Journal of Chemistry
Volume 2019 (2019), Article ID 3158572, 1 page
https://doi.org/10.1155/2019/3158572

Corrigendum

Corrigendum to “Biomass Modification Using Cationic Surfactant Cetyltrimethylammonium Bromide (CTAB) to Remove Palm-Based Cooking Oil”

Amira Satirawaty Mohamed Pauzan and Normala Ahad

Faculty of Resource Science and Technology, Universiti Malaysia Sarawak, 94300 Kota Samarahan, Sarawak, Malaysia

Correspondence should be addressed to Amira Satirawaty Mohamed Pauzan; mpasatirawaty@unimas.my

Received 10 February 2019; Accepted 19 February 2019; Published 24 March 2019

Copyright © 2019 Amira Satirawaty Mohamed Pauzan and Normala Ahad. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Biomass Modification Using Cationic Surfactant Cetyltrimethylammonium Bromide (CTAB) to Remove Palm-Based Cooking Oil” [1], the grant details were missing from the Acknowledgments section as follows:

“Thanks are extended to the Universiti Malaysia Sarawak for the funding and facilities provided.”

Thus, the Acknowledgments section should be updated as follows:

“This study was supported by the research grant from the Ministry of Higher Education, Malaysia, under the Research Acculturation Grant Scheme (RAGS) with Grant number RAGS/ST/01(1)/932/2012(33). The authors wish to thank Universiti Malaysia Sarawak for the facilities provided.”

References

A. S. Mohamed Pauzan and N. Ahad, “Biomass modification using cationic surfactant cetyltrimethylammonium bromide (CTAB) to remove palm-based cooking oil,” Journal of Chemistry, vol. 2018, Article ID 5059791, 7 pages, 2018.