Journal of Ophthalmology
Volume 2014 (2014), Article ID 269837, 7 pages
http://dx.doi.org/10.1155/2014/269837

Clinical Study

Predicting Visual Outcomes for Macula-Off Rhegmatogenous Retinal Detachment with Optical Coherence Tomography

Noriyuki Suzuki,¹ Hiroshi Kunikata,1,2 Naoko Aizawa,¹ Toshiaki Abe,³ and Toru Nakazawa1,2,4

¹Department of Ophthalmology, Tohoku University Graduate School of Medicine, Sendai 980-8574, Japan
²Department of Retinal Disease Control, Tohoku University Graduate School of Medicine, Sendai 980-8574, Japan
³Division of Clinical Cell Therapy, Tohoku University Graduate School of Medicine, Sendai 980-8575, Japan
⁴Department of Advanced Ophthalmic Medicine, Tohoku University Graduate School of Medicine, Sendai 980-8574, Japan

Received 11 September 2014; Revised 2 November 2014; Accepted 3 November 2014; Published 11 December 2014

Academic Editor: Wai T. Wong

Copyright © 2014 Noriyuki Suzuki et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. We evaluated the ability of novel optical coherence tomography (OCT) parameters to predict postoperative best-corrected visual acuity (BCVA) in macula-off rhegmatogenous retinal detachment (RRD) eyes. Methods. We reviewed the medical records of 56 consecutive eyes with macula-off RRD. Clinical findings were analyzed including the relationship between preoperative OCT findings and 6-month postoperative BCVA. Results. Six-month postoperative BCVA was significantly correlated with preoperative findings including retinal height at the fovea, total and inner layer cross-sectional macular area within 2 mm of the fovea, and preoperative BCVA (, and , resp.). Multiple regression analysis revealed that the duration of macular detachment and total cross-sectional macular area were independent factors predicting 6-month postoperative BCVA ( and , resp.). Conclusions. Measuring preoperative total cross-sectional area of the macular layer within 2 mm of the fovea with OCT is a useful and objective way to predict postoperative visual outcome in eyes with macula-off RRD.

1. Introduction

Although remarkable progress has been achieved in the surgical treatment of eyes with rhegmatogenous retinal detachment (RRD), it is still difficult to predict postoperative visual outcomes when RRD includes a detached macula, known as macula-off RRD. Newly developed less-invasive surgical interventions, particularly 25-gauge microincision vitrectomy surgery (25GMIVS), have led to a very high initial reattachment rate for eyes with RRD, currently about 95% [1–5]. However, in eyes with macula-off RRD, degeneration of the photoreceptors in the detached area of the macula often prevents complete recovery of visual function and leads to central visual dysfunction, even after successful reattachment [5, 6].

Photoreceptor apoptosis has been reported to mainly occur within 3 days of RRD onset in experimental animal models [7, 8] and to induce the expression of various cytokines and chemokines [9, 10]. Clinically, many cases of macula-off RRD undergo postoperative atrophy of the outer macular layer after reattachment. Accordingly, a few reports have performed qualitative analysis of changes in the structure of the detached macular area represented in optical coherence tomography (OCT) images and have examined the potential role of such analysis in determining the postoperative visual prognosis of eyes with macula-off RRD [11, 12]. However, to the best of our knowledge, there are no current reports investigating the potential of quantitative OCT measurement parameters of the macula to serve as prognostic indicators of visual outcome.

We hypothesized that preoperative macular volume reflected photoreceptor apoptosis and could thus predict postoperative outcomes in eyes with macula-off RRD. In order to test this hypothesis, we developed new OCT parameters that could provide a suitable evaluation of the macular structure and then determined the relationship between these parameters and postoperative visual outcomes in macula-off RRD eyes.

