Journal of Chemistry
Volume 2015 (2015), Article ID 932819, 7 pages
http://dx.doi.org/10.1155/2015/932819

Research Article

Phase Behavior and Heat Capacity of {DPnP + Water} Mixtures at the Temperature Range of 273.15–338.15 K

Mariola Tkaczyk, Henryk Piekarski, and Paweł Góralski

Department of Physical Chemistry, Faculty of Chemistry, University of Łódź, Pomorska 165, 90-236 Łódź, Poland

Received 9 December 2014; Accepted 16 February 2015

Academic Editor: Eri Yoshida

Copyright © 2015 Mariola Tkaczyk et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The differential scanning calorimetry method (DSC) was used to examine the miscibility in the dipropylene glycol propyl ether (DPnP) + water system. Based on recorded curves of differential heat flow on temperature, HF , the range (composition, temperature) of the occurrence of miscibility gap, the values of lower critical solution temperature (LCST), and critical concentration were determined. On the basis of the experimentally determined specific heat capacity data the partial molar heat capacities () of DPnP in the mixtures with water were calculated. Analyzing changes in the course of function, the boundary of transition from a homogeneous solution was determined, in which the monomers of amphiphile dominate, to the region, in which aggregates of the cluster type appear.

1. Introduction

Monoalkyl ethers of polyoxyalkylene glycols with general formula CnH2n+1[OR]mOH (where n is number of carbon atoms in hydrocarbon chain of hydrophobic tail and m is number of oxyethylene or oxypropylene groups in hydrophilic head) consist a group of nonionic surfactants that exhibit growing importance during the last decades. The generally accepted abbreviations for these amphiphiles are C nE m and C nP m, respectively. On account of their specific properties, these compounds have found a wide use in many fields of life. They were also the subject of numerous experimental investigations. Our previous studies [1] devoted to the derivatives of polyoxyethylene glycols have shown that their molecules in aqueous solution undergo aggregation. Depending on the concentration, temperature, and the alkyl chain length in the nonpolar tail of C nE m, these compounds show different susceptibility to miscibility with water and different values of LCST (lower critical solution temperature) [2–5]. In the 80s of the 20th century, the first reports on the high toxicity of polyoxyethylene amphiphiles (C nE m) were published. From these reports it followed that the substance tested, used first of all as solvents, exerted an adverse effect on the health and life of men and animals. It has been found that the metabolism process of amphiphiles C nE m results in the formation of aldehyde and alkoxyacetic acid that can penetrate the cell nucleus causing changes in the genome structure. Therefore C nE m have been included in the list of chemically hazardous substances and up to the end of the 20th century they have been largely replaced with the derivatives of polyoxypropylene glycols (C nP m), called Dowanol. These are safer for health as their metabolism results in the formation of carbon dioxide that is expelled by lungs. Compared to the polyoxyethylene glycol ethers, these compounds are characterized by a lower inflammability and explosion capability. Owing to the fact that they show a low surface tension and have a great capability to solve hydrophilic and lipophilic compounds, polyoxypropylene glycol ethers are used in various branches of industry such as chemical, cosmetic, pharmaceutical, food, or textile industry. However, despite the growing application importance of Dowanol, there is a lack of fundamental experimental data concerning their thermochemical properties. The amount of experimental data describing phase equilibria in aqueous solutions of the group of C nP m compounds is also limited [6–10]. The above reasons influenced us to undertake the studies of these compounds. The aim of this study is to use differential scanning calorimetry (DSC) to obtain information about the miscibility of dipropylene glycol propyl ether (C₃P₂ or DPnP) in aqueous solution. The molecules of polyoxyalkylene glycol ethers undergo association in aqueous solutions, which can result in microimmiscibility of system [1, 11–14]. Both of this phenomenon and phase separation in the system, that is, the determination of the range (temperature/composition) of the occurrence of the system miscibility {DPnP + water}, constitute the object of these studies.

2. Experiment

2.1. Materials

Dipropylene glycol propyl ether, C₃H₇[OCH₂CH(CH₃)]₂OH, was an Aldrich product with declared purity better than 98.5%. Prior to use the substance was purified by fractional distillation (boiling point: 349.15 K at 8 mmHg) and dried with moleculer sieves type 4 Å (from Lancaster) activated in vacuum at 570 K for 48 h. Deionized water was triply distilled in an argon atmosphere and degassed. The purity of water was checked by conductometry; the specific conductivity was less than 2·10⁻⁶ S cm⁻¹ at 298.15 K. All solutions were prepared by weight with an accuracy of 2·10−5 g.

