Journal of Ophthalmology
Volume 2016 (2016), Article ID 8592790, 1 page
http://dx.doi.org/10.1155/2016/8592790

Corrigendum

Corrigendum to “Local Relationship between Global-Flash Multifocal Electroretinogram Optic Nerve Head Components and Visual Field Defects in Patients with Glaucoma”

Chan Hee Moon, Jungwoo Han, Young-Hoon Ohn, and Tae Kwann Park

Department of Ophthalmology, Soonchunhyang University College of Medicine, Bucheon Hospital, Bucheon 14584, Republic of Korea

Received 18 January 2016; Accepted 27 March 2016

Copyright © 2016 Chan Hee Moon et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Local Relationship between Global-Flash Multifocal Electroretinogram Optic Nerve Head Components and Visual Field Defects in Patients with Glaucoma” [1] the affiliation of the first author was incorrectly listed as “Department of Ophthalmology, Seoul St. Mary’s Hospital, The Catholic University of Korea College of Medicine, Seoul 06591, Republic of Korea.” The correct affiliations are presented above.

References

C. H. Moon, J. Han, Y. Ohn, and T. K. Park, “Local relationship between global-flash multifocal electroretinogram optic nerve head components and visual field defects in patients with glaucoma,” Journal of Ophthalmology, vol. 2015, Article ID 397495, 8 pages, 2015.