Journal of Nanomaterials
Volume 2015 (2015), Article ID 675862, 8 pages
http://dx.doi.org/10.1155/2015/675862

Research Article

Enhanced Adsorption and Removal of Ciprofloxacin on Regenerable Long TiO₂ Nanotube/Graphene Oxide Hydrogel Adsorbents

Yuan Zhuang,¹ Fei Yu,2,3 and Jie Ma1,4

¹State Key Laboratory of Pollution Control and Resource Reuse, School of Environmental Science and Engineering, Tongji University, 1239 Siping Road, Shanghai 200092, China
²Tianjin Key Laboratory of Aquatic Science and Technology, Tianjin Chengjian University, 26 Jinjing Road, Tianjin 300384, China
³College of Chemistry and Environmental Engineering, Shanghai Institute of Technology, Shanghai 2001418, China
⁴Jiangsu Key Laboratory for Environment Functional Materials, Suzhou University of Science and Technology, Suzhou 215009, China

Received 24 October 2015; Accepted 26 November 2015

Academic Editor: Bao Yu Xia

Copyright © 2015 Yuan Zhuang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

To improve the adsorption performance and regeneration ability of adsorbent, a simple method was designed to synthesize long TiO₂ nanotube/reduced graphene oxide (rGO-TON) hydrogel, which has good adsorption and regeneration capacity toward ciprofloxacin. rGO-TON hydrogel could form 3D structure, which makes the separation and regeneration of adsorbent easy. For comparison, commercial P25 particle is used to prepare composite hydrogel with rGO; the results showed that TiO₂ nanotube supports the graphene sheets better than P25 particles, which would reduce the agglomeration of graphene sheets. rGO-TON have larger specific surface area (138.2 m²/g) than rGO-P25 (79.4 m²/g). In this paper, ciprofloxacin was chosen as target pollutants, the rGO-TON obtain excellent adsorption capacity, and the maximum adsorption capacities of rGO-TON for ciprofloxacin calculated from Langmuir model are 178.6 mg/g (), 181.8 mg/g (), and 108.7 mg/g () for graphene oxide (GO), GO-TON, and GO-P25, respectively. In regeneration, the adsorption capacity of rGO-TON and rGO-P25 has little reduced after 5 cycles, while the adsorption capacity of rGO decreases to below 100 mg/g. Results of this work are of great significance for environmental applications of regenerable long TiO₂ nanotube/graphene oxide hydrogel as a promising adsorbent nanomaterial for antibiotic pollutants from aqueous solutions.

1. Introduction

As the pharmaceuticals industry is blooming these years, more and more antibiotics are polluted into the environment. Moreover, they are usually deposited continuously and maintain stability for a long time in the ecosystem [1]. Ciprofloxacin is a kind of second generation fluoroquinolone antibiotic which has been commonly used in various areas; however, it has a high solubility in aqueous solution at various pH conditions and a high stability in soil and wastewater systems; thus the removal of ciprofloxacin from water is very important [2]. Various chemical and physical methods could be used to remove antibiotic from wastewater [3], such as membrane techniques [4], biodegradation [5], chemical oxidation [6–8], adsorption [9–12], and ion-exchange [13]. Among them, adsorption is widely used in water treatment as it is easily operated with high removal efficiency. Thus, the adsorbent disposal is necessary after adsorption process [14, 15]. At present, there are two groups of regeneration methods [16]: wet reclamation and dry reclamation. Thermal regeneration, which is a kind of dry reclamation, is the most popular method. However, if not combusted, it could produce pollutant gas. For overcoming these defects, microwave irradiation has been increasingly investigated these years [17]. However, in microwave method, some organic pollutants may volatilize rather than mineralize, and it still could not be used for continuous regeneration.

