Journal of Immunology Research
Volume 2015 (2015), Article ID 834749, 9 pages
http://dx.doi.org/10.1155/2015/834749

Research Article

Evaluation of Anti-TBGL Antibody in the Diagnosis of Tuberculosis Patients in China

Jingge Zhao,¹ Zhaoqin Zhu,² Xiaoyan Zhang,2,3 Yasuhiko Suzuki,⁴ Haorile Chagan-Yasutan,1,5 Haili Chen,² Yanmin Wan,2,3 Jianqing Xu,2,3 Yugo Ashino,¹ and Toshio Hattori1,5

¹Division of Emerging Infectious Diseases, Department of Internal Medicine, Graduate School of Medicine, Tohoku University, Sendai, Miyagi 980-8574, Japan
²Shanghai Public Health Clinical Center, Fudan University, Shanghai 201508, China
³Key laboratory of Medical Molecular Virology of the Ministries of Education, School of Basic Medical Science, Fudan University, Shanghai 201508, China
⁴Division of Global Epidemiology, Hokkaido University Research Center for Zoonosis Control, Sapporo, Hokkaido 001-0020, Japan
⁵Laboratory of Disaster-Related Infectious Disease, International Research Institute of Disaster Science, Tohoku University, Sendai, Miyagi 980-8574, Japan

Received 21 November 2014; Revised 28 April 2015; Accepted 24 May 2015

Academic Editor: Beatrice Saviola

Copyright © 2015 Jingge Zhao et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Tuberculous glycolipid (TBGL) is a component of the Mycobacterium tuberculosis cell wall, and anti-TBGL antibodies are used for serodiagnosis of tuberculosis. Anti-TBGL IgG and IgA levels were measured in 45 pulmonary TB patients (PTB), 26 extra-pulmonary TB patients (ETB), 16 AIDS-TB patients, and 58 healthy controls (HC) including 39 health care workers (HW) and 19 newly enrolled students (ST). Anti-TBGL IgG measurements yielded 68.9% and 46.2% sensitivity in PTB and ETB, respectively, and 81.0% specificity. However, anti-TBGL IgA measurements were significantly less sensitive in detecting ETB than PTB (15.4% versus 46.7% sensitivity) but showed up to 89.7% specificity. Samples from AIDS-TB patients exhibited low reaction of anti-TBGL IgG and IgA with 6.3% and 12.5% sensitivity, respectively. Unlike anti-lipoarabinomannan (LAM) IgG that was found to elevate in sputum smearpositive subjects, anti-TBGL IgG and IgA elevated in those with cavitation and bronchiectasis, respectively. Anti-TBGL IgG in cavitary TB yielded 78.2% sensitivity compared to 57.1% in those otherwise. Meanwhile, higher anti-TBGL IgA titers were observed in HW than in ST, and increasing anti-TBGL IgG titers were observed in HW on follow-up. Therefore, higher anti-TBGL antibody titers are present in patients presenting cavities and bronchiectasis and subjects under TB exposure risk.

1. Introduction

In 2013, tuberculosis (TB) infected 9 million new individuals and caused 1.5 million deaths, making it one of the most critical infectious diseases worldwide. In terms of the number of reported cases, China ranks the second after India [1]. However, conventional microscopy is still widely used to diagnose TB, which renders variable sensitivities of 20–60% in detecting tubercle bacilli [2]. Moreover, approximately 20% of active TB cases and all latent TB infection (LTBI) cases cannot be microbiologically proven, even with fluorescence microscopy [3].

The specific IgG response to tuberculous glycolipid antigen (TBGL), a combination of trehalose-6,6′-dimycolate (TDM) and minor glycolipids, has been used to diagnose clinical TB infection in Japan, with approximately 80% sensitivity and specificity [4, 5]. The WHO Stop TB Strategy recommends TB screening and diagnostic algorithms should be implemented at a country level [6]. Previous studies performed in Japan have found that anti-TBGL IgG and anti-TBGL IgA titers correlate with cavitation and severities implicated by chest radiography [7]. Therefore, a combination of TBGL antibody detection and other TB clinical findings could further improve the accuracy of TB diagnosis [7, 8]. In a study in the Philippines, elevated anti-TBGL antibody titers were observed in healthcare workers (HW) with LTBI [9]. However, no study has evaluated anti-TBGL antibodies in TB patients or healthy individuals in China. Like TBGL, lipoarabinomannan (LAM), another glycolipid that constitutes mycobacterial cell walls, has been immensely investigated for its important roles in the immune-pathogenesis of TB [8–10], albeit limitations of anti-LAM IgG in TB diagnosis that may mislead diagnosis in about a quarter of cases [10]. Therefore, it is important to evaluate anti-TBGL antibodies in the context of varied TB pathogenesis attributable to pulmonary TB (PTB) patients, extrapulmonary TB (ETB) patients, and AIDS-TB patients.

