Journal of Diabetes Research
Volume 2015 (2015), Article ID 604986, 1 page
http://dx.doi.org/10.1155/2015/604986

Retraction

Retracted: Prognostic Utility of Coronary Computed Tomographic Angiography: A 5-Year Follow-Up in Type 2 Diabetes Patients with Suspected Coronary Artery Disease

Journal of Diabetes Research

Received 14 January 2015; Accepted 14 January 2015

Copyright © 2015 Journal of Diabetes Research. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Prognostic Utility of Coronary Computed Tomographic Angiography: A 5-Year Follow-Up in Type 2 Diabetes Patients with Suspected Coronary Artery Disease” [1], published in Journal of Diabetes Research, has been retracted as it is found to contain a substantial amount of material from the published paper “Value of multi-detector computed tomography angiography in predicting acute cardiac events in patients with type 2 diabetes” by Daliang Liu, Huijuan Jia, Wei Liu, Daqing Ma, Guangshan Tan, Wen He, Yucun Fu, and Le-Xin Wang, published in Experimental Therapeutic Medicine in April 2014.

References

D. Liu, H. Jia, Y. Fu, W. He, and D. Ma, “Prognostic utility of coronary computed tomographic angiography: a 5-year follow-up in type 2 diabetes patients with suspected coronary artery disease,” Journal of Diabetes Research, vol. 2014, Article ID 103459, 7 pages, 2014.