Journal of Nucleic Acids
Volume 2014 (2014), Article ID 178350, 9 pages
http://dx.doi.org/10.1155/2014/178350

Research Article

Effects of Stability of Base Pairs Containing an Oxazolone on DNA Elongation

Masayo Suzuki, Kazuya Ohtsuki, Katsuhito Kino, Teruhiko Kobayashi, Masayuki Morikawa, Takanobu Kobayashi, and Hiroshi Miyazawa

Kagawa School of Pharmaceutical Sciences, Tokushima Bunri University, 1314-1 Shido, Sanuki, Kagawa 769-2193, Japan

Received 17 September 2014; Accepted 14 November 2014; Published 7 December 2014

Academic Editor: Hiroshi Sugiyama

Copyright © 2014 Masayo Suzuki et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The nucleoside 2,2,4-triamino-5(2H)-oxazolone (Oz) can result from oxidative damage to guanine residues in DNA. Despite differences among the three polymerases (Pol β, KF exo⁻, and Pol η) regarding nucleotide incorporation patterns opposite Oz, all three polymerases can incorporate guanine opposite Oz. Based on ab initio calculations, we proposed a structure for a stable Oz:G base pair. Here, to assess the stability of each Oz-containing base pair (Oz:G, Oz:A, Oz:C, and Oz:T) upon DNA replication, we determined the efficiency of Pol β-, KF exo⁻-, or Pol η-catalyzed primer extension beyond each base pair. With each polymerase, extension beyond Oz:G was more efficient than that beyond Oz:A, Oz:C, or Oz:T. Moreover, thermal denaturation studies revealed that the value for the duplex containing Oz:G was significantly higher than those obtained for duplexes containing Oz:A, Oz:C, or Oz:T. Therefore, the results from ab initio calculations along with those from DNA replication assays and thermal denaturation experiments supported the conclusion that Oz:G is the most stable of the Oz-containing base pairs.

1. Introduction

DNA is constantly damaged by various oxidative stresses. Oxidized DNA causes mutations that can lead to aging, carcinogenesis, and other diseases. Guanine has the lowest oxidation potential among the four bases; therefore, it is much more sensitive than A, T, or C to oxidative stresses. G:C to T:A and G:C to C:G transversions are preferentially caused by several oxidative stresses and are observed in vivo; for example, G:C-T:A and G:C-C:G transversions caused by passive smoking were detected in codons 12 and 13 of the K-ras gene [1]. 8-Oxo-7,8-dihydro-guanine (8-oxoG) is a typical form of oxidative guanine damage (Scheme 1), and 8-oxoG arises under various oxidative conditions. 8-oxoG can pair with adenine but not guanine; therefore, 8-oxoG can generate G:C-T:A transversions [2]. G:C-C:G transversions are assumed to be caused by other forms of oxidative guanine damage.

Scheme 1: Products of oxidation of guanine and 8-oxoG.

2,5-Diamino-4H-imidazol-4-one (Iz) can be formed from guanine or 8-oxoG under various oxidative conditions (Scheme 1) [3, 4]. Iz and guanine can potentially form base pairing structures that can in turn cause G:C-C:G transversions [5]. However, Iz is slowly hydrolyzed to 2,2,4-triamino-5(2H)-oxazolone (Oz); this reaction has a half-life of 147 min under physiological conditions (Scheme 1) [3]. In samples of liver DNA, two to six molecules of Oz are detected per 10⁷ guanine bases [6], and the biological impact of Oz should not be ignored.

We previously investigated the incorporation of nucleotides opposite Oz by various DNA polymerases [7, 8]. We found that Pol , , and each incorporated only guanine opposite Oz; in contrast, Klenow Fragment exo⁻ (KF exo⁻), Pol , and Pol IV each incorporated either guanine or adenine; Pol incorporated guanine, adenine, or cytosine. That is, incorporation of guanine opposite Oz was common to all DNA polymerases used in this analysis [7, 8], and Oz appears to participate in the generation of G:C to C:G transversions. Based on previous ab initio calculations, we predicted that (1) Oz forms a stable base pair with guanine, (2) the Oz:G base pair is planar, and (3) it has two hydrogen bonds (Figure 1) [8–10]. These predictions can explain the observation that guanine is incorporated opposite Oz by each of the polymerases used in the analysis.

