Journal of Lipids

Volume 2012 (2012), Article ID 914693, 6 pages

doi:10.1155/2012/914693

Research Article

Supercritical SC-CO₂ and Soxhlet n-Hexane Extract of Tunisian Opuntia ficus indica Seeds and Fatty Acids Analysis

Nizar Yeddes,¹ Jamila Kalthoum Chérif,1,2 Amel Jrad,³ Danielle Barth,⁴ and Malika Trabelsi-Ayadi¹

¹Laboratoire d'Application de la Chimie aux Ressources et Substances Naturelles et à l'Environnement (LACReSNE), Faculté des Sciences de Bizerte, Zarzouna, Bizerte 7021, Tunisia

²Institut préparatoire aux Études d'Ingénieurs de Tunis (IPEIT), Montfleury, Tunis 1008, Tunisia

³Centre Internationale de Technologie de l’Environnement (CITET), Boulevards Leader Yasser Arafat, Tunis 1080, Tunisia

⁴Laboratoire Réactions et Génie des Procédés, UPR CNRS 3339, Nancy-Université, 1 rue Grandville, BP 20451, Nancy, France

Received 25 February 2012; Revised 14 April 2012; Accepted 16 April 2012

Academic Editor: Gerhard M. Kostner

Copyright © 2012 Nizar Yeddes et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The fatty acids profiles of Tunisian Opuntia ficus indica seeds (spiny and thornless form) were investigated. Results of supercritical carbon dioxide (SC-CO₂) and soxhlet n-hexane extract were compared. Quantitatively, the better yield was obtained through soxhlet n-hexane: 10.32% (spiny) and 8.91% (thornless) against 3.4% (spiny) and 1.94% (thornless) by SC-CO₂ extract (T = , bar, time = 135 mn, CO₂ flow rate = 15 mL·s⁻¹). Qualitatively, the main fatty acids components were the same for the two types of extraction. Linoleic acid was the major compound, SC-CO₂: 57.60% (spiny), 59.98% (thornless), soxhlet n-hexane: 57.54% (spiny), 60.66% (thornless), followed by oleic acid, SC-CO₂: 22.31% (spiny), 22.40% (thornless), soxhlet n-hexane: 25.28% (spiny), 20.58% (thornless) and palmitic acid, SC-CO₂: 14.3% (spiny), 12.92% (thornless), soxhlet n-hexane: 11.33% (spiny), 13.08% (thornless). The SC-CO₂ profiles fatty acids showed a richness with other minority compounds such as C20:1, C20:2, and C₂₂.The seeds oil was highly unsaturated (US = 4.44–5.25), and the rising temperatures donot affect the selectivity of fatty acids extract by SC-CO2: US = 4.44 (T = ) and 4.13 (T = ).

1. Introduction

O. ficus indica is a species of cactus that belongs to the Cactaceae family, the order Centrospermae, and the genus Opuntia. This plant is associated with the semiarid zones of the world mainly in Africa, Mediterranean countries, southwestern United States, northern Mexico, and other areas [1]. In Tunisia, the prickly pear grows everywhere and mainly used for human consumption [2]. In chemistry, the main studies on the Opuntia fruits were the chemical analysis of pulp, skin, and seeds [1]. The proximate composition of O. ficus indica L. has been investigated [1, 3]. Seeds constitute about 10–15% of edible pulp and are usually discarded in the food industry as waste after pulp extraction. Edible oil can be obtained from prickly pear seeds in yield of 5.8–13.6% [1, 4–6]. The oil has a high degree of unsaturation in fatty acids (82%) with a linoleic acid content of 73.4% [5]. According to the investigation of Ramadan and Mörsel [7] using a chloroform/methanol as extraction solvent procedure of total lipids in seeds oil of cactus pear (O. ficus indica L.), linoleic acid was the dominating fatty acid (53.5%), followed by palmitic (20.1%) and oleic acids (18.3%). Two spices of prickly pear from Tunisia, O. ficus indica and O. stricta, were investigated for fatty acid composition seeds by Ennouri et al. [2] with an exceptional level of linoleic acid (up to 70%); the oils were extracted with hexane in a soxhlet extractor. Moreover, no data has been mentioned about the difference of fatty acids composition in the two spines (wild) and thornless (cultivated) forms of Tunisian O. ficus indica seeds. Mechanical processes and organic solvent were used for extracting industrial seed oil. The oil obtained by mechanical separation processes was of high quality, but, in most cases, the yield was lower. Hexane extraction achieved almost complete recovery of the oil, and the resulting oil contains traces of solvent; however, the solvent was dangerous and unacceptable as it was quite harmful to human health and the environment, which may restrict its use in food, cosmetic and pharmaceutical industries. Supercritical fluid extraction (SFE) with SC-CO₂ represents an alternative method for the extraction of oils from natural products and has received considerable attention [8]. SFEs have been used as solvents for a wide varieties of applications such as essential oil extraction [9]. SFE use increases in the last years because of legal limitations of solvent residues, and solvents make this process more economical. The CO₂ remained the most commonly used fluid for SFE applications thanks to its low critical parameters (°C; bar), it has non-toxic, nonflammable properties, and it was available in high purity with low cost. The oils obtained by SC-CO₂ extraction were of outstanding quality, and the yields were comparable with those obtained with organic solvent extraction method [10]. The CO₂ can be used in many extractions and reactions and has been recognized as earth-compatible solvent [11]. Therefore, SFE may serve as a promising technology in food and pharmaceutical processing [12]. The objective of the present research was to illustrate and to compare between the SC-CO₂ and the soxhlet n-hexane profiles fatty acids of two forms of Tunisian O. ficus indica seeds.

