Journal of Healthcare Engineering
Volume 2017 (2017), Article ID 9519321, 9 pages
https://doi.org/10.1155/2017/9519321

Research Article

A Granular Ontology Model for Maternal and Child Health Information System

Saadia Ismail,¹ Majed Alshmari,² Khalid Latif,³ and Hafiz Farooq Ahmad²

¹National University of Sciences and Technology (NUST), Islamabad, Pakistan
²College of Computer Sciences and Information Technology (CCSIT), King Faisal University, Alahssa 31982, Saudi Arabia
³COMSATS Institute of Information Technology, Islamabad, Pakistan

Correspondence should be addressed to Khalid Latif; khalid.latif@comsats.edu.pk

Received 18 December 2016; Revised 17 February 2017; Accepted 27 February 2017; Published 16 May 2017

Academic Editor: Cui Tao

Copyright © 2017 Saadia Ismail et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In several developing countries, maternal and child health indicators trail behind the international targets set by the UN as Millennium or Sustainable Development Goals. One of the reasons is poor and nonstandardized maternal health record keeping that affects data quality. Effective decision making to improve public healthcare depends essentially on the availability of reliable data. Therefore, the aim of this research is the design and development of the standard compliant data access model for maintaining maternal and child health data to enable the effective exchange of healthcare data. The proposed model is very granular and comprehensive in contrast with existing systems. To evaluate the effectiveness of the model, a web application was implemented and was reviewed by healthcare providers and expectant mothers. User feedback highlights the usefulness of the proposed approach as compared to traditional record-keeping techniques. It is anticipated that the proposed model will lay a foundation for a comprehensive maternal and child healthcare information system. This shall enable trend analysis for policy making to help accelerate the efforts for meeting global maternal and child health targets.

1. Introduction

The United Nations Millennium Development Goals (MDGs) numbers 4 and 5 aimed to reduce child mortality by two-third and maternal mortality by three-quarters, respectively, till 2015 [1]. However, several developing regions, including Pakistan, were unable to meet the international targets [2, 3] and the efforts to achieve MDGs were marked as insufficient [4]. For instance, by the year 2015, Pakistan’s under 5 mortality rate was 81.1 and the maternal mortality ratio per 100,000 live births was 178 [5]. Situation is not very different in many other developing countries such as Saudi Arabia [6]. The need for improvement resulted as a new set of Sustainable Development Goals (SDGs), which also define targets to deal with global health issues including a reduction in maternal, neonatal, and child mortality in the next 15 years [7].

Achieving maternal and child health (MCH) targets in underdeveloped or developing parts of the world requires significant investment in the infrastructure, improvement in the service delivery, and quality of care [8], as well as the availability of reliable health data [9, 10]. In Pakistan, however, immature e-health solutions are deployed in a limited number of healthcare facilities [2]. The existing nonstandardized record-keeping techniques result in missing records, inconsistencies, poor data quality, and inaccuracies and hence undermine evidence-based decision making in healthcare service delivery [11, 12]. Most of the local hospitals and clinics only have a primitive patient registration systems to record billing information, and electronic records of clinical and medical data are ignored for the most part. In the absence of reliable data, country-level statistics are based on estimates from a selected sample.

Higher level ranking indicators in MCH domain are very well established [13]. Developed countries use more granular data models. Japan, for instance, initiated the Maternal and Child Health Handbook [14] in 1942 (referred as MCHHJ in this manuscript), to create awareness and log necessary information related to pregnancy and delivery, child development, and health education. This handbook greatly contributed in decreasing maternal mortality rate (MMR) and infant mortality rate (IMR) in Japan [15]. Later on, customized handbooks were implemented in many countries such as Bangladesh [16], Indonesia [17], Thailand [18], Cambodia [19], and Mongolia [20]. Our model is also an extension of MCHHJ. However, MCHHJ is a record book so it does not offer some of the features of an information system such as patient scheduling, lab test report, lab orders by a practitioner, and details of procedures and medical examination carried out for patient’s assessment.