Figure 1: Proposed base pairing between Oz and G.

Generally, the replicative DNA polymerases have difficulty progressing through distorted DNA, and mismatched purine (Pur):Pur or pyrimidine (Pyr):Pyr base pairs are more distorted and less stable than Pur:Pyr or Pyr:Pur base pairs. Previous simulations of molecular dynamics indicate that DNA containing a mismatch (either G:G, C:C, or C:A) at the primer terminus is distorted, and the hierarchy of the distortions are as follows: G:G > C:C > C:A [11]. Previous experimental findings show that the efficiency of correct nucleotide incorporation is higher with a Pur:Pyr or Pyr:Pur mismatch at a primer terminus than with a Pur:Pur or Pyr:Pyr mismatch [12]. Therefore, the extension activity of DNA polymerase is dependent on the stability of the base pair at the primer terminus.

The aim of this study was to assess the stability of each of the four base pairs (Oz:G, Oz:A, Oz:C, and Oz:T) during DNA replication. For this purpose, we used primer extension assays to measure extension of primers that had an Oz:G, Oz:A, Oz:C, or Oz:T base pair at the primer terminus/extension site; we used each of the three polymerases (Pol , KF exo⁻, and Pol ) in these assays to assess consistency of our findings. In addition, thermal denaturation studies can be used to measure the stability of the double-stranded DNA and, by extension, the stability of the base pairs included in duplex. Therefore, we subjected DNA duplex containing an Oz residue to thermal denaturation studies.

2. Materials and Methods

2.1. Proteins

A human POLH (which encodes Pol ) cDNA was amplified via PCR from a cDNA template isolated from HEK293 cells; KOD-Plus-Neo (TOYOBO) and two POLH-specific primers (XhoI-linked forward primer, 5′-TACTCGAGATGGCTACTGGACAGGATCGAGTG-3′, and XhoI-linked reverse primer, 5′-TACTCGAGCTAATGTGTTAATGGCTTAAAAAA-3′; XhoI sites are underlined) were used for amplification. The human POLH cDNA fragment was cloned into the XhoI sites of the vector pET-15b (Novagen) to generate the pET-15b/POLH-NHis₆ construct, which encoded recombinant human Pol fused to an N-terminal His₆ tag.

Recombinant, His-tagged human Pol was expressed in the E. coli strain Rosetta2 (DE3) pLysS. E. coli Rosetta2 (DE3) pLysS cells harboring pET-15b/POLH-NHis₆ were grown in Luria-Bertani medium supplemented with ampicillin (100 μg/mL) at 37°C with aeration. When cultures reached OD₆₀₀ 0.6–0.8, IPTG (1 mM) was added to the cells to induce expression of recombinant Pol η; 3 h after induction, cells were collected by centrifugation. Harvested cell pellets were resuspended in lysis buffer (20 mM sodium phosphate, pH 7.4, 0.5 M NaCl, and 1% TritonX-100). Suspensions were sonicated, and cell lysates were clarified by centrifugation. The resulting supernatants were loaded onto a HisTrap HP 1 mL (GE Healthcare), and each column was washed with Buffer A (20 mM sodium phosphate, pH 7.4, 0.5 M NaCl, and 40 mM imidazole). Bound His₆-tagged Pol was eluted with Buffer B (20 mM sodium phosphate, pH 7.4, 0.5 M NaCl, and 500 mM imidazole). Fractions containing recombinant Pol were dispensed in small aliquots into storage buffer (20 mM sodium phosphate, pH 7.4, 0.1 M NaCl, 1 mM EDTA, 10% glycerol, 10 mM -mercaptoethanol, and 0.5 mM phenylmethylsulfonyl fluoride) and stored at −80°C.

