Journal of Electrical and Computer Engineering
Volume 2017 (2017), Article ID 1936849, 5 pages
https://doi.org/10.1155/2017/1936849

Research Article

Compact Design of Circularly Polarized Antenna with Vertical Slotted Ground for RFID Reader Application

Hesheng Cheng,¹ Jin Zhang,² Hexia Cheng,³ and Qunli Zhao¹

¹College of Computer Science, Hefei Normal University, Hefei, China
²School of Electronic and Information Engineering, Jinling Institute of Technology, Nanjing, China
³College of Computer & Information, Anqing Normal University, Anqing, China

Correspondence should be addressed to Hesheng Cheng; chenghesheng238@126.com

Received 7 March 2017; Revised 17 August 2017; Accepted 6 September 2017; Published 3 December 2017

Academic Editor: Jit S. Mandeep

Copyright © 2017 Hesheng Cheng et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A novel compact circular polarization (CP) microstrip antenna is proposed for UHF ultrahigh frequency (UHF) radio frequency identification (RFID) reader applications. The proposed antenna is composed of a corner truncated square-ring radiating patch on a substrate and a vertical slotted ground surrounding four sides of the antenna. A new feeding scheme is designed from flexible impedance matching techniques. The impedance bandwidths for  dB and 3 dB axial ratio (AR) bandwidth are 12.1% (794.5–896.5 MHz) and 2.5% (833.5–854.5 MHz), respectively.

1. Introduction

RFID reader system in the UHF band has developed rapidly due to its numerous application [1]. The reader antenna is one of the important components in the RFID reader system, which has been designed with CP radiation for reducing the loss caused by the multipath effects between a reader and the tag. Circularly polarized reader antenna is useful in practice when tag antenna system is in rotating motion or when its respective orientation cannot be ensured

Total frequency span of 840–960 MHz is used for UHF RFID systems worldwide. In China, RFID and other low-power radio applications are regulated, allowing RFID operation with somewhat complex band restrictions from 840 to 845 MHz or 920 to 925 MHz. In this paper, a compact circularly polarized antenna for handheld UHF RFID reader operates at the bands of 840–845 MHz. Design of a compact CP microstrip antenna is attractive for handheld/portable device application. Some minimized CP antennas have been reported in literatures [2–4]. Reference [2] demonstrated that the size requirement of square-ring microstrip antenna is smaller than that of conventional design using a square patch. However, the antenna gains and 3 dB axial ratio bandwidth for such compact circular polarization (CP) designs are also decreased, which is a severe limitation for practical applications of such antennas. Reference [3] proposed antenna with vertical ground surrounding four sides of the antenna to further reduce size and obtain high gain; however the antenna’s cost is high for using a high-permittivity substrate. Reference [4] used foam instead of high-permittivity substrate to obtain the merit of low cost. The antenna in [5] is composed of two corner truncated patches and a suspended microstrip line with open-circuited termination. The main patch is fed by four probes which are sequentially connected to the suspended microstrip feed line. Reference [6] designed a circularly polarized RFID antenna using a horizontal bend line feed technology. The antenna in [7] is composed of two patches. The main patch which is truncated to generate CP radiation is fed directly by the SMA connector oriented in the same plane via the vertical part of the L-shaped ground. The parasitic patch used to enhance the bandwidth is placed at the same layer of the main patch. References [5–7] realized the UHF RFID antenna but its size is too large to facilitate the practical application. References [8, 9] developed a small circularly polarized RFID antenna, but the antenna bandwidth is so narrow that it cannot meet the requirements of UHF RFID applications.

In this letter, a new compact CP and low cost design of a square-ring microstrip antenna with a vertical slotted ground plane are proposed. It is found that, by properly embedding a group of slots in the finite vertical ground plane surrounding four sides of the square-ring microstrip antenna, the lowering of the resonant frequency of the antenna can be obtained. Moreover, the 3 dB axial ratio bandwidth of the proposed scheme is greater than that of the above-mentioned design [2–4].

