Journal of Ophthalmology
Volume 2018 (2018), Article ID 1757494, 8 pages
https://doi.org/10.1155/2018/1757494

Research Article

Comparison of the Effect of Intravitreal Dexamethasone Implant in Vitrectomized and Nonvitrectomized Eyes for the Treatment of Diabetic Macular Edema

Sadık Görkem Çevik,¹ Sami Yılmaz,² Mediha Tok Çevik,³ Fatma Düriye Akalp,⁴ and Remzi Avcı²

¹Department of Ophthalmology, Yüksek Ihtisas Research and Training Hospital, Bursa, Turkey
²Retina Eye Hospital, Bursa, Turkey
³Sisli Hamidiye Etfal Research and Training Hospital, İstanbul, Turkey
⁴Department of Ophthalmology, Acıbadem Hospital, Bursa, Turkey

Correspondence should be addressed to Sadık Görkem Çevik; gorkemcevik@hotmail.com

Received 13 January 2018; Revised 22 March 2018; Accepted 3 April 2018; Published 22 April 2018

Academic Editor: Dirk Sandner

Copyright © 2018 Sadık Görkem Çevik et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. To compare the effectiveness of sustained-release dexamethasone (DEX) intravitreal implant in nonvitrectomized eyes and vitrectomized eyes with diabetic macular edema (DME). Methods. A retrospective review of the medical records of 40 eyes of 30 consecutive patients with diabetic macular edema who underwent intravitreal DEX implant injection. Patients were divided into 2 subgroups: 31 eyes that were nonvitrectomized (group 1) and 9 eyes that had previously undergone standard pars plana vitrectomy (group 2). The main outcome measures were BCVA and foveal thickness (FT). Results. A significant improvement was seen in BCVA in both group 1 and group 2 at the 1st, 2nd, and 6th months after treatment with DEX implant (). In group 1, a significant reduction in FT was observed at the 1st, 2nd, and 6th months (). In group 2, a significant reduction in FT was seen at the 1st and 2nd months (), but the reduction rate at the 6th month after the injection was not statistically significant (). Conclusion. DEX implant is effective for the treatment of diabetic macular edema, and the effectiveness of the drug is similar in vitrectomized and nonvitrectomized eyes.

1. Introduction

Diabetic macular edema is one of the most important causes of blindness worldwide particularly affecting those individuals of working age [1–3]. Since the recognition of the role of inflammation and importance of the vascular endothelial growth factor (VEGF) in the pathogenesis of diabetic retinopathy, treatment options have been altered with anti-VEGF drugs, and corticosteroids have taken an active role in the treatment of diabetic retinopathy [4–7]. Dexamethasone and triamcinolone are the most frequently used corticosteroids. Although dexamethasone is powerful, it remains in the vitreous for a limited amount of time; therefore, attempts have been made to support it with carriers which can remain longer in the vitreous [8, 9].

Despite the many new treatments that are available, a pars plana vitrectomy (PPV) is still required in some diabetic patients. The vitreoretinal tractions can be released, and the inflammatory stimulators that cause macular edema can be removed via PPV [10]. By its very nature, repeated intravitreal injections may be required in post-PPV patients. Anti-VEGF drugs, 5-FU, triamcinolone, and amphotericin B have been observed to clear out more rapidly in patients who have undergone PPV; thus, the effective duration has been reported to be shorter than expected [11–15].

The positive effects of corticosteroids in cases of diabetic macular edema have been known for many years. The effect of corticosteroids is achieved through the lowering of ICAM-1 gene expression and the VEGF level [17–19]. To prolong the corticosteroid half-life, carrier platforms which dissolve within the vitreous over a longer period of time have been developed, with Ozurdex being a significant long-term release dexamethasone implant. Ozurdex contains 0.7 mg of dexamethasone within its carrying system (Novadur® Styrolution; Aurora, Illinois, USA). It dissolves into lactic and glycolic acid in the vitreous, and this dissolution generates a slow dexamethasone release [20–22]. Following the implantation, an intense effect occurs during the first 2 months, which continues for 6 months [23].

This research aimed to compare the effective duration of a slow-release dexamethasone implant (Ozurdex) in vitrectomized and nonvitrectomized eyes for the treatment of diabetic macular edema.

