Journal of Nanomaterials

Volume 2012 (2012), Article ID 943204, 12 pages

doi:10.1155/2012/943204

Research Article

Harmonic Generation and Wave Mixing in Confinement Structures: An Account of Pump Depletion in Second-Order Nonlinear Multilayer Microcavities

Serge Gauvin and Maxime Boudreau

Groupe de Recherche sur les Couches Minces et la Photonique, Département de Physique et d'Astronomie, Université de Moncton, Moncton, NB, Canada, E1A 3E9

Received 15 May 2012; Accepted 20 June 2012

Academic Editor: Vo-Van Truong

Copyright © 2012 Serge Gauvin and Maxime Boudreau. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In presence of weakly nonlinear media, it is tempting to neglect pump wave depletion when calculating the intensity of the various generated nonlinear components. However, even in the case of very weak pump wave depletion conditions, an optical structure that allows multipass optical paths, such as high finesse multilayer microcavities, could lead to significant cumulative pump wave depletion. In such conditions, neglecting pump depletion might lead to large computational errors. A matrix formalism devoted to such pump depletion in planar layered nonlinear structures without resort to the “bound” and “free” waves concept is described. A general approach that makes use of “intrinsic” and “extrinsic” waves concept is given, through a slight modification of the canonical propagation matrix. The theoretical results show that even in the case of very weak pump depletion conditions, the cumulative effect due to confinement actually leads to very significant effects. It turns out that taking into account the pump depletion is mandatory for numerous experimental conditions. This matrix formalism applies to absorbing media, and is extensible to include the case of anisotropic layers and cascading effects.

1. Introduction

From both classical electromagnetism and quantum electrodynamics point of view, there is a constantly growing interest with respect to nonlinear optics in confined structures [1–10]. In the last two decades, a large amount of theoretical and experimental efforts have been devoted to nonlinear processes in optical microcavities, including layered structures [11–22]. Notable attention was given to harmonic generation. Besides a better understanding of basic phenomena in highly confined media, interest is also linked to the possibility of conceiving new technological devices. Indeed, it is now well established that in highly confined structures many optical processes are strongly modified [23–29]. From the point of view of quantum electrodynamics, the modification of vacuum field fluctuations and the concomitant modulation of the density of states are responsible for such effects [30]. The resultant enhancement and inhibition for specific optical processes open doors toward new possibilities devoted to the manipulation of electromagnetic radiation. An important applications field is integrated optics and significant innovations are anticipated.

Because high-confinement structures imply many roundtrips of optical waves, even small pump depletion could cause a significant cumulative reduction in the pump wave amplitude. It is an important goal of the present paper to address this issue. Among other possible formal approaches, including purely numerical ones, here we focus on the transfer matrix method and show how a generalized version of the so-called “propagation matrix” leads to a convenient matrix formalism. Indeed, the transfer matrix method is widely used to calculate the optical properties of layered structures. This formalism automatically takes into account all multiple reflections for all waves components (pump and nonlinear waves) without explicit enumeration and cumbersome summations. Moreover, this formalism is well suited to computer calculations. This formalism could be especially useful in the context of multilayer microcavities. In brief, this paper describes an alternative approach and we believe that the picture and formalism linked to this formalism are both simple and allow further generalization.

2. System Description

Figure 1 shows a general planar multilayered structure made of N stratums (including the substrate and the superstrate). The layers are of infinite extension in the “x-y” plane. The incidence medium is labeled 0. The layer in concern is medium l (which should go over 0 to N in order to account for all nonlinear layers). The transmission medium is . It is assumed that both media 0 and are semi-infinite and transparent. All layers are nonmagnetic (), can be nonlinear and anisotropic. However, they are homogeneous. For every layer, including the substrate and the superstrate, the coherence length of the incident radiation is assumed much larger than its optical thickness. The substrate and superstrate can thus be accounted by the matrices described below. If the substrate or the superstrate have an optical thickness much larger than the incident radiation coherence length and are made of linear material, one takes account of their presence through the reflectance of their respective interface with surrounding media. The intermediate context of layers thickness similar to the incident radiation coherence length needs specific approach. It is omitted here. As for any layer, when the substrate or the superstrate are absorbing, one includes the exponential decrease absorption law (Beer-Lambert-Bouguer).

Figure 1: General planar multilayered structure and notation system example. Dark layers are assumed nonlinear.

The incident radiation is a plane wave. Section 4 describes the formal details. In a few words, each layer l has a thickness and a complex refractive index (The layer is absorbing when is positive). This choice presumes that a forward traveling wave is described by an exponential phase factor of the form (). Care must be practiced with various possible conventions [31]. The electric field of the light wave components is . The input field, , is associated to the incident (external) pump wave while the output fields, and , are linked to the nonlinear outgoing waves emerging from the structure. The outgoing components and are propagating in the backward (incidence side) and forward (transmission side) direction respectively.

