Journal of Nanomaterials
Volume 2018 (2018), Article ID 9583485, 1 page
https://doi.org/10.1155/2018/9583485

Corrigendum

Corrigendum to “Novel Nanofluid Based on Water-Loaded Delafossite CuAlO₂ Nanowires: Structural and Thermal Properties”

H. Alhummiany

Department of Physics, Faculty of Science, King Abdulaziz University, Jeddah 21589, Saudi Arabia

Correspondence should be addressed to H. Alhummiany; halhummiany@kau.edu.sa

Received 29 May 2018; Accepted 21 June 2018; Published 19 July 2018

Copyright © 2018 H. Alhummiany. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Novel Nanofluid Based on Water-Loaded Delafossite CuAlO₂ Nanowires: Structural and Thermal Properties” [1], there was an error with the grant number included in the Acknowledgments section that should be corrected to D-122-363-1439. The updated Acknowledgments section is as follows:

This work was supported by the Deanship of Scientific Research (DSR), King Abdulaziz University, Jeddah, under Grant no. D-122-363-1439. The authors, therefore, gratefully acknowledge the DSR technical and financial support.

References

H. Alhummiany, “Novel nanofluid based on water-loaded delafossite CuAlO₂ nanowires: structural and thermal properties,” Journal of Nanomaterials, vol. 2018, Article ID 4076960, 6 pages, 2018.