Fast Healthcare Interoperability Resources (FHIR) is the latest and emerging standard from Health Level Seven International (HL7) for exchanging healthcare data [21]. FHIR exposes various information units, called resources, as granular constituents of medical records. The FHIR specification describes a set of base resources only that may be used in a generic contexts in healthcare. Implementing FHIR in MCH domain, however, requires additional structure definitions and rules about which resource elements and terminologies map to particular MCH requirements. Therefore, the objective of our research is to design and develop a granular data model using existing standards such as HL7 FHIR, MCH Handbook of Japan, and clinical terminologies such as SNOMED for improved record keeping and interoperability in MCH domain (This research is an extended version of our work published in BIBE 2016 [22]).

A web application is also developed to evaluate the usefulness of the proposed model. The system is made accessible to healthcare providers including gynecologist, obstetrician, and pediatrician at partner healthcare facilities. It can be used by expecting women to view their records, and it can also be used by parents to view and maintain health records of neonatal. Feedback was gathered from users. The proposed approach is perceived as more useful compared to traditional record-keeping techniques.

2. Methods

The design approach for the data model follows METHONTOLOGY, a methodology for knowledge engineering [23], in an incremental strategy with steps being repeated when necessary. The steps involved in the approach are described as follows:

2.1. Requirement Gathering

Specification of the high-level requirements for the model, for example, necessary concepts required to be covered to build a comprehensive and meaningful semantic model were articulated. A set of requirements from two internationally recognized resources, the MCH Handbook in Japan [14] and Common Requirements for Maternal Health Information Systems released by Program for Appropriate Technology in Health (PATH) [24], formed the baseline for the proposed ontology model. An extensive literature review was conducted to gather additional requirements. A list of papers reviewed to collect requirements about which data element is necessary in the MCH domain is given in Table 1.

Table 1: Sources for requirement gathering.

Reference
Concepts of MCHIS

[24]
(i) Scheduling

(ii) Diagnostics including laboratory tests

(iii) Medication management

[25, 26]
(i) Outputs: in the form of information that can form the basis for evidence-based decision making. This highlights the importance of patient’s diagnostic/lab reports

(ii) Indicators: such as socioeconomic, environmental, behavioral, and demographic determinants of health; data on maternal attitudes and experiences before, during, and shortly after pregnancy; and also, the indicators that determine health status such as rates of mortality and morbidity

[27, 28]
(i) Information access: users are able to view maternity information through a website.

End users of the ontology model, for example, hospitals, practitioners, patients, researchers, national and international agencies, and government bodies, were defined. Opinion was solicited from local practitioners including obstetricians, gynecologists, pediatricians, and lady health workers (LHW). A list of partner hospitals is mentioned in Table 2. All practitioners consulted during requirement gathering had 5 to 20 years experience of working in a public or private hospital and thus had a deep understanding of patient profiling and hospital procedures. Requirements were translated into use cases as shown in Table 3. For details of these use cases, readers are referred to an online technical document (https://github.com/klatifch/mch).

Table 2: Partner hospitals and clinics for requirement gathering.

Title
Location
Beds

Military Hospital (MH)
Rawalpindi
1200

Combined Military Hospital (CMH)
Rawalpindi
1000

Medicsi Clinic
Islamabad
50

Shifa International Hospital
Islamabad
500

Anwar Clinic
Rawalpindi
100

Nusrat Clinic
Rawalpindi
50

Table 3: High-level use cases for the data model.

Sr.
Use case
Frequency

1
Manage patient registration
Once

2
Manage patient history
Once

3
Schedule encounters
Multiple

4
Manage vitals
Multiple

5
Manage pregnancy profile
Multiple

6
Maintain record of treatment
Multiple

7
Maintain record of outcome
Multiple

8
Manage labor and delivery plan
Once

9
Labor and delivery record
Once

10
Manage neonatal health record
Multiple

2.2. Semantic Structuring

A glossary of key domain concepts identified during the requirements specification steps was formalized, and related terms were categorized. Some of the concepts include Patient (e.g. expectant woman), Vital sign, Symptom, Procedure, and Allergy intolerance. Glossary was further extended by adding attributes of the concepts, identifying data types, and modeling relationships among concepts. Key concepts and their attributes were then mapped to HL7 FHIR resources. Some of the concepts had direct mapping, such as Patient information is modeled as Patient resource (Figure 1 depicts the Patient resource as in HL7 FHIR). Some of the concepts were mapped to their equivalent resources having a different name, such as Observation resource from HL7 is used for recording vitals. See Table 4 for details of these mappings. It is worth pointing out that many FHIR resources heavily benefit from concepts in other code systems such as SNOMED and LOINC. For instance, AllergyIntolerance resource may use the following concept from SNOMED:

"identifier":[{"label": "House dust allergy","system": "http://snomed.info/sct","value": "232349006" }]

Figure 1: Patient resource model from HL7 FHIR.