1.1. Practical Applications

Research on oil extracted from O. ficus indica seeds showed that this material was a potential source of food and feed. Moreover, these oils have several applications in pharmacology, medicinal, and cosmetic fields. The fact that extraction with SC-CO₂ enables to have pure oil free of solvent makes it possible to better enhance these oils safety.

2. Materials and Methods

2.1. Prickly Pear Seed

Fresh and mature pears fruits of two forms of Tunisian O. ficus indica were collected in summer 2009. The spiny wild form was from the region of Al-Ala in the centre of Tunisia located at 35° 36′ N (North) latitude, 9° 34′ E (East) longitude, and 450 m (meter) altitude. The thornless cultivated form was from local pilot cultivar of Bou Argoub region in the north east of Tunisia located at 36° 32′ N latitude, 10° 33′ E longitude, and 62 m altitude. The fruits were washed with running water, air dried, and hand peeled. The seeds were recovered, after mixing the pulp and filtration through a 2 mm sieve. The seeds were washed thoroughly with bidistilled water, dried in an oven at 35°C for 48 h. The seeds were ground by a domestic coffee grinder (SEB Prep line) just before extraction. The moisture content of the seeds was determined by drying 50 g of seeds at 70°C to a constant weight in an oven for 72 h.

2.2. Standards and Reagents

Reference standards of caprylic acid (C₈ : ₀), capric acid (C₁₀ : ₀), lauric acid (C12 : 0), myristic acid (C₁₄ : ₀), palmitic acid (C₁₆ : ₀), palmitoleic acid (C₁₆ : ₁), heptadecanoic acid (C₁₇ : ₀), stearic acid (C₁₈ : ₀), oleic acid (C₁₈ : ₁), linoleic acid (C₁₈ : ₂), linolenic acid (C₁₈ : ₃), arachidic acid (C₂₀ : ₀), eicosenoic acid (C₂₀ : ₁), eicosadienoic acid (C₂₀ : ₂) and behenic acid (C₂₂ : ₀) that had a minimum purity of 99%, sodium methoxide, methanol (HPLC grade), hexane, and sulfuric acid (1N) were purchased from Sigma Aldrich (USA). The SC-CO₂ extractions were carried out with a high purity carbon dioxide (99.95%) supplied by Messer (France).

2.3. Supercritical Fluid Extraction

The extractions were conducted in a cylindrical stainless steel extractor (300 mm × 23 mm, internal volume: 125 cm³) and a three cyclonic separators type. The ground seeds (50 g) of O. ficus indica (spiny: 92.49%—thornless: 93.64% dry matter) were loaded into steel cylinder, filled into the extractor vessel and extracted at temperatures of 35, 40, 45, 50, 60, and 70°C (spiny) and 40°C (thornless), 180 bar and the CO₂ flow rate of 15 mL·s⁻¹ for 135 min. The desired extraction temperature was achieved by heating the extraction vessel, and the temperature was monitored by a thermocouple and regulated by a controller. The extraction pressure was controlled by a back pressure regulator, and the flow rate of CO₂ was controlled by manual adjustment of a needle-metering valve. The extracts were collected in one tube throughout the 135 min, and the yields were calculated (for each temperature). The final volume of extract was analyzed using GC-FID to determine the fatty acids profile as described below.