As a semiconducting metal oxide, titanium dioxide (TiO₂) is widely used due to its excellent photocatalytic property [8]. Electrons could be excited from the valence band to the conduction band while being irradiated by UV light; during this process, electron-hole pairs are created. Thus TiO₂ possesses photocatalytic character. However, the traditional photocatalytic degradation method has some defect, such as the low usage of the light and the high consume of the energy [18]. For TiO₂, electron-hole pairs are easy to be recovered which may be faster than the pollutant degradation rate. To overcome the defects in which the electron-hole pairs are easy to be recovered which would reduce the photocatalytic efficiency, a combination of TiO₂ with carbon nanomaterials has been considered as an efficient way [19]. Graphene oxide (GO) has a single layer two-dimensional graphite structure with abundant oxygen functional groups [20, 21]. Through treatment by reduction, GO could form a reduced graphene oxide (rGO) hydrogel, which possesses high adsorption capacity toward antibiotics [22]. GO has great potential to promote fast electron transfer. Thus the photoexcited electrons from TiO₂ are transferred to GO to hinder electron-hole recombination and to enhance oxidative reactivity [23]. There have been many investigations which reported the developments in the preparation of TiO₂/GO composites for the removal of organic pollutants in water [24, 25]. However, though GO has high adsorption capacity, the regeneration ability is not well for reuse [26]. After the addition of TiO₂ into GO, the composite could be better reused through photocatalytic degradation after adsorption.

Providing TiO₂ with greater interracial contact with the GO surface with lower aggregation is important to improve the photocatalytic performance of GO-TiO₂ composites as this could promote the electron transfer and charge separation from TiO₂ to GO [25]. Comparing with TiO₂ nanoparticles, long TiO₂ nanotubes (TON) have a higher specific surface area and more active sites. Then, while TON and GO have a greater degree of interfacial contact, charge separation would be better; moreover, under higher aspect ratio of TON, the photocatalytic property would be improved [27]. Therefore, we put forward a simple way for the preparation of the rGO-TON hydrogel to remove ciprofloxacin from aqueous solution. Rather than the traditional simultaneous adsorption and photocatalytic degradation, the photocatalytic degradation is operated after adsorption in our study, which would acquire better light availability because the pollutant is more concentrated on the adsorbents after adsorption. The separation of adsorption and photocatalytic degradation would avoid the light scattering caused by external environment or the pollutants. For rGO-TON hydrogel with a 3D microstructure, the separation and regeneration are easy. The results of this work are of great significance for environmental applications of regenerable long TiO₂ nanotube/graphene oxide, as a promising adsorbent nanomaterial for ciprofloxacin pollutants from aqueous solutions.

2. Materials and Methods

2.1. Materials

All chemicals were purchased from Sinopharm Chemical Reagent Co., Ltd. (Shanghai, China), in analytical purity and were used in the experiments without any further purification. All solutions were prepared using deionized water.

2.2. Preparation

Graphite oxide was prepared using the modified Hummers’ method [28–30]. To get GO solution, graphite oxide is dispersed in deionized water and sonicated in an ultrasound bath for 12 h. Commercial P25 (a mixture of 80% anatase and 20% rutile with an average surface area of 50 m²/g, size 20–30 nm) was purchased from Degussa Company, Essen, Germany.

TON is prepared by hydrothermal method [31]. 2.7 g P25 powder is put into 300 mL sodium hydroxide solution (8 mol/L), ultrasonic stirred for 2 h, and then magnetic stirred for 5 h, so that the titanium dioxide was fully dissolved in sodium hydroxide solution; then, the solution was transferred into 150 mL polytetrafluoroethylene reactor, the reaction kettle was put into stainless steel jacket, the reaction kettle was assembled and put into the oil bath with the heat conduction oil, and the rotating speed is maintained at 400 rpm, heating up to 130 for 28 h; after the reaction, the reactor was naturally cooled to room temperature; the mother liquor was centrifuged at 4000 rpm for 20 min to obtain coarse product; the filter cake was put into the water to rinse 5 times, until the washing supernatant pH is 12; then hydrochloric acid was added until the pH value of the solution was 2; then the sodium titanate became a hydrogen titanate; the solution was washed 4 times until the supernatant pH was 6, and then the solution was put into the hydrochloric acid; the pH value of the solution was adjusted to 2; after 5 hours, the sodium type is converted into a hydrogen titanate type; through suction filtration and freeze-drying, TON could be obtained.