2. Materials and Methods

2.1. Study Subjects

Blood samples were drawn from adult subjects (age > 18) recruited from Shanghai Public Health Clinical Center (SHAPHC), affiliated with Fudan University, Shanghai, China, between 2008 and 2011, after informed consent was obtained according to the protocol approved by the ethics committees from SHAPHC and the Tohoku University School of Medicine, Japan (20121322). PTB, ETB, and AIDS-TB samples were obtained from hospitalized patients who had undergone less than 2 weeks of anti-TB treatment. Blood was drawn after diagnosis of TB (Table 1). ETB samples included samples from patients with 9 different subtypes of ETB (Table 2). HIV-1 infection in the AIDS-TB patients was confirmed by detecting HIV-1 antibodies. The healthy control subjects (HC) recruited included 19 students (ST) and 39 health care workers (HW). The samples used for follow-up analysis were collected from 16 HW who underwent an annual checkup from 2009 to 2011. All HC subjects were diagnosed as free from active TB based on chest radiography and free from HIV infection at the time of blood collection.

Table 1: Clinical and demographic information of study patients.

Parameter
Value for group

PTB
ETB
AIDS-TB
HC

Number of patients
45
26
16
58

Age (years [mean ± SD])

Sex (number of males/number of females)
35/10
11/15
12/3
41/17

Classification (number)

    New case
28
21
12
0

    Relapsed case
11
4
3
0

    Unknown
6
1
1
0

Comorbidities

    Chronic diseases
27/17 (61.4)
9/17 (34.6)
5/9 (33.3)
n.a

Symptoms

    Cough & chest discomfort
38/6 (86.4)
12/12 (50.0)
8/7 (53.3)
0/58 (0.0)

    Fever
14/30 (31.8)
15/9 (62.5)
11/4 (73.3)
0/58 (0.0)

    Hemoptysis
12/32 (27.3)
1/23 (4.2)
0/16 (0.0)
0/58 (0.0)

    Expectoration
23/21 (52.3)
5/20 (20.0)
0/16 (0.0)
0/58 (0.0)

Chest X-ray

    Cavitation
24/20 (54.5)
0/26 (0.0)
0/16 (0.0)
0/58 (0.0)

    Pleural effusion
15/29 (34.1)
10/15 (40.0)
5/9 (35.7)
0/58 (0.0)

    Lymphadenopathy (BHL)
3/41 (6.8)
3/22 (12.0)
3/11 (21.4)
0/58 (0.0)

    Bronchiectasis
13/31 (29.5)
2/23 (8.0)
0/14 (0.0)
0/58 (0.0)

TB screening test

    Smear
23/18 (56.1)
7/14 (33.3)
9/4 (69.2)
0/58 (0.0)

    TST
11/6 (64.7)
7/3 (70.0)
1/0 (100.0)
0/58 (0.0)

TB antibody

    Anti-TBGL IgG
31/14 (68.9)
12/14 (46.2)
1/15 (6.3)
11/47 (19.0)

    Anti-TBGL IgA
21/23 (46.7)
4/22 (15.4)
2/14 (12.5)
6/52 (10.3)

Others mean ± std

    Blood IgA (g/L)

n.a
n.a

    Blood IgG (g/L)

n.a
n.a

    Blood IgM (g/L)

n.a
n.a

    CRP (mg/L)

n.a
n.a

    CD4 count
n.a
n.a

n.a

    CD8 count
n.a
n.a

n.a

PTB = pulmonary TB; ETB = extrapulmonary TB; HC = healthy control. aThe number of positive subjects/the number of negative subjects (percentage of positive subjects). bSignificant difference between PTB and HC samples (). cSignificant difference between PTB and AIDS-TB samples (). dSignificant difference between PTB and ETB samples (). eSignificant difference between ETB and HC samples ().