2. Patient and Methods

2.1. Subjects

We performed a retrospective analysis of the medical records of 56 consecutive eyes with macula-off RRD that underwent surgical intervention with a 25-gauge trocar cannula system or scleral buckling from January 2011 to February 2014 at Tohoku University Hospital. Eyes were included only if complete reattachment of the RRD was achieved after initial surgery. Eyes were excluded if they had prior vitreoretinal surgery, proliferative retinopathy, retinal vascular disease, chorioretinal atrophy, or high myopia (more than −10 diopters), if we could not obtain clear preoperative OCT measurements due to a bullous RRD or vitreous opacity, or if a single OCT scan could not capture the detached fovea and the retinal pigment epithelium layer. After the purpose and procedures of the operation were explained, informed consent was obtained from all patients. The procedures conformed to the tenets of the Declaration of Helsinki, and the study was approved by the Institutional Review Board of Tohoku University Graduate School of Medicine.

2.2. Measurements of Clinical Findings

All patients underwent a complete ocular examination 6 months after surgery. Best-corrected visual acuity (BCVA) was measured preoperatively and 1 and 6 months postoperatively with the Landolt C visual acuity chart. Decimal acuity values were converted to logarithm of the minimal angle of resolution (log MAR) units. The detached macula was examined with spectral-domain (SD) OCT (Cirrus OCT, Carl Zeiss Meditec) in all patients preoperatively, and foveal thickness was also measured 1 and 6 months postoperatively. To evaluate the detached macula preoperatively, a 2 mm circle was manually centered on the surface of the fovea in a cross-sectional OCT macular image. The image of the macula within this circle was then manually segmented into three layers: the inner layer (nerve fiber layer and ganglion cell layer), middle layer (inner plexiform layer and inner nuclear layer), and outer layer (outer plexiform layer and outer nuclear layer) (Figure 1). All OCT images were horizontal scans. Postoperative foveal thickness was defined as the value in the central 1000 μm area and was automatically calculated by the onboard OCT software. Our analysis of preoperative OCT parameters included retinal detachment (RD) height (the vertical distance from the detached fovea to the retinal base) [12] and macular cross-sectional area within a 2 mm circle centered on the foveal surface center in the OCT image. Separate values were also recorded for cross-sectional area in three macular layers.

Figure 1: Preoperative optical coherence tomography (OCT) images. A circle with a diameter of 2 mm was manually centered at the foveal surface center of the detached macula in the OCT image. The macular area within the circle was divided into three sections: the inner layer (upper right: nerve fiber layer and ganglion cell layer), middle layer (lower right: inner plexiform layer and inner nuclear layer), and outer layer (lower left: outer plexiform layer and outer nuclear layer).

2.3. Statistical Analyses

All statistical analysis was performed with JMP software (Pro version 10.0.2, SAS Institute Japan Inc., Tokyo, Japan). The correlation of 6-month postoperative BCVA to preoperative characteristics and operative, visual, and anatomical outcomes was determined with Spearman’s rank correlation coefficient. Significant differences between preoperative and 1- and 6-month postoperative BCVA were determined with the paired -test. Independent variables affecting 6-month postoperative BCVA were determined with multiple linear regression analysis. The significance level was set at .

3. Results

Table 1 shows the possible association of preoperative characteristics and operative, visual, and anatomical outcomes with 6-month postoperative BCVA in 56 eyes with RRD. Lens-sparing 25-gauge vitrectomy was performed in patients younger than 50 years. Cataract progression, which could have affected visual acuity, did not occur in any of these patients 6 months after surgery. Six-month postoperative BCVA was positively correlated with preoperative BCVA, 1-month postoperative BCVA, and preoperative RD height (, , and , resp.; Table 1 and Figure 2). Six-month postoperative BCVA was negatively correlated with 1-month postoperative foveal thickness and preoperative total and inner layer cross-sectional macular area (, , and , resp.; Table 1 and Figure 2). Six-month postoperative BCVA was significantly higher than preoperative BCVA and 1-month postoperative BCVA ( and , resp.). Multiple regression analysis revealed that the duration of the macular detachment and the total cross-sectional macular area were independent factors predicting 6-month postoperative BCVA ( and , resp.; Table 2).