3. Formalism Overview

Our approach is based on a matrix formalism [32–35]. In brief, column vectors describe the fields everywhere along the “” axis while square “transmission matrices” describes the system. Any field vectors pairs are linked through a square transmission matrix. In presence of isotropic media, the field vectors have two rows, and are linked through matrices. In presence of anisotropic media, the field distribution within each layer can be expressed as a sum of four partial waves (eigenwaves) [34–46]. Then, one deals with four-row field vectors and matrices. Fortunately, in numerous practical applications we deal with anisotropic transparent layer having one axis normal to the layers' plane. Then, working with plane polarized pump waves, orienting properly its polarization plane, and restraining the incidence to the normal angle in case of biaxial material, the isotropic matrix formalism is suitable. Working with effective nonlinear coefficient is another possibility when dealing with anisotropic nonlinear media [47].

The point of view underlying the current formal approach can be summarized simply with the concept of “intrinsic” and “extrinsic” waves. This concept was already put forward with success [15] (the concept of “intrinsic” and “extrinsic” waves, equivalent of the one of “self" and “add" waves found in [15], were coined without knowledge of [15], during a study on microcavities in France Telecom's laboratories, in 1995). In brief, a contrario to the point of view based on the concept of “bound” and “free” waves [48–50], here there is no need for a source vector and, in addition, we use a modified “propagation matrix” (details specified in Section 5).

For the purpose of the present discussion, we are dealing with two semi-infinite media where the intrinsic wave does not suffer any reflection. From the intrinsic and extrinsic waves point of view, a nonlinear wave generated within a bulk medium is depicted as a unique wave propagating along with the pump wave and having amplitude that varies in space. Because this wave does not originate from outside the bulk medium nor depends on external factors such as the presence of interfaces, this wave is thus said to be “intrinsic”. Consequently, in context of harmonic generation the nonlinear wave is not given by the superposition of constant amplitude “bound” and “free” waves from which interference governs the spatial amplitude modulation. As shown in Figure 2, an intrinsic nonlinear wave propagating in a medium, , originates from within that medium. A contrario, an “extrinsic” wave propagating in a medium, l, originates from an interface or an external stratum. The most important feature of an extrinsic wave is that it travels in space with constant amplitude (except when linear absorption occurs).

Figure 2: Variable-amplitude pump and nonlinear waves in semi-infinite media. The nonlinear wave defines the internal wave.

Figure 2 also depicts the spatial evolution of the pump and nonlinear waves as they go deeper into a nonlinear medium. Both waves have variable amplitude. The (internal) pump field is the one inside the nonlinear medium, not the one incident on the medium .

Our approach involves each nonlinear layer separately. For each such layer, the specific goal is to calculate the field amplitude of the corresponding intrinsic (nonlinear) and pump waves versus depth inside the medium, at every wavelength. From now on, this pair of solutions is the so-called “non-linear-layer solution.” Once that solution is known for the layer , the matrix formalism allows to easily relates the nonlinear fields inside the structure to its outside. Of course, the use of the Manley-Rowe relation is invaluable to compute pump depletion.

Wave mixing is also important in nonlinear optics. Here we wish to make distinction between mixing of two, or more, incident pump waves and mixing of generated nonlinear waves with pump wave or other nonlinear waves (cascading). We refer to the former as “primary mixing” while the later is designated as “secondary mixing”. In the context of primary wave mixing, the overall pump field in the layer is given by the superposition of the incident pump waves. On the other hand, the intrinsic wave is alternatively one of the nonlinear components making the global “nonlinear layer solution”. Thus, in case of two pump waves, and , in a second-order nonlinear medium, one computes every component , , 2, and 2 separately. Even if only one of these nonlinear components is under concern, one has to compute all components if accurate pump depletion is required.

In presence of many nonlinear layers, when secondary mixing is neglected, the overall output is obtained by running through all layers and summing all the outgoing nonlinear waves (including the phase) propagating in the transmission side. From now on, this is the so-called “process.” Provided that secondary mixing entails negligible depletion, the matrix method presented below can account for cascading. Indeed the secondary mixing waves are simply seen as usual pump waves.

In presence of weak nonlinearity, it would be tempting to neglect pump depletion. However, in case of large number of nonlinear layers, the cumulative effect of even weak pump depletion in each layer could lead to large computational error. Thus, in order to take account of pump depletion that might occur in nonlinear layers, the pump field distribution within the structure is treated as a whole (self-consistency).

The linear and nonlinear properties of every layer are supposed known. This adds to material's axis orientations when anisotropy can't be neglected. It will soon become obvious to the reader that the extension of our approach to anisotropic layers is straightforward, though more algebraically cumbersome. The difficulties are only computational, not conceptual. However, it adds very little to the comprehension of the current approach to keep track of every field components and advance with a complete formal treatment of N anisotropic layers. Because the isotropic and anisotropic formalisms are isomorphic, the generalization to the case of anisotropic layers is left as a forthcoming paper. Specific formalisms are better adapted to this extension than others [41–46]. Then, for the sake of simplicity the formalism put forward in this paper is devoted to isotropic layers. It provides the basic description of our formalism. Subsidiary parameters such as, inhomogeneity, interface roughness, coherence length, beam size, anisotropy and so forth are omitted. This enables us to focus on the basic ideas without the added algebraic complications.

