Journal of Nanomaterials
Volume 2015 (2015), Article ID 712415, 1 page
http://dx.doi.org/10.1155/2015/712415

Retraction

Retracted: Mechanical and Thermal Stability Properties of Modified Rice Straw Fiber Blend with Polycaprolactone Composite

Journal of Nanomaterials

Received 15 January 2015; Accepted 15 January 2015

Copyright © 2015 Journal of Nanomaterials. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Mechanical and Thermal Stability Properties of Modified Rice Straw Fiber Blend with Polycaprolactone Composite” [1], published in Journal of Nanomaterials, has been retracted as it was found to have violated the journal’s policy against citation manipulation.

References

R. Khandanlou, M. B. Ahmad, K. Shameli, M. Z. Hussein, N. Zainuddin, and K. Kalantari, “Mechanical and thermal stability properties of modified rice straw fiber blend with polycaprolactone composite,” Journal of Nanomaterials, vol. 2014, Article ID 675258, 9 pages, 2014.