2.2. Measurements

The specific heat capacities under a constant pressure of {DPnP + water} mixtures were measured by means of a high sensitivity differential scanning calorimeter, based on Tian-Calvet’s idea (type Micro DSC III, Setaram, France). The so-called “continuous with reference” method was used. The heat flow during sample heating with a scanning rate of 0.35 K min⁻¹ from 273.15 K to 338.15 K was recorded. The specific heat capacity of the mixtures was measured with the use of the “batch” type cell with a volume of about 1 cm³. The details of apparatus and measuring procedure are described elsewhere [15]. The uncertainty of specific heat capacity measurement amounts to about ±0. 2%, excluding the effects of the sample impurities. In order to provide homogeneity at lower temperature than LCST, the solutions were cooled to a temperature about 278 K and placed into a cooled measurement cell and then transferred to a calorimetric block at a temperature of 273.15 K.

To determine the critical miscibility temperature, DSC measurements were performed at a scanning rate of R = 0.1 K·min⁻¹. No influence of changes in the scanning rate (within 0.1–0.5 K·min⁻¹) on the phase separation temperature was found.

3. Results and Discussion

3.1. Miscibility Gap in {DPnP + Water} System

The examined dipropylene glycol propyl ether forms with water a system exhibiting miscibility gap with LCST. For this reason, at a specified temperature and composition of solution, the phase separation phenomenon occurs. It leads to the appearance of two immiscible phases: water-rich and organic solvent-rich ones. To prepare a phase diagram by DSC method, the differential heat flow (HF) versus temperature was recorded during heating the sample within temperature range of 273.15–338.15 K with a scanning rate of 0.1 K min⁻¹. The studied mixtures contained from about 5 to about 85 mass% DPnP. The trace of typical curve recorded during sample heating is shown in Figure 1.

Figure 1: A DSC trace of aqueous DPnP (the weight fraction of amphiphile ).

The heat flow of sample at the temperature, at which the phase separation occurs, suddenly decreases, which is connected with the appearance of endothermic heat effect and a jump-vise increase in the heat capacity of the two-phase system in relation to the one-phase system at the same temperature. The temperature of phase separation was determined as the so-called onset point. The onset point is an intersection point of tangent drawn where the curve has the highest slop and the extrapolated baseline. Figure 1 shows an example of the HF = f(T) dependence for the solution, in which the mass fraction of amphiphile ≈ 0.156. The determined temperature of extrapolated peak beginning amounts to 301.85 K.

For each of the {DPnP + water} mixtures showing a limited miscibility within the investigated temperature range, the transition temperature between the single-phase and two-phase solution was determined. The results obtained are listed in Table 1.

Table 1: Equilibrium temperature for {DPnP (, ) + water} system.

/K
/°C

0.00616
0.05687
336.44
63.29

0.00771
0.07061
327.01
53.86

0.00983
0.08849
318.76
45.61

0.01202
0.10635
312.82
39.67

0.01635
0.13988
304.95
31.80

0.01856
0.15613
301.85
28.70

0.02194
0.17998
298.22
25.07

0.02488
0.19973
295.80
22.65

0.02753
0.21690
294.01
20.86

0.03170
0.24259
291.82
18.67

0.03487
0.26117
290.81
17.66

0.03857
0.28185
289.01
15.86

0.04206
0.30046
288.06
14.91

0.04847
0.33258
287.52
14.37

0.05164
0.34751
287.47
14.32

0.05223
0.35029
287.46
14.31

0.05960
0.38274
287.20
14.05

0.06369
0.39960
287.00
13.85

0.06550
0.40672
287.11
13.96

0.06879
0.41952
287.08
13.93

0.07350
0.43699
287.05
13.90

0.07702
0.44941
287.04
13.89

0.07968
0.45860
287.04
13.89

0.08255
0.46812
287.03
13.88

0.08816
0.48603
287.05
13.90

0.09052
0.49336
287.06
13.91

0.09802
0.51531
287.08
13.93

0.10465
0.53400
287.13
13.98

0.11270
0.55411
287.18
14.03

0.11683
0.56404
287.25
14.10

0.12729
0.58797
287.32
14.17

0.14086
0.61599
287.50
14.35

0.18408
0.68821
289.26
16.11

0.21477
0.72796
292.01
18.86

0.25124
0.76651
295.47
22.32

0.28907
0.79912
300.58
27.43

0.34407
0.83692
311.96
38.81

0.38360
0.85893
327.28
54.13

, : mole fraction and mass fraction of DPnP in solution, respectively.