Table 1: Preoperative characteristics and operative, visual, and anatomical outcomes of 56 eyes with rhegmatogenous retinal detachment and their possible association with 6-month postoperative visual acuity.

value

Number of eyes
56
—
—

Age (years)
50.0 ± 19.8
0.09
0.524a

Sex (, %)

—
0.557b

    Male
38, 67.9%
—
—

    Female
18, 32.1%
—
—

Spherical equivalent (diopter)
−3.15 ± 2.67
−0.01
0.950a

Duration of macular detachment (days)
33.3 ± 72.7
−0.09
0.565a

Procedure (, %)

—
0.935b

    PPV only
10, 17.7%
—
—

    PPV with cataract surgery
27, 48.2%
—
—

    Scleral buckling
19, 33.9%
—
—

Visual course (decimal VA)

    Preoperative
0.19 ± 0.27
0.48
<0.001a

    1 M postoperative
0.53 ± 0.51
0.82
<0.001a

    6 M postoperative
0.69 ± 0.55
—
—

Pre-op OCT findings

    RD height (mm)
1.45 ± 0.87
0.47
<0.001a

    Total macular area (mm²)
1.05 ± 0.16
−0.44
<0.001a

    Outer layer macular area (mm²)
0.62 ± 0.13
−0.17
0.221a

    Middle layer macular area (mm²)
0.19 ± 0.06
−0.04
0.759a

    Inner layer macular area (mm²)
0.23 ± 0.08
−0.43
0.001a

Post-op OCT findings

    1 M postoperative FT (m)
269.9 ± 79.7
−0.37
0.006a

    6 M postoperative FT (m)
255.4 ± 35.7
−0.24
0.096a

FT = foveal thickness, OCT = optical coherence tomography, PPV = pars plana vitrectomy, RD = retinal detachment, and VA = visual acuity.

aSpearman’s correlation coefficient by rank test, bunpaired -test.

Table 2: Multiple regression analysis for independent factors contributing to 6 M postoperative VA.

Variable

value

Dependent
Independent

Postoperative VA
Age

0.041
0.784

Duration of macular detachment

0.869
0.024

Preoperative VA

0.188
0.249

Preoperative OCT findings
RD height
0.212
0.203

Total macular area
−0.511
0.041

Outer layer macular area
0.334
0.180

Middle layer macular area
0.267
0.156

VA = visual acuity, OCT = optical coherent tomography, RD = retinal detachment, and = standard partial regression coefficient.

(a)

(b)

(c)

(d)

Figure 2: Correlation of preoperative clinical findings to 6-month postoperative best-corrected visual acuity (BCVA). There was a positive correlation between preoperative and 6-month postoperative BCVA ((a); , ). There was also a positive correlation between retinal detachment height and 6-month postoperative BCVA ((b); , ). There was a negative correlation between the cross-sectional area of the inner macular layer and 6-month postoperative BCVA ((c); , ). There was also a negative correlation between total macular cross-sectional area and 6-month postoperative BCVA ((d); , ).

Images of eyes representing good and poor visual outcomes after surgery for macula-off RRD are shown in Figure 3.

(a)

(b)

Figure 3: Representative eyes with good and poor visual outcomes after surgery for macula-off rhegmatogenous retinal detachment. (a) 65-year-old woman (preoperative decimal visual acuity: 0.7) with a good visual outcome (postoperative decimal visual acuity: 1.2). (b) 60-year-old woman (preoperative decimal visual acuity: 0.3) with a poor visual outcome (postoperative decimal visual acuity: 0.3). Preoperative photographs of the fundus, preoperative optical coherence tomography (OCT) images, and postoperative OCT images are shown on the left, center, and right, respectively. Preoperative foveal area was relatively thinner in the case with a poor outcome than in the case with a good outcome.

4. Discussion

We set out to evaluate the potential of newly developed OCT parameters to predict postoperative BCVA in macula-off RRD eyes. We found that 6-month postoperative BCVA was significantly correlated with RD height at the fovea and with the total and inner cross-sectional area of the macular layer within 2 mm of the fovea, as well as with preoperative BCVA. Furthermore, multiple regression analysis revealed that the duration of the macular detachment and the total cross-sectional macular area were independent factors predicting 6-month postoperative BCVA.