TON (or P25) and ascorbic acid were put into the GO solution and placed into an ultrasound bath for 5 h to form a uniform solution. The mass ratio of GO to TiO₂ was 2 : 1. The mixed solution was heated under 90°C for 12 h to prepare a hydrogel [2, 11]. The hydrogel without TiO₂ was named rGO.

2.3. Characterization Methods

The material surface morphology of the material was tested by a field-emission scanning electron microscopy (SEM, Hitachi, S-4800) and transmission electron microscopy (TEM, JEOL, JEM-2010). X-ray diffraction (XRD) was tested on a Bragg-Brentano diffractometer (Rigaku, D/Max-2200) under monochromatic Cu Kα radiation ( Å) in a graphite curve monochromator, and the data was collected from = 10°–50° with a scan rate of 2°/min. The specific surface area and pore parameters were measured using an Accelerated Surface Area and Porosimetry system (Micromeritics, ASAP 2020), calculated from the N₂ adsorption/desorption isotherms at 77 K using BJH model.

2.4. Batch Sorption Experiments

To evaluate the ciprofloxacin adsorption on the adsorbents, batch experiments were operated. Ciprofloxacin (200 mg) is dissolved in 1 L deionized water 200 mg/L stock solution to obtain a 200 mg/L stock solution. The stock solution was diluted with deionized water to get the required concentrations. All the adsorption experiments were operated in 100 mL flasks containing 10 mg adsorbent and 20 mL ciprofloxacin solutions with required concentrations. The flasks were shaken in a thermostatic shaker at 150 rpm at 298 K for 24 h in the dark. All the adsorption experiments were made in duplicate and calculate the mean values. To ensure that the decrease in the concentration was actually due to the adsorbent rather than by the adsorption on the glass bottle wall, the blank experiments were conducted without the addition of adsorbent. After adsorption, the adsorbent was separated through a 0.45 m membrane. The ciprofloxacin concentration is analyzed by an ultraviolet spectrophotometer (Tianmei UV-2310(II)) at 270 nm for ciprofloxacin. After adsorption, the adsorbents were placed in distilled water UV light for 24 h for regeneration. The above process was repeated 5 times to study the ability of the photocatalytic technology to regenerate the adsorbents.

The adsorption isotherm was studied under initial concentration from 1 mg/L to 200 mg/L at pH = 7, 25°C. The adsorption capacity (mg/g) was calculated using

where is the initial concentration, is the concentration of time (mg/L), is the initial solution volume (L), and is the adsorbent dosage (g).

Langmuir model, which assumes that the adsorbate forms a monolayer on the homogenous surface of the adsorbent and there is no interaction between the adsorbed molecules, is used to analyze the adsorption isotherms shown in

where (L/g) and (L/mg) are the Langmuir isotherm constants and relates to the energy of adsorption. When is plotted against , a straight line will be obtained.

3. Results and Discussion

3.1. Morphology Characterization

The preparation process of rGO-TON hydrogel for ciprofloxacin removal is shown in Scheme 1. GO and TON were mixed to form a uniform solution first, and then the composite hydrogel could be formed after hydrothermal treatment. The ciprofloxacin adsorption on GO/TON was operated in dark. Thus the ciprofloxacin was just adsorbed on GO/TON rather than being degraded. After adsorption, the rGO-TON was treated under UV, and the TON could degrade the ciprofloxacin. Thus the rGO-TON could be reused for adsorption. Optic image of rGO-TON is shown in Figure 1.

Scheme 1: Preparation, adsorption, and regeneration process of rGO-TON.

Figure 1: Optic image of rGO-TON.

To investigate the morphology of rGO-P25 and rGO-TON, the SEM analysis is shown in Figure 2. Obviously, the structure of rGO-TON is totally different, the surface of rGO-P25 consists of thick blocks, while the surface of rGO-TON is fiber-like, as shown in Figures 2(c) and 2(d).