The phase diagram drawn on the basis of the experimental data is presented in Figure 2.

Figure 2: Coexistence curve for {DPnP + water} mixtures.

The determined value of LCST for {DPnP + water} system amounts to 287.03 K for a solution with the critical mass fraction w c = 0.468. It is worth mentioning here that the DSC method used in this work, compared to phase equilibrium methods, allows relatively quick, precise, and little labor-consuming determination of these values. Additionally, its use makes it possible to determine the course of function for compositions close to w c, for which, for example, the phase volume method is insufficiently effective.

The data obtained by us are well consistent with appropriate literature data obtained by other methods. Investigating the clouding phenomenon of aqueous mixtures of DPnP by turbidity methods, Bauduin et al. [9] obtained the values of LCST amounting to 286.95 K. Estimated from the function presented in their paper, the critical mass fraction amounts to w c = . Recently Lin et al. [10], using the phase volume method, determined the value of LCST as 286.59 K and w c = 0.486. Also the value of DPnP solubility in water at 298.15 K (17.1 mass %) reported by Bauduin et al. [9] is similar to that obtained by us (18.0 mass %). The presented above literature data concerning miscibility in the system {DPnP + water} are also given in the diagram (Figure 2).

In the group of simple polypropylene glycol monoethers, the extension of molecule by an additional oxypropylene group causes a decrease in the molecule hydrophilicity. This causes a decrease in the value of LCST widening the concentration range of miscibility gap [9]. Therefore the highest value of LCST is shown by propylene glycol propyl ether (305.05 K) for dipropylene glycol propyl ether LCST = 286.95 K, and for tripropylene glycol propyl ether this value only amounts to 278.55 K.

3.2. Specific Heat Capacity () of {DPnP + Water} System

Heat capacity under a constant pressure is one of the basic thermodynamic quantities used among others in chemical engineering. The analysis of its changes caused by temperature and the solution composition gives many valuable pieces of information about structural changes occurring in aqueous solutions.

The character of the experimental curve obtained depends on the mixture composition, similarly as it was observed in the systems examined by us earlier. A typical course of this dependence for the completely miscible solution and solution with miscibility gap is presented in Figure 3.

(a) Mixture with miscibility gap ()

(b) Homogenous solution ()

(c) Homogenous solution ()

Figure 3: Specific heat capacity of some aqueous solutions of DPnP.

The specific heat capacities of mixtures determined within the examined temperature range (only for one-phase systems) are described by the polynomial:

where is specific heat capacity of solution at temperature ; are constants.

The selection of the polynomial degree depends of the shape of the experimental curve obtained for the mixture with a defined composition. The interpolated values of specific heat capacity at ten selected temperatures are given in Table 2 (no data, miscibility gap). A typical course of the dependence within the whole examined composition range at 283.15 K is shown in Figure 4.

Table 2: Specific heat capacity () of {DPnP (, ) + water} system from 273.15 to 338.15 K.

Specific heat capacity /J·g⁻¹·K⁻¹

273.15
278.15
283.15
288.15
293.15
298.15
308.15
318.15
328.15
338.15

0
0
4.2174
4.2048
4.1956
4.1891
4.1849
4.1823
4.1807
4.1822
4.1854
4.1899

0.00052
0.02902
4.2187
4.2057
4.1965
4.1899
4.1858
4.1834
4.1820
4.1831
4.1859
4.1903

0.00074
0.04081
4.2193
4.2067
4.1976
4.1914
4.1873
4.1848
4.1827
4.1831
4.1855
4.1906

0.00122
0.06798
4.2204
4.2080
4.1986
4.1910
4.1872
4.1850
4.1836
4.1846
4.1872
4.1915

0.00139
0.07716
4.2207
4.2083
4.1992
4.1945
4.1904
4.1879
4.1863
4.1876
4.1904
4.1942