Surgeons cannot easily predict postoperative visual outcomes in cases of RRD, and even after successful RRD surgery, many patients only regain a poor level of postoperative visual function. This often causes patients to experience preoperative anxiety. Our results confirmed existing data showing that the duration of the macular detachment was associated with postoperative visual outcome, although the usefulness of this parameter is limited, because it depends on the memory of the patient and their cooperation and therefore cannot always be reliably known [13–15]. Though there are many existing reports showing that early postoperative OCT macular findings are associated with final visual function [16–25], there are only a few reports examining preoperative structural changes in the macula using up-to-date SD-OCT imaging of the detachment and the association of these changes with visual outcomes [11, 12]. These studies found that qualitatively measured preoperative characteristics of RRD eyes, such as intraretinal separation and outer layer undulation, were associated with a higher postoperative incidence of disruption to the photoreceptor inner/outer segment junction and the presence of external limiting membranes, causes of poor visual outcomes. Qualitative measurements are, however, subjective and prone to error, creating the need for quantitative methods to measure the detached macula with OCT, in order to find prognostic indicators of final visual outcome in RRD eyes.

The pathogenesis of poor visual outcomes in RRD is related to photoreceptor cell death [7–10], suggesting that the number of surviving retinal cells in the fovea should be the ideal prognostic indicator of final visual outcome. The three-dimensional (3D) volume of the macula, which is measureable by recent advanced OCT techniques, is closely associated with the number of surviving cells but would only be feasible to measure in young patients with flat RRD. In patients with bullous RRD, the detached macula is unstable and shifts its position in the vitreous faster than the scanning speed of existing 3D OCT devices, making it impossible to evaluate foveal volume in these eyes. To overcome this technical difficulty, we used two-dimensional OCT to measure the cross-sectional area of the macular layer in a 2 mm circle centered on the fovea and investigated its potential as an indicator of final BCVA. We developed this measurement parameter after observing that the detached section of the macula is not straight or flat in OCT images but instead lies obliquely across the image plane. Conventionally measuring cross-sectional area in a square or rectangle horizontal to the choroid would thus tend to overestimate foveal thickness. By contrast, measurements of cross-sectional area in a 2 mm circle centered on the fovea (which is about 1 mm in diameter) should be reliable regardless of the orientation or position of the detachment. A circular area larger than 2 mm would begin to lose reliability, as it would be more influenced by intraretinal edema, bending, or severe undulation of the detachment. Thus, we believe that it is most reasonable to adopt the cross-sectional area of the macular layer within 2 mm of the fovea as an indicator of macular health.

This study showed that RD height at the fovea, a measurement parameter used in a number of earlier studies, was associated with postoperative BCVA in a single regression analysis, confirming earlier reports [11, 12]. This is an understandable result, as when the distance between the retinal pigment epithelium and the photoreceptors increases, the foveal cones receive less oxygenation and nutrition from the choroid and photoreceptor cell degeneration increases. However, multiple regression analysis revealed that it was not an independent factor predicting 6-month postoperative BCVA (). The cause of this discrepancy is unclear but may have been related to the instability of RD height, particularly in bullous RRD and particularly in older eyes, because the detached macula can more easily shift its position in the vitreous. It is difficult to accurately and reproducibly evaluate RD height in such eyes, leading us to speculate that preoperative RD height cannot be considered a reliable predictor of postoperative visual function in eyes with macula-off RRD.

Limitations of this study included a relatively short follow-up time of 6 months, a relatively small sample size (about 60), and the omission of postoperative functional findings from standard automated perimetry or focal electroretinography. Additionally, although bullous RRD eyes are often seen in the clinic, the method described here cannot be used to predict postoperative outcomes in cases when OCT scans do not show the macula. Furthermore, to prevent bias in the results, it was necessary to omit the inner macular layer in the cross-sectional image from our multiple regression analysis, because the total and inner layer values were not independent, both being OCT findings and being closely correlated with 6-month postoperative BCVA. At first, we hypothesized that visual outcome would be associated with the area of the outer macular layer, as this contains the outer nuclear layer and the photoreceptor cells, but this hypothesis was not borne out by the data. It is unclear why this was so, but it may have been related to the susceptibility of the outer layer to intraretinal edema or undulation, which makes it difficult to obtain accurate measurements. Nevertheless, we believe our results show that simple OCT measurement of total cross-sectional area within 2 mm of the fovea is currently the most useful and objective way to predict postoperative visual outcomes in eyes with macula-off RRD, at least until technology to quickly evaluate macular volume in three dimensions becomes available for use in eyes with detached maculas. The usefulness of the measurement method described here would also be greatly enhanced by an OCT program to automatically measure cross-sectional macular area in eyes with macula-off RRD.

