Journal of Ophthalmology

Volume 2013 (2013), Article ID 236371, 4 pages

http://dx.doi.org/10.1155/2013/236371

Clinical Study

The Mean Platelet Volume in Patients with Retinal Vein Occlusion

Alparslan Şahin, Muhammed Şahin, Harun Yüksel, Fatih Mehmet Türkcü, Yasin Çınar, Abdullah Kürşat Cingü, Şeyhmus Arı, and İhsan Çaça

Department of Ophthalmology, School of Medicine, Dicle University, 21280 Diyarbakır, Turkey

Received 18 December 2012; Revised 2 May 2013; Accepted 8 May 2013

Academic Editor: Michel Eid Farah

Copyright © 2013 Alparslan Şahin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. The aim of this study was to investigate the mean platelet volume (MPV) of patients with retinal vein occlusion (RVO). Methods. Hundred and ninty-three patients with the diagnosis of RVO and 83 healthy control subjects were included in this retrospective study. Retinal vein occlusion was diagnosed based on clinical examination. All patients and control subjects underwent complete ocular examination. MPV, hematocrit, hemoglobin, and platelet count of the participants were recorded. The data of patients with RVO was compared with the control subjects. Results. Patients with RVO had significantly higher MPV values ( fL) compared with the control subjects ( fL) (). No significant difference was found in platelet counts between RVO group and the control group ( 10⁹/L and  10⁹/L, resp., ), Mean platelet volume was an independent predictor of RVO (odds ratio (OR) = 1.43; 95% confidence interval (CI) = 1.09–1.89; ). Conclusion. Our results demonstrated that the MPV values were significantly higher in patients with RVO, suggesting that larger platelets may contribute to the pathogenesis of the RVOs.

1. Introduction

Retinal vein occlusion (RVO) is a major sight-threatening disease of the retina that causes vision loss, blindness, and neovascular glaucoma, especially in elderly patients. According to the location of the obstruction, the RVO can be classified as central retinal vein occlusion (CRVO) and branch retinal vein occlusion (BRVO). The prevalence of CRVO and BRVO is 0.08% and 0.44%, respectively [1].

The pathogenesis of the RVO is not clear. However, systemic conditions such as hypertension, diabetes mellitus, hypercholesterolemia, pregnancy, use of oral contraceptive agents, and inherited thrombophilia have been shown to be related with RVO [2]. Increased intraocular pressure and/or glaucoma have established local risk factors for RVO [3]. Management of vision loss and neovascularization is still challenging. Both BRVO and CRVO variably cause vision loss depending on the retinal ischemia and macular edema [4].

Platelets have an important role in the pathogenesis of thrombo-occlusive disease. Mean platelet volume (MPV) is an indicator of platelet size and has been known to be a marker of platelet activity. Large platelets are more reactive than small platelets and produce more thromboxane A₂, express more glycoprotein Ib and glycoprotein IIb/IIIa receptors, and aggregate more easily [5, 6].

Increased values of MPV have been shown as a risk factor for stroke and myocardial infarction [7, 8]. In a recent study, significant correlation was found between the degree of retinopathy and the mean values of MPV in diabetic patients [9]. To the best of our knowledge, we did not find any article in the Medical Literature in English that studied the MPV in patients with RVO. The purpose of the current study was to investigate the MPV levels and platelet counts in patients with RVO.

2. Materials and Methods

All subjects underwent a full ocular examination using slit lamp biomicroscopy and fundoscope. Patients who were diagnosed as any type of RVO between January 2006 and December 2011 were enrolled. CRVO was diagnosed on the basis of the presence of retinal hemorrhages combined with retinal vein dilatation in four retinal quadrants. Patients with venous dilation and tortuosity with flame-shaped and dot-blot hemorrhages in a wedge-shaped region were diagnosed as BRVO.

The patients and the subjects with any systemic disease other than hypertension [10] were excluded from the study. Patients with diabetes mellitus, anemia (hematocrit below 38%) [11], any cardiovascular disease, such as congestive heart failure, and heart valve disease treated with anticoagulant, stroke, chronic renal failure, history of alcohol consumption, and history of smoking were excluded from the study. Patients with glaucoma and with a history of any ocular surgery or trauma were also excluded.