(a)

(b)

(c)

(d)

Figure 2: SEM images of rGO-P25 (a, b) and rGO-TON (c, d).

The TEM images of TON, rGO, rGO-P25, and rGO-TON are shown in Figure 3. In Figure 3(a), the as-prepared rGO is shown to have a typical layered structure. In Figures 3(c) and 3(d), it can be seen that both P25 and TON are anchored onto the rGO sheets after the hydrothermal reaction, the diameter of TON is ~30 nm, and the diameter of P25 is ~50 nm. The length of TON in rGO-TON is more than 500 nm, which is 10 times larger than its diameter. Both the P25 and TON tend to be distributed on the wrinkles and edges of the rGO sheets, which may help to prevent the rGO from agglomeration.

(a)

(b)

(c)

(d)

Figure 3: TEM images of TON (a), rGO (b), rGO-P25 (c), and rGO-TON (d).

3.2. Composition and Structure Analysis

The specific surface area (SSA) and pore size distribution characterization of rGO, TON, rGO-TON, and rGO-P25 are shown in Figures 4(a) and 4(b). The SSA of rGO and TON are 119.2 m²/g and 139.8 m²/g, while rGO-TON and rGO-P25 are 138.2 m²/g and 79.4 m²/g, respectively. It can be seen that rGO-TON has larger SSA than rGO-P25, indicating that the tube-like structure of TON may support the graphene sheets better than the particles of P25. Moreover, it can be seen from the pore distribution analysis, as shown in Table 1, that rGO-TON has the highest pore volume among rGO, TON, rGO-TON, and rGO-P25, which indicate that the graphene sheets are well separated by TON. For further investigating the interaction between graphene and TON or P25, XRD patterns of GO, rGO, TON, rGO-TON, and rGO-P25 are shown in Figure 5. The peak at 10.5° in GO indicates the interlayer space of 0.9 nm. However, in rGO, TON, rGO-TON, and rGO-P25, all the peaks at = 10.5° are obviously weaker than in GO, indicating that the GO has been reduced to rGO [32]. The disappearance of the rGO characteristic peaks in the rGO-TON indicates that the graphene sheets are separated by TON [33]; however, it can be seen that there is still a small peak around 27° in rGO-P25, indicating that the graphene sheets are better separated by TON than P25, which may be a benefit for SSA of rGO-TON. The peaks of rGO-TON and TON in 25.3°, 37.8°, and 48° correspond to the (101), (004), and (200) planes of the anatase TiO₂ (JCPDS 21-1272), respectively [31].

Table 1: Physical properties of rGO, rGO-TON, and rGO-P25.

Sample
TON
rGO
rGO-TON
rGO-P25

Specific surface area (m²/g)
139.8
119.2
138.2
79.4

Average pore size (nm)
7.9
6.2
6.5
5.3

Total pore volume (m³/g)
0.28
0.27
0.48
0.22

(a)

(b)

Figure 4: N₂ adsorption/desorption isotherms (a) and BJH pore size distribution (b) of rGO, TON, rGO-TON, and rGO-P25.

Figure 5: XRD of rGO, TON, rGO-TON, and rGO-P25.