In conclusion, OCT measurement of preoperative total cross-sectional area of the macular layer within 2 mm of the fovea is a useful and objective way to predict postoperative visual outcomes in eyes with macula-off RRD and was closely correlated with 6-month postoperative BCVA. Further investigation is needed to measure the macular volume and determine its relationship with visual outcomes, which could lead to the development of a new automatic OCT program.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Authors’ Contribution

The principal investigator, Dr. Noriyuki Suzuki, and the coinvestigator, Dr. Naoko Aizawa, had full access to all the data in the study and take responsibility for the integrity of the data and the accuracy of the analysis. Involved in the design and conduct of the study were Hiroshi Kunikata and Toru Nakazawa; collection, management, analysis, and interpretation of the data Noriyuki Suzuki, Hiroshi Kunikata, and Naoko Aizawa; drafting of the paper Hiroshi Kunikata; and review or approval of the paper Hiroshi Kunikata, Toshiaki Abe, and Toru Nakazawa. All authors read and approved the final paper.

Acknowledgments

This paper was supported in part by a JST grant from JSPS KAKENHI Grants-in-Aid for Scientific Research (B) (Toru Nakazawa 26293372), for Scientific Research (C) (Hiroshi Kunikata 26462629), and for Exploratory Research (Toru Nakazawa 26670751).

References

G. Y. Fujii, E. De Juan Jr., M. S. Humayun et al., “A new 25-gauge instrument system for transconjunctival sutureless vitrectomy surgery,” Ophthalmology, vol. 109, no. 10, pp. 1807–1812, 2002.

N. Acar, Z. Kapran, T. Altan, Y. B. Unver, S. Yurtsever, and Y. Kucuksumer, “Primary 25-gauge sutureless vitrectomy with oblique sclerotomies in pseudophakic retinal detachment,” Retina, vol. 28, no. 8, pp. 1068–1074, 2008.

D. M. Miller, C. D. Riemann, R. E. Foster, and M. R. Petersen, “Primary repair of retinal detachment with 25-gauge pars plana vitrectomy,” Retina, vol. 28, no. 7, pp. 931–936, 2008.

H. Kunikata and K. Nishida, “Visual outcome and complications of 25-gauge vitrectomy for rhegmatogenous retinal detachment; 84 consecutive cases,” Eye, vol. 24, no. 6, pp. 1071–1077, 2010.

H. Kunikata, T. Abe, and K. Nishida, “Successful outcomes of 25- and 23-gauge vitrectomies for giant retinal tear detachments,” Ophthalmic Surgery Lasers and Imaging, vol. 42, no. 6, pp. 487–492, 2011.

T. Wakabayashi, Y. Oshima, H. Fujimoto et al., “Foveal microstructure and visual acuity after retinal detachment repair: imaging analysis by Fourier-domain optical coherence tomography,” Ophthalmology, vol. 116, no. 3, pp. 519–528, 2009.

B. Cook, G. P. Lewis, S. K. Fisher, and R. Adler, “Apoptotic photoreceptor degeneration in experimental retinal detachment,” Investigative Ophthalmology and Visual Science, vol. 36, no. 6, pp. 990–996, 1995.

T. Hisatomi, T. Sakamoto, Y. Goto et al., “Critical role of photoreceptor apoptosis in functional damage after retinal detachment,” Current Eye Research, vol. 24, no. 3, pp. 161–172, 2002.

T. Nakazawa, A. Matsubara, K. Noda et al., “Characterization of cytokine responses to retinal detachment in rats,” Molecular Vision, vol. 12, pp. 867–878, 2006.

T. Nakazawa, T. Hisatomi, C. Nakazawa et al., “Monocyte chemoattractant protein 1 mediates retinal detachment-induced photoreceptor apoptosis,” Proceedings of the National Academy of Sciences of the United States of America, vol. 104, no. 7, pp. 2425–2430, 2007.