Control group consisted of healthy subjects who had undergone routine ophthalmic examination. Best corrected visual acuities and intraocular pressures of all subjects were recorded. Fundus fluorescein angiography was performed in patients with RVO.

Blood samples were taken at the time of diagnosis of RVO. Complete blood count samples which were drawn into vacutainer tubes containing 0.04 mL of the 7.5% K3 salt of EDTA were analyzed within an hour after sampling with a commercially available analyzer (CELL-DYN 3700, Abbott Diagnostics, Abbott Park, IL, USA). MPV, platelet count, hemoglobin, and hematocrit parameters of the subjects were recorded.

The study protocol was approved by the Ethic Committee of Dicle University School of Medicine, and the study was conducted in accordance with the Declaration of Helsinki.

2.1. Statistical Analyses

All values were given as mean ± SD. Statistical analyses were performed using SPSS versus 11.5 statistical package program. The Kolmogorov-Smirnov test was applied to test the distribution pattern of each data. The Student’s t-test was used for normally distributed data in group comparisons. A value less than 0.05 was considered significant. Receiver-operating characteristic (ROC) analyses were used to determine the cutoff values and the sensitivity/specificity of the MPV. Univariate logistic regression analysis was used to assess the associations among MPV, hematocrit and hemoglobin levels, hypertension, age, and gender with RVO.

3. Results

Patients with any type of RVO were consecutively recruited at the Dicle University, School of Medicine, Department of Ophthalmology. Totally, 193 patients with RVO were eligible for the study. Control group consisted of 83 subjects. The mean age of the RVO group and the control group was and years, respectively. Male-to-female ratio was 98/95 in the RVO group, and 38/45 in the control group. There were no statistical differences in age and sex between groups () (Table 1). There was no significant difference in the control (36 of 83) and RVO (89 of 193) groups, according to presence of hypertension. There was no difference between groups regarding antihypertensive drug use.

Table 1: The demographic and clinical features of the RVO and control groups.

Retinal vein occlusions
Control
value

Age (years)
60.8 ± 12.4
61.6 ± 15.8
0.65

Gender (M/F)
98/95
38/45
0.27

Hypertension
89/193
36/83
0.11

Hb (g/dL)
13.8 ± 1.6
13.6 ± 1.4
0.41

Hct (%)
40.7 ± 4.5
40.1 ± 4.0
0.43

Plt (K/uL)
262.0 ± 59.4
275.8 ± 70.9
0.16

MPV (fL)
8.19 ± 1.22
7.68 ± 1.11
0.004

IOP (mmHg)
13.88 ± 4.03
13.22 ± 3.02
0.19

Visual acuity (snellen)
0.41 ± 0.30
1.00 ± 0.0
<0.001

Hb: hemoglobin, Hct: hematocrit, Plt: platelet count, MPV: mean platelet volume, IOP: intraocular pressure.

The mean MPV was significantly higher in patients with RVO than the control group ( fL versus  fL, ). The mean platelet count was slightly higher in the control group compared to RVO group,  10⁹/L and  10⁹/L, respectively (). Logistic regression analysis showed that MPV was also an independent predictor of RVO (odds ratio (OR) = 1.43; 95% confidence interval (CI) = 1.09–1.89; ).

In the ROC analysis performed, when the control group and patients with RVO were compared, the cutoff value was 8.00 (area under curve (AUC): 0.628), sensitivity was 56.1%, and specificity was 60.2% for the patients with RVO () (Figure 1).

Figure 1: Receiver-operating characteristic curves for predictors of retinal vein occlusion. The MPV values area under the curve, 0.628; green line.

4. Discussion

The current study showed the higher levels of MPV in patients with RVO. To the best of our knowledge, this is the first paper, shows that relationship between higher MPV values in patients with RVO.

Retinal vein occlusions are the most common cause of vision loss, after diabetic retinopathy, in the elderly patients [12]. Vision is decreased depending on the amount of retinal ischemia and macular edema. The pathogenesis of RVO is multifactorial and has not yet been elucidated. Several risk factors such as age, smoking, hypertension, diabetes mellitus, hyperlipidemia, and glaucoma were attributed in the etiology of RVO [12].