2. Antenna Structure

Figure 1 shows the proposed CP antenna which is formed from five layers. The parameters of the optimized antenna are shown in Table 1. Layer 1 is a foam plate ( mm²); the radiating corner truncated square-ring patch ( mm²) is mounted on layer 2. The corners truncated patch is to achieve circular polarization. In the center of patch, one square slot is taken in order to achieve miniaturization of the antenna. Feed line 1 is printed on layer 3; by the same token, feed line 2 is printed on the layer 4 ( mm²). Feed line 1 connects the radiating patch by capacitive coupled technique. Feed line 1 is linked to feed 2 with probe 1 embedded in layer 3; similarly, feed port which is in layer 4 is attached to feed line 2 with probe 2. Layer 5 is a ground plane which is FR4 plate covered with copper sheet. Moreover, feed lines 1 and 2 are designed to Z shape in order to achieve 50 Ω impedance matching. The Z-shaped and capacitive coupled structure can obtain flexible impedance matching. To further reduce size, vertical slotted ground, which is employed by rectangular parallelepiped metallic via holes for easily fabricated, surrounding four sides of the antenna is proposed. Using a dielectric substrate with a high dielectric constant, the size of the antenna can be reduced. The dielectric constant is in this paper.

Table 1: Values of proposed antenna parameters.

= 106.5 mm
= 15.5 mm
= 8 mm
= 5 mm

= 110.5 mm
= 15.4 mm
= 0.8 mm
= 6 mm

= 116.5 mm
= 47 mm
= 18.7 mm
= 0.8 mm

= 102.5 mm
= 25 mm
= 6 mm
= 0.6 mm

= 53 mm
= 3 mm
= 1 mm
= 12 mm

(a)

(b)

(c)

Figure 1: Geometry of proposed antenna. (a) 3D structure; (b) top view; (c) side view (hide vertical slotted ground). is the total height of the five layers, , and dielectric constant .

3. Simulation and Discussion

The simulation CP axial ratio and return loss parameters of the proposed antenna are displayed in Figure 2. The simulation results show that the bandwidth of CP and return loss operation, which are defined by 3 dB axial ration and −10 dB return loss, are about 21 MHz (2.5% at 842.5 MHz) and 102 MHz (12.1% at 842.5 MHz), respectively, at the centered 842.5 MHz, covering the bandwidth of 840–845 MHz. The radiation patterns of two principal planes at 842.5 MHz are plotted in Figure 3. The gain of 3.8 dBi is obtained at 842.5 MHz, good right-hand CP radiation is observed, and the CP isolation is more than 26 dB. The half-power beam width (HPBW) is and , respectively, in plane and plane. Due to the vertical slotted ground the front-to-back ratio (F/B) reaches 15 dB.

Figure 2: Axial ratio and return loss of the proposed antenna.

Figure 3: Radiation pattern of the proposed antenna.

At the same sizes of radiating patch (parameters ) and height of substrate (parameter ), another three antenna prototypes are implemented for comparing with the proposed antenna: antenna with vertical ground and square-ring patch (antenna 1), antenna without vertical ground and with square-ring patch (antenna 2), and conventional corner truncated square patch antenna [5] (antenna 3). The simulated results of the axial ratio and return loss are shown in Figure 4. From the results obtained, it is clearly seen that the center frequency of the proposed antenna is about 9% lower than antenna 1, about 19% lower than antenna 2, and about 31% lower than antenna 3. That corresponds to an antenna size reduction of about 10%, 23%, and 44% for the proposed antenna at a fixed frequency, respectively. This characteristic suggests that the constructed vertical slotted ground surrounding square-ring patch achieves good effect in miniaturization.

Figure 4: Simulated return losses and axial ratio of the proposed antenna and reference antennas.

The corresponding simulated data of the proposed antenna and the other reference antennas are given in Table 2 for comparison. It is first noted that the impedance bandwidth and the CP bandwidth of the proposed antenna are larger than antenna 1 and antenna 2 and approximate to antenna 3. As known, the quality factor of the microstrip antenna dropped with operating frequency risen. Therefore, comparing proposed antenna with the reference antennas, it is found that embedded slot in vertical ground can effectively widen antenna bandwidth. Moreover, the F/B reaches 15 dB of proposed antenna, larger than any other references. It is also noted that, owing to the lowering of the resonant frequency which results in a decrease in peak directivity of the proposed antenna, the peak gain is decreased.

