Journal of Nanomaterials
Volume 2015 (2015), Article ID 137312, 1 page
http://dx.doi.org/10.1155/2015/137312

Retraction

Retracted: Restoration of Critical-Sized Defects in the Rabbit Mandible Using Autologous Bone Marrow Stromal Cells Hybridized with Nano-β-tricalcium Phosphate/Collagen Scaffolds

Journal of Nanomaterials

Received 15 March 2015; Accepted 15 March 2015

Copyright © 2015 Journal of Nanomaterials. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Restoration of Critical-Sized Defects in the Rabbit Mandible Using Autologous Bone Marrow Stromal Cells Hybridized with Nano-β-tricalcium Phosphate/Collagen Scaffolds” [1] has been retracted upon the authors’ request, as they found that there are some wrong results in their paper.

References

X. Zhang, M. Xu, X. Liu et al., “Restoration of critical-sized defects in the rabbit mandible using autologous bone marrow stromal cells hybridized with nano-β-tricalcium phosphate/collagen scaffolds,” Journal of Nanomaterials, vol. 2013, Article ID 913438, 8 pages, 2013.