3.3. Adsorption and Regeneration Properties

Langmuir isotherm is used to fit the ciprofloxacin adsorption on rGO, rGO-TON, and rGO-P25, as shown in Figure 6(a); all the samples were operated in 3 duplicates with presented data equally (). The maximum adsorption capacities are 178.6 mg/g (), 181.8 mg/g (), and 108.7 mg/g (), respectively. The excellent adsorption capacity of rGO-TON is mainly attributed to its larger SSA. Besides physical adsorption, chemical adsorption also plays important role in this adsorption process. During ciprofloxacin adsorption on rGO, rGO-TON, and rGO-P25, the graphene provides bond and hydrogen bond with ciprofloxacin. One of the driving forces for the organic chemicals adsorption on graphene is electron donor-acceptor interaction owing to the benzene rings. With –OH groups on the surface, graphene could act as electron donors and enhanced adsorption significantly through forming bond [34]. Figure 6(b) shows the regeneration of rGO, rGO-TON, and rGO-P25; all the samples were operated in 3 duplicates with presented data equally (). Obviously, the rGO-TON and rGO-P25 have little reduction of adsorption capacity after 5 cycles, while the rGO decreases to below 100 mg/g. It can be seen that both TON and P25 promote the composite hydrogel with good regeneration ability. While under the UV irradiation, electron-hole pairs are generated in TiO₂, which could move immediately from valence band to conduction band in the excited state, and the charge separation and hydroxyl radical formation occur in the regeneration process. Moreover, the electrons transfer from TiO₂ to rGO, and the photogenerated holes stay behind in the valence band. Therefore, the electrons and holes are separated immediately and then react with dissolved oxygen and water molecules to form hydroxyl radical, acting as a strong oxidant for ciprofloxacin degradation [35]. Therefore, the rGO has good adsorption capacity but low regeneration capacity; however, the rGO-P25 has good regeneration ability but the adsorption capacity is not well while the rGO-TON has both good adsorption capacity and regeneration ability.

(a)

(b)

Figure 6: Langmuir isotherm model (a) and regeneration properties (b) (initial concentration 200 mg/L) of rGO, rGO-TON, and rGO-P25.

4. Conclusion

To combine the adsorption of graphene and photocatalytic degradation of TiO₂, TiO₂ nanotube-reduced graphene oxide (rGO-TON) hydrogel is prepared toward ciprofloxacin removal. Commercial P25 particle is used for comparison with long TON; graphene sheets are shown to be better separated by TON than P25. The resulting rGO-TON have a higher specific surface area, adsorption capacity, and regeneration ability than rGO-P25. Calculated from Langmuir model, the maximum adsorption capacities of ciprofloxacin on the hydrogels are 178.6, 181.8, and 108.7 mg/g, respectively, indicating the excellent adsorption ability of rGO-TON. The rGO has good adsorption capacity, but the regeneration ability is low while the rGO-P25 has good regeneration ability but the adsorption capacity is not well. However, the rGO-TON overcome the above-mentioned defects of rGO and rGO-P25; it has both good adsorption capacity and regeneration ability attributed to the combination of graphene and long TON. Therefore, results of this work are of great significance for environmental applications of regenerable long TiO₂ nanotube/graphene oxide hydrogel adsorbent for antibiotic pollutants.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This research was supported by the National Natural Science Foundation of China (no. 21577099), the Research Fund of Tianjin Key Laboratory of Aquatic Science and Technology (no. TJKLAST-ZD-2014-06), the Opening Project (no. SJHG140) of the Jiangsu Key Laboratory for Environment Functional Materials, State Key Laboratory of Pollution Control and Resource Reuse Foundation (no. PCRRF14021), and the Fundamental Research Funds for the Central Universities.

References

J. Ma, M. X. Yang, F. Yu, and J. H. Chen, “Easy solid-phase synthesis of pH-insensitive heterogeneous CNTs/FeS Fenton-like catalyst for the removal of antibiotics from aqueous solution,” Journal of Colloid and Interface Science, vol. 444, pp. 24–32, 2015.

Y. Zhuang, F. Yu, J. Ma, and J. H. Chen, “Adsorption of ciprofloxacin onto graphene–soy protein biocomposites,” New Journal of Chemistry, vol. 39, no. 5, pp. 3333–3336, 2015.

V. Homem and L. Santos, “Degradation and removal methods of antibiotics from aqueous matrices—a review,” Journal of Environmental Management, vol. 92, no. 10, pp. 2304–2347, 2011.

I. Koyuncu, O. A. Arikan, M. R. Wiesner, and C. Rice, “Removal of hormones and antibiotics by nanofiltration membranes,” Journal of Membrane Science, vol. 309, no. 1-2, pp. 94–101, 2008.

