Journal of Diabetes Research
Volume 2017 (2017), Article ID 9709704, 1 page
https://doi.org/10.1155/2017/9709704

Corrigendum

Corrigendum to “Large Gliadin Peptides Detected in the Pancreas of NOD and Healthy Mice following Oral Administration”

Susanne W. Bruun,¹ Knud Josefsen,¹ Julia T. Tanassi,² Aleš Marek,3,4 Martin H. F. Pedersen,³ Ulrik Sidenius,⁵ Martin Haupt-Jorgensen,¹ Julie C. Antvorskov,¹ Jesper Larsen,¹ Niels H. Heegaard,² and Karsten Buschard¹

¹The Bartholin Institute, Rigshospitalet, Copenhagen N, Denmark
²Clinical Biochemistry, Immunology & Genetics, Statens Serum Institut, Copenhagen S, Denmark
³The Hevesy Laboratory, DTU Nutech, Technical University of Denmark, Roskilde, Denmark
⁴Institute of Organic Chemistry and Biochemistry, Academy of Sciences of the Czech Republic, Prague 6, Czech Republic
⁵Enzyme Purification and Characterization, Novozymes A/S, Bagsværd, Denmark

Correspondence should be addressed to Knud Josefsen; knud@eln.dk

Received 21 December 2016; Accepted 5 January 2017; Published 12 March 2017

Copyright © 2017 Susanne W. Bruun et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Large Gliadin Peptides Detected in the Pancreas of NOD and Healthy Mice following Oral Administration” [1], there was an error in the peptide sequences in Section . Gliadin Peptides, which should be corrected as follows:

The sequences H-LQLQPFPQPELPYPQPELPYPQPELPYPQPQPF-OHY and H-LGQQQPFPPQQPYPQPQPF-OHY should be corrected to H-LQLQPFPQPELPYPQPELPYPQPELPYPQPQPF-OH and H-LGQQQPFPPQQPYPQPQPF-OH.

References

S. W. Bruun, K. Josefsen, J. T. Tanassi et al., “Large gliadin peptides detected in the pancreas of NOD and healthy mice following oral administration,” Journal of Diabetes Research, vol. 2016, Article ID 2424306, 11 pages, 2016.