Journal of HistologyVolume 2014 (2014), Article ID 729846, 1 pagehttp://dx.doi.org/10.1155/2014/729846

Erratum

Erratum to ‘‘Chemical Separation of Fixed Tissue Using Thermolysin’’

Anahita Dua,¹ Anna Lysakowski,² and Sapan S. Desai³

¹Center for Translational Injury Research (CeTIR), Department of Surgery, University of Texas-Houston, 6413 Fannin Street, Houston, TX 77034, USA²Department of Anatomy and Cell Biology, University of Illinois at Chicago, Chicago, IL 60612, USA³Department of Surgery, Duke University, Durham, NC 27707, USA

Received 15 December 2013; Accepted 19 January 2014; Published 23 February 2014

Copyright © 2014 Anahita Dua et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors, Anahita Dua and Sapan S. Desai, whose work appeared in the Journal of Histology, Volume 2013, Article ID 643670, 5 pages, added the following corrections.

The corresponding author apologizes that a coauthor’s name was missing, Anna Lysakowski, from the corresponding author list in the paper. The author and affiliation lines should read as follows: Department of Anatomy and Cell Biology, University of Illinois at Chicago, Chicago, IL 60612, USA.

Additionally, Acknowledgments section should be added which includes the following: “Thanks are due to S. D. Price for technical assistance. This work was supported by NIH R01 DC-02521 (Anna Lysakowski), NASA NAG 2–1358 (Anna Lysakowski), and NIH F30 DC-05451 (Sapan S. Desai).”