In presence of isotropic layers only, an arbitrary pump wave has to be separated into two orthogonal eigenmodes (“s” and “p” polarization). The resultant, overall outgoing waves are calculated separately and combined at the end of the “process”. Because of their more general structure, no such double treatment is required when anisotropic media matrices are in use.

4. Definitions, Conventions, and Notation System

For sake of simplicity, and in order to keep track of all phase shifts, the complex amplitude (phasor) notation is used to fully describe the electric field. Because it doesn’t add any supplementary information, the use of complex conjugate when dealing with real quantities is redundant and not systematically shown in equations.

In order to avoid confusion, the formalism makes use of a subscripts-superscripts notation system, for both coordinates and fields. The superscripts are sometime bracketed to avoid mixup with mathematical exponents. As shown in Figure 1, the incident waves propagate along the “z” axis, forward from the right to the left. The superscripts “+” and “−” are used to indicate the propagation direction when applied to E. These superscripts are also applied to z with a slightly different meaning. A self-explained example is shown in Figure 1. It designates the amplitude () of the intrinsic (I), nonlinear (N), and electric field (E) of a wave located on the backward side (−) of the coordinate (the interface between layers m and l) and propagating into layer l in the forward (+) direction.

For the purpose of easy reading of some important equations, we sometimes write the abbreviated form of selected specific fields. According to the notation system, the abbreviated forms for the incident pump wave field () and the generated outgoing waves () are defined by

In (1), we keep the superscript + in order to distinguish from an ongoing pump wave eventually incident on the structure from the transmission side. Indeed, the picture described below remains valid. Nevertheless, here we set the negative input component to 0 (). We define the abbreviated forms for intrinsic ( and ) and pump ( and ) fields, shown in Figure 3, as follows

Finally, our convention for isotropic media is that the forward traveling waves amplitude figures in the first row of the column field vectors.

Figure 3: Definition of “intrinsic” and (internal) pump waves.

5. Basic Matrices

In regard to the current formalism, four basic system matrices are required (“coupling,” “continuity,” “propagation,” and “characteristic” matrix). Care must be practiced with various possible conventions [31] when writing matrices.

5.1. Coupling Matrix

On both sides of an interface, say interface l/k, the field vectors are related through a “coupling matrix," , such that (incidence medium is labeled by the rightmost index)

The form of the coupling matrix does not depend on the polarization type and is given by

However, the Fresnel coefficients and (reflection and transmission, resp.) depend on the polarization type. Here, we adhere to the normal (Fresnel) convention [31]. We refer the reader to literature for their explicit expression.

5.2. Continuity Matrix

On both sides of an interface, say interface , the field vectors are also related through “continuity matrices” (This matrix is also known as “admittance matrix" and “dynamical matrix"), and , such that

These matrices originate from the tangential continuity condition for electric and magnetic fields at an interface (in absence of interfacial current density). They can be used as an alternative definition to the coupling matrix. Indeed, from (8) and (10), we conclude that

The continuity matrix depends on polarization. It is given by (Y is the admittance and the propagation angle)

for s type polarization, and by

for p type polarization.

5.3. Propagation Matrix

On both intrinsic sides of a single layer, say layer l, the field vectors are related through a “propagation matrix" (we prefer “propagation matrix" to the denomination “phase matrix" because that matrix contains information on amplitude in addition to translational phase shift), , such that

The propagation matrix does not depend on polarization and is given by

This matrix also agrees with the convention that a forward traveling wave is described by an exponential phase factor of the form (). The reader would notice that, the propagation matrix defined here has a slightly different form than usual. Indeed, we introduced the “nonlinear amplitude coefficients” and . This allows accounting for the amplitude variation other than linear absorption (Amplification in case of lasing medium). Indeed, linear absorption is fully described by the complex phase . In context of linear optics the amplitude coefficients both reduce to 1. Formally, we define the amplitude coefficients for both internal (not the incident or external) pump waves as, using (6) as follows:

and, using (7) as

In presence of depletion, the pump waves are such that and . Most of the formal difficulties come from the nonlinear behavior of the optical process. Indeed, nonlinearity imposes that and depend on the field amplitudes and respectively. We discuss the formal implications below. For the moment, we assume that the amplitude coefficients are known. As stated in Section 3, the most important feature of the extrinsic waves is that they are described by propagation matrices having amplitude coefficients and set to 1.

5.4. Charateristic Matrix

With the help of continuity and propagation matrices, one defines the “characteristic matrix" (“Characteristic matrices” are also known as “Abelès matrices") as

The characteristic matrix contains all the necessary information about the layer l.