2. Materials and Methods

This study was conducted in accordance with the Declaration of Helsinki, and informed consent forms were obtained from all of the patients. Our study involved a retrospective review of 40 eyes of 30 patients who were treated with Ozurdex implant injections for diabetic macular edema under operating room conditions at the Bursa Retina Eye Hospital between January 2012 and May 2015. Each intravitreal implant was applied under topical anesthesia with a 22 G applicator, 3.5 mm posterior to the limbus. The patients were divided into two: group 1 (), patients who were not operated on, and group 2 (), patients who had undergone vitrectomy surgery. The patients in group 1 had diabetic retinopathy, and those patients were previously treated with panretinal laser photocoagulation, intravitreal anti-VEGF (bevacizumab), or triamcinolone injections. Combined vitrectomy surgeries (phacoemulsification + PPV + endolaser treatment + gas tamponade + ILM peeling) were performed due to complications of diabetic retinopathy in all of the group 2 patients.

The age, gender, lens status of the patients, and previous treatments like focal-grid laser or other intravitreal therapies like anti-VEGF and triamcinolone were recorded. We used bevacizumab as anti-VEGF drug, and we did not switch throughout the study period. The inclusion criteria were the presence of intraretinal fluid demonstrated by optical coherence tomography (OCT) and at least 60 days since the last treatment. The exclusion criteria were a history of glaucoma, any kind of vitreomacular traction, uncontrolled diabetes (HbA1c > 8), incomplete laser treatment, and cases which required vitreous surgery during the follow-up. Recurrence of DME was defined as new intraretinal fluid showed by OCT after the final injection.

For each patient, the best-corrected visual acuity (BCVA) (Snellen converted logMAR) and macular thickness on OCT at baseline visit and within the 1st, 2nd, 6th months, and during follow-up visits were obtained. The OCT measurements were taken with a spectral domain OCT device (Heidelberg, Germany). Those patients who presented with complaints of visual impairment were measured for visual acuity and macular thickness. The changes in the BCVA, the presence of intraretinal fluid and intraocular pressure (IOP), the complications, and the time to recurrence were evaluated. When recurrence of DME was observed, a second injection was performed after the 6th month.

The statistical analyses were performed using IBM SPSS 22.0 statistics software. The Wilcoxon signed-rank test was used for the determination of the visual acuity and the changes in foveal thickness in the groups. The Chi-squared test was used in the evaluation of the distribution of the patients with recurrence, while the Mann–Whitney U test was used in the evaluation of the time to recurrence. A value of was accepted as statistically significant.

3. Results

The mean age of patients was 63.1 ± 8.1 (47–85) years in group 1 and 60.4 ± 9.2 (47–77) years in group 2. The mean follow-up time was 19.7 ± 11.2 (6–36) months in group 1 and 15.8 ± 9.3 (6–36) months in group 2. Focal laser photocoagulation treatment was performed before the intravitreal Ozurdex therapy in 25 eyes (71%) in group 1 and in 9 eyes (100%) in group 2. The intravitreal steroid (except Ozurdex) and/or anti-VEGF (bevacizumab) injections were given before the intravitreal Ozurdex therapy in 27 eyes (87%) in group 1 and in 8 eyes (88%) in group 2. Fourteen eyes (45%) in group 1 and 9 eyes (100%) in group 2 had pseudophakia (Table 1).

Table 1: Results of the current study.

Eye
Patient age
Focal laser treatment
Intravitreal injection
Preoperative lens status
Complication
Vitrectomy surgery
Usage of treatment after recurrence (patients who accepted the treatment)

1
53
N
7
N
Ø
N
Dex

2
55
N
2
P
Ø
N
Dex

3
60
Y
4
N
Ø
N

4
68
Y
2
N
Ø
N

5
55
Y
4
P
Ø
N
Dex

6
55
Y
Ø
P
Ø
N

7
68
Y
1
P
Ø
N

8
68
Y
1
P
Ø
N

9
77
Y
1
P
Ø
N

10
67
Y
1
P
Ø
N

11
67
Y
3
N
Ø
N
Dex

12
67
Y
3
N
Ø
N
Dex

13
67
Y
3
N
Ø
N

14
85
Y
3
P
Ocular HT
N
Anti-VEGF

15
52
Y
1
N
Ø
N

16
69
Y
7
N
Cataract
N

17
71
N
2
P
Ø
N

18
54
N
1
P
Ø
N

19
54
Y
1
N
Ø
N

20
60
Y
1
N
Ø
N

21
77
Y
1
P
Ø
N

22
58
N
2
N
Ocular HT
N
Anti-VEGF

23
47
Y
1
N
Ø
N

24
65
Y
1
N
Ø
N
Dex

25
65
Y
2
N
Cataract
N
Dex

26
60
Y
2
N
Ø
N
Dex

27
67
Y
1
N
Ø
N

28
57
Y
1
N
Ø
N

29
65
N
Ø
P
Ø
N

30
63
Y
Ø
P
Ø
N

31
63
Y
Ø
P
Ø
N

32
55
Y
1
P
Ø
Y

33
51
Y
1
P
Ø
Y

34
47
Y
1
P
Ø
Y
Dex

35
77
Y
2
P
Ø
Y
Dex

36
65
Y
1
P
Ø
Y

37
60
Y
Ø
P
Ø
Y

38
60
Y
1
P
Ø
Y

39
59
Y
2
P
Ø
Y

40
70
Y
3
P
Glaucoma
Y

Y: yes; N: no; P: pseudophakic; N: natural; Dex: dexamethasone implant.