The platelets have an important role in the pathogenesis of vascular diseases. MPV is the indicator of the size and activity of platelets. Increased values of MPV have been shown as a risk factor for stroke [7]. Relationship between increased MPV with deep venous thrombosis [13], acute myocardial infarction [14], and acute ischemic cerebrovascular events [15] was also reported. Since larger platelets store and release larger amounts of serotonin and β-thromboglobulin and produce more thromboxane A₂, they are more reactive and prone to aggregation [5, 6].

The roles of platelets in RVOs were also studied. Leoncini et al. reported increased platelet response to thrombin in patients with RVO [16]. They suggested that platelet hyperaggregability inducing thrombus formation might be an important factor in the onset and/or development of RVO. Increased platelet activation induced by collagen [17], increased levels of platelet factors [18], and platelet hyperaggregability [19] were reported in RVOs.

As larger platelets are haemostatically more active, they produce more prothrombotic factors [20]. Bath and Butterworth reported that the platelet hyperactivity results in an increase in MPV [21]. Larger platelets aggregate easier than smaller ones [6]. In our study, the MPV values were significantly higher compared to control group which may contribute to the pathogenesis of RVO. Logistic regression analysis revealed that MPV is an independent predictor for RVO. Presence of high MPV in these patients may increase the risk of RVO.

MPV was studied in a few ocular vascular disorders. Ateş et al. reported a significant increase in MPV in patients with diabetic retinopathy [9]. They found a correlation between the severity of diabetic retinopathy and MPV values. Ricart et al. found that MPV was not related with posterior uveitis in Behçet’s disease [22].

Several studies also demonstrated that MPV is elevated in venous occlusive diseases such as deep venous thrombosis [13, 23], sinus thrombosis [24], and pulmonary thromboembolism [25]. A higher level of MPV is seemed to be a risk factor for vascular occlusive diseases.

The limitations of our study are lack of systolic and diastolic pressure of the subjects, lack of body mass index and lipid profile of the patients, and the retrospective nature of the study. In the current study, the results demonstrate only the hematologic status at the acute stage of RVO within a week. Therefore, these results may not reflect the status of these patients over long periods.

5. Conclusion

MPV was significantly higher in patients with RVO. Despite the retrospective nature of our study, we suggest that MPV may be used as a predictive tool for identifying risk for RVOs in the future. Further studies are needed to confirm the predictive value of MPV for the RVO risk.

Conflict of Interests

None of the authors declared a conflict of interests. The authors have no proprietary or financial interests in the products mentioned in this study.

Disclosure

The authors received no financial support for this study. This paper has not been published nor submitted simultaneously for publication elsewhere.

References

S. Rogers, R. L. McIntosh, N. Cheung et al., “The prevalence of retinal vein occlusion: pooled data from population studies from the United States, Europe, Asia, and Australia,” Ophthalmology, vol. 117, no. 2, pp. 313–319, 2010.

M. Turello, S. Pasca, R. Daminato et al., “Retinal vein occlusion: evaluation of “classic” and “emerging” risk factors and treatment,” Journal of Thrombosis and Thrombolysis, vol. 29, no. 4, pp. 459–464, 2010.

R. David, L. Zangwill, M. Badarna, and Y. Yassur, “Epidemiology of retinal vein occlusion and its association with glaucoma and increased intraocular pressure,” Ophthalmologica, vol. 197, no. 2, pp. 69–74, 1988.

M. S. Ip, N. L. Oden, I. U. Scott et al., “SCORE Study Report 3. Study design and baseline characteristics,” Ophthalmology, vol. 116, no. 9, pp. 1770–1777, 2009.

H. Giles, R. E. A. Smith, and J. F. Martin, “Platelet glycoprotein IIb-IIIa and size are increased in acute myocardial infarction,” European Journal of Clinical Investigation, vol. 24, no. 1, pp. 69–72, 1994.

V. M. Haver and A. R. L. Gear, “Functional fractionation of platelets,” Journal of Laboratory and Clinical Medicine, vol. 97, no. 2, pp. 187–204, 1981.

P. Bath, C. Algert, N. Chapman, and B. Neal, “Association of mean platelet volume with risk of stroke among 3134 individuals with history of cerebrovascular disease,” Stroke, vol. 35, no. 3, pp. 622–626, 2004.

Z. Huczek, J. Kochman, K. J. Filipiak et al., “Mean platelet volume on admission predicts impaired reperfusion and long-term mortality in acute myocardial infarction treated with primary percutaneous coronary intervention,” Journal of the American College of Cardiology, vol. 46, no. 2, pp. 284–290, 2005.