5.5. Transmission Matrix

Writing an ordered product of coupling and propagation matrices, we can establish a connection anywhere along the -axis between any field vectors pairs, say the fields within the layers and as follows:

Even in presence of many nonlinear layers causing pump depletion, the formalism remains well founded if one uses the propagation matrices through (15). Introducing the characteristic matrices, we reduce the number of required matrices by a factor of two. Making use of (11), (18) and (19) we easily get

This allows defining the system transmission matrix as

Equation (20) then takes the abbreviated form

6. Pump and Nonlinear Waves in Layered Structures

In the act of a starting point we assume that the whole structure contains only one (isotropic) nonlinear layer, . From (22) we connect the field of the nonlinear wave emerging from the structure in the transmission side to the layer through

or equivalently as

On the other hand, we connect the field of the nonlinear wave emerging from the structure in the incidence side to the layer as

Equations (24) and (25) can now be connected via the propagation matrix such as

In (26) we connect extrinsic waves. As stated above, the extrinsic waves are described by propagation matrices having amplitude coefficients and set to 1 (superscript E is used as a reminder). This connection leads to the following:

Making use of (2), (3), (4), and (5), we abbreviate this equation for easier reading as

where

Equation (28) set up an explicit link between the pump wave incident on the structure and the outgoing nonlinear components. Indeed, the field amplitudes and are determined from the “nonlinear-layer solution,” and are known functions. From (28) we get (the matrix element indexes are bracketed to avoid confusion with layers' labels)

As illustrated in Figure 3, the process of calculating and requires the amplitude of the pump waves and given by (6) and (7) respectively. They are determined from ( is the amplitude reflection coefficient of the whole structure at pump wavelength)

Here, is given by

with now defined by

In presence of pump depletion, we make use of the generalized propagation matrix introduced in (15). The amplitude coefficients and are determined from the “nonlinear layer solution” for and are known. One understands that in presence of pump depletion, the amplitude coefficients and cannot be set to 1. Unfortunately, from (6), (7), (15), (16), (17), (18), (31), and (32) one realizes that the fields and are themselves required for their own determination. Indeed, the pump fields are required in the computation of , and therefore also for the computation of . This self-consistency requirement leads to two complex implicit equations for and . More specifically, writing (31) and (32) in the following compact forms

and the implicit equations are (here pump depletion occurs only in one layer)

In (36) we explicitly introduced the fields as variable for clarity. From these equations, we now introduce the “deviation functions” and as

In general, these functions do not have simple analytic representation. Finding analytic solution to this system could be difficult. However, (37) are easily computable once the amplitude coefficients and are known. Because the pump fields are complex numbers, each deviation function depends on four parameters (in addition to ). From a geometrical point of view, the deviation functions describe two complex ( and ), or evenly four real (, , and ), hypersurfaces in a five dimensional space. The solution for the pump fields and is clearly given at the crossing point of the hypersurfaces in the hyperplane . This procedure is equivalent to solving a system of four-variable nonlinear algebraic equations. It is also analogous to load-line analysis practiced in electronics when dealing with nonlinear electronic devices and searching for the operating (quiescent) point. Thus, one solves self-consistency approximately through numerical calculations. However, the accuracy level can be made arbitrary small. Developing algorithms that locate the crossing point is not a difficult task, especially if one puts forward the knowledge one has on the gradient of the hypersurfaces. The solution can be granted a posteriori by the application of conservation laws such as field continuity at all interfaces and/or energy balance accounting for linear and nonlinear waves (even in presence of absorption, if known). In case of many depleting layers, the approach described here still applies. One has to add four more dimensions to the hyperspace each time one includes a depleting layer. As an alternative, an iterative algorithm applied to the pump fields could also help. Finally, the above algorithms extend to the context of primary wave mixing. One adds four dimensions to the hyperspace for each pump wave. Nonetheless, it is not the purpose of this paper to further scrutinize the aspects of pump fields' self-consistency.

7. Testing the Formalism: Second Harmonic Generation

7.1. Structure Description

The cavity's thickness is defined by the thickness of the confined nonlinear layer. The microcavity involves two identical mirrors with one nonlinear layer imbedded in-between. Each mirror consists of dielectric layers. The low index layers are 205.4 nm thick SiO₂ () and the high-index layers are 151.7 nm thick ZrO₂ (). The layers in contact with the nonlinear layer are both SiO₂. All dielectric layers are assumed transparent, isotropic and achromatic. The cavity's finesse is close to 400. The incoming pump wave amplitude is  V/m. This corresponds to a fairly small pump intensity of 5,31 GW/m² (531 kW/cm², this intensity is approximately obtained with a 1 μJ, 50 ps duration pulse focalized on a 200 μm diameter spot.). The nonlinear medium is presumed to be 2-methyl-4-nitroaniline (MNA), a highly nonlinear material [51, 52], known as a “yellow material”. The only important nonlinear axis is along the cleavage plane. Fortunately, this axis is parallel to the layers’ plane [53]. Working with linearly polarized pump wave having their plane aligned along the nonlinear axis, an isotropic medium formalism is adequate. The incidence angle is set normal. The nonlinear layer is assumed transparent, although chromatic dispersion is included [54]. The second order susceptibility is  pm/V [55]. Finally, the intensity is obtained from

