at 5°C/min.

The morphology and the particle’s dimension of the sample were investigated by field-emission-scanning electron microscopy (SEM) (Model INSPECT S) and transmission electron microscopy with high resolution transmission microscope (HRTEM) (TITAN G2 80–200). The band gap of the Zn₃Nb₂O₈ materials was calculated by recording the diffuse reflectance spectrum at room temperature, using a UV-VIS-NIR spectrometer Lambda 950. The PL spectra were recorded with an Edinburgh Instruments FLS980 luminescence spectrometer, by using a special holder for powder solid samples.

Besides all these investigations, the Zn₃Nb₂O₈ nanomaterial was embedded in an acrylic based paint and also in isopropyl alcohol in order to prove its blue fluorescence. The suspensions were allowed to dry in air and were then illuminated with an UV light lamp (,  nm).

3. Results and Discussion

3.1. Structural Characterization

The XRD patterns of Zn₃Nb₂O₈ (Figure 1) revealed that the novel crystalline phase of the nanomaterial starts forming around 800°C and the maximum of this phase is set around 1100°C. The spectra were compared and indexed with the 01-079-1164 JCPDS. Zn₃Nb₂O8 is monoclinic with the space group C2/c (space group number 15), with the following lattice parameters:  Å,  Å,  Å, and ° and the interplanar distance  Å. The mean crystallite size of the Zn₃Nb₂O8 was calculated using Scherrer’s formula [19]. The average crystallite size determined from XRD line broadening was found to be 32 nm.

Figure 1: XRD patterns of Zn₃Nb₂O₈. A magnified zone of the XRD patterns containing the most intense peak was inserted.

In the XRD spectrum, the most intense peak appears at 2θ = 31.25° (-511). In the right upper corner of Figure 1 is presented the magnified image of the most intense peak of the XRD pattern.

3.2. Morphological Characterization

In Figure 2(a), the morphology of the Zn₃Nb₂O8 material can be observed. The agglomerates formed by the Zn₃Nb₂O₈ nanomaterial particles are crystallizing as multifacet columns which is a novelty.

(a)

(b)

Figure 2: The morphology of Zn₃Nb₂O₈: (a) SEM micrographs; (b) HRTEM.

Using the high resolution electron transmission microscopy (HRTEM), in Figure 2(b), the forming of the crystallographic planes of the Zn₃Nb₂O8 nanomaterial can be observed. The crystalline plane with Miller indices (-511) indicates the perfect orientation of the lattice. The measured interplanar distance is about 2,68 Å and corresponds to the measurements determined by the X-ray diffraction.

3.3. Optical Properties

The optical absorption spectra (Figure 3) of the Zn₃Nb₂O8 nanomaterial were performed in the 240–480 nm range, at ambient conditions. The absorbance was calculated from the reflectance using Kubelka-Munk equation [20, 21]. From each of the absorption spectra, the versus was plotted (Figure 3, right upper corner), where denotes the absorption coefficient, “’’ is the scattering coefficient, and is the photon energy.

Figure 3: The absorption spectra of Zn₃Nb₂O₈. Plot of versus (energy) of Zn₃Nb₂O₈.

The band gap was calculated from Figure 3 (absorbance) and its value was found to be 4.3 eV for Zn₃Nb₂O₈.

The PL spectra recorded in the 220–700 nm range for Zn₃Nb₂O₈ are presented in Figure 4. The PL spectra show only a single peak at 465 nm for Zn₃Nb₂O₈ which is corresponding to the blue color fluorescence.

Figure 4: The room temperature PL spectra (excitation at 284 nm and emission at 465 nm) of the synthesized nanomaterial Zn₃Nb₂O₈.

To point out the blue emitting color of the Zn₃Nb₂O₈, in relation to our further interest to exploit this property, a sample of the nanomaterial was embedded in an acrylic based paint and another sample was embedded in isopropyl alcohol. After drying, these two samples were exposed to a UV light lamp (λ = 254 nm). In Figure 5 are presented the images for these two samples that both preserved the initial blue fluorescence of the nanomaterial.

(a)

(b)

Figure 5: Zn₃Nb₂O₈ in (a) acrylic based paint and (b) isopropyl alcohol.

4. Conclusions

In this paper are presented the results regarding the obtaining of the Zn₃Nb₂O₈ using the hydrothermal method, in a novel crystalline phase (multifacet columnar crystals) and the characterization of the nanomaterial. The powder structure was established by XRD diffraction at room temperature which revealed the forming of the novel structured material at 1100°C.

Field-emission scanning electron microscopy evidenced the columnar morphology of the particle’s agglomeration. High resolution electron transmission microscopy confirms the measured interplanar distances calculated from the XRD. Using the UV-VIS spectra and Kubelka-Munk equations, the absorbance and the band gap for the Zn₃Nb₂O8 nanomaterial were calculated. PL spectra revealed a single peak at 465 nm corresponding to the blue color fluorescence that is preserved also in acrylic based paint and after embedding in isopropyl alcohol.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This paper is partially supported by the Sectoral Operational Programme Human Resources Development (SOP HRD), financed from the European Social Fund and by the Romanian Government under Project no. POSDRU/159/1.5/S/134378. This work was partially supported by the strategic Grant POSDRU/159/1.5/S/137070 (2014) of the Ministry of National Education, Romania, cofinanced by the European Social Fund-Investing in People, within the Sectoral Operational Programme Human Resources Development 2007–2013. Author Eugenia Fagadar-Cosma is acknowledging Romanian Academy for financial support in the frame of Programme 3 of ICT-AR.