Table 4: Data entities and mappings with HL7 FHIR resources.

Data entities
FHIR resources

(1) Patient registration

Personal information, emergency contact
Patient

Marriage details, previous children
RelatedPerson

(2) Patient history

Illness, infections, pregnancy history
Condition

Assertions related to illness
Observation

Surgical history
Procedure

Medication history
MedicationPrescription

Allergy history
AllergyIntolerance

Family history
FamilyHistory

Social history (such as tobacco use)
Observation

(3) Current pregnancy record/encounters

Encounter details
Encounter

Health status/characteristics
Observation

Weight and height for BMI calculation
Observation

Baby’s characteristics
Observation

Lab reports, diagnostic tests
DiagnosticReport

(4) Record of treatment

Suggesting tests/scans
DiagnosticOrder

Suggesting medications/food supplements/advice
MedicationPrescription

Conduct ultrasounds
Procedure

(5) Labor and delivery record

Plan for method of delivery
CarePlan

Baby’s health status
Observation

Birth outcome (e.g., live or still)
Observation

Model validation was performed by the selected practitioners, and their feedback was used to correct inconsistencies. Suitability of the model was evaluated in combination with an application infrastructure as explained in the later section.

2.3. Mapping with Indicators

The commission on information and accountability for women’s and children’s health has selected 11 core indicators on maternal, child, and neonatal health, aligned with indicators of MDGs [29]. Amongst these, our model provides estimation of the impact indicators: maternal mortality ratio and under five child mortality. It can also help determine the outcome indicators such as medications provided to patients for treatment of illness. Table 5 details the mapping of the model to MCH indicators. A list of key healthcare indicators was formed such as maternal and neonatal mortality and morbidity, socioeconomic and demographic determinants of health, and behaviour during pregnancy related to exercise, diet, and nutrition intake. These indicators were also mapped to HL7 FHIR resources in our data model.

Table 5: Indicator mapping.

Indicator type
Indicators/examples
Concept of the model
Corresponding FHIR resource

Impact
Maternal mortality ratio
Record of mother’s death
Observation

Under five mortality
Record of neonatal death/still birth
Observation

Outcome
Proportion of women treated for an illness
Patient
Patient

Medication
MedicationPrescription

Surgery
Procedure

Illness
Condition

3. The Proposed System

The design and development of proposed MCHR system involved the following major steps:

(1)Designing MCH system architecture(2)Designing underlying database structure(3)Implementation of the MCH system using proposed data model.

3.1. MCH System Architecture

A modular architecture for the proposed MCH system is explained in this section. Figure 2 depicts the choice of technologies in different modules and layers. The modules involved in the architecture are described in detail as follows:

Figure 2: Proposed maternal and child health record system architecture.

3.2. Database Structure

FHIR resources may be serialized either as XML or as JSON documents. JSON format being lightweight is preferred in modern web applications for data exchange. The mother and child data objects are mapped to FHIR resources in the proposed system and are processed as JSON objects. Hence, MongoDB as a native JSON storage system [30] was used. It stores data as JSON-formatted documents. Moreover, MongoDB scales well as compared to relational databases for document models. This is because join-based queries are not required as all the relevant data of an entity is present in a single-JSON document. This flexibility can help in overall system scalability.

Though MongoDB is schema-free but, an underlying structure (schema) was defined in order to ensure conformance with the proposed data model. Each collection in the database represents a category of resources, such as “Patient,” “Practitioner,” and “Organization.” Each patient-related document, for instance a lab report, is placed as a nested JSON document within the relevant patient resource. This is different from traditional relational databases where items are stored in separate tables and are linked through foreign keys. In contrast, a patient resource in MongoDB represents a comprehensive record of all related actions and outcomes. Figure 3 represents this data model.