2.4. Soxhlet Method Extraction

Soxhlet n-hexane extraction was carried in triplicate for 30 g of ground seed of O. ficus indica by 250 mL of n-hexane (99%) for 8 h. A rotary evaporator was used for the efficient removal of solvent (n-hexane) from samples by evaporation at 68°C. The extracts were stored in a glass jars in the deep freeze (−20°C) pending for further analysis.

2.5. Preparation of Fatty Acid Methyl Esters (FAMEs)

The extract samples were methylated by sodium methoxide according to the method of Carreau and Dubacq [13]. The methylation of fatty acids occurred in the presence of 0.5 mL sodium methoxide in methanol 3% and 2 mL of hexane. A known amount of methyl ester heptadecanoic acid (C₁₇ : ₀) was used as internal standard to quantify the fatty acids. After stirring during 60 seconds and decantation for 2 min, the reaction was neutralized by the addition of 0.2 mL of H₂SO₄ (1N). Finally, 1.5 mL salt water (10% NaCl) was added to allow the separation of two phases. The organic higher phase containing dissolved methyl esters in hexane was retained. After a concentration under nitrogen current, the FAMEs were analyzed by GC-FID.

2.6. Fatty Acid Analysis

The methyl-esterified fatty acids were analyzed by GC-FID to determine fatty acid constituents. The GC analysis was performed by using a Hewlett-Packard (HP) 6890 series equipped with a flame ionization detector (FID) and a polar capillary column: HP Innowax (30 m length × 0.25 mm internal diameter and 0.25 μm film thickness).The column temperature was initially at 120°C (held for 1 min) and then increased to 200°C at 15°C min⁻¹ and finally increased to 250°C at 2°C min⁻¹. The operational conditions were injector temperature 250°C; detector temperature 275°C; carrier gas was nitrogen at a flow of 1.7 mL min⁻¹ with a split ratio of 40 : 1. The fatty acids were identified by comparing their chromatograms to those of pure standards analyzed under the same conditions. The HP ChemStation software allowed the end of each analysis to provide the surface of each peak and its percentage. Three injections were done for quantification of each fatty acid.

2.7. Statistical Analysis

All experiments were the result of three runs that were averaged together. The standard deviations of the extractions yields and the fatty acid constituents were based on triplicate measurements. Each value was expressed as mean ± standard deviation (SD).

3. Results and Discussion

In this study, we intend to compare the efficiency of the SFE by SC-CO₂ extract process with the solvent extraction by soxhlet n-hexane. Efficiency is based on the extraction yield (quantity) with its relationship to composition of fatty acids (quality).

3.1. SC-CO₂ and Soxhlet n-Hexane Extract Yield

Various parameters potentially influenced the SC-CO₂ extraction process, and the first step of SC-CO₂ extract knowledge was to optimize the temperature at fixed conditions: Pressure = 180 bar, CO₂ flow rate = 15 mL s⁻¹, and time = 135 min, to obtain a better yield of extract. The experimental results of SC-CO₂ extract yield of the spiny form were calculated and illustrated in Figure 1.

Figure 1: SC-CO₂ extraction yield of seeds oil from Tunisian O. ficus indica spiny form versus temperature.

The yields (Y) of oil defined on 100 g dry seeds of O. ficus indica basis and the total extraction yield were calculated as follow:

where was the mass of glass trap with extract, was the mass of empty glass trap, and M was the initial mass of seeds in the extractor. The extract collected in the cold trap at atmospheric pressure consisted of a yellow solid mass and water. According to Figure 1, the extraction yield of seed oil depended most on extraction temperature variations. The extraction yields first increased from 1114.8 mg ± 34.5/50 g of ground seeds at °C, reached a maximum value at 40°C (1702.4 mg ± 40.1/50 g of ground seeds), and then decreased at higher temperatures 70°C (122.3 mg ± 6.6/50 g of ground seeds). Extraction with SC-CO₂ at °C versus time of spiny and thornless forms of O. ficus indica seeds showed, respectively, an extraction percentage of 3.4% (1702.4 mg ± 40.1/50 g of ground seeds) and 1.94% (970.7 mg ± 49/50 g of ground seeds) (Figure 2). In the same condition of our extraction (°C and fixed parameters), the SC-CO₂ extraction yields depended on the variability of plant material (seeds) of two Opuntia forms. At °C, the extraction yield was gradually increased with increasing time, for the two forms of O. ficus indica, the majority of the extract oil was recovered at an interval time of 15 to 75 min, and the extraction yields were 79.42% and 78.82%, respectively, for the spiny and the thornless form. The oils soxhlet n-hexane extract yield for the wild spiny form (10.32%) and cultivated form (8.91%) of Tunisian O. ficus indica were higher than the SC-CO₂ extract. These values were similar to the results found by Ennouri et al. [2] (Table 1).