0.00176
0.09797
4.2210
4.2088
4.1999
4.1937
4.1895
4.1871
4.1855
4.1867
4.1894
4.1933

0.00195
0.10845
4.2216
4.2094
4.2003
4.1915
4.1875
4.1851
4.1835
4.1844
4.1871
4.1918

0.00295
0.16412
4.2231
4.2107
4.2017
4.1956
4.1915
4.1891
4.1875
4.1887
4.1916
4.1963

0.00322
0.17943
4.2235
4.2116
4.2030
4.1969
4.1927
4.1901
4.1880
4.1885
4.1908
4.1951

0.00485
0.27073
4.2253
4.2145
4.2067
4.2011
4.1973
4.1949
4.1929
4.1933
4.1954
4.1993

0.00613
0.34210
4.2257
4.2156
4.2083
4.2032
4.1998
4.1975
4.1953
4.1950
4.1964
4.2004

0.00983
0.55882
4.2258
4.2197
4.2148
4.2112
4.2085
4.2067
4.2054
4.2061

0.01202
0.67520
4.2230
4.2199
4.2172
4.2152
4.2140
4.2134
4.2140

0.01635
0.92269
4.2192
4.2232
4.2265
4.2289
4.2309
4.2345

0.01856
1.0497
4.2186
4.2297
4.2359
4.2415
4.2486
4.2571

0.02194
1.2453
4.2160
4.2334
4.2464
4.2585
4.2737

0.02488
1.4161
4.2154
4.2404
4.2594
4.2776
4.3019

0.02753
1.5715
4.2169
4.2482
4.2725
4.2964
4.3270

0.03170
1.8173
4.2179
4.2534
4.2808
4.3073
4.3403

0.03487
2.0056
4.2158
4.2538
4.2817
4.3083

0.03857
2.2268
4.2022
4.2391
4.2646
4.2971

0.04206
2.4370
4.1586
4.1958
4.2219
*

0.04847
2.8273
4.0540
4.0911
4.1184

0.05142
3.0090
3.9930
4.0280
4.0620

0.05960
3.5180
3.8710
3.9090
3.9370

0.06369
3.7762
3.8220
3.8630
3.8900

0.06879
4.1005
3.7741
3.8128
3.8431

0.07350
4.4038
3.7280
3.7660
3.7975

0.07968
4.8060
3.6753
3.7127
3.7467

0.08686
5.2800
3.5987
3.6357
3.6690

0.09052
5.5250
3.5639
3.6013
3.6350

0.09802
6.0320
3.4971
3.5350
3.5690

0.10465
6.4878
3.4465
3.4845
3.5195

0.11270
7.0507
3.3836
3.4209
3.4558

0.12729
8.0964
3.2842
3.3207
3.3547

0.14086
9.1014
3.2003
3.2370
3.2722

0.18408
12.524
2.9773
3.0161
3.0548
3.0971

0.21477
15.183
2.8575
2.8942
2.9290
2.9627

0.25124
18.626
2.7403
2.7748
2.8073
2.8382
2.8682

0.28907
22.571
2.6503
2.6835
2.7148
2.7446
2.7729
2.8000

0.34407
29.117
2.5505
2.5817
2.6117
2.6406
2.6686
2.6956
2.7471

0.38360
34.545
2.4816
2.5118
2.5410
2.5691
2.5964
2.6228
2.6737
2.7224

0.47428
50.077
2.3883
2.4162
2.4435
2.4703
2.4966
2.5224
2.5724
2.6202
2.6660
2.7097

0.58375
77.845
2.2973
2.3229
2.3481
2.3728
2.3971
2.4210
2.4674
2.5120
2.5548
2.5959

0.66293
109.17
2.2560
2.2803
2.3041
2.3275
2.3505
2.3732
2.4171
2.4595
2.5002
2.5393

0.83504
280.99
2.1703
2.1910
2.2115
2.2316
2.2515
2.2711
2.3095
2.3468
2.3830
2.4181

iscibility gap.

, : mole fraction of DPnP and molality of solution, respectively.

Figure 4: Specific heat capacity of {DPnP + water} mixtures versus mole fraction of DPnP at 283.15 K.