Recombinant Pol and KF exo⁻ proteins were purchased from CHIMERx and Fermentas, respectively.

2.2. Oligodeoxynucleotides

A 30-mer DNA template (5′-CTCATCAACATCTTXAATTCACAATCAATA-3′, where X represents Oz) for polymerase assays and a 9-mer DNA oligomer (5′-TGCTXGCGT-3′, where X represents Oz) for thermal denaturation studies were prepared as described previously [8]. For polymerase assays, the DNA template (5′-CTCATCAACATCTTGAATTCACAATCAATA-3′) and 5′-Alexa680-labeled 16-mer primers (5′-TATTGATTGTGAATTN-3′, where N represents either a C, G, A, or T) were purchased from Japan Bio Services. For thermal denaturation studies, 9-mer DNA oligomer (5′-TGCTNGCGT-3′ where N represents C or T and 5′-ACGCNAGCA-3′ where N represents C, G, A, or T) was synthesized using the standard phosphoramidite method.

2.3. Polymerase Assay for Primer Extension

Primer extension assays with all four dNTPs (5 μL) were carried out in mixtures containing the following components: (for Pol ) 50 mM Tris-HCl, pH 8.8, 10 mM MgCl₂, 1 mM DTT, and 400 μg/mL BSA; (for KF exo⁻) 50 mM Tris-HCl, pH 8.0, 5 mM MgCl₂, 1 mM DTT, and 100 μg/mL BSA; and (for Pol ) 40 mM Tris-HCl, pH 8.0, 1 mM MgCl₂, 10 mM DTT, 250 μg/mL BSA, 60 mM KCl, and 25% glycerol. All reaction mixtures contained 20 nM of the template, 10 nM of each primer, and 100 μM of each of the four dNTPs (dATP, dCTP, dGTP, and dTTP). The concentrations used for each DNA polymerase are specified in the respective figure legends. Reactions were performed at 37°C for 30 min and terminated by adding 5 μL of stop buffer (15 mM EDTA/10% glycerol). Aliquots (2.5 μL) of each reaction were subjected to electrophoresis in a denaturing 16% polyacrylamide gel containing 8 M urea at 30 W for 60 min. The Odyssey Infrared Imaging System (LI-COR) was used to measure signals on gel images.

2.4. Polymerase Assay for Incorporation opposite 5′-Neighboring Bases of G or Oz

Reaction mixtures similar to those described for the primer extension assays were used to analyze nucleotide selectivity during nucleotide incorporation opposite the bases adjacent to G or Oz. However, each of these reaction mixtures contained 20 nM of the template, 10 nM of each primer 5′-TATTGATTGTGAATTA(C/G)-3′, and 100 μM of a single dNTP (dCTP, dGTP, dATP, or dTTP).

2.5. Thermal Denaturation Studies

Thermal denaturation studies to determine values were conducted with a 9-mer DNA strand (5′-TGCTXGCGT-3′, in which X represents C, T, or Oz) and a complementary 9-mer strand (5′-ACGCNAGCA-3′, where N represents G, A, C, or T). Samples (100 μL) for thermal denaturation studies contained a 1 : 1 molar ratio of a 9-mer DNA strand and the complementary 9-mer strand in 50 mM sodium phosphate, pH 7.0, and 1 M NaCl with a final duplex concentration of 4 μM. Complementary oligomer pairs were allowed to anneal; each sample was heated in water bath to 60°C for 5 min and then slowly cooled to room temperature. Each sample was then covered with 90 μL of silicone oil (Life Technologies) to prevent evaporation by heating; an Ultrospec 3100 pro (GE Healthcare) was used to heat annealed samples from 20°C to 80°C at a rate of 1°C/min. As the samples were heated, the absorbance was monitored at 260 nm. Each of the values was determined from the maximum in the first derivative of the melting curve.