Table 1: Relative content and results of GC-FID analysis of seeds oil fatty acid extracted by SC-CO₂ and soxhlet n-hexane of two Tunisian O. ficus indica forms.

Tunisian O. ficus indica seeds
Relative content [%] M ± SD

SC-CO₂ extract (°C, bar, CO₂

flow rate = 15 mL·s⁻¹ and time = 135 min)
Soxhlet n-hexane extract

Fatty acids
Forms

Spiny
Thornless
Spiny
Thornless

Extraction yield

Myristic C14 : 0

Palmitic C16 : 0

Palmitoleic C16 : 1

Stearic C18 : 0

Oleic C18 : 1

Linoleic C18 : 2n6

Linolenic C18 : 3n3

Arachidic C20 : 0

Eicosenoic C20 : 1

nd
nd

Eicosadienoic C20 : 2

nd
nd

Behinic C22 : 0

nd
nd

U/S
4,44
5,25
5,22
4,68

M: mean (); SD: relative standard deviation; U/S: Unsaturation ratio, U/S = (C16 : 1 + C18 : 1 + C18 : 2n6 + C18 : 3n3 + C20 : 1 + C20 : 2)/(C14 : 0 + C16 : 0 + C18 : 0 + C20 : 0 + C22 : 0); nd: not detected.

Figure 2: Cumulative SC-CO₂ extraction yield oil of Tunisian O. ficus indica seeds at °C versus time.

The performance of SC-CO₂ extraction was relatively low compared to soxhlet n-hexane extract and other extraction methods that exist in the literature, the extraction solvent chloroform/methanol recovers 9.88% [7]. According to Snyder et al. [14], moisture content between 3% and 12% has very little effect on the extractability of oils from seeds with SC-CO₂.

3.2. Fatty Acids Composition of Seed Oil

In the literature, it was reported that O. ficus indica contain a good quality of edible oil [4, 5, 15, 16] such as fatty acids. The fatty acid profiles of two forms of O. ficus indica seeds were analyzed by GC-FID, and the results are summarized in Table 1. The results enabled us to identify and compare the constituent fatty acids of total lipids extracted from seeds of the O. ficus indica (Table 1). The percentage of each compound was calculated from the peak areas given by the GC- FID. The SC-CO₂ extraction of fatty acids profile showed eleven peaks (Figure 3(a)); the soxhlet n-hexane extract of fatty acids profile illustrated only 8 peaks (Figure 3(b)). Each peak corresponded to fatty acid which was identified with respect to standards.

(a)

(b)

Figure 3: GC-FID chromatograms of fatty acids profile of Tunisian O. ficus indica seeds oil (spiny form), (a) from SC-CO₂ extract ( bar, °C, CO₂ flow rate = 15 mL·s⁻¹ and time = 135 min) and (b) from soxhlet n-hexane extract.