In group 1, the best-corrected visual acuity (BCVA) was 0.88 ± 0.46 at the baseline visit, 0.60 ± 0.38 at the 1st month, 0.56 ± 0.32 at the 2nd month, and 0.58 ± 0.41 at the 6th month (logMAR). In group 2, the BCVA was 0.98 ± 0.66 at the baseline visit, 0.67 ± 0.48 at the 1st month, 0.54 ± 0.26 at the 2nd month, and 0.77 ± 0.58 at the 6th month (logMAR). When compared to the baseline values, the increases in the BCVA in group 1 within the 1st, 2nd, and 6th months were statistically significant (, , and , resp.). In group 2, the increases in the BCVA were also statistically significant at the 1st, 2nd, and 6th months when compared to the baseline levels (, , and , resp.).

In group 1, the macular thickness was 596 ± 170 (265–1004) microns prior to injection, 403 ± 108 (160–575) microns at the 1st, 304 ± 74 (190–440) microns at the 2nd, and 339 ± 176 (88–835) microns at the 6th month. In group 1, the changes in the macular thickness were statistically significant at the 1st, 2nd, and 6th months when compared to the baseline visit values (). The macular thickness in group 2 at baseline visit was 547 ± 166 (354–810) microns, and it was 358 ± 99 (200–505) microns at the 1st, 221 ± 105 (150–350) microns at the 2nd, and 349 ± 178 (164–700) microns at the 6th month. The changes in the macular thickness within the 1st and 2nd months in group 2 were statistically significant ( and , resp.) when compared to the baseline values, but the change at the 6th month was not statistically significant () (Table 2).

Table 2: Results of the current study.

Eye
Prein. VA (Snellen)
Postin. 1st month VA (Snellen)
Postin. 2nd month VA (Snellen)
Postin. 6th month VA (Snellen)
Prein. foveal thickness (μ)
Postin. 1st month foveal thickness (μ)
Postin. 2nd month foveal thickness (μ)
Postin. 6th month foveal thickness (μ)
Time to recurrence (week)
Group