The curves for a wide range of the solution composition were obtained only within the 273.15 to 283.15 K temperature range due to the occurrence of miscibility gap at about 287 K. These curves have similar shape characterized by a maximum in the water-rich range and sharp decrease of the function beyond the maximum. The negative slope of becomes smaller along with the increase of the amphiphile content. The dependence of the specific heat capacity on the investigated composition for low concentrations of amphiphile at several temperatures is shown in Figure 5.

Figure 5: Specific heat capacity of the {DPnP () + water} at selected temperatures.

The increase in temperature makes the maximum of the function higher. No change in the position of this extremum with temperature was observed probably due to the relatively narrow temperature range available for these measurements. Our previous studies [1] concerning ether derivatives of polyoxyethylene glycols show that a change in the position of the maximum mentioned above can be observed only for a wider examined temperature range. The occurrence of the maximum of function is probably connected with structural changes occurring in solution due to a change in its composition and temperature, especially with the formation of greater aggregates or micelles [1].

3.3. Partial Molar Heat Capacity of {DPnP + Water} System

A sensitive indicator of structural changes in the system is the behavior of the third derivative of Gibbs free enthalpy in relation to composition, pressure, and/or temperature. Particularly the observation of changes in the partial molar heat capacity of solute () that is the third derivative of Gibbs energy in relation to composition and temperature

makes it possible to observe changes occurring in the mixture.

The appearance of extrema in the curves of describing the aqueous solutions of amphiphile can indicate the existence of association processes that result in the formation of molecular aggregates with higher thermodynamic stability in solution.

The studies on aqueous solutions of polyoxyethylene glycol ethers have shown that in this type of systems the function exhibits the maximum in the water-rich region [1]. It is a symptom of the formation of molecular aggregates leading to the appearance of microheterogeneity in the system. Analyzing the position of the maximum (composition, temperature) in micellar solution, this makes it possible to determine a boundary between the area where monomers dominate and the region connected with the appearance of aggregates, for example, micellar or pseudomicellar aggregates. Previous studies concerning the aqueous solutions of C nE m [1] indicated that the values of critical micelle concentration (CMC) derived from various experimental methods are well located at the borderline obtained by the analysis of the function under discussion. It means that the above conclusion in relation to ether derivatives of polyoxyethylene glycols has found its confirmation in the results obtained by other methods.

On the basis of the specific heat capacity data determined experimentally, the apparent () and partial molar heat capacities () of DPnP in the mixtures with water were calculated according to the following formulas:

where  (g mol⁻¹) is the DPnP molecular mass;  (mol kg⁻¹) is the molality; and (J g⁻¹ K⁻¹) are the specific heat capacity of solution and pure water, respectively.

The dependence of the partial molar heat capacity of DPnP in aqueous solutions up to x ₂ = 0.5 at 273.15 K and within the range of diluted mixtures at 273.15–293.15 K is shown in Figure 6.

Figure 6: Partial molar heat capacity of DPnP in the aqueous solution: (a) up to at 273.15 K and (b) up to at 273.15 K, 278.15 K, 283.15 K, 288.15 K, and 293.15 K.

As is seen, the addition of a small amount of Dowanol, DPnP (), to water causes a slight decrease in its partial molar heat capacity and then increases until the maximum is reached. Its intensity increases with increasing temperature. In the {DPnP + water} system, the light and neutron diffraction studies did not confirm the hypothesis about the existence of micelles in it [9]. A significant hindrance in the process of micellar aggregation can be the brunching of oxypropylene chain. Owing to its structure, the hydrophobic surface of oxypropylene group becomes smaller and simultaneously it constitutes an important hindrance in the H-bond interactions between ether oxygen atom and the hydrogen atoms of water molecules or the hydroxyl proton of other Dowanol molecules. Therefore, the presence of extrema in the course of function should be related to the aggregation of Dowanol molecules in water. However, as a result of this, micelles probably are not formed but rather aggregates of the cluster type are created, whose size and quantitative composition cannot be defined at the present time. Based on the course of function at the given temperature, we determined the composition of solution corresponding to its maximum. The compositions obtained are plotted in the graph shown in Figure 7.

Figure 7: The mixing scheme of {DPnP + water} system.

Summarizing, as the result of our studies, we obtained a phase diagram, in which one can observe the following:

(1)the boundary (composition, temperature) between one-phase and two-phase solutions;(2)the area of homogeneous solution where the amphiphile monomers dominate;(3)the region where one observes the greater aggregates (clusters), whose presence affects the change in the heat capacity of the system under investigation.