Table 2: Anti-TBGL IgG, anti-TBGL IgA, and anti-LAM IgG in ETB patients.

Subtypes of ETB ()
Number
TB related Biomarkers

Anti-TBGL IgG
Anti-TBGL IgA
Anti-LAM IgG

Tuberculous pleurisy
7
2 (28.6%)a
1.2 [0.4–7.0]b
1 (14.3%)
0.4 [0–4.0]
2 (28.6%)
0.06 [0.02–0.50]

Tuberculous meningitis
4
1 (25%)
0.65 [0.6–8.2]
0 (0%)
0.05 [−0.1–0.7]
1 (25%)
0.05 [0.03–0.08]

Miliary TB
3
2 (66.7%)
2.9 [1.3–5.6]
1 (33.3%)
0.6 [0–2.1]
3 (100%)
0.10 [0.01–0.14]

Intestinal TB
3
3 (100%)
15.9 [3.9–27.9]
1 (33.3%)
1.7 [0.2–428.8]
3 (100%)
0.14 [0.12–0.33]

Lymph node TB
3
1 (33.3%)
0.5 [0.4–11]
0 (0%)
0.2 [0.2–0.2]
2 (66.7%)
0.12 [0.06–0.39]

Renal TB
2
1 (50%)
20.4 [0.3–40.5]
0 (0%)
0.45 [0.2–0.7]
1 (50%)
0.12 [0.06–0.19]

Bone TB
2
1 (50%)
12.85 [0.4–25.3]
0 (0%)
0.2 [0–0.4]
2 (100%)
0.11 [0.10–0.12]

Endometrial TB
1
1 (100%)
3.5 [3.5]
1 (100%)
3.3 [3.3]
0 (0%)
0.06 [0.06]

Extrarenal TB
1
0 (0%)
0.8 [0.8]
0 (0%)
0.1 [0.1]
1 (100%)
0.13 [0.13]

ETB = extrapulmonary TB. apositive number (percentage) in compariso with the cut off of anti-TBGL IgG (cut off = 2), anti-TBGL IgA (cut off = 2), and anti-LAM IgG (cut off = 0.07), respectively; bmedian [range].

2.2. Anti-TBGL Antibodies

Plasma levels of anti-TBGL IgG and IgA were measured using a Determiner TBGL Antibody ELISA kit (Kyowa Medex Co., Ltd., Tokyo, Japan). This assay uses TBGL antigen which is a combination of trehalose 6,6-dimycolate (TDM) and hydrophobic glycolipids extracted from MTB H37Rv and has been described previously [7]. The cutoff index for anti-TBGL IgG and IgA was set to 2.0 U/mL in accordance with previous studies (Figure 1(a)) [4, 5].

(a)

(b)

(c)

Figure 1: Detection of anti-TBGL IgG, anti-TBGL IgA, and anti-LAM IgG in TB patients and HC. PTB = pulmonary TB; ETB = extrapulmonary TB; HC = healthy control. Anti-TBGL antibody titers were evaluated in U/mL, and the anti-LAM IgG reactivity was assessed as OD values.

2.3. Anti-LAM IgG ELISA

The anti-LAM IgG ELISA method has been previously described [11]. ELISA Nunc MaxiSorp plates (Thermo Fisher Scientific, Inc., Waltham, MA) [12] were coated with 100 μL per well of 0.5 μg/mL purified lipoarabinomannan (LAM) (NACALAI TESQUE, INC.). A polyclonal antibody from Dr. Makoto Matsumoto (Otsuka Pharmaceutical Co., Ltd., Tokushima, Japan), which was made from a LAM immunized rabbit, was used as a positive control. Serum samples were diluted 100-fold in fetal bovine serum and incubated in coated well for 1 hour. After being washed, HRP-conjugated goat anti-human IgG heavy chain polyclonal antibody (LifeSpan BioSciences, Inc., Seattle, WA) was diluted 1 : 10,000 in 1% (w/v) BSA in PBS and added as the secondary antibody to detect anti-LAM IgG. Reactions were visualized using a TMB HRP substrate kit (KPL, Inc., Gaithersburg, MD). Optical density (OD) values were measured at 450 nm. The cutoff for anti-LAM IgG was set based on Receiver Operating Characteristic (ROC) curve (Figure 3(c)).