Figure 3: MongoDB physical data model.

The FHIR documents received from the client-side web applications are parsed into JSON documents by the data access objects (DAOs). Data objects provide an interface to the underlying MongoDB repository, validate the payloads, append identifiers, and transfer contents to the MongoDB repository for storage in an appropriate collection. Data objects are also responsible to return the results of queries performed by the client. Figure 4 shows an abridged example of a “Patient” resource as MongoDB JSON document.

Figure 4: A patient resource as JSON document.

3.2.1. FHIR-Based RESTful API

This layer consists of the RESTful services that process the requests received from a client. The clients includes both the MCH system and other external systems to enable integration with existing information systems used in the partner hospitals. The REST web services are defined for each resource category corresponding to FHIR specification, to enable the create, read, search, update, and delete operations on these resources. The services respond JSON objects to be consumed at the client side. We have defined the URI templates to which a web service responds. Table 6 contains some generic service paths and their descriptions that are followed for access.

Table 6: REST resource URIs.

URL pattern
Service description

POST/resource
Enables creation of resource in particular collection. Such as a “Patient”

GET/resource
Lists resources of a particular type such as a list of all patients

GET (or POST)/resource/{id}
View (or edit) a particular resource specified by the identifier

GET/resource/_search?[criteria]
List resources of particular type meeting the given search criteria

GET/patient/{id}/bmi
Analyze if BMI is appropriate according to prepregnancy BMI and current gestational age

4. Evaluation

To determine the effectiveness of the proposed model, a web-based application was implemented. Five healthcare providers from partner hospitals that were involved in requirement-gathering phase as well as 30 women who were pregnant or had a baby within last 6 months used the system and provided a candid opinion regarding the system’s effectiveness. Table 7 lists the characteristics of mothers interviewed for system evaluation. Participants were required to perform certain tasks. Healthcare providers were asked to register patients on the system and add their personal data and clinical history. The patients were able to view this record. They also checked their prepregnancy and current BMI on providing their weights and heights to know if the BMI was appropriate according to the gestational age. These users later on filled a questionnaire to record their opinion about the system. The questionnaire targeted information about women’s or healthcare providers’ characteristics. Table 8 lists the questions asked from participants. It is worth pointing out that six of the participant mothers had no formal education and were trained to use a computer-based system.

Table 7: Characteristics of participants (mothers).

Characteristics
Number
Percentage

Age

18–24
3
10

25–34
21
70

36–45
6
20

Religion

Muslims
27
90

Non-Muslims
3
10

Formal school education

No
6
20

Yes
24
80

Employment status

No
21
70

Yes
9
30

Pregnancy status

Pregnant
12
40

Gave birth within last six months
18
60

Gravida

Primi
12
40

Multi
18
60

Table 8: List of questions asked from participants.

Questions from mothers
Questions from healthcare providers

Were they already seeing a doctor or visiting a healthcare facility?
For how long have they been working?

Have they ever used a digital system before?
At which healthcare facilities have they worked?

Do they understand the purpose of the system and its features?
Current modes of recording health data that they use?

Do they find it useful?
Have they ever used a digital EMR before?

Comments for improvement
Computer usage skills?

Opinion regarding system’s acceptability?

Comments for improvement?

The system was evaluated on the basis of user opinion regarding its usability and effectiveness. The answers to the questions asked were categorized depending upon the level of confidence that users showed in this system. Table 9 presents a summary of this evaluation. Each evaluation criteria is further explained in subsequent sections.

Table 9: Opinions of test users about MCHRS.

Question
Category
Count
Percentage

Extent of understanding
All features
32
91.4

Only common features
3
8.6

Level of effectiveness
Very effective
29
82.86

Unsuitable (considering issues of resources)
2
5.71

Unsuitable (lack of education/awareness)
4
11.43

Level of usefulness (patient’s perspective)
Very useful
31
88.6

Unsuitable (considering issues of resources)
2
5.7

Unsuitable (lack of education/awareness)
2
5.7

Level of willingness to use the system
Definitely
26
74.3

Reluctant (comfortable in manual records)
3
8.6

Reluctant (incapable of using)
4
11.4

Not interested
2
5.7

4.1. Understanding System Features

The healthcare providers and majority of women understood all the functionalities that the system offers. However, some women from weaker educational background could not comprehend even very simple features such as BMI value and range.