The main components for two forms were linoleic acid: SC-CO₂ (spiny 57.60%, thornless 59.98%) and soxhlet n-hexane (spiny 57.54%, thornless 60.66), oleic acid: SC-CO₂ (spiny 22.31%, thornless 22.40%) and soxhlet n-hexane (spiny 25.28%, thornless 20.58%) and palmitic acid: SC-CO₂ (spiny 14.3%, thornless 12.92%) and soxhlet n-hexane (spiny 11.33%, thornless 31.08%). According to the Ramadan and Mörsel work [7], solvent extraction using a chloroform/methanol showed that palmitic acid was the second compound after linoleic acid in terms of amount. Ennouri et al. [2] reported that the oils extracted with hexane using a soxhlet extractor, linoleic acid contents were higher than our results (70.3%), oleic acid was very much lower (16.8%) and palmitic acid (9.3%). Coşkuner and Tekin [17] reported that the seed oil extracted from Turkish O. ficus indica (Mersin) with petroleum ether by soxhlet extractor, palmitic acid content (12%), and linoleic (52%). The observed difference is probably due to extraction process and the maturation stage of fruits. Coşkuner and Tekin [17] suggested that there was an increase in saturated fatty acid content towards the end of fruit maturation. The solvent extraction of O. ficus indica seeds has been studied at different conditions previously, but, to the best of our knowledge, there is not any research about the SC-CO₂ extraction of Tunisian O. ficus indica. The results of SC-CO₂ extract showed that the saturated fatty acids composition was slightly more important for wild spiny form (14.30% for palmitic acid and 3.12% for stearic acid) than the cultivated thornless form (12.92% for palmitic acid and 2.38% for stearic acid). In contrast, the soxhlet n-hexane extract of palmitic acid was most important for the thornless form (13.08% for) than the spiny form (11.33%). For the extraction process, the results showed that the oils were found to be highly unsaturated (US = 4.44–5.25). The soxhlet n-hexane extract showed an US more important for the spiny form (5.22), the soxhlet n-hexane extract allowed a better extraction of unsaturated fatty acids for the wild form. The SC-CO₂ extract showed an US more important for the thornless form (5.25), and the SC-CO₂ extract allowed a better extraction of unsaturated fatty acids for the cultivated form (Table 1). Compared to Ramadan and Mörsel results [7], the SC-CO₂ profiles fatty acids of Tunisian O. ficus indica seeds showed the richness of this profile with other compounds such as myristic, arachidic, eicosenoic, eicosadienoic, and behenic fatty acid. Compared to our soxhlet n-hexane extract results, the SC-CO₂ profiles fatty acids showed the richness of small proportion compounds such as eicosenoic, eicosadienoic, and behenic fatty acid. The profiles of fatty acids extracted from O. dillenii Haw. (Cactaceae) by supercritical CO₂ revealed other compounds found in low percentage such as vaccenic and margaric fatty acid [18]. These results showed that the supercritical CO₂ extraction ensures a better extraction of small proportion compounds. The composition of the spiny Tunisian O. ficus indica seeds oils revealed the similar fatty acid constituents at different temperature (Table 2). The temperature of SC-CO₂ extraction seemed has not effect on the selectivity of fatty acids. The increasing temperature from 40°C () to 70°C () tended to decrease the SC-CO₂ extraction yield but not affect the solubility of fatty acids.

Table 2: Fatty acid constituents in seed oil extracted by SC-CO₂ from Tunisian O. ficus indica spiny form at different temperatures at fixed parameters ( bar, CO₂ flow rate = 15 mL s⁻¹, and time = 135 min).

Fatty acids
Extraction SC-CO₂ temperature [°C]

40
50
60
70

Fatty acids constituents [%] M ± SD

C14 : 0

C16 : 0

C16 : 1

C18 : 0

C18 : 1

C18 : 2n6

C18 : 3n3

C20 : 0

C20 : 1

C20 : 2

C22 : 0

U/S
4.44
4.45
4.49
4.13

M: mean (); SD: relative standard deviation; U/S: Unsaturation ratio.

4. Conclusion

The SC-CO₂ and soxhlet n-hexane extraction was applied to the extraction of oil seeds from wild and cultivated Tunisian O. ficus indica. The oil yields were higher by soxhlet n-hexane extraction, and the wild form gave the best results. The fatty acids profiles were investigated, and linoleic acid was the major compound followed by oleic acid and palmitic acid for the two forms and for the two extraction process. The SC-CO₂ extract allowed a better extraction of unsaturated fatty acids for the cultivated form, and oils revealed a better extraction of small proportion compounds. In contrast, the soxhlet n-hexane extract allowed a better extraction of unsaturated fatty acids for the wild form, and the fatty acids profile did not identify some compound of lower proportion. The low extractable compounds of fatty acids and the purity of the SC-CO₂ extract are giving a better quality of oil. We can extend our research on the various parameters of supercritical extraction for optimizing better extraction efficiency. With a better extraction of small proportion compounds of fatty acids seed oils, the SC-CO₂ process could be more advantageous than the soxhlet n-hexane. The fatty acids seed oil would seem to have a potential use and be valuable in different areas of bioindustrial implementation, nutraceutical and pharmaceutical. These results provide a better opportunity to improve and to enhance the natural heritage that characterizes the Tunisian O. ficus indica.

Abbreviations

SC-CO₂: | Supercritical carbon dioxide
SFE: | Supercritical fluid extraction
O: | Opuntia
GC-FID: | Gas chromatography flame ionization detector.