O. Ateş, I. Kiki, H. Bilen et al., “Association of mean platelet volume with the degree of retinopathy in patients with diabetes mellitus,” European Journal of General Medicine, vol. 6, no. 2, pp. 99–102, 2009.

E. J. Roccella, “The sixth report of the joint national committee on prevention, detection, evaluation, and treatment of high blood pressure,” Archives of Internal Medicine, vol. 157, no. 21, pp. 2413–2446, 1997.

E. Beutler and J. Waalen, “The definition of anemia: what is the lower limit of normal of the blood hemoglobin concentration?” Blood, vol. 107, no. 5, pp. 1747–1750, 2006.

Baseline and Early Natural History Report, “The Central Vein Occlusion Study,” Archives of Ophthalmology, vol. 111, no. 8, pp. 1087–1095, 1993.

H. Cil, C. Yavuz, Y. Islamoglu, et al., “Platelet count and mean platelet volume in patients with in-hospital deep venous thrombosis,” Clinical and Applied Thrombosis/Hemostasis, vol. 18, no. 6, pp. 650–653, 2012.

T. J. Hendra, G. A. Oswald, and J. S. Yudkin, “Increased mean platelet volume after acute myocardial infarction relates to diabetes and to cardiac failure,” Diabetes Research and Clinical Practice, vol. 5, no. 1, pp. 63–69, 1988.

S. Greisenegger, G. Endler, K. Hsieh, S. Tentschert, C. Mannhalter, and W. Lalouschek, “Is elevated mean platelet volume associated with a worse outcome in patients with acute ischemic cerebrovascular events?” Stroke, vol. 35, no. 7, pp. 1688–1691, 2004.

G. Leoncini, M. G. Signorello, A. Segantin et al., “In retinal vein occlusion platelet response to thrombin is increased,” Thrombosis Research, vol. 124, no. 6, pp. e48–e55, 2009.

G. Leoncini, D. Bruzzese, M. G. Signorello et al., “Platelet activation by collagen is increased in retinal vein occlusion,” Thrombosis and Haemostasis, vol. 97, no. 2, pp. 218–227, 2007.

P. M. Dodson, J. Westwick, G. Marks, V. V. Kakkar, and D. J. Galton, “β-Thromboglobulin and platelet factor 4 levels in retinal vein occlusion,” British Journal of Ophthalmology, vol. 67, no. 3, pp. 143–146, 1983.

I. A. Priluck, “Impending central retinal vein occlusion associated with increased platelet aggregability,” Annals of Ophthalmology, vol. 11, no. 1, pp. 79–84, 1979.

J. A. Jakubowski, C. B. Thomson, R. Vaillancourt, C. R. Valeri, and D. Deykin, “Arachidonic acid metabolism by platelets of differing size,” British Journal of Haematology, vol. 53, no. 3, pp. 503–511, 1983.

P. M. W. Bath and R. J. Butterworth, “Platelet size: measurement, physiology and vascular disease,” Blood Coagulation and Fibrinolysis, vol. 7, no. 2, pp. 157–161, 1996.

J. M. Ricart, F. España, S. Navarro, J. Todolí, J. Miguel De la Fuente, and A. Vayá, “Mean platelet volume does not seem to relate to thrombosis or posterior uveitis in Behçet's disease,” Clinical Hemorheology and Microcirculation. In press

M. Gulcan, E. Varol, M. Etli, F. Aksoy, and M. Kayan, “Mean platelet volume is increased in patients with deep vein thrombosis,” Clinical and Applied Thrombosis/Hemostasis, vol. 18, no. 4, pp. 427–430, 2012.

O. Kamisli, S. Kamisli, Y. Kablan, S. Gonullu, and C. Ozcan, “The prognostic value of an increased mean platelet volume and platelet distribution width in the early phase of cerebral venous sinus thrombosis,” Clinical and Applied Thrombosis/Hemostasis, vol. 19, no. 1, pp. 29–32, 2013.

E. Varol, A. Icli, B. A. Uysal, and M. Ozaydin, “Platelet indices in patients with acute pulmonary embolism,” Scandinavian Journal of Clinical and Laboratory Investigation, vol. 71, no. 2, pp. 163–167, 2011.