Journal of Nanomaterials
Volume 2016 (2016), Article ID 6721806, 1 page
http://dx.doi.org/10.1155/2016/6721806

Corrigendum

Corrigendum to “Development of a Doxycycline Hydrochloride-Loaded Electrospun Nanofibrous Membrane for GTR/GBR Applications”

Lie-ni Jia,¹ Xin Zhang,² Hong-yu Xu,¹ Fei Hua,³ Xiang-gang Hu,¹ Qiao Xie,¹ Wei Wang,¹ and Jun Jia¹

¹State Key Laboratory of Military Stomatology, Department of Prosthodontics, School of Stomatology, The Fourth Military Medical University, Xi’an, Shaanxi 710032, China
²Department of Stomatology, Central Hospital of Xi’an, Shaanxi 710032, China
³Department of Pharmacy, Institute of Material Medical, The Fourth Military Medical University, Xi’an, Shaanxi 710032, China

Received 22 September 2016; Accepted 1 December 2016

Copyright © 2016 Lie-ni Jia et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Development of a Doxycycline Hydrochloride-Loaded Electrospun Nanofibrous Membrane for GTR/GBR Applications” [1], there was an error in the Acknowledgments section, which should be corrected as follows:

The authors would like to acknowledge the financial support by the National Science Foundation of China (no. 81271136). This investigation was supported by School of Stomatology, Institute of Material Medical School of Pharmacy, and Department of Military Toxicology, the Fourth Military Medical University.

References

L. Jia, X. Zhang, H. Xu et al., “Development of a doxycycline hydrochloride-loaded electrospun nanofibrous membrane for GTR/GBR applications,” Journal of Nanomaterials, vol. 2016, Article ID 6507459, 10 pages, 2016.