Journal of Marine Biology

Volume 2013 (2013), Article ID 768926, 2 pages

http://dx.doi.org/10.1155/2013/768926

Erratum

Erratum to “Incidence and Spatial Distribution of Caribbean Yellow Band Disease in La Parguera, Puerto Rico”

Francisco J. Soto-Santiago1,2 and Ernesto Weil¹

¹Department of Marine Sciences, University of Puerto Rico, Mayagüez, P.O. Box 9000, San Juan, PR 00681, USA

²Department of Environmental Sciences, University of Puerto Rico, Río Piedras Campus, P.O. Box 70377, San Juan, PR 00936, USA

Received 2 October 2013; Accepted 10 October 2013

Copyright © 2013 Francisco J. Soto-Santiago and Ernesto Weil. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article, Table  4 is the same as Table  3. This is an error. The captions of each table are correct but the tables are the same. Below is the correct Table 4 with its proper caption.

Table 4: Colony distribution departure from randomness; and values (in parenthesis) from the test of significance for the three 100 m² quadrants in the different sites. (—): no data was found. (∗): not significant data.

Reef
Q 1
Q 2
Q 3

Healthy + YBD
YBD
Healthy + YBD
YBD
Healthy + YBD
YBD

Pelotas
−3.84 ()
4.72 ()
—
—
—
—

Enrique
*
*
−3.47 ()
−4.03 ()
−2.23 ()
−1.4 ()

M. Luna
−7.5 ()
−2.45 ()
−10.9 ()
−2.29 ()
−12.5 ()
−4 ()

Turrumote
−5 ()
−1.65 ()
−5.2 ()
−2.1 ()
−4.12 ()
*

Buoy
−2.27 ()
*
−1.13 ()
*
−2.85 ()
−0.25 ()

Weinberg
−0.7 ()
−0.4 ()
−2.83 ()
0.08 ()
4.51 ()
−2.42 ()