4.2. Approval of Effectiveness

Several users found the system as very effective in improving the current record maintenance techniques, contributing towards a better and efficient healthcare delivery system. The majority of healthcare providers stated that manual procedures overburden the doctors as they have to see the patients and create the records twice—once for the patients, that is, prescriptions and then for hospital registers. This process is inefficient, time consuming and prone to errors. The maintenance of hospital registers is hard causing space issues and making it cumbersome to locate patient files for future references. Patients face risks of losing their manual records. This is critical especially in pregnancy-related data because the records, once lost of earlier time span (trimester), cannot be obtained in a later stage of pregnancy. The unavailability of a systematic means of recording previous histories results in patients being asked the same questions on each encounter regarding their pregnancy/medical history. Similarly, the diagnostic tests or medications, that need only be used once or for a particular time span, may also be repeatedly prescribed.

However, some found it unsuitable, especially for women belonging to underprivileged areas that lack resources. Similarly, the lack of education and awareness was also identified as one of the big reasons for not being able to use the system. One of the LHWs stated, “Women in the villages usually do not disclose their pregnancies unless it becomes very obvious in later stages. They are also not willing to have monthly check-ups, ultrasounds or medications even if provided free-of-cost by the government. LHWs also require training and education for being able to use these systems.”

4.3. Level of Usefulness

Most of the patients, especially those doing jobs, acknowledged the system features as very practical and useful in helping them track health status. However, some of them, due to lack of resources, education, or awareness, did not think that they could use the system on their own. However, they acknowledged the benefits of viewing health record on an online health system and the ability to track health status by recording weight or calculating BMI and getting suggestions online from the physician.

4.4. Willingness to Use in Future

Several doctors and women agreed to use the system considering the level of ease it provides as compared to traditional record keeping. However, some of them felt more comfortable in keeping the file-based records. Although they acknowledged the risks of losing their manual records and also have had the experience of misplacing their files, they still did not feel the desire/need to change. A woman stated, “I lost my previous records but it is okay. I shall see the doctor, get the scans done again and thus have my new records.”

Some of the women, however, were incapable of using the system because of lack of education or resources. There were also some, who were not interested in using the system. Some social issues were identified as reasons for their unwillingness. One woman said, “I would prefer leaving the household and taking a break, be it a doctor’s visit.” They also felt that their husband, mother-in-law, or other family members will not trust their opinions on the basis of health information they interpret from an online health record system.

4.5. Evaluation Summary

The system provides all the relevant functionalities starting from patient registration to patient-doctor encounter details to a prescription for the patient and record maintenance for later reference. The proposed system also provides access to patients for viewing their medical records. Moreover, the capability of adding blood pressure and weight by the patient for review by the health care provider was also added. However, doctors’ opinion reflected that measurements entered by patients are not trustworthy. So, for the time being, an ability to add only height and weight is provided to the patient. The patients can also view their body mass index (BMI). The system automatically generates a message indicating whether the calculated BMI is appropriate or not according to the stage of pregnancy. This is helpful in identifying the health and appropriate weight gain of a patient and for taking suitable measures for improving the diet and habits of a patient for a healthy pregnancy. According to some of the doctors, carrying out researches on existing data sources in Pakistan is challenging because of the poor data collection efforts. However, the proposed approach can provide very granular data to the doctors or researchers to facilitate analysis and policy making. The system also enables maintenance of a child’s health record and allows parents/guardian to view the record of their child from the beginning. Table 10 describes the benefits of the proposed system over the existing record-keeping options. At the same time, there were various limitations of the system as well. Some of these limitations or challenges involved in implementation include the following:

(1)National HIT policies are difficult to enforce in an effective and secure environment in the absence of government support.(2)People are generally less motivated and apprehensive to adapt to new technologies because of cultural and social reasons.(3)Lack of adequate technological infrastructure (hardware, communication channels, and internet) is a huge barrier in a widespread implementation. People in rural areas who do not have Internet and other technical facilities available were not able to use it.