3. Results and Discussion

3.1. Primer Extension Assay with Pol

We investigate the efficiency of Pol -mediated primer extension past a lesion because Pol incorporates only guanine opposite Oz [8]. Specifically, we designed two 30-mer DNA templates that were identical except that one contained a G and the other contained an Oz; we also designed four different 16-mer primers that differed only in the nucleotide at the 3′ end; this nucleotide would pair with the G or Oz in the template.

When the template contained an undamaged G, Pol elongated DNA most efficiently from the primer with a C at the 3′-primer terminus; each of the mispaired primer termini resulted in less efficient primer elongation (Figure 2(a), compare lane 1 with lanes 4, 7, and 10). These results confirmed that Watson-Crick base pair is the most stable. A G:T mismatch at the primer terminus allowed for more efficient elongation than did the two other mismatches (Figure 2(a), compare lane 10 with lanes 4 and 7). These results were consistent with the previous finding that Pur:Pyr base pairs are more stable than Pur:Pur base pairs [12].

(a)

(b)

Figure 2: Extension from primer ends by Pol . Each primer contained a different nucleotide at the 3′ end (indicated by N, where N was C, G, A, or T in lanes 1–3, 4–6, 7–9, and 8–12, resp.) opposite G (a) or Oz (b). The amount of Pol was 25 mU in lanes 1, 4, 7, and 10 or 2.5 mU in lanes 2, 5, 8, and 11.

With the template containing Oz, Pol elongated DNA more efficiently from the primer with a G opposite the Oz (Figure 2(b), compare lane 4 with lanes 1, 7, and 10). Full-length elongation past the Oz:G base pair was at least 8-fold higher than elongation past any other base pair. These results were consistent with the previous finding that Pol incorporates only G opposite Oz [8]. Therefore, we speculated that Pol -mediated incorporation of G opposite Oz could be attributed to the stability of the Oz:G base pair.

Moreover, Pol -catalyzed full-length elongation past Oz:G was more efficient than elongation past either the G:G or G:A mismatch (compare Figure 2(b) lane 4 with Figure 2(a) lanes 4 and 7). These findings indicated that Oz:G was more stable than the Pur:Pur mismatches upon DNA synthesis that was catalyzed by Pol , which has a relatively high fidelity.

3.2. Primer Extension Assay with KF exo⁻

Next, we examined the ability of KF exo⁻ to extend primers past various primer-template base pairs (Figure 3). KF exo⁻, like Pol , extended primers past G:C more efficiently than past any other base pair (Figure 3(a), compare lane 1 with lanes 4, 7, and 10). Additionally, the order of base pairs with regard to efficiency of extension past a 3′-primer terminus was the same as that for Pol .

(a)

(b)

Figure 3: Extension from primer ends by KF exo⁻. Each primer contained a different nucleotide at the 3′ end (indicated by N, where N was C, G, A, or T in lanes 1–3, 4–6, 7–9, and 8–12, resp.) opposite G (a) or Oz (b). The amount of KF exo⁻ was 250 μU in lanes 1, 4, 7, and 10 or 25 μU in lanes 2, 5, 8, and 11.

Surprisingly, although KF exo⁻ incorporated both G and A opposite Oz [8], a primer containing Oz:G at the 3′-terminus was elongated up to the full length most efficiently (Figure 3(b) lane 4). In addition, the extension efficiency beyond Oz:G was ≥2-fold higher than that beyond Oz:C, Oz:A, or Oz:T (Figure 3(b), compare lane 4 with lanes 1, 7, and 10). This finding indicated that Oz:G was more stable than Oz:A upon primer extension; moreover, this difference in base pair stability was consistent with our previous ab initio calculations, which indicated that Oz:G is more stable than Oz:A [8].