2.4. Statistical Analysis

All data were analyzed using GraphPad Prism 6.0 (GraphPad Software, San Diego, CA). A nonparametric -test was used to determine the significance of differences between 2 groups with non-Gaussian distributions. Kruskal-Wallis tests were used to evaluate differences when more than 2 groups were involved. Dunn’s post hoc tests were used to evaluate the differences between 2 groups following the Kruskal-Wallis test. A Chi-square test was used to test the variances among groups. The results were considered significant at . Paired nonparametric -tests were used to compare the differences in the same samples in the three years of follow-up. Estimated optimal cutoff for other antibodies was achieved by Youden’s index by MedCalc (MedCalc Software bvba, Belgium).

3. Results

3.1. Anti-TBGL Antibodies and Anti-LAM Antibodies

For anti-TBGL IgG, more samples from PTB patients had elevated titers compared to those with AIDS-TB () or compared to HC (). Amongst ETB samples, more samples had elevated titers of anti-TBGL IgG compared to HC () (Figure 1(a)). Of note, there was no difference in anti-TBGL IgG titers between PTB and ETP samples. For anti-TBGL IgA, significantly higher titers were observed in the PTB samples compared to those of other groups ( for HC, for AIDS-TB, and for ETB). However, there was no difference between ETP and HC samples or between ETP and AIDS-TB samples (Figure 1(b)). For anti-LAM IgG, significantly larger number of samples with higher responses was found amongst those from PTB patients compared to HC () or AIDS-TB () patients. Nevertheless, measurements of ETB samples were not significantly different from those of HC or AIDS-TB samples for anti-LAM IgG. Unlike that for anti-TBGL IgA, no difference was observed between the PTB and ETB samples with respect to anti-LAM IgG (Figure 1(c)).

3.2. Serodiagnosis amongst TB Patients

PTB patients were grouped in correspondence with the clinical findings listed in Table 1. Anti-TBGL IgG titers were significantly higher in patients with cavitation compared to those without such pathology, and significantly elevated anti-TBGL IgA titers were observed in subjects with bronchiectasis compared to those without it (-test, , Figures 2(a) and 2(b)). However, there were no differences between subgroups for anti-LAM IgG with respect to chest radiographic findings (, Figure 2(c)), in spite of the fact that there were subjects with positive sputum smears that were higher anti-LAM IgG responses, which was not observed for anti-TBGL IgG or IgA (Figure 2(c)). Similar to PTB patients, ETB patients showed relatively high anti-TBGL IgG titers in contrast to anti-TBGL IgA titers which were lower in ETB samples. Remarkably, all 3 intestinal TB subjects were anti-TBGL IgG positive (Median 15.9 Range [3.9–27.9]), while only 2 out of 7 TB pleurisy subjects showed positive in anti-TBGL IgG (Median 1.2 Range [0.4–7.0]). Samples from AIDS-TB patients had considerably lower titers for anti-TBGL antibodies compared to other TB groups (Figures 1(a) and 1(b)).

(a)

(b)

(c)

Figure 2: Elevated titers in association with different clinical findings. (a), (b), and (c) display findings of PTB-cavity versus PTB-noncavity, PTB-bronchiectasis versus PTB-nonbronchiectasis, and PTB-smear-negative versus PTB-smear-positive, respectively. A value less than 0.05 indicates a significant difference between 2 groups by nonparametric -test. (L), (M), and (R) referred to anti-TBGL IgG, anti-TBGL IgA, and anti-LAM IgG, respectively.

(a)

(b)

(c)

(d)

Figure 3: ROC analysis for different antibodies. (a) and (b) ROC analysis between PTB patients and HC for anti-TBGL IgA and anti-LAM IgG, respectively; (c) ROC analysis between cavities positive and negative subjects for anti-TBGL IgG; (d) ROC analysis between bronchiectasis positive and negative subjects for anti-TBGL IgA. Circle: estimated optimal cutoff according to Youden’s index; triangle: arbitrary cutoff.