S. Chelliapan, T. Wilby, and P. J. Sallis, “Performance of an up-flow anaerobic stage reactor (UASR) in the treatment of pharmaceutical wastewater containing macrolide antibiotics,” Water Research, vol. 40, no. 3, pp. 507–516, 2006.

I. Arslan-Alaton and S. Dogruel, “Pre-treatment of penicillin formulation effluent by advanced oxidation processes,” Journal of Hazardous Materials, vol. 112, no. 1-2, pp. 105–113, 2004.

Y. B. Liu, J. H. Li, B. X. Zhou et al., “Photoelectrocatalytic degradation of refractory organic compounds enhanced by a photocatalytic fuel cell,” Applied Catalysis B: Environmental, vol. 111-112, pp. 485–491, 2012.

Y. Liu, B. Zhou, J. Bai et al., “Efficient photochemical water splitting and organic pollutant degradation by highly ordered TiO₂ nanopore arrays,” Applied Catalysis B: Environmental, vol. 89, no. 1-2, pp. 142–148, 2009.

Y. Zhuang, F. Yu, J. Ma, and J. Chen, “Graphene as a template and structural scaffold for the synthesis of a 3D porous bio-adsorbent to remove antibiotics from water,” RSC Advances, vol. 5, no. 35, pp. 27964–27969, 2015.

F. Yu, J. Ma, and D. Bi, “Enhanced adsorptive removal of selected pharmaceutical antibiotics from aqueous solution by activated graphene,” Environmental Science and Pollution Research, vol. 22, no. 6, pp. 4715–4724, 2014.

J. Ma, Y. Mingxuan, F. Yu, and Z. Jie, “Water-enhanced removal of ciprofloxacin from water by porous graphene hydrogel,” Scientific Reports, vol. 5, article 13578, 2015.

F. Yu, J. Ma, and S. Han, “Adsorption of tetracycline from aqueous solutions onto multi-walled carbon nanotubes with different oxygen contents,” Scientific Reports, vol. 4, article 5326, 2014.

K.-J. Choi, J.-H. Choi, E.-H. Hwang, Y.-W. Rhee, and T.-S. Hwang, “Preparation and characterization of heterogeneous anion exchange membrane for recovery of sulfate ion from waste water,” Polymer, vol. 31, no. 3, pp. 247–254, 2007.

A. S. A. Bakr, Y. M. Moustafa, M. M. H. Khalil, M. M. Yehia, and E. A. Motawea, “Magnetic nanocomposite beads: synthesis and uptake of Cu(II) ions from aqueous solutions,” Canadian Journal of Chemistry, vol. 93, no. 3, pp. 289–296, 2015.

T. Gao, W. Wang, and A. Wang, “A pH-sensitive composite hydrogel based on sodium alginate and medical stone: synthesis, swelling, and heavy metal ions adsorption properties,” Macromolecular Research, vol. 19, no. 7, pp. 739–748, 2011.

F. Yu, L. Chen, J. Ma et al., “Self-regenerative adsorbent based on the cross-linking chitosan for adsorbing and mineralizing azo dye,” RSC Advances, vol. 4, no. 11, pp. 5518–5523, 2014.

K. B. Yang, J. H. Peng, C. Srinivasakannan, L. B. Zhang, H. Y. Xia, and X. H. Duan, “Preparation of high surface area activated carbon from coconut shells using microwave heating,” Bioresource Technology, vol. 101, no. 15, pp. 6163–6169, 2010.

J. Ma, M. X. Yang, Y. R. Sun et al., “Fabrication of Ag/TiO₂ nanotube array with enhanced photo-catalytic degradation of aqueous organic pollutant,” Physica E: Low-Dimensional Systems and Nanostructures, vol. 58, pp. 24–29, 2014.

S. H. Hsieh, W. J. Chen, and C. T. Wu, “Pt-TiO₂/graphene photocatalysts for degradation of AO7 dye under visible light,” Applied Surface Science, vol. 340, pp. 9–17, 2015.

