Journal of Diabetes Research
Volume 2015 (2015), Article ID 415253, 1 page
http://dx.doi.org/10.1155/2015/415253

Corrigendum

Corrigendum to “Evacuation after the Fukushima Daiichi Nuclear Power Plant Accident Is a Cause of Diabetes: Results from the Fukushima Health Management Survey”

Hiroaki Satoh,1,2 Tetsuya Ohira,2,3 Mitsuaki Hosoya,2,4 Akira Sakai,2,5 Tsuyoshi Watanabe,1,2 Akira Ohtsuru,2,6 Yukihiko Kawasaki,2,4 Hitoshi Suzuki,2,7 Atsushi Takahashi,2,8 Gen Kobashi,⁹ Kotaro Ozasa,¹⁰ Seiji Yasumura,2,11 Shunichi Yamashita,2,12 Kenji Kamiya,2,13 and Masafumi Abe²

¹Department of Nephrology, Hypertension, Diabetology, Endocrinology, and Metabolism, Fukushima Medical University, Fukushima 960-1295, Japan
²Radiation Medical Science Center for the Fukushima Health Management Survey, Fukushima Medical University, Fukushima 960-1295, Japan
³Department of Epidemiology, Fukushima Medical University, Fukushima 960-1295, Japan
⁴Department of Pediatrics, Fukushima Medical University, Fukushima 960-1295, Japan
⁵Department of Radiation Life Sciences, Fukushima Medical University, Fukushima 960-1295, Japan
⁶Department of Radiation Health Management, Fukushima Medical University, Fukushima 960-1295, Japan
⁷Department of Cardiology and Hematology, Fukushima Medical University, Fukushima 960-1295, Japan
⁸Department of Gastroenterology and Rheumatology, Fukushima Medical University, Fukushima 960-1295, Japan
⁹Department of Planning and Management, National Institute of Radiological Sciences, Fukushima Medical University, Fukushima 960-1295, Japan
¹⁰Department of Epidemiology, Radiation Effects Research Foundation, Fukushima Medical University, Fukushima 960-1295, Japan
¹¹Department of Public Health, Fukushima Medical University, Fukushima 960-1295, Japan
¹²Atomic Bomb Disease Institute, Nagasaki University, Nagasaki, Japan
¹³Research Institute for Radiation Biology and Medicine, Hiroshima University, Hiroshima, Japan

Received 1 July 2015; Accepted 30 July 2015

Copyright © 2015 Hiroaki Satoh et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Evacuation after the Fukushima Daiichi Nuclear Power Plant Accident Is a Cause of Diabetes: Results from the Fukushima Health Management Survey” [1], the description of “multivariate logistic regression analysis” (Line 11) in the Abstract is incorrect. “Cox proportional hazards model” is the correct form mentioned in the description in Materials and Methods.

References

H. Satoh, T. Ohira, M. Hosoya et al., “Evacuation after the fukushima daiichi nuclear power plant accident is a cause of diabetes: results from the fukushima health management survey,” Journal of Diabetes Research, vol. 2015, Article ID 627390, 9 pages, 2015.