3.3. Anti-TBGL Antibody and Anti-LAM IgG in Healthy Controls (HC)

We examined HC and HW anti-TBGL antibody titers. There are two subgroups of HC in this study, HW who worked in environments with higher risk to TB exposure and ST who had merely enrolled less than 1 year in the lab. The age of HW (, ) was significantly higher than that of ST (, ) (Table 1). Age did not correlate with either anti-TBGL antibody or anti-LAM IgG titers within HC or ST (Spearman, ). The difference between ST and HW for anti-TBGL IgG and anti-LAM IgG titers was not statistically significant (nonparametric -test, for both), while such difference for anti-TBGL IgA titers was significant (, Figure 4(b)). We also performed a follow-up study of anti-TBGL antibodies in 16 HW. In the three-year follow-up, we observed a trend of HW subjects with increasing positive for anti-TBGL IgG but not for anti-TBGL IgA (, Figures 4(c) and 4(d)).

(a)

(b)

(c)

(d)

Figure 4: Detection of anti-TBGL antibodies and anti-LAM IgG among HC including HW and ST and follow-up study of HW. HW refers to health care workers; ST refers to new enrolled students (a and b); 2009, 2010, and 2011 refer to different years of sample collection (c and d).

4. Discussion

The findings that the highest levels of anti-TBGL IgG were associated with cavitation in Chinese PTB patients were consistent with a previous study on Japanese subjects [7], a trend that was not observed for anti-LAM IgG. In contrast, higher anti-LAM IgG responses were observed in patients who are sputum smear positive, in agreement with a previous study [10, 13]. LAM-Anti-LAM complex may be formed in the serum of the sputum negative samples, reducing the sensitivity of anti-LAM antibody detection [14]. On the other hand, LAM was found more frequently in the urine of smear-positive patients, suggesting a constant stimulus for anti-LAM antibodies existing in such patients [15]. LAM may not associate with cavitation, while TBGL contained TDM, a cord factor, which has been reported to induce cavitation and granulomatous responses [16, 17]. CD1d targets TDM, which may play a critical role in hypersensitive granulomatous response to mycobacterial cord factor [18]. Therefore, in spite of the elevated titers of anti-TBGL IgG and anti-LAM IgG in PTB patients (Figures 1(a) and 1(c)), results of the clinical factor analysis for PTB suggested that anti-TBGL antibody responses are associated with a pathogenesis different from that associated with anti-LAM antibody. Although anti-TBGL IgA showed a higher titer in bronchiectasis PTB patients, 9 out of 13 patients presented with cavitation. In China, TB antibody measurements serving as a suggestive reference must be in combination with a third TB specific clinical reference for TB diagnosis. Amongst clinical findings, smear positive appears less challenging compared to cavitation and bronchiectasis to diagnose TB [19] that can be found not only in TB but also in other lung infections, such as Aspergillus fumigatus infection, or in lung cancer; therefore measurement of anti-TBGL antibody may benefit confirmation of PTB infection with cavitation or bronchiectasis radiography and avoid being compromised by sputum smear results [5, 8].

Elevated anti-TBGL IgG titers but low anti-TBGL IgA and anti-LAM IgG titers were observed in ETB patients (Figures 1(a) and 1(b)). Although higher anti-TBGL IgG titers were detected in all the ETB subtypes combined, anti-TBGL IgG titers varied with different sites of ETB. Of note, tuberculous pleurisy showed relatively lower anti-TBGL IgG titers as compared to intestinal TB (, data not shown), suggesting an association between anti-TBGL antibody and specific sites of ETB where gastrointestinal mucosal may participate in responding to TBGL [20], as anti-TBGL antibody titer was found to decrease significantly in gastrectomized TB patients in our previous study [21]. Low titers of TB related antibody have been found in TB pleurisy in previous studies, but the reason is still unclear [22]. Low anti-TBGL antibodies and anti-LAM IgG titers were observed in AIDS-TB patients (Figure 1) due to failure in the development of potent humoral responses [23] and a malfunctioning gastrointestinal immune system [24].

The possibility of health care workers developing latent TB infection (LTBI) was 2.02–2.76 times higher than that of those in low-risk workplaces, and the LTBI incidence rate in HW was reported to be up to 43.4% in China [25]. In our previous study in the Philippines, we found elevated titers of both anti-TBGL IgG and IgA in HC subjects with diagnosed LTBI [9]. Of note, the follow-up study on 16 HW showed significant increase in anti-TBGL IgG titers over 3 years in the current study, though the significance of the data is not clear because LTBI was not confirmed.

