Experimental Diabetes ResearchVolume 2011 (2011), Article ID 319202, 1 pagedoi:10.1155/2011/319202

Erratum

Erratum to “Subthreshold α ₂-Adrenergic Activation Counteracts Glucagon-Like Peptide-1 Potentiation of Glucose-Stimulated Insulin Secretion”

Minglin Pan,¹ Guang Yang,¹ Xiuli Cui,¹ and Shao-Nian Yang1,2

¹Endocrinology and Metabolic Diseases Laboratory, Tianjin Research Center of Basic Medical Sciences and Metabolic Diseases Hospital, Tianjin Medical University, Tianjin 300070, China²The Rolf Luft Research Center for Diabetes and Endocrinology, Karolinska Institutet, 171 76 Stockholm, Sweden

Received 8 January 2011; Accepted 10 January 2011

Copyright © 2011 Minglin Pan et al. Minglin Pan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

There are three errors in the original paper. First, the last sentence of the legend for Figure 3 should have read “ versus group subjected to treatment with the ED₅₀ concentration of GLP-1 and stimulation with 11 mM glucose.” Second, the word “inhibits” in the third line of the right column on page 5 should have read “regulate.” Third, the typo “LD” in Reference 23 on page 6 should have read “LD”. We apologize to readers for these errors.

References