1
20/2000
20/800
20/400
20/2000
752
575
300
380
16
1

2
20/1600
20/400
20/400
20/1600
550
368
280
471
20
1

3
20/100
20/80
20/80
20/40
577
270
244
200
Ø
1

4
20/100
20/100
20/100
20/100
454
438
350
476
22
1

5
20/200
20/100
20/100
20/125
662
291
190
835
19
1

6
20/40
20/32
Ø
20/25
350
242
200
240
Ø
1

7
20/40
20/40
Ø
20/25
383
364
Ø
300
Ø
1

8
20/400
20/400
Ø
20/200
853
563
Ø
104
Ø
1

9
20/200
20/100
Ø
20/125
413
400
Ø
163
Ø
1

10
20/100
20/50
Ø
20/40
642
400
Ø
485
20
1

11
20/40
20/40
20/40
20/125
662
540
265
481
24
1

12
20/40
20/32
20/32
20/63
550
432
380
463
20
1

13
20/200
20/125
20/125
20/125
1004
560
390
204
Ø
1

14
20/2000
20/400
20/400
20/200
330
200
200
250
22
1

15
20/125
20/40
20/40
20/80
607
400
305
334
Ø
1

16
20/125
20/40
20/40
20/80
529
356
290
200
Ø
1

17
20/50
20/32
20/32
20/25
525
390
280
173
Ø
1

18
20/125
20/100
Ø
20/40
496
337
Ø
490
20
1

19
20/400
20/125
Ø
20/63
884
540
Ø
150
Ø
1

20
20/200
20/50
20/50
20/40
826
550
350
88
Ø
1

21
20/200
20/125
20/200
20/200
525
332
300
118
Ø
1

22
20/50
20/40
20/40
20/63
716
505
440
553
16
1

23
20/200
20/125
20/100
20/200
808
510
430
162
Ø
1

24
20/63
20/40
20/125
20/40
741
450
400
450
21
1

25
20/200
20/125
20/125
20/63
592
480
190
363
20
1

26
20/200
20/63
20/63
20/50
516
440
320
419
24
1

27
20/200
20/100
Ø
20/125
479
400
Ø
186
Ø
1

28
20/200
20/63
Ø
20/63
265
160
Ø
302
20
1

29
20/40
20/40
20/63
20/25
620
325
300
600
20
1

30
20/40
Ø
Ø
20/25
590
364
Ø
317
Ø
1

31
20/125
Ø
Ø
20/100
598
335
300
560
20
1

32
20/200
20/100
20/100
20/125
810
387
350
283
Ø
2

33
20/40
Ø
20/32
20/32
463
Ø
Ø
358
Ø
2

34
20/50
20/40
20/40
20/40
449
250
210
700
16
2

35
20/200
20/100
20/50
20/100
708
505
310
468
22
2

36
20/200
20/50
20/50
20/125
768
450
150
164
Ø
2

37
20/200
20/50
20/40
20/50
456
375
180
165
Ø
2

38
20/2000
20/500
20/400
20/500
457
374
200
166
Ø
2

39
20/2000
20/500
20/500
20/2000
458
323
180
389
20
2

40
20/32
20/25
20/32
20/50
354
200
190
450
12
2

During the first 6-month period, the time to recurrence of macular edema was 20.2 ± 2.2 weeks in group 1 and 17.5 ± 4.4 weeks in group 2, but there was no statistically significant difference between the 2 groups (). Recurrences were observed in 16 eyes in group 1 and in 4 eyes in group 2, but there was no statistically significant difference between the 2 groups ().

High IOP (HIP) values, which can be brought under control with medical treatment, were measured as >25 mmHg in 2 eyes in group 1 and in 1 eye in group 2, although none of these measurements exceeded 30 mmHg. Within the first 6-month period, cataract development was observed in 2 eyes in group 1. Moreover, all of the group 2 patients had pseudophakia. Cataract progression was clinically observed. Visual acuities of the cases with cataract were removed from statistical analysis.

Of the patients with recurrence, a second dexamethasone implant was applied to 8 of the patients who accepted treatment in group 1 and to 2 of the patients in group 2. The remaining patients with recurrence did not accept another intravitreal injection. Intravitreal anti-VEGF (bevacizumab) treatments were applied to 2 patients following recurrence in group 1 because of the HIP. The recurrences of diabetic macular edema were observed in 6 eyes that had undergone second dexamethasone implant injections in group 1. In those eyes, the mean recurrence time was 21 ± 2.6 (19–25) weeks. We observed a recurrence of diabetic macular edema during the 21st week in 1 patient who had undergone a second intravitreal injection of a dexamethasone implant in group 2. A third dexamethasone implant was injected into 2 patients in group 1. Following repeated Ozurdex injections, the time to recurrence of DME extended from 21 ± 2.6 weeks to 25 ± 1.3 weeks (Table 3).

Table 3: Recurrence and retreatment number and times.

Total
Retreatment
Avg. recurrence time
Second retreatment
Secondary recurrence
Avg. recurrence time 2
Retreatment

Recurrence in 6 months

    Group 1
16 eyes
8 (out of 16)
21 ± 2.6 weeks
8 eyes
6 eyes
25 ± 1.3 weeks
2 eyes

    Group 2
4 eyes
2 eyes
21 weeks
1 eye

Recurrence > 6 month

6–12 months

    Group 1
20 eyes

    Group 2
6 eyes

Recurrence > 6 month

    Group 1
20
9
24.2 ± 1.3 weeks
9 eyes
6 eyes
26.4 ± 1.8 weeks
3 eyes

    Group 2
6
4
24.16 ± 1.83 weeks
2 eyes
2 eyes
25.1 ± 1.3 weeks
1 eye

When we looked at the final results of those patients without recurrence during the first 6 months of follow-up, we saw recurrence in both group1 and group 2 during the following 6 months. In group 1, recurrence was observed in 8 of 15 eyes within 6 to 9 months of follow-up and in 5 eyes within 9 to 12 months. No recurrence was observed in 2 eyes in 36 months of total follow-up. Of those 9 eyes (out of 13) in which recurrence was observed after 6 months, 6 of them were treated with Ozurdex and 3 of them were treated with anti-VEGF (bevacizumab). Four eyes left untreated due to the patients’ disapproval. In group 2, recurrence was observed in 4 eyes after 6 months, which were retreated with Ozurdex. No recurrence was observed within 36 months in only 1 eye.