The strength of this study, performed in a TB-prevalent country, is that anti-TBGL antibody detection could be sensitive and specific for PTB and ETB patients and HC in the context of clinical manifestation. In PTB, high anti-TBGL IgG and IgA titers were found to be associated with cavitation and bronchiectasis, respectively. In ETB, elevated anti-TBGL IgG titer in the absence of anti-TBGL IgA titer may serve as a pair of biomarkers to diagnose ETB from PTB. TBGL antibody titers may be high in those who have been at risk of TB exposure, thereby raising cautions for low sensitivity of anti-TBGL antibodies test for healthy individuals. The limitation of this study includes the lack of the prognostic observation for PTB subjects, insufficient samples from each subgroup of ETB, and the inability to confirm LTBI infection in HW.

Disclosure

Jingge Zhao and Zhaoqin Zhu are the co-first authors for this work.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the Scientific Research Expenses for Health and Welfare program from the Ministry of Health, Labour and Welfare, Japan (TH), International Collaborative Study Grants from Human Science Foundation, and the grant from the Ministry of Education, Culture, Sports, Science, and Technology, Japan (MEXT) for the Joint Research Program of the Research Center for Zoonosis Control, Hokkaido University. This study was also supported by Shanghai Health Bureau project, Nongovernmental International Cooperation Project from the Shanghai Municipal Science and Technology Commission, National Natural Science Funds of China, and the Twelfth-Five-Major-Project of the Ministry of Science and Technology of China. The authors thank Dr. Yanqing Xiong and Dr. Shuihua Lu from SHAPHC for providing samples. TBGL kits were kindly provided by Kyowa Medex Co., Ltd., Japan. Anti-LAM antibodies were kindly provided by Dr. Makoto Matsumoto from Otsuka Pharmaceutical Co., Ltd., Tokushima, Japan.

References

WHO, “Global tuberculosis report 2014,” Tech. Rep. WHO/HTM/TB/2014.08, World Health Organization, Geneva, Switzerland, 2014, http://www.who.int/tb/publications/global_report/en/.

S. S. S. Lima, W. T. Clemente, M. Palaci, R. V. Rosa, C. M. D. F. Antunes, and J. C. Serufo, “Conventional and molecular techniques in the diagnosis of pulmonary tuberculosis: a comparative study,” Jornal Brasileiro de Pneumologia, vol. 34, no. 12, pp. 1056–1062, 2008.

K. R. Steingart, M. Henry, V. Ng et al., “Fluorescence versus conventional sputum smear microscopy for tuberculosis: a systematic review,” The Lancet Infectious Diseases, vol. 6, no. 9, pp. 570–581, 2006.

T. Kishimoto, O. Moriya, J.-I. Nakamura, T. Matsushima, and R. Soejima, “Evaluation of the usefulness of a serodiagnosis kit, the determiner TBGL antibody for tuberculosis: setting reference value,” Kekkaku, vol. 74, no. 10, pp. 701–706, 1999.

R. Maekura, Y. Okuda, M. Nakagawa et al., “Clinical evaluation of anti-tuberculous glycolipid immunoglobulin G antibody assay for rapid serodiagnosis of pulmonary tuberculosis,” Journal of Clinical Microbiology, vol. 39, no. 10, pp. 3603–3608, 2001.

World Health Organization (WHO), The Stop TB Strategy, World Health Organization (WHO), Geneva, Switzerland, 2014, http://www.who.int/tb/strategy/stop_tb_strategy/en/.

M. Mizusawa, M. Kawamura, M. Takamori et al., “Increased synthesis of anti-tuberculous glycolipid immunoglobulin G (IgG) and IgA with cavity formation in patients with pulmonary tuberculosis,” Clinical and Vaccine Immunology, vol. 15, no. 3, pp. 544–548, 2008.

R. Maekura, H. Kohno, A. Hirotani et al., “Prospective clinical evaluation of the serologic tuberculous glycolipid test in combination with the nucleic acid amplification test,” Journal of Clinical Microbiology, vol. 41, no. 3, pp. 1322–1325, 2003.

U. R. Siddiqi, P. S. A. Leano, H. Chagan-Yasutan et al., “Frequent detection of anti-tubercular-glycolipid-IgG and -IgA antibodies in healthcare workers with latent tuberculosis infection in the Philippines,” Clinical and Developmental Immunology, vol. 2012, Article ID 610707, 10 pages, 2012.