7.2. Comparison of Conceptual Approaches

In order to test the current matrix formalism, we compare calculations, based on the intrinsic and extrinsic waves concept, with previous one [29], based on the concept of bound and free waves (Bethune's formalism [11]). Of course, because only the current formalism takes into account the pump depletion, for the purpose of comparison we neglected pump depletion. In [29], our aim was to calculate the outgoing second harmonic generation (SHG) from a layered microcavity embedding only one second-order nonlinear layer. The calculations are performed for a “thick” microcavity, that is a “ microcavity” ( μm). Figure 4(a) shows calculation based on bound and free waves concept while Figure 4(b) shows calculation based on the current matrix formalism, founded on the concept of intrinsic and extrinsic nonlinear waves. The agreement appears very satisfying. Only minute differences (due to graphical resolution) can be seen. This comparison is an indication that both conceptual approaches are well founded.

(a)

(b)

Figure 4: Calculation comparisons. (a) calculation based on “bound” and “free” waves concept (Bethune's formalism), (b) calculation based on “intrinsic” and “extrinsic” waves concept (present formalism).

Figure 4 does not show however that the intensity of modes is strongly wavelength dependent. Indeed, the intensity of the sharp peaks between 1,05 and 1,30 μm goes far beyond the graph limit of 4000 W/m². This modulation and “pseudomodes” very close to the edges of the mirror's bandgap below 1,1 μm and above 1,3 μm are discussed elsewhere [29].

7.3. Nonlinear Layer Solutions

To determine the nonlinear-layer solutions, we solve the following one-dimensional nonlinear wave equation (here it is implicit that E applies to the nonlinear wave and v is its phase velocity):

This equation is readily obtained from basic electromagnetic theory [47]. We assume that the source of nonlinear component is only the second-order nonlinear susceptibility. The nonlinear source function, , is then given by (the subscript stands for “pump")

As above, the permeability is set to 1. We search for solutions in the form of a modulated amplitude plane wave

The occurrence of phase mismatch is formally described through

For convenience, we investigated four possibilities; (1) nonphase matching SHG without pump depletion (NMND), (2) nonphase matching SHG with pump depletion (NMWD), (3) phase matching SHG without pump depletion (PMND), (4) phase matching SHG with pump depletion (PMWD). The corresponding “nonlinear-layer solutions” are already known (can be found in any good book on nonlinear optics) and summarized in Table 1. They assume slowly varying amplitude approximation (the context of important amplitude variation is easier solved through numerical calculations.) and no absorption at pump and harmonic waves. Nonetheless, absorption at pump wavelength can be included in the calculation of pump fields and given by (31) and (32), respectively.

Table 1: “Nonlinear layer solutions” (Equations number are below each one).

Without pump depletion
With pump depletion

Non-phase matching
NMND
NMWD

(*)
(**)

Phase matching
PMND
PMWD

(***)
(****)

In order to complete the pertaining “nonlinear-layer solution,” the pump wave amplitude is found through the use of Manley-Rowe relation expressed in the following form (by definition the phase of pump wave is set to 0)

We note that from (43), (* *), and (* * * *) in Table 1 one sees the implicit dependence of the amplitude coefficients on the pump fields.

From (43) and (* * * *) in Table 1, one determines that pump wave suffers an amplitude decline of about 15% when

From (38), this imposes a limit on pump wave intensity given by

For a 1 μm thick MNA pumped at  μm, this limit is about 1,64 PW/m² (164 GW/cm²). Through focusing, such value is easily achievable with typical ps-lasers.

8. Results and Discussion

With the aim to characterize the significance, or not, of pump depletion in nonlinear multilayer microcavities, we investigate the effects of three important parameters; (1) intensity of the incident (external) pump wave (Figure 5), (2) thickness of the nonlinear layer (Figure 6), and (3) nonlinear susceptibility of the nonlinear layer (Figure 7). For all figures, a continuous (blue) curve means “without pump depletion” while a dashed (red) curve means “with pump depletion.”

(a)

(b)

(c)

Figure 5: Effect of incident-pump-wave intensity on pump depletion, versus wavelength. Continuous (blue) curve: pump depletion neglected; dashed (red) curve: pump depletion taken into account. (a) “weak” incident-pump-wave intensity (5,31 GW/m² or 2,0 MV/m). The inset is a zoom-in on the central peak. (b) “Intermediate” incident-pump-wave intensity (53,1 GW/m²). (c) “Strong” incident-pump-wave intensity (531 GW/m²).