A. Lecleire-Collet, M. Muraine, J.-F. Menard, and G. Brasseur, “Predictive visual outcome after macula-off retinal detachment surgery using optical coherence tomography,” Retina, vol. 25, no. 1, pp. 44–53, 2005.

S. G. Joe, Y. J. Kim, J. B. Chae et al., “Structural recovery of the detached macula after retinal detachment repair as assessed by optical coherence tomography,” Korean Journal of Ophthalmology, vol. 27, no. 3, pp. 178–185, 2013.

Y. Oshima, S. Yamanishi, M. Sawa, M. Motokura, S. Harino, and K. Emi, “Two-year follow-up study comparing primary vitrectomy with scleral buckling for macula-off rhegmatogenous retinal detachment,” Japanese Journal of Ophthalmology, vol. 44, no. 5, pp. 538–549, 2000.

W. H. Ross and F. A. Stockl, “Visual recovery after retinal detachment,” Current Opinion in Ophthalmology, vol. 11, no. 3, pp. 191–194, 2000.

J. D. Kim, H. H. Pham, M. M. Lai, J. W. Josephson, J. R. Minarcik, and M. von Fricken, “Effect of symptom duration on outcomes following vitrectomy repair of primary macula-off retinal detachments,” Retina, vol. 33, no. 9, pp. 1931–1937, 2013.

T. Baba, S. Mizuno, T. Tatsumi et al., “Outer retinal thickness and retinal sensitivity in macula-off rhegmatogenous retinal detachment after successful reattachment,” European Journal of Ophthalmology, vol. 22, no. 6, pp. 1032–1038, 2012.

A. Matsui, H. Toshida, R. Honda, T. Seto, T. Ohta, and A. Murakami, “Preoperative and postoperative optical coherence tomography findings in patients with rhegmatogenous retinal detachment involving the macular region,” vol. 2013, Article ID 426867, 6 pages, 2013.

J. H. Kim, D. Y. Park, H. S. Ha, and S. W. Kang, “Topographic changes of retinal layers after resolution of acute retinal detachment,” Investigative Ophthalmology and Visual Science, vol. 53, no. 11, pp. 7316–7321, 2012.

R. Dell'Omo, M. Mura, S. Y. L. Oberstein, H. Bijl, and H. S. Tan, “Early simultaneous fundus autofluorescence and optical coherence tomography features after pars plana vitrectomy for primary rhegmatogenous retinal detachment,” Retina, vol. 32, no. 4, pp. 719–728, 2012.

M. P. Delolme, B. Dugas, F. Nicot, A. Muselier, A. M. Bron, and C. Creuzot-Garcher, “Anatomical and functional macular changes after rhegmatogenous retinal detachment with macula off,” The American Journal of Ophthalmology, vol. 153, no. 1, pp. 128–136, 2012.

M. Gharbiya, F. Grandinetti, V. Scavella et al., “Correlation between spectral-domain optical coherence tomography findings and visual outcome after primary rhegmatogenous retinal detachment repair,” Retina, vol. 32, no. 1, pp. 43–53, 2012.

H. Kawashima, K. Mizukawa, I. Watanabe, H. Kamao, and J. Kiryu, “Evaluation of recovery process of photoreceptor outer segment after retinal detachment repair,” Nippon Ganka Gakkai zasshi, vol. 115, no. 4, pp. 374–381, 2011.

S. Sheth, S. Dabir, S. Natarajan, A. Mhatre, and N. Labauri, “Spectral domain-optical coherence tomography study of retinas with a normal foveal contour and thickness after retinal detachment surgery,” Retina, vol. 30, no. 5, pp. 724–732, 2010.

Y. Shimoda, M. Sano, H. Hashimoto, Y. Yokota, and S. Kishi, “Restoration of photoreceptor outer segment after vitrectomy for retinal detachment,” American Journal of Ophthalmology, vol. 149, no. 2, pp. 284–290, 2010.

W. W. Lai, G. Y. O. Leung, C. W. S. Chan, I. Y. L. Yeung, and D. Wong, “Simultaneous spectral domain OCT and fundus autofluorescence imaging of the macula and microperimetric correspondence after successful repair of rhegmatogenous retinal detachment,” British Journal of Ophthalmology, vol. 94, no. 3, pp. 311–318, 2010.