3.3. Primer Extension Assay with Pol

As with Pol and KF exo⁻, we analyzed the efficiency of primer extension efficiency past G or Oz with Pol (Figure 4). Pol , like Pol and KF exo⁻, extended primers most efficiently from a C at the 3′-primer terminus (Figure 4(a), compare lane 1 with lanes 4, 7, and 10) whereas, unlike Pol or KF exo⁻, the extension efficiency from a mispaired primer terminus (G:G, G:A, or G:T) was 50% or more of that past a G:C base pair (Figure 4(a), lanes 4, 7, and 10). This finding was unsurprising given that Pol catalyzes error-prone replication of undamaged DNA [13–15].

(a)

(b)

Figure 4: Extension from primer ends by Pol . Each primer contained a different nucleotide at the 3′ end (indicated by N, where N was C, G, A, or T in lanes 1–3, 4–6, 7–9, and 8–12, resp.) opposite G (a) or Oz (b). The amount of Pol was 11.5 ng in lanes 1, 4, 7, and 10 or 1.15 ng in lanes 2, 5, 8, and 11.

Our previous study showed that Pol was equally able to incorporate G, A, or C opposite Oz [7], and Pol is known to be error-prone polymerase [13–15]. Nevertheless, the extension beyond Oz:G was about 2-fold more efficient than that beyond Oz:C, Oz:A, or Oz:T (Figure 4(b), compare lane 4 with lanes 1, 7, or 10). This result showed that Oz:G is more stable than each other Oz base pair; this finding was consistent with the findings for Pol or KF exo⁻.

3.4. The Thermal Stability of the DNA Duplex Containing the Oz Lesion

Furthermore, the values for duplexes containing Oz:G, Oz:A, Oz:C, or Oz:T were analyzed via thermal denaturation studies. However, the amount of oligonucleotide used in the polymerase reactions was insufficient to perform thermal denaturation studies. The yields from DNA synthesis of DNA oligonucleotides containing Oz usually increase as the length of the oligonucleotide decreases; therefore, we used short sequences that differed from those used in the primer extension reactions.

The value for DNA duplexes containing C:G was 55.1°C (Figure 5(a)) and that for a duplex containing T:A was 48.9°C (Figure 5(b)). This finding showed that C:G was more thermodynamically stable than T:A, which is a well-established fact commonly attributed to the difference in the number of hydrogen bonds forming the respective base pairs.

(a)

(b)

(c)

Figure 5: Melting curves of (a) C:G, (b) T:A, and (c) Oz:G 9-mer DNA duplexes at 4 μM duplex concentration.

The value for DNA duplex containing Oz:G was 45.7°C (Figure 5(c)). Meanwhile, values for DNA duplexes containing Oz:A, Oz:C, or Oz:T could not be determined because they were apparently below the detection limit ( < 40.0°C). Therefore, the Oz:G base pair was significantly more thermodynamically stable than the Oz:A, Oz:C, or Oz:T base pair.

3.5. Nucleotide Selectivity during Incorporation opposite 5′-Neighboring Bases of G or Oz

Findings from the primer extension assays revealed that for Pol , KF exo⁻, or Pol extension beyond Oz:G was more efficient than extension beyond any other base pair involving Oz. However, it is important that in cases of lesion bypass nucleotides are correctly incorporated beyond the lesion. To determine whether Pol , KF exo⁻, Pol , or each of these polymerases can accurately incorporate nucleotides after bypassing a Oz:G lesion, we analyzed nucleotide incorporation opposite the sequence TT immediately adjacent to and 5′ of G or Oz. As with the previous primer extension assays, we used each polymerase individually along with the optimal primer-template combination (G:C or Oz:G at the 3′-primer terminus) for efficient extension.