4. Discussion

Following PPV surgery, frequently repeated application of intravitreal medication may be required; therefore, it is important to know how these medications will act on the eyes which have undergone vitrectomy surgery [16]. The results of this study showed that a dexamethasone implant was effective in both vitrectomized and nonvitrectomized eyes. After the removal of the vitreous, the eye becomes less viscous; therefore, a clearance of intravitreal drugs from the vitreus cavity is accelerated [11, 24, 25]. It is well known that the clearance of triamcinolone particles is much faster in vitrectomized eyes [26, 27]. Previous studies have shown a shorter half-life of anti-VEGF drugs in the eyes which have undergone PPV, and a 60% decrease has been observed in the half-life of bevacizumab in monkey eyes following PPV [28]. In a study by Niwa et al., comparing the half-lives of ranibizumab and aflibercept in vitrectomized and nonvitrectomized eyes, the half-lives of both molecules were decreased in vitrectomized eyes [29]. Moisseiev et al. calculated the half-life of bevacizumab on vitrectomized and nonvitrectomized eyes and reported that the half-life was 4.9 days in the nonvitrectomized eyes and 0.66 days in the vitrectomized eyes [30]. However, the Diabetic Retinopathy Clinical Research Network trial had shown favorable responses to intravitreal ranibizumab treatment in the management of DME among patients with prior vitrectomy [43].

In the current study, the increases in the BCVA during the 1st, 2nd, and 6th months, when compared to the baseline levels, were statistically significant in the nonvitrectomized and vitrectomized eyes, and all of the medications were seen to have similar effects in both groups. In a study comprised of 24 vitrectomized and 34 nonvitrectomized eyes by Dutra Medeiros et al., statistically significantly increases were observed in BCVA during the 1st, 3rd, and 6th months after the intravitreal Ozurdex injection. In the same study, statistically significant improvements in the foveal thicknesses of both the vitrectomized and nonvitrectomized eyes were observed during the 1st, 3rd, and 6th months when compared with the baseline levels [31]. Although we have found similar results in our study, the change in macular thickness in vitrectomized eyes at 6 months was not statistically significant. This nonstatistically significant result was attributed to the lower number of patients in group 2 (), which was a significant drawback of our study. Given the small number of cases in group 2, this condition may be interpreted as clinically significant.

The detection time of recurrent macular edema was an average of 17.5 weeks in the vitrectomized eyes and 20 weeks in the nonvitrectomized eyes, and this period was determined to be similar between the 2 groups. In a study by Escobar-Barranco et al., Ozurdex implants were applied to refractory and treatment naïve patients with diffuse diabetic macular edema, and the median time for reinjection was 4 months [32]. Hattenbach et al. studied 24 patients (25 eyes) who had undergone PPV and had persistent postoperative macular edema. The macular thickness decreased within 4 to 8 weeks after the Ozurdex implantation, and the visual improvement was observed in 79% of the patients. In the same study, the macular thickness was observed to increase between 10 and 16 weeks, and the dexamethasone implant was reapplied to 12 of 25 eyes [33]. In another study by Hattenbach et al., the medical records of 37 patients (39 eyes) who had been treated with intravitreal DEX implant for postoperative persistent cystoid macular edema following vitrectomy and peeling of idiopathic epiretinal membranes were retrospectively reviewed [39]. And they reported that 17 of 39 eyes (43.6%) necessitated minimum 1 repeat injection of DEX implant. Klamann et al. reported that intravitreal DEX implant is an effective treatment among patients with postoperative macular edema after cataract surgery or pars plana vitrectomy. They observed recurrence of macular edema in 8 patients 8.1 ± 5.3 months after the first injection of DEX which responded to reinjection [40]. In an experimental study, the behavior of Ozurdex implants injected into vitrectomized eyes was modeled, and Ozurdex was injected into a BSS-filled box at different release angles (15°, 30°, and 45°) [41]. They found that the implant injected at 15° reached the highest mean initial velocity and mean initial normalized energy. The combination of intravitreal DEX injection with pars plana vitrectomy had been shown to be safe and effective for some underlying conditions that result in macular edema, like diabetic retinopathy, retinal vein occlusion, and uveitis [42].

The results obtained in this study showed no statistically significant difference regarding recurrence of macular edema time between vitrectomized and nonvitrectomized eyes. The time to recurrence of macular edema was 20.2 ± 2.2 weeks in nonvitrectomized group and 17.5 ± 4.4 weeks in vitrectomized group.