Acknowledgments

The authors are indebted to Mr. H. Ghaith for performing the GC-FID analysis. They have declared that there is no conflict of interests.

References

R. L. El Kossori, C. Villaume, E. El Boustani, Y. Sauvaire, and L. Méjean, “Composition of pulp, skin and seeds of prickly pears fruit (Opuntia ficus indica sp.),” Plant Foods for Human Nutrition, vol. 52, no. 3, pp. 263–270, 1998.

M. Ennouri, B. Evelyne, M. Laurence, and A. Hamadi, “Fatty acid composition and rheological behaviour of prickly pear seed oils,” Food Chemistry, vol. 93, no. 3, pp. 431–437, 2005.

F. C. Stintzing, A. Schieber, and R. Carle, “Phytochemical and nutritional significance of cactus pear,” European Food Research and Technology, vol. 212, no. 4, pp. 396–407, 2001.

C. Saenz-Hernandez, “Food manufacture and by products,” in Agro-Ecology, Cultivation and Uses of Cactus Pear, G. Barbera, P. Inglese, and E. Pimienta-Barrios, Eds., pp. 137–143, FAO, Rome, Italy, 1995.

W. N. Sawaya and P. Khan, “Chemical characterization of prickly seed oil, Opuntia ficus-indica,” Journal of Food Science, vol. 47, pp. 2060–2061, 1982.

W. N. Sawaya, J. K. Khalil, and M. M. Al-Mohammad, “Nutritive value of prickly pear seeds, Opuntia ficus indica,” Qualitas Plantarum Plant Foods for Human Nutrition, vol. 33, no. 1, pp. 91–97, 1983.

M. F. Ramadan and J. T. Mörsel, “Oil cactus pear (Opuntia ficus indica L.),” Food Chemistry, vol. 82, no. 3, pp. 339–345, 2003.

P. B. Gomes, V. G. Mata, and A. E. Rodrigues, “Production of rose geranium oil using supercritical fluid extraction,” Journal of Supercritical Fluids, vol. 41, no. 1, pp. 50–60, 2007.

A. Molero Gómez, C. Pereyra López, and E. De La Martínez Ossa, “Recovery of grape seed oil by liquid and SC-CO₂ extraction: a comparison with conventional solvent extraction,” Chemical Engineering Journal and the Biochemical Engineering Journal, vol. 61, no. 3, pp. 227–231, 1996.

M. H. Eikani, I. Goodarznia, and M. Mirza, “SC-CO₂ of cumin seeds (Cuminum cyminum),” Flavour and Fragrance Journal, vol. 14, pp. 29–31, 1999.

K. Arai and T. Adschiri, “Importance of phase equilibria for understanding supercritical fluid environments,” Fluid Phase Equilibria, vol. 158–160, pp. 673–684, 1999.

J. W. King, “Advances in critical fluid technology for food processing,” Food Science and Technology Today, vol. 14, pp. 186–191, 2000.

J. P. Carreau and J. P. Dubacq, “Adaptation of a macro scale method to the micro scale for fatty acid methyl transesterification of biological lipid extracts,” Journal of Chromatography, vol. 151, no. 3, pp. 384–390, 1978.

J. M. Snyder, J. P. Friedrich, and D. D. Christianson, “Effect of moisture and particle size on the extractability of oils from seeds with supercritical CO₂,” Journal of the American Oil Chemists' Society, vol. 61, no. 12, pp. 1851–1856, 1984.

G. Nieddu, L. De Pau, M. Schirra, and D. D’hallewin, “Chemical composition of fruit and seeds of cactus pears during early and late induced crop ripening,” Acta Horticulturae, vol. 438, pp. 105–111, 1997.

R. N. Barbagallo and G. Spagna, “Fatty acids determination from oil seeds of Opuntia ficus indica L. (Miller),” Industrie Alimentari, vol. 38, no. 383, pp. 815–817, 1999.

Y. Coşkuner and A. Tekin, “Monitoring of seed composition of prickly pear (Opuntia ficus indica L) fruits during maturation period,” Journal of the Science of Food and Agriculture, vol. 83, no. 8, pp. 846–849, 2003.

W. Liu, Y. J. Fu, Y. G. Zu et al., “SC-CO₂ extraction of seed oil from Opuntia dillenii Haw. And its antioxidant activity,” Food Chemistry, vol. 114, no. 1, pp. 334–339, 2009.