When the template contained an undamaged G, Pol and KF exo⁻ almost always incorporated two adenines opposite the TT bases that were immediately adjacent to the G in the template strand (Figures 6(a) and 6(b), lane 4); however, each enzyme did incorrectly incorporate some guanine (Figures 6(a) and 6(b), lane 3). Pol , unlike Pol or KF exo⁻, incorporated not only four adenines but also a guanine and a thymine (Figure 6(c), lanes 3–5), owing to the error-prone replication that is a characteristic of Pol [15].

(a)

(b)

(c)

Figure 6: Nucleotide incorporation opposite the bases adjacent to G or Oz by Pol (a), KF exo⁻ (b), or Pol (c). Left panels of (a), (b), and (c) show the control, which was extension of primers containing C opposite an undamaged G in the template. Right panels of (a), (b), and (c) show the extension of primers containing G opposite Oz in the template. The amount of Pol or Pol was 25 mU or 11.5 ng; the amount of KF exo⁻ was 25 μU for the left panel or 250 μU for the right panel.

With the Oz template, Pol β and KF exo⁻ each incorporated two adenines opposite the sequence TT that were adjacent to Oz in the template (Figures 6(a) and 6(b), lane 9); however, this incorporation was less efficient than that with the template that contained G instead of Oz. Pol incorporated four adenines, a guanine, and a thymine (Figure 6(c), lanes 8–10); however, these incorporation efficiencies with the Oz-containing template were lower than those with the G-containing template. Notably, Pol , unlike Pol and KF exo⁻, incorporated a cytosine opposite the T neighboring Oz (Figure 6(c), lane 7). Thus, Pol and KF exo⁻ can accurately incorporate the correct nucleotides after having passed beyond an Oz in a template; in contrast, Pol was error prone with regard to the nucleotides incorporated beyond Oz to the same degree as with incorporation beyond a G.

4. Conclusions

Our previous studies show that Pol , KF exo⁻, and Pol differ with regard to the pattern of nucleotide insertion opposite Oz. Specifically, Pol incorporates only G; KF exo⁻ incorporates either G or A; and Pol incorporates G, A, or C [7, 8]. Based on ab initio calculations, we predicted that only G would form a stable base pair with Oz [8–10]. Here, we try to clarify the difference between Oz:G, Oz:A, Oz:C, and Oz:T base pairs with regard to stability during DNA replication with Pol , KF exo⁻, or Pol .

We found that, for each polymerase (Pol , KF exo⁻, or Pol ), the efficiency of extension beyond Oz:G was higher than those for extension beyond Oz:C, Oz:A, or Oz:T. Furthermore, Oz:G was significantly more thermodynamically stable than Oz:A, Oz:C, or Oz:T based on determination of values for duplexes containing only one of the base pairs.

Therefore, we demonstrated that Oz:G was a stable base pair in experiments involving DNA replication and thermal denaturation. These conclusions were consistent with our previous ab initio calculations, which also indicated that Oz:G is more stable than Oz:A. Specifically, the results of this study reinforce the importance of Oz in oxidative guanine damage involving G:C-C:G transversions.

Conflict of Interests

The authors declare no conflict of interests.

Acknowledgments

This work was supported by K. Kino’s research grants from Japan Society for the Promotion of Science (JSPS), from Tokushima Bunri University, from Radiation Effects Association, from the Nakatomi Foundation, and from Japan Prize Foundation. M. Suzuki and M. Morikawa were supported by a Research Fellowship from JSPS for Young Scientists.

References

F. Maehira, I. Miyagi, T. Asato et al., “Alterations of protein kinase C, 8-hydroxydeoxyguanosine, and K-ras oncogene in rat lungs exposed to passive smoking,” Clinica Chimica Acta, vol. 289, no. 1-2, pp. 133–144, 1999.

S. Shibutani, M. Takeshita, and A. P. Grollman, “Insertion of specific bases during DNA synthesis past the oxidation-damaged base 8-oxodG,” Nature, vol. 349, no. 6308, pp. 431–434, 1991.