Q. Xiang, J. Yu, and M. Jaroniec, “Enhanced photocatalytic H2-production activity of graphene-modified titania nanosheets,” Nanoscale, vol. 3, no. 9, pp. 3670–3678, 2011.

L. Yu, Y. Ma, C. N. Ong, J. Xie, and Y. Liu, “Rapid adsorption removal of arsenate by hydrous cerium oxide–graphene composite,” RSC Advances, vol. 5, no. 80, pp. 64983–64990, 2015.

J. Ma, M. X. Yang, F. Yu, and J. Zheng, “Water-enhanced removal of ciprofloxacin from water by porous graphene hydrogel,” Scientific Reports, vol. 5, Article ID 13578, 2015.

D. L. Zhao, G. D. Sheng, C. L. Chen, and X. K. Wang, “Enhanced photocatalytic degradation of methylene blue under visible irradiation on graphene@TiO₂ dyade structure,” Applied Catalysis B: Environmental, vol. 111-112, pp. 303–308, 2012.

G. Williams, B. Seger, and P. V. Kamt, “TiO₂-graphene nanocomposites. UV-assisted photocatalytic reduction of graphene oxide,” ACS Nano, vol. 2, no. 7, pp. 1487–1491, 2008.

S. D. Perera, R. G. Mariano, K. Vu et al., “Hydrothermal synthesis of graphene-TiO₂ nanotube composites with enhanced photocatalytic activity,” ACS Catalysis, vol. 2, no. 6, pp. 949–956, 2012.

Y. Zhuang, F. Yu, J. Ma, and J. H. Chen, “Graphene as a template and structural scaffold for the synthesis of a 3D porous bio-adsorbent to remove antibiotics from water,” RSC Advances, vol. 5, no. 35, pp. 27964–27969, 2015.

Y. Yao, G. Li, S. Ciston, R. M. Lueptow, and K. A. Gray, “Photoreactive TiO₂/carbon nanotube composites: synthesis and reactivity,” Environmental Science and Technology, vol. 42, no. 13, pp. 4952–4957, 2008.

T. S. Gendy, Y. Barakat, and A. I. Mead, “Adsorption of ethoxylated alkylphenol–formaldehyde polymeric surfactants at the aqueous solution–air interface,” Polymer International, vol. 33, no. 3, pp. 247–252, 1994.

M. Hirata, T. Gotou, S. Horiuchi, M. Fujiwara, and M. Ohba, “Thin-film particles of graphite oxide 1: high-yield synthesis and flexibility of the particles,” Carbon, vol. 42, no. 14, pp. 2929–2937, 2004.

S. Mao, H. H. Pu, and J. H. Chen, “Graphene oxide and its reduction: modeling and experimental progress,” RSC Advances, vol. 2, no. 7, pp. 2643–2662, 2012.

P. Gao, A. Li, D. D. Sun, and W. J. Ng, “Effects of various TiO₂ nanostructures and graphene oxide on photocatalytic activity of TiO₂,” Journal of Hazardous Materials, vol. 279, pp. 96–104, 2014.

C. Xu, X. Wang, and J. Zhu, “Graphene—metal particle nanocomposites,” Journal of Physical Chemistry C, vol. 112, no. 50, pp. 19841–19845, 2008.

W. Yao, Y. Li, D. Yan et al., “Fabrication and photocatalysis of TiO₂-graphene sandwich nanosheets with smooth surface and controlled thickness,” Chemical Engineering Journal, vol. 229, pp. 569–576, 2013.

H. Chen, B. Gao, and H. Li, “Functionalization, pH, and ionic strength influenced sorption of sulfamethoxazole on graphene,” Journal of Environmental Chemical Engineering, vol. 2, no. 1, pp. 310–315, 2014.

P. Gao, A. R. Li, D. D. Sun, and W. J. Ng, “Effects of various TiO₂ nanostructures and graphene oxide on photocatalytic activity of TiO₂,” Journal of Hazardous Materials, vol. 279, pp. 96–104, 2014.