Table 2: Performance of proposed and reference antennas.

Kinds of antenna

(MHz)
Peak directivity (dB)
Peak gain
(dBi)
Radiation efficiency
(%)
F/B
(dB)
BW1
(%)
BW2
(%)

Proposed antenna
842.5
4.1
3.8
92.8
15.0
12.1
2.5

Antenna 1
928.8
5.7
4.6
77.8
10.5
2.9
0.65

Antenna 2
1034.3
5.3
4.9
89.3
3.8
6.3
1.4

Antenna 3
1215.2
6.5
6.4
97.0
5.7
13
2.2

: centre frequency of BW2; F/B: front to back ratio; BW1: 10 dB return loss impedance bandwidth; BW2: 3 dB axial ratio CP bandwidth.

4. Conclusions

A novel compact circularly polarized square-ring microstrip antenna with vertical slotted ground for UHF RFID has been successfully implemented, which is designed as Z-shaped and capacitive coupled structure. The proposed design can have a size reduction of about 10% (contrasting with [2]), 23% (contrasting with [3]), and 44% (contrasting with [4]); moreover, the substrate material is foam and FR4, in order to be low cost. Furthermore, the impedance bandwidths for < −dB and 3 dB AR bandwidth are 12.1% (794.5–896.5 MHz) and 2.5% (833.5–854.5 MHz), respectively. Due to the use of a vertical trench structure, the antenna achieves up to 15 dB of front-to-back ratio at 845.2 MHz.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This research work was supported by Educational Commission of Anhui Province of China (KJ2016A585, 1708085QF157, gxyq2017050, and 2015jyxm271).

References

K. Finkenzeller, RFID Handbook, John Wiley & Sons, New York, NY, USA, 2nd edition, 2003.

W.-S. Chen, C.-K. Wu, and K.-L. Wong, “Single-feed square-ring microstrip antenna with truncated corners for compact circular polarisation operation,” IEEE Electronics Letters, vol. 34, no. 11, pp. 1045–1047, 1998.

S. Kim, H. Park, D. Lee, and J. Choi, “A novel design of an UHF RFID reader antenna for PDA,” in Proceedings of the 2006 Asia-Pacific Microwave Conference, APMC, pp. 1471–1473, December 2006.

Z. Wang, S. Fang, and S. Fu, “A low cost miniaturized circularly polarized antenna for UHF radio frequency identification reader applications,” Microwave and Optical Technology Letters, vol. 51, no. 10, pp. 2382–2384, 2009.

N. Z. Chen, X. Qing, and L. C. Hang, “A universal UHF RFID reader Antenna,” IEEE Transactions on Microwave Theory & Techniques, vol. 57, no. 5, pp. 1275–1282, 2009.

Z. Wang, S. Fang, S. Fu, and S. Jia, “Single-fed broadband circularly polarized stacked patch antenna with horizontally meandered strip for universal UHF RFID applications,” IEEE Transactions on Microwave Theory and Techniques, vol. 59, no. 4, pp. 1066–1073, 2011.

Y. Pan, L. Zheng, H. J. Liu, J. Y. Wang, and R. L. Li, “Directly-fed single-layer wideband RFID reader antenna,” IEEE Electronics Letters, vol. 48, no. 11, pp. 607-608, 2012.

C.-Y. Sim and C.-J. Chi, “A slot loaded circularly polarized patch antenna for UHF RFID reader,” IEEE Transactions on Antennas and Propagation, vol. 60, no. 10, pp. 4516–4521, 2012.

M. K. Chang, J. R. Lin, and C. I. Deng, “A novel design of a microstrip-fed shorted square-ring slot antenna for circular polarization,” Microwave & Optical Technology Letters, vol. 49, no. 7, pp. 1684–1687, 2010.