References

K. Shijina, U. Megha, and G. Varghese, “Ultraviolet multi-peak emissions of mono-dispersed polymer capped ZnNiO nanocomposites,” Journal of Luminescence, vol. 145, pp. 219–223, 2014.

M. Vasilopoulou, D. G. Georgiadou, A. Soultat et al., “Solution processed multi-color organic light emitting diodes for application in telecommunications,” Microelectronic Engineering, vol. 145, pp. 21–28, 2015.

W. K. Tan, G. Kawamura, H. Muto, K. A. Razak, Z. Lockman, and A. Matsuda, “Blue-emitting photo luminescence of rod-like and needle-like ZnO nanostructures formed by hot-water treatment of sol-gel derived coatings,” Journal of Luminescence, vol. 158, pp. 44–49, 2015.

E. Schab-Balcerzak, M. Siwy, M. Filapek et al., “New core-substituted with electron-donating group 1,8-naphthalimides towards optoelectronic applications,” Journal of Luminescence, vol. 166, pp. 22–39, 2015.

S. J. Cha, N. S. Han, J. K. Song, S. R. Park, Y. M. Jeon, and M. C. Suh, “Efficient deep blue fluorescent emitter showing high external quantum efficiency,” Dyes and Pigments, vol. 120, pp. 200–207, 2015.

Y.-C. Liou, H.-M. Chen, and W.-C. Tsai, “Synthesis of Zn₃Nb₂O₈ ceramics using a simple and effective process,” Ceramics International, vol. 35, no. 6, pp. 2135–2138, 2009.

W.-R. Yang, C.-C. Pan, and C.-L. Huang, “Influence of Mg substitutions for Zn on the phase relation and microwave dielectric properties of (Zn1-xMgx)₃Nb₂O₈ (x = 0.02–1.0) system,” Journal of Alloys and Compounds, vol. 581, pp. 257–262, 2013.

Y.-C. Huang, M.-C. Wu, T.-H. Chang, J.-F. Kiang, and W.-F. Su, “Broadband DR antenna made of high-Q ceramic,” Journal of the European Ceramic Society, vol. 27, no. 8-9, pp. 2841–2844, 2007.

M.-C. Wu, Y.-C. Huang, and W.-F. Su, “Silver cofirability differences between Bi1.5Zn0.92Nb1.5O6.92 and Zn₃Nb₂O₈,” Journal of the European Ceramic Society, vol. 27, no. 8-9, pp. 3017–3021, 2007.

P. Amonpattaratkit, A. Ngamjarurojana, and S. Ananta, “Microstructure and dielectric properties of Zn₃Nb₂O₈ ceramics prepared by a two-stage sintering method,” Ceramics International, vol. 39, no. 1, pp. S331–S334, 2013.

D. W. Kim, J. H. Kim, J. R. Kim, and K. S. Hong, “Phase constitutions and microwave dielectric properties of Zn₃Nb₂O₈–TiO₂,” Japanese Journal of Applied Physics, vol. 40, pp. 5994–5998, 2001.

A. J. Pollard, “Note on the system niobium oxide-zinc oxide,” Journal of the American Ceramic Society, vol. 44, no. 12, p. 630, 1961.

R. R. Dayal, “The binary system ZnO–Nb₂O₅,” Journal of the Less Common Metals, vol. 26, no. 3, pp. 381–390, 1972.

A. Prasatkhetragarn, R. Yimnirun, and S. Ananta, “Effect of calcination conditions on phase formation and particle size of Zn₃Nb₂O₈ powders synthesized by solid-state reaction,” Materials Letters, vol. 61, no. 18, pp. 3873–3877, 2007.

A. Prasatkhetragarn, P. Ketsuwan, S. Ananta, and R. Yimnirun, “Effects of vibro-milling time on phase formation and particle size of Zn₃Nb₂O₈ nanopowders,” Materials Letters, vol. 64, no. 9, pp. 1113–1116, 2010.

M.-C. Wu, K.-T. Huang, and W.-F. Su, “Microwave dielectric properties of doped Zn₃Nb₂O₈ ceramics sintered below 950 °C and their compatibility with silver electrode,” Materials Chemistry and Physics, vol. 98, no. 2-3, pp. 406–409, 2006.

M. Birdeanu, I. Sebarchievici, A. V. Birdeanu, B. Taranu, F. Peter, and E. Fagadar-Cosma, “Synthesis, characterization and potential application of Zn₃(Ta1−xNbx)₂O₈ oxides,” Digest Journal of Nanomaterials and Biostructures, vol. 10, pp. 543–555, 2015.

X. Xiao and B. Yan, “Chemical co-precipitation synthesis and photoluminescence of Eu³⁺ or Dy³⁺ doped Zn₃Nb₂O₈ microcrystalline phosphors from hybrid precursors,” Materials Science and Engineering: B, vol. 136, no. 2-3, pp. 154–158, 2007.

T. Minami, H. Sato, K. Ohashi, T. Tomofuji, and S. Takata, “Conduction mechanism of highly conductive and transparent zinc oxide thin films prepared by magnetron sputtering,” Journal of Crystal Growth, vol. 117, no. 1–4, pp. 370–374, 1992.

P. Kubelka and F. Munk, “Ein Beitrag zur Optik der Farban-striche,” Zhurnal Tekhnicheskoy Fiziki, vol. 12, pp. 593–607, 1931.

P. Kubelka, “New contributions to the optics of intensely light-scattering materials,” Journal of the Optical Society of America, vol. 38, no. 5, pp. 448–457, 1948.