Shah et al. evaluated the efficacy of intravitreal dexamethasone implants among 8 vitrectomized eyes with persistent diabetic macular edema, which were previously treated with intravitreal anti-VEGF therapy [37]. They observed an increase in the visual acuity and a decrease in the macular thickness 1 month after treatment. Additionally, that effect lasted for at least 3 months. Thanos et al. injected intravitreal Ozurdex implant to patients who had recalcitrant macular edema after a successful rhegmatogenous retinal detachment repair surgery. They observed recurrence of the edema in all patients at the end of 3 months [38]. In that study, the average number of implants to treat macular edema in their set of patients was 4 (range 1–14). In our study, we observed longer duration of the effect. Also, the second injection had greater efficacy than the first.

In a study by the Ozurdex CHAMPLAIN study group, a 26-week evaluation of the safety and efficacy of Ozurdex was conducted on 55 vitrectomized eyes via OCT scanning and foveal thickness examination. The findings showed a decrease in the maximum foveal thickness and an increase in vision in the 8th week, and these effects continued for 26 weeks. In the current study, the maximum increases in vision and decreases in the foveal thickness were observed in both patient groups in the postoperative 1st and 2nd months. The most frequently seen side effects in the Ozurdex CHAMPLAIN study group were conjunctival bleeding, an increase in the IOP, and pain; however, the medication was deemed to be safe [34]. In the current study, an increase in the IOP possibly requiring medical treatment was observed in 1 vitrectomized eye and 2 nonvitrectomized eyes. When the side effect profile of Ozurdex was evaluated, the increase in the IOP and development of cataract became prominent.

In the BEVORDEX study in which Ozurdex and bevacizumab were compared for 12 months, the IOP levels of 26% of the patients in the Ozurdex group were ≥25 mmHg, but they were lowered with medical treatment [35]. In the current study, all of the HIP cases were brought under control with medical treatment. In addition, cataract development is an important side effect of steroids that are applied intraocularly. In the MEAD study, in which dosages of 0.7 mg and 0.35 mg were compared, cataract development was determined at the rates of 67.9%, 64.1%, and 20.4%, respectively, for the 3 groups (including a 3rd control group) over a 3-year period. The rates of cataract surgery were 59.2%, 52.3%, and 7.2%, respectively, while in the dexamethasone implant group, cataract surgery was performed between 18 and 30 months in 75% of the patients [36]. In the current study, cataract development was observed in 2 eyes within the first 6-month period, with an expected increase at the longer term follow-up visits.

Our study had certain limitations, such as its retrospective nature, the small sample of eyes in group 2, and that the refusal of reinjection by some patients with recurrent macular edema. However, our follow-up time is long enough to evaluate the long-term effectiveness and safety of Ozurdex. In addition, we observed the period of recurrence extended as the number of injections increased in vitrectomized and nonvitrectomized eyes.

5. Conclusion

Overall, the sustained-release dexamethasone implant was shown to be similarly effective in both vitrectomized and nonvitrectomized eyes. When the duration of the effect on vitrectomized eyes in particular is taken into consideration, sooner, reinjection may be required in vitrectomized eyes to achieve the same results.

Disclosure

This study was presented as a poster in EuRetina 2016 meeting.

Conflicts of Interest

The authors do not have any conflict of interest.

References

T. A. Ciulla, A. G. Amador, and B. Zinman, “Diabetic retinopathy and diabetic macular edema: pathophysiology, screening, and novel therapies,” Diabetes Care, vol. 26, no. 9, pp. 2653–2664, 2003.

S. Resnikoff, D. Pascolini, D. Etya'ale et al., “Global data on visual impairment in the year 2002,” Bulletin of the World Health Organization, vol. 82, no. 11, pp. 844–851, 2004.

I. Kocur and S. Resnikoff, “Visual impairment and blindness in Europe and their prevention,” British Journal of Ophthalmology, vol. 86, no. 7, pp. 716–722, 2002.

H. A. Al Dhibi and J. F. Arevalo, “Clinical trials on corticosteroids for diabetic macular edema,” World Journal of Diabetes, vol. 4, no. 6, pp. 295–302, 2013.

Early Treatment Diabetic Retinopathy Study Research Group, “Photocoagulation for diabetic macular edema. Early Treatment Diabetic Retinopathy Study report number 1,” Archives of Ophthalmology, vol. 103, no. 12, pp. 1796–1806, 1985.

P. Romero-Aroca, J. Reyes-Torres, M. Baget-Bernaldiz, and C. Blasco-Sune, “Laser treatment for diabetic macular edema in the 21st century,” Current Diabetes Reviews, vol. 10, no. 2, pp. 100–112, 2014.

N. Cheung, I. Y. Wong, and T. Y. Wong, “Ocular anti-VEGF therapy for diabetic retinopathy: overview of clinical efficacy and evolving applications,” Diabetes Care, vol. 37, no. 4, pp. 900–905, 2014.