J. Cadet, M. Berger, G. W. Buchko, P. C. Joshi, S. Raoul, and J.-L. Ravanat, “2,2-Diamino-4-[(3,5-di-O-acetyl-2-deoxy-β-D-erythro-pentofuranosyl)amino]-5-(2H)-oxazolone: a novel and predominant radical oxidation product of 3′,5′-Di-O-acetyl-2′-deoxyguanosine,” Journal of the American Chemical Society, vol. 116, no. 16, pp. 7403–7404, 1994.

W. Luo, J. G. Muller, and C. J. Burrows, “The pH-dependent role of superoxide in riboflavin-catalyzed photooxidation of 8-oxo-7,8-dihydroguanosine,” Organic Letters, vol. 3, no. 18, pp. 2801–2804, 2001.

K. Kino and H. Sugiyama, “Possible cause of G--G transversion mutation by guanine oxidation product, imidazolone,” Chemistry & Biology, vol. 8, no. 4, pp. 369–378, 2001.

B. Matter, D. Malejka-Giganti, A. S. Csallany, and N. Tretyakova, “Quantitative analysis of the oxidative DNA lesion, 2,2-diamino-4-(2-deoxy-β-D-erythro-pentofuranosyl) amino]-5(2H)-oxazolone (oxazolone), in vitro and in vivo by isotope dilution-capillary HPLC-ESI-MS/MS,” Nucleic Acids Research, vol. 34, no. 19, pp. 5449–5460, 2006.

K. Kino, N. Ito, K. Sugasawa, H. Sugiyama, and F. Hanaoka, “Translesion synthesis by human DNA polymerase eta across oxidative products of guanine,” Nucleic Acids Symposium Series, vol. 48, pp. 171–172, 2004.

K. Kino, K. Sugasawa, T. Mizuno et al., “Eukaryotic DNA polymerases α, β and ε incorporate guanine opposite 2,2,4-triamino-5(2H)-oxazolone,” ChemBioChem, vol. 10, no. 16, pp. 2613–2616, 2009.

M. Suzuki, K. Kino, M. Morikawa, T. Kobayashi, R. Komori, and H. Miyazawa, “Calculation of the stabilization energies of oxidatively damaged guanine base pairs with guanine,” Molecules, vol. 17, no. 6, pp. 6705–6715, 2012.

M. Suzuki, K. Kino, M. Morikawa, T. Kobayashi, and H. Miyazawa, “Calculating distortions of short DNA duplexes with base pairing between an oxidatively damaged guanine and a guanine,” Molecules, vol. 19, no. 8, pp. 11030–11044, 2014.

L. Yang, W. A. Beard, S. H. Wilson, B. Roux, S. Broyde, and T. Schlick, “Local deformations revealed by dynamics simulations of DNA polymerase β with DNA mismatches at the primer terminus,” Journal of Molecular Biology, vol. 321, no. 3, pp. 459–478, 2002.

W. A. Beard, D. D. Shock, and S. H. Wilson, “Influence of DNA structure on DNA polymerase β active site function: extension of mutagenic DNA intermediates,” The Journal of Biological Chemistry, vol. 279, no. 30, pp. 31921–31929, 2004.

T. Matsuda, K. Bebenek, C. Masutani, I. B. Rogozin, F. Hanaoka, and T. A. Kunkel, “Error rate and specificity of human and murine DNA polymerase η,” Journal of Molecular Biology, vol. 312, no. 2, pp. 335–346, 2001.

C. Kano, F. Hanaoka, and J.-Y. Wang, “Analysis of mice deficient in both REV1 catalytic activity and POLH reveals an unexpected role for POLH in the generation of C to g and G to C transversions during Ig gene hypermutation,” International Immunology, vol. 24, no. 3, pp. 169–174, 2012.

C. Masutani, R. Kusumoto, S. Iwai, and F. Hanaoka, “Mechanisms of accurate translesion synthesis by human DNA polymerase η,” EMBO Journal, vol. 19, no. 12, pp. 3100–3109, 2000.