Table 10: Comparison of proposed MCH system with existing techniques.

Feature
Proposed
Techniques in use
OpenEMR
OpenMRS

HL7 FHIR or other health standard for information modeling
Yes
No
Standard-based medical billing
HL7 engine for data import

RESTful web services
Yes
No
No
Yes

MongoDB or other NoSQL data stores
Yes
No
No
No

Open-source web-based solution
Yes
No
Yes
Yes

Access for patients
Capability to view all personal records
Some provide access to lab reports only
Yes
Yes

Calculation of BMI

Record of complete patient history (past pregnancies, medications, allergies, surgeries)
Yes
Few hospitals maintain discharge summaries of inpatients and lab reports
Yes
Yes

Minimal chances of losing patient records
Yes
No
Yes
Yes

Easier record maintenance
Yes
No
Yes
Yes

Efficient retrieval
Yes
No
Yes
Yes

Reliable data for research and analysis
Yes
No
Yes
Yes

5. Conclusion

Though a preliminary implementation of the proposed system was carried out, the evaluation study suggests that the MCH system can enable reliable and efficient record keeping. It can be a catalyst in the availability of quality data to facilitate analysis, research, and evidence-based decision making. However, additional work is needed to rollout a comprehensive MCH information system at a wider scale to facilitate the manipulation, analysis, and dissemination of health data pertaining to a mother as well as child health to help achieve the global health targets at the national level.

The biggest challenge identified in system rollout was the lack of education and awareness. The adult female literacy rate for Pakistan is only 45% [31]. Therefore, we conclude that a significant effort is required in training and educating people for the use of a comprehensive health record system. Moreover, healthcare providers generally feel intimidated in using a computerized system compared with the traditional approaches.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this paper.

Acknowledgments

The authors extend their sincere appreciation to the Deanship of Scientific Research, King Faisal University, for funding this research work through the annual Grant no. 150173.

References

“Millennium Development Goals indicators,” 2008, http://mdgs.un.org/unsd/mdg/Host.aspx?Content=Indicators/OfficialList.htm.

S. Nishtar, T. Boerma, S. Amjad et al., “Pakistan’s health system: performance and prospects after the 18th constitutional amendment,” The Lancet, vol. 381, no. 9884, pp. 2193–2206, 2013.

F. A. Mansuri, “Situation analysis of Millennium Development Goals 4 & 5: Pakistan’s perspective,” Annals of Abbasi Shaheed Hospital & Karachi Medical & Dental College, vol. 19, no. 2, 2014.

Z. A. Bhutta, M. Chopra, H. Axelson et al., “Countdown to 2015 decade report (2000–10): taking stock of maternal, newborn, and child survival,” The Lancet, vol. 375, no. 9730, pp. 2032–2044, 2010.

World Health Organization, “World health statistics 2016: monitoring health for the SDGs, Sustainable Development Goals,” 2016, http://www.who.int/gho/publications/world_health_statistics/en/. http://apps.who.int/iris/bitstream/10665/44844/1/9789241564441_eng.pdf.

Ministry of Economy and Planning, United Nations Development Program, “Kingdom of Saudi Arabia, Millennium Development Goals,” 2013, http://planipolis.iiep.unesco.org/upload/Saudi.

U. N. Department of Public Information, “Goal 3: ensure healthy lives and promote well-being for all at all ages,” http://www.un.org/sustainabledevelopment/health/.

M. Ali, M. Hotta, C. Kuroiwa, and H. Ushijima, “Emergency obstetric care in Pakistan: potential for reduced maternal mortality through improved basic EmOC facilities, services, and access,” International Journal of Gynecology & Obstetrics, vol. 91, no. 1, pp. 105–112, 2005.

E. Tomasi, L. A. Facchini, and M. d. F. S. Maia, “Health information technology in primary health care in developing countries: a literature review,” Bulletin of the World Health Organization (WHO), vol. 82, no. 11, pp. 867–874, 2004.