I. M. Gan, L. C. Ugahary, J. T. van Dissel, and J. C. van Meurs, “Effect of intravitreal dexamethasone on vitreous vancomycin concentrations in patients with suspected postoperative bacterial endophthalmitis,” Graefe’s Archive for Clinical and Experimental Ophthalmology, vol. 243, no. 11, pp. 1186–1189, 2005.

L. Zhang, W. Shen, J. Luan et al., “Sustained intravitreal delivery of dexamethasone using an injectable and biodegradable thermogel,” Acta Biomaterialia, vol. 23, pp. 271–281, 2015.

E. Stefánsson, “Physiology of vitreous surgery,” Graefe’s Archive for Clinical and Experimental Ophthalmology, vol. 247, no. 2, pp. 147–163, 2009.

S. S. Lee, C. Ghosn, Z. Yu et al., “Vitreous VEGF clearance is increased after vitrectomy,” Investigative Ophthalmology & Visual Science, vol. 51, no. 4, pp. 2135–2138, 2010.

H.-S. Chin, T.-S. Park, Y.-S. Moon, and J.-H. Oh, “Difference in clearance of intravitreal triamcinolone acetonide between vitrectomized and nonvitrectomized eyes,” Retina, vol. 25, no. 5, pp. 556–560, 2005.

R. H. Schindler, D. Chandler, R. Thresher, and R. Machemer, “The clearance of intravitreal triamcinolone acetonide,” American Journal of Ophthalmology, vol. 93, no. 4, pp. 415–417, 1982.

B. H. Doft, J. Weiskopf, I. Nilsson-Ehle, and L. B. Wingard Jr., “Amphotericin clearance in vitrectomized versus nonvitrectomized eyes,” Ophthalmology, vol. 92, no. 11, pp. 1601–1605, 1985.

G. Jarus, M. Blumenkranz, E. Hernandez, and N. Sossi, “Clearance of intravitreal fluorouracil: normal and aphakic vitrectomized eyes,” Ophthalmology, vol. 92, no. 1, pp. 91–96, 1985.

D. A. H. Laidlaw, “Vitrectomy for diabetic macular oedema,” Eye, vol. 22, no. 10, pp. 1337–1341, 2008.

S. G. Schwartz, H. W. Flynn, and I. U. Scott, “Intravitreal corticosteroids in the management of diabetic macular edema,” Current Ophthalmology Reports, vol. 1, no. 3, pp. 144–149, 2013.

M. Nauck, G. Karakiulakis, A. P. Perruchoud, E. Papakonstantinou, and M. Roth, “Corticosteroids inhibit the expression of the vascular endothelial growth factor gene in human vascular smooth muscle cells,” European Journal of Pharmacology, vol. 341, no. 2-3, pp. 309–315, 1998.

J. L. Edelman, D. Lutz, and M. R. Castro, “Corticosteroids inhibit VEGF-induced vascular leakage in a rabbit model of blood–retinal and blood–aqueous barrier breakdown,” Experimental Eye Research, vol. 80, no. 2, pp. 249–258, 2005.

D. P. Hainsworth, P. A. Pearson, J. D. Conklin, and P. Ashton, “Sustained release intravitreal dexamethasone,” Journal of Ocular Pharmacology and Therapeutics, vol. 12, no. 1, pp. 57–63, 1996.

L. Zhang, Y. Li, C. Zhang, Y. Wang, and C. Song, “Pharmacokinetics and tolerance study of intravitreal injection of dexamethasone-loaded nanoparticles in rabbits,” International Journal of Nanomedicine, vol. 4, pp. 175–183, 2009.

B. D. Kuppermann, M. S. Blumenkranz, J. A. Haller et al., “Randomized controlled study of an intravitreous dexamethasone drug delivery system in patients with persistent macular edema,” Archives of Ophthalmology, vol. 125, no. 3, pp. 309–317, 2007.

J.-E. Chang-Lin, M. Attar, A. A. Acheampong et al., “Pharmacokinetics and pharmacodynamics of a sustained-release dexamethasone intravitreal implant,” Investigative Opthalmology & Visual Science, vol. 52, no. 1, p. 80, 2011.

J. I. Patel, P. G. Hykin, M. Schadt, V. Luong, F. Fitzke, and Z. J. Gregor, “Pars plana vitrectomy for diabetic macular oedema: OCT and functional correlations,” Eye, vol. 20, no. 6, pp. 674–680, 2006.

Diabetic Retinopathy Clinical Research Network Writing Committee, “Vitrectomy outcomes in eyes with diabetic macular edema and vitreomacular traction,” Ophthalmology, vol. 117, no. 6, pp. 1087–1093.e3, 2010.