T. A. Tessema, G. Bjune, B. Hamasur, S. Svenson, H. Syre, and B. Bjorvatn, “Circulating antibodies to lipoarabinomannan in relation to sputum microscopy, clinical features and urinary anti-lipoarabinomannan detection in pulmonary tuberculosis,” Scandinavian Journal of Infectious Diseases, vol. 34, no. 2, pp. 97–103, 2002.

J. A. D. Navoa, S. Laal, L.-A. Pirofski et al., “Specificity and diversity of antibodies to Mycobacterium tuberculosis arabinomannan,” Clinical and Diagnostic Laboratory Immunology, vol. 10, no. 1, pp. 88–94, 2003.

J. Nowak, C. Watala, and M. Boncler, “Antibody binding, platelet adhesion, and protein adsorption on various polymer surfaces,” Blood Coagulation and Fibrinolysis, vol. 25, no. 1, pp. 52–60, 2014.

X. Yu, R. Prados-Rosales, E. R. Jenny-Avital, K. Sosa, A. Casadevall, and J. M. Achkar, “Comparative evaluation of profiles of antibodies to mycobacterial capsular polysaccharides in tuberculosis patients and controls stratified by HIV status,” Clinical and Vaccine Immunology, vol. 19, no. 2, pp. 198–208, 2012.

A. Raja, P. R. Narayanan, R. Mathew, and R. Prabhakar, “Characterization of mycobacterial antigens and antibodies in circulating immune complexes from pulmonary tuberculosis,” Journal of Laboratory and Clinical Medicine, vol. 125, no. 5, pp. 581–587, 1995.

S. D. Lawn, A. D. Kerkhoff, M. Vogt, and R. Wood, “Clinical significance of lipoarabinomannan detection in urine using a low-cost point-of-care diagnostic assay for HIV-associated tuberculosis,” AIDS, vol. 26, no. 13, pp. 1635–1643, 2012.

T. V. Guidry, R. L. Hunter Jr., and J. K. Actor, “Mycobacterial glycolipid trehalose 6,6′-dimycolate-induced hypersensitive granulomas: contribution of CD4⁺ lymphocytes,” Microbiology, vol. 153, no. 10, pp. 3360–3369, 2007.

K. J. Welsh, R. L. Hunter, and J. K. Actor, “Trehalose 6,6′-dimycolate—a coat to regulate tuberculosis immunopathogenesis,” Tuberculosis, vol. 93, supplement, pp. S3–S9, 2013.

M. S. Vincent, J. E. Gumperz, and M. B. Brenner, “Understanding the function of CD1-restricted T cells,” Nature Immunology, vol. 4, no. 6, pp. 517–523, 2003.

L. B. Gadkowski and J. E. Stout, “Cavitary pulmonary disease,” Clinical Microbiology Reviews, vol. 21, no. 2, pp. 305–333, 2008.

P. D. Smith, L. E. Smythies, R. Shen, T. Greenwell-Wild, M. Gliozzi, and S. M. Wahl, “Intestinal macrophages and response to microbial encroachment,” Mucosal Immunology, vol. 4, no. 1, pp. 31–42, 2011.

J. Ashino, Y. Ashino, H. Guio, H. Saitoh, M. Mizusawa, and T. Hattori, “Low antibody response against tuberculous glycolipid (TBGL) in elderly gastrectomised tuberculosis patients,” International Journal of Tuberculosis and Lung Disease, vol. 9, no. 9, pp. 1052–1053, 2005.

K. R. Steingart, M. Henry, S. Laal et al., “A systematic review of commercial serological antibody detection tests for the diagnosis of extrapulmonary tuberculosis,” Thorax, vol. 62, no. 10, pp. 911–918, 2007.

J. M. Achkar and E. R. Jenny-Avital, “Incipient and subclinical tuberculosis: defining early disease states in the context of host immune response,” Journal of Infectious Diseases, vol. 204, supplement 4, pp. S1179–S1186, 2011.

J. M. Brenchley and D. C. Douek, “HIV infection and the gastrointestinal immune system,” Mucosal Immunology, vol. 1, no. 1, pp. 23–30, 2008.

X. Zhang, H. Jia, F. Liu et al., “Prevalence and risk factors for latent tuberculosis infection among health care workers in China: a cross-sectional study,” PLoS ONE, vol. 8, no. 6, Article ID e66412, 2013.