In order to determine the factors that influence the behavior of such systems further investigations on solutions containing Dowanol with different number of oxypropylene groups as well as different length of hydrocarbon chain are necessary. The appropriate studies are underway at the moment.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

H. Piekarski, M. Tkaczyk, and M. Tyczyńska, “Heat capacity and phase behavior of aqueous diethylene glycol n-pentyl ether by DSC,” Thermochimica Acta, vol. 550, pp. 19–26, 2012.

M. Corti, C. Minero, and V. Degiorgio, “Cloud point transition in nonionic micellar solutions,” Journal of Physical Chemistry, vol. 88, no. 2, pp. 309–317, 1984.

R. Strey, “I. experimental facts water-nonionic surfactant systems, the of effect of additives,” Berichte der Bunsengesellschaft für Physikalische Chemie, vol. 100, no. 3, pp. 182–189, 1996.

M. N. García-Lisbona, A. Galindo, G. Jackson, and A. N. Burgess, “An examination of the cloud curves of liquid-Liquid immiscibility in aqueous solutions of alkyl polyoxyethylene surfactants using the SAFT-HS approach with transferable parameters,” Journal of the American Chemical Society, vol. 120, no. 17, pp. 4191–4199, 1998.

H.-H. Lai and L.-J. Chen, “Liquid-liquid equilibrium phase diagram and density of three water + nonionic surfactant CiEj binary systems,” Journal of Chemical and Engineering Data, vol. 44, no. 2, pp. 251–253, 1999.

S. P. Christensen, F. A. Donate, T. C. Frank, R. J. LaTulip, and L. C. Wilson, “Mutual solubility and lower critical solution temperature for water + glycol ether systems,” Journal of Chemical and Engineering Data, vol. 50, no. 3, pp. 869–877, 2005.

R. R. Davison, W. H. Smith Jr., and D. W. Hood, “Mutual solubility of water and glycerol and glycol ethers,” Journal of Chemical and Engineering Data, vol. 11, no. 3, pp. 404–406, 1966.

P. Bauduin, L. Wattebled, D. Touraud, and W. Kunz, “Hofmeister ion effects on the phase diagrams of water-propylene glycol propyl ethers,” Zeitschrift fur Physikalische Chemie, vol. 218, no. 6, pp. 631–641, 2004.

P. Bauduin, L. Wattebled, S. Schrödle, D. Touraud, and W. Kunz, “Temperature dependence of industrial propylene glycol alkyl ether/water mixtures,” Journal of Molecular Liquids, vol. 115, no. 1, pp. 23–28, 2004.

S.-Y. Lin, C.-H. Su, and L.-J. Chen, “Liquid-liquid equilibria for the binary systems of propylene glycol ether + water measured by the phase volume method,” Journal of the Taiwan Institute of Chemical Engineers, vol. 45, no. 1, pp. 63–67, 2014.

G. Roux, G. Perron, and J. E. Desnoyers, “Model systems for hydrophobic interactions: volumes and heat capacities of n-alkoxyethanols in water,” Journal of Solution Chemistry, vol. 7, no. 9, pp. 639–654, 1978.

F. Quirion, L. J. Magid, and M. Drifford, “Aggregation and critical behavior of 2-butoxyethanol in water,” Langmuir, vol. 6, no. 1, pp. 244–249, 1990.

K. Tamura, T. Sonoda, and S. Murakami, “Thermodynamic properties of aqueous solution of 2-isopropoxyethanol at 25°C,” Journal of Solution Chemistry, vol. 28, no. 6, pp. 777–789, 1999.

U. Kaatze, K. Menzel, R. Pottel, and S. Schwerdtfeger, “Microheterogeneity of 2-butoxyethanol/water mixtures at room temperature. An ultrasonic relaxation study,” Zeitschrift für Physikalische Chemie, vol. 186, pp. 141–170, 1994.

P. Góralski, M. Tkaczyk, and M. Chora̧zewski, “Heat capacities of α,ω-dichloroalkanes at temperatures from 284.15 K to 353.15 K and a group additivity analysis,” Journal of Chemical and Engineering Data, vol. 48, no. 3, pp. 492–496, 2003.