P. M. Beer, S. J. Bakri, R. J. Singh, W. Liu, G. B. Peters III, and M. Miller, “Intraocular concentration and pharmacokinetics of triamcinolone acetonide after a single intravitreal injection,” Ophthalmology, vol. 110, no. 4, pp. 681–686, 2003.

S. Gisladottir, T. Loftsson, and E. Stefansson, “Diffusion characteristics of vitreous humour and saline solution follow the Stokes Einstein equation,” Graefe's Archive for Clinical and Experimental Ophthalmology, vol. 247, no. 12, pp. 1677–1684, 2009.

M. Kakinoki, T. Miyake, O. Sawada, T. Sawada, H. Kawamura, and M. Ohji, “The clearance of intravitreal bevacizumab in vitrectomized macaque eyes,” Investigative Ophthalmology & Visual Science, vol. 52, no. 14, p. 5630, 2011.

Y. Niwa, M. Kakinoki, T. Sawada, X. Wang, and M. Ohji, “Ranibizumab and aflibercept: intraocular pharmacokinetics and their effects on aqueous VEGF level in vitrectomized and nonvitrectomized macaque eyes,” Investigative Ophthalmology & Visual Science, vol. 56, no. 11, p. 6501, 2015.

E. Moisseiev, M. Waisbourd, E. Ben-Artsi et al., “Pharmacokinetics of bevacizumab after topical and intravitreal administration in human eyes,” Graefe's Archive for Clinical and Experimental Ophthalmology, vol. 252, no. 2, pp. 331–337, 2014.

M. Dutra Medeiros, M. Alkabes, R. Navarro, J. Garcia-Arumí, C. Mateo, and B. Corcóstegui, “Dexamethasone intravitreal implant in vitrectomized versus nonvitrectomized eyes for treatment of patients with persistent diabetic macular edema,” Journal of Ocular Pharmacology and Therapeutics, vol. 30, no. 9, pp. 709–716, 2014.

J. J. Escobar-Barranco, B. Pina-Marín, and M. Fernández-Bonet, “Dexamethasone implants in patients with naïve or refractory diffuse diabetic macular edema,” Ophthalmologica, vol. 233, no. 3-4, pp. 176–185, 2015.

L. O. Hattenbach, C. Kuhli-Hattenbach, C. Springer, J. Callizo, and H. Hoerauf, “Intravitreales dexamethason-implantat zur behandlung des persistierenden postoperativen makulaödems nach vitrektomie,” Der Ophthalmologe, vol. 113, no. 7, pp. 581–588, 2016.

D. S. Boyer, D. Faber, S. Gupta et al., “Dexamethasone intravitreal implant for treatment of diabetic macular edema in vitrectomized patients,” Retina, vol. 31, no. 5, pp. 915–923, 2011.

M. C. Gillies, L. L. Lim, A. Campain et al., “A randomized clinical trial of intravitreal bevacizumab versus intravitreal dexamethasone for diabetic macular edema: the BEVORDEX study,” Ophthalmology, vol. 121, no. 12, pp. 2473–2481, 2014.

D. S. Boyer, Y. H. Yoon, Belfort R Jr et al., “Three-year, randomized, sham-controlled trial of dexamethasone intravitreal implant in patients with diabetic macular edema,” Ophthalmology, vol. 121, no. 10, pp. 1904–1914, 2014.

A. R. Shah, M. Xi, A. M. Abbey et al., “Short-term efficacy of intravitreal dexamethasone implant in vitrectomized eyes with recalcitrant diabetic macular edema and prior anti-VEGF therapy,” Journal of Ophthalmic & Vision Research, vol. 11, no. 2, pp. 183–187, 2016.

A. Thanos, B. Todorich, Y. Yonekawa et al., “Dexamethasone intravitreal implant for the treatment of recalcitrant macular edema after rhegmatogenous retinal detachment repair,” Retina, p. 1, 2017.

L. O. Hattenbach, C. Springer-Wanner, H. Hoerauf et al., “Intravitreal sustained-release steroid implants for the treatment of macular edema following surgical removal of epiretinal membranes,” Ophthalmologica, vol. 237, no. 4, pp. 232–237, 2017.

A. Klamann, K. Böttcher, P. Ackermann, G. Geerling, M. Schargus, and R. Guthoff, “Intravitreal dexamethasone implant for the treatment of postoperative macular edema,” Ophthalmologica, vol. 236, no. 4, pp. 181–185, 2016.

R. Panjaphongse, W. Liu, P. Pongsachareonnont, and J. M. Stewart