(a)

(b)

Figure 6: Effect of high nonlinear layer's thickness on pump depletion, versus wavelength. Continuous (blue) curve: pump depletion neglected, dashed (red) curve: pump depletion taken into account. (a)  μm or . (b)  μm or .

(a)

(b)

Figure 7: Effect of high nonlinear susceptibility on pump depletion versus wavelength. Continuous (blue) curve: pump depletion neglected, dashed (red) curve: pump depletion taken into account. (a) =100pm/V. (b) =10pm/V.

In Figure 5, the calculations are performed in the cases of PMND and PMWD, for a “thin” microcavity, that is a “ microcavity” ( μm). This thickness allows one mode in the center of the mirror's bandgap and two pseudomodes. In Figure 5 the intensity of the incident pump wave varies from 5,31 GW/m² (as previously) to 531 GW/m². The effect of pump depletion is clearly seen even at weak intensity and is dominant for the central mode, relatively to the pseudomodes. This is expected because the central mode suffers much more roundtrips than pseudomodes. Also anticipated and in agreement with the results from the undepleted case, an increase in incoming pump wave intensity by one order of magnitude increases the outgoing harmonic wave by two orders of magnitude. Also expected and shown in Figures 5(b) and 5(c), neglecting the pump depletion might lead to such a large computational error that the outgoing harmonic intensity can be calculated having a higher value than the incoming pump wave intensity, which is not the case when taking into account the pump depletion. Finally, it worth noting that even the “strong” incident pump wave intensity (531 GW/m²) is far from the strongest possible intensity.

In Figure 6, the calculations are performed in the cases of NMND and NMWD, at the “intermediate” incident pump wave intensity (53,1 GW/m²). In Figure 6 the thickness of the nonlinear layer varies from 10 μm to 11 μm. The 10 μm thickness corresponds very closely to an odd number, 11, of nonlinear coherence lengths (in this work, we adopt the definition of the nonlinear coherence length, , as the distance between a minimum and a maximum in the spatial profile of SHG intensity. Formally, here, . Some authors define the nonlinear coherence length as twice this value), so that SHG is maximized. A contrario, The 11 μm thickness corresponds very closely to an even number, 12, of coherence lengths, so that SHG is minimized. As expected, the layer having an odd number of coherence lengths in thickness yield a greater SHG wave than for an even number of coherence lengths.

In Figure 7, the calculations are performed in the cases of PMND and PMWD, for a “thin” microcavity, that is a “ microcavity” ( μm), at the “intermediate” incident pump wave intensity (53,1 GW/m²). In Figure 7 the nonlinear susceptibility varies from  pm/V to  pm/V. As expected from the undepleted case, a decrease in nonlinearity by one order of magnitude decreases the resulting outgoing harmonic wave by two orders of magnitude. From the numerical values found in Figure 7, neglecting the pump depletion for the current structure (a typical multilayered microcavity embedding a nonlinear medium the order of 100 pm/V) when submitted to a moderate incident pump wave intensity (~50 GW/m²), causes an inaccuracy as large as 350% in the intensity of the outgoing harmonic wave. This error is reduced to a mere 2% in presence of a moderately nonlinear medium (~10 pm/V). We expect a negligible error in case of a weakly nonlinear medium (~1 pm/V). Of course, this is not a general rule and various structures embedding arbitrary nonlinear medium and submitted to variable incident pump wave intensity should be covered with proper calculation.

9. Summary, Conclusions, and Perspectives

In summary, in presence of optically confining structures embedding nonlinear medium, even submitted to a low incident pump wave intensity, neglecting the pump depletion could lead to large errors in the computation of the intensity of the outgoing harmonic waves. This could have important consequences when light control and management in stratified nanostructures is involved. The matrix formalism described in this paper appears very suitable to this task and could be helpful in numerous interesting situations where the simulation of the optical properties on nonlinear-layered nanostructures is required. The complete formalism presented here is easily implemented on a computer in few hours.

The approach given in this paper is a step forward; a very general formalism devoted to the theory of nonlinear processes in layered structure. Especially when multiple layer (cumulative) pump depletion might occur. It would also be of interest to study different structures incorporating some nonlinear layers. The effect of various parameters such as their thickness and/or separation would strongly affect the emerging nonlinear waves. A forthcoming next step could be the extension of this approach to include subsidiary parameters neglected above such as, anisotropy, inhomogeneity, and strongly depleting secondary wave mixing.

Acknowledgment

One of the authors (SG) is very grateful to Professor Joseph Zyss for his assistance and support at the early stage of this work. The authors thank the Conseil de recherches en sciences naturelles et en génie du Canada, the Fondation de l’innovation du Nouveau-Brunswick and the Faculté des études supérieures et de la recherche de l’Université de Moncton for their financial support.