M.-P. Gagnon, F. Légaré, M. Labrecque et al., “Interventions for promoting information and communication technologies adoption in healthcare professionals,” Cochrane Database of Systematic Reviews, vol. 1, no. 1, p. CD006093, 2009.

S. Aziz and M. Rao, “Existing record keeping system in government teaching hospitals of Karachi,” Journal of the Pakistan Medical Association, vol. 52, no. 4, pp. 163–173, 2002.

M. Ali and C. Kuroiwa, “Accurate record keeping in referral hospitals in Pakistan’s north west frontier province and Punjab: a crucial step needed to improve maternal health,” Journal of the Pakistan Medical Association, vol. 57, no. 9, pp. 443–446, 2007.

M. Peoples-Sheps, P. Guild, A. Farel et al., “Model indicators for maternal and child health: an overview of process, product, and applications,” Maternal and Child Health Journal, vol. 2, no. 4, pp. 241–256, 1998.

Y. Nakamura, “Maternal and Child Health Handbook in Japan,” JMAJ, vol. 53, no. 4, pp. 259–265, 2010.

K. Takayanagi, S. Iwasaki, and Y. Yoshinaka, “The role of the Maternal and Child Health Handbook system in reducing perinatal mortality in Japan,” Clinical Performance and Quality Health Care, vol. 1, no. 1, pp. 29–33, 1992.

S. U. Bhuiyan, Y. Nakamura, and N. A. Qureshi, “Study on the development and assessment of Maternal and Child Health (MCH) Handbook in Bangladesh,” Journal of Public Health, vol. 4, no. 2, p. 46, 2006.

A. Kusumayati and Y. Nakamura, “Increased utilization of maternal health services by mothers using the Maternal and Child Health Handbook in Indonesia,” Kokusai Hoken Iryo (Journal of International Health), vol. 22, no. 3, pp. 143–151, 2007.

Y. Aihara, Effect of maternal and child health handbook on maternal and child health promoting belief and action, [Ph.D. Dissertation], Mahidol University, 2005.

S. Yanagisawa, A. Soyano, H. Igarashi, M. Ura, and Y. Nakamura, “Effect of a Maternal and Child Health Handbook on maternal knowledge and behaviour: a community-based controlled trial in rural Cambodia,” Health Policy and Planning, vol. 30, no. 9, pp. 1184–1192, 2015.

R. Mori, N. Yonemoto, H. Noma et al., “The Maternal and Child Health (MCH) Handbook in Mongolia: a cluster-randomized, controlled trial,” PLoS One, vol. 10, no. 4, article e0119772, 2015.

“Fhir,” 2016, http://hl7.org/fhir/.

S. Ismail, M. Alshmari, U. Qamar, W. H. Butt, K. Latif, and H. F. Ahmad, “Hl7 FHIR compliant data access model for maternal health information system,” in 2016 IEEE 16th International Conference on Bioinformatics and Bioengineering (BIBE), pp. 51–56, Taichung, 2016.

M. Fernández-López, A. Gómez-Pérez, and N. Juristo, “METHONTOLOGY: from ontological art towards ontological engineering,” Tech. Rep., AAAI Technical Report SS-97-06, American Asociation for Artificial Intelligence, 1997.

Program for Appropriate Technology in Health, “Common requirements for maternal health information systems,” December 2012, https://www.path.org/publications/files/MCHN_mhis_crdm.pdf.

World Health Organization, Framework and Standards for Country Health Information Systems, World Health Organization, Geneva, 2008.

Centers for Desease Control and Prevention, , 2016, https://www.cdc.gov/prams/.

“Maternity information systems program,” 2016, http://healthitboard.health.govt.nz/our-programmes/national-solutions/maternity-information-systems-programme.

“PRAMStat system,” 2016, https://www.cdc.gov/prams/pramstat/index.html.

World Health Organization, “Accountability for women’s and children’s health,” 2016, http://www.who.int/woman_child_accountability/progress_information/recommendation2/en/.

“MongoDB,” 2016, https://www.mongodb.org.

World Health Organization, “Country cooperation strategy at a glance,” May 2013, http://www.who.int/countryfocus/cooperation_strategy/ccsbrief_pak_en.pdf?ua=1.