Journal of Ophthalmology
Volume 2016 (2016), Article ID 7064093, 1 page
http://dx.doi.org/10.1155/2016/7064093

Corrigendum

Corrigendum to “A Review of Collagen Cross-Linking in Cornea and Sclera”

Xiao Zhang,¹ Xiang-chen Tao,¹ Jian Zhang,² Zhi-wei Li,¹ Yan-yun Xu,¹ Yu-meng Wang,¹ Chun-xiao Zhang,¹ and Guo-ying Mu¹

¹Department of Ophthalmology, Shandong Provincial Hospital Affiliated to Shandong University, Jinan, Shandong 250000, China
²Zibo Eye Hospital, No. 33-6, Songlingxi Street, Zichuan, Zibo, Shandong 255100, China

Received 18 July 2016; Accepted 9 August 2016

Copyright © 2016 Xiao Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Review of Collagen Cross-Linking in Cornea and Sclera” [1], the first affiliation was incorrectly written as “Department of Ophthalmology, Shandong Provincial Hospital, Shandong University, Jinan, Shandong 250000, China,” while the correct address is “Department of Ophthalmology, Shandong Provincial Hospital Affiliated to Shandong University, Jinan, Shandong 250000, China.” The corrected affiliations are shown above.

References

X. Zhang, X.-c. Tao, J. Zhang et al., “A review of collagen cross-linking in cornea and sclera,” Journal of Ophthalmology, vol. 2015, Article ID 289467, 12 pages, 2015.