References

H. Yokoyama and K. Ujihara, Eds., Spontaneous Emission and Laser Oscillation Microcavities, CRC Press, 1995.

R. Chang and A. Campillo, Eds., Optical Processes in Microcavities, World Scientific, 1996.

K. Vahala, Ed., Optical Microcavities, World Scientific, 2004.

S. Dutra, Cavity Quantum Electrodynamics: The Strange Theory of Light in a Box, Wiley, 2005.

S. Haroche and J. M. Raimond, Exploring the Quantum: Atoms, Cavities, and Photons, Oxford University Press, 2006.

A. Kavokin, J. Baumberg, G. Malpuech, and F. Laussy, Microcavities, Oxford University Press, 2007.

B. Deveaud, Ed., The Physics of Semiconductor Microcavities, Wiley-VCH, 2007.

J. Heebner, R. Grover, and T. Ibrahim, Optical Microresonators: Theory, Fabrication and Applications, Springer, 2008.

A. Matsko, Ed., Practical Applications of Microresonators in Optics and Photonics, CRC Press, 2009.

K. Ujihara, Output Coupling in Optical Cavities and Lasers, Wiley-VCH, 2010.

D. S. Bethune, “Optical harmonic generation and mixing in multilayer media: analysis using optical transfer matrix techniques,” Journal of the Optical Society of America B, vol. 6, pp. 910–916, 1989.

D. S. Bethune, “Optical harmonic generation and mixing in multilayer media: extension of optical transfer matrix approach to include anisotropic materials,” Journal of the Optical Society of America B, vol. 8, pp. 367–373, 1991.

S. Bauer, “Second-harmonic generation of light in ferroelectric polymer films with a spatially nonuniform distribution of polarization,” IEEE Transactions on Electrical Insulation, vol. 27, no. 4, pp. 849–855, 1992.

N. C. Frateschi, P. D. Dapkus, S. S. Ou, J. J. Yang, and M. Jansen, “Analysis of nonplanar wave propagation through multilayer bragg reflectors for folded cavity and vertical cavity surface emitting laser structures,” IEEE Journal of Quantum Electronics, vol. 31, no. 4, pp. 627–635, 1995.

N. Hashizume, M. Ohashi, T. Kondo, and R. Ito, “Optical harmonic generation in multilayered structures: a comprehensive analysis,” Journal of the Optical Society of America B, vol. 12, pp. 1894–1904, 1995.

E. Rosencher, B. Vinter, and V. Berger, “Second-harmonic generation in nonbirefringent semiconductor optical microcavities,” Journal of Applied Physics, vol. 78, no. 10, pp. 6042–6045, 1995.

R. J. Gehr, G. L. Fischer, R. W. Boyd, and J. E. Sipe, “Nonlinear optical response of layered composite materials,” Physical Review A, vol. 53, no. 4, pp. 2792–2798, 1996.

C. Pedersen and T. Skettrup, “Laser modes and threshold conditions in N-mirror resonators,” Journal of the Optical Society of America B, vol. 13, no. 5, pp. 926–937, 1996.

M. Auslender and S. Hava, “Scattering-matrix propagation algorithm in full-vectorial optics of multilayer grating structures,” Optics Letters, vol. 21, no. 21, pp. 1765–1767, 1996.

L. Caleo, C. Sibilia, P. Masciulli, and M. Bertolotti, “Nonlinear-optical filters based on the cascading second-order effect,” Journal of the Optical Society of America B, vol. 14, no. 9, pp. 2315–2324, 1997.

S. Enoch and H. Akhouayri, “Second-harmonic generation in multilayered devices: theoretical tools,” Journal of the Optical Society of America B, vol. 15, no. 3, pp. 1030–1041, 1998.

S. V. Fedorov, M. A. Kaliteevskii, N. V. Lukovskaya, and V. V. Nikolaev, “Transfer matrix method for media with quadratic optical nonlinearity,” Technical Physics, vol. 44, no. 4, pp. 456–457, 1999.

F. De Martini, “Vacuum confinement effects on molecular dynamics in a microscopic cavity,” Physica Scripta, vol. 21, pp. 58–64, 1988.

S. Haroche and D. Kleppner, “Cavity quantum electrodynamics,” Physics Today, vol. 42, no. 1, pp. 24–30, 1989.

G. Björk, S. MacHida, Y. Yamamoto, and K. Igeta, “Modification of spontaneous emission rate in planar dielectric microcavity structures,” Physical Review A, vol. 44, no. 1, pp. 669–681, 1991.

H. Yokoyama, K. Nishi, T. Anan et al., “Controlling spontaneous emission and threshold-less laser oscillation with optical microcavities,” Optical and Quantum Electronics, vol. 24, no. 2, pp. S245–S272, 1992.

G. Rempe, “Atoms in an optical cavity: quantum electrodynamics in confined space,” Contemporary Physics, vol. 34, pp. 119–129, 1993.

S. W. Koch, F. Jahnke, and W. W. Chow, “Physics of semiconductor microcavity lasers,” Semiconductor Science and Technology, vol. 10, no. 6, pp. 739–751, 1995.

S. Gauvin and J. Zyss, “Optical parametric processes in crystalline molecular layered confinement structures: Second harmonic generation in microcavities,” in Applications of Photonic Technology 2, G. A. Lampropoulos and R. A. Lessard, Eds., pp. 41–49, Plenum Press, 1997.

S. Gauvin and C. Walker, “Strong intensification of parametric fluorescence due to the confinement of vacuum field fluctuations inside microcavities: formalism without resort to the concept of density of states,” Nonlinear Optics and Quantum Optics, vol. 43, pp. 303–317, 2012.

R. T. Holm, “Convention confusions,” in Handbook of Optical Constants of Solids II, E. D. Palik, Ed., p. 39, Academic Press, 1991.

O. S. Heavens, Optical Properties of Thin Films, Dover, 1965.

Z. Knittl, Optics of Thin Films, Wiley, 1976.

P. Yeh, Optical Waves in Layered Media, Wiley, 1988.

A. Sh Furman and A. V. Tikhonravov, Basics of Optics of Multilayer Systems, Frontières, 1992.

S. Teitler and B. W. Henvis, “Refraction in stratified, anisotropic media,” Journal of the Optical Society of America, vol. 60, pp. 830–834, 1970.

D. W. Berreman, “Optics in stratified and anisotropic media: -matrix formulation,” Journal of the Optical Society of America A, vol. 62, pp. 502–510, 1972.

M. O. Vassell, “Structure of optical guided modes in planar multilayers of optically anisotropic materials,” Journal of the Optical Society of America, vol. 64, no. 2, pp. 166–173, 1974.

D. J. De Smet, “Generalized ellipsometry and the 4 × 4 matrix formalism,” Surface Science, vol. 56, pp. 293–306, 1976.

R. M. A. Azzam and N. M. Bashara, Ellipsometry and Polarized Light, North-Holland, 1977.

P. Yeh, “Electromagnetic propagation in birefringent layered media,” Journal of the Optical Society of America, vol. 69, no. 5, pp. 742–756, 1979.

P. J. Lin-Chung and S. Teitler, “ matrix formalisms for optics in stratified anisotropic media,” Journal of the Optical Society of America A, vol. 1, no. 7, pp. 703–705, 1984.

R. S. Weis and T. K. Gaylord, “Electromagnetic transmission and reflection characteristics of anisotropic multilayered structures,” Journal of the Optical Society of America A, vol. 4, pp. 1720–1740, 1987.

K. Eidner, “Light propagation in stratified anisotropic media: orthogonality and symetry properties of the matrix formalisms,” Journal of the Optical Society of America A, vol. 6, pp. 1657–1660, 1989.

M. Schubert, “Polarization-dependent optical parameters of arbitrarily anisotropic homogeneous layered systems,” Physical Review B, vol. 53, no. 8, pp. 4265–4274, 1996.

I. J. Hodgkinson and Q. H. Wu, Birefringent Thin Films and Polarizing Elements, World Scientific, 1997.

B. E. A. Saleh and M. C. Teich, Fundamentals of Photonics, Wiley, 2nd edition, 2007.

J. A. Armstrong, N. Bloembergen, J. Ducuing, and P. S. Pershan, “Interactions between light waves in a nonlinear dielectric,” Physical Review, vol. 127, no. 6, pp. 1918–1939, 1962.

N. Bloembergen and P. S. Pershan, “Light waves at the boundary of nonlinear media,” Physical Review, vol. 128, no. 2, pp. 606–622, 1962.

D. A. Kleinman, “Theory of second harmonic generation of light,” Physical Review, vol. 128, no. 4, pp. 1761–1775, 1962.

B. F. Levine, C. G. Bethea, C. D. Thurmond, R. T. Lynch, and J. L. Bernstein, “An organic crystal with an exceptionally large optical second-harmonic coefficient: 2-methyl-4-nitroaniline,” Journal of Applied Physics, vol. 50, no. 4, pp. 2523–2527, 1979.

G. F. Lipscomb, A. F. Garito, and R. S. Narang, “An exceptionally large linear electro-optic effect in the orgranic solid MNA,” Journal of Chemical Physics, vol. 75, no. 3, pp. 1509–1516, 1981.

S. Gauvin and J. Zyss, “Growth of organic crystalline thin films, their optical characterization and application to non-linear optics,” Journal of Crystal Growth, vol. 166, no. 1–4, pp. 507–527, 1996.

R. Morita, N. Ogasawara, S. Umegaki, and R. Ito, “Refractive indices of 2-methyl-4-nitroaniline (MNA),” Japanese Journal of Applied Physics, Part 2, vol. 26, no. 10, pp. L1711–L1713, 1987.

R. Morita, T. Kondo, Y. Kaneda et al., “Dispersion of second-order nonlinear optical coefficient d ₁₁ of 2-methyl-4-nitroaniline (MNA),” Japanese Journal of Applied Physics, Part 2, vol. 27, no. 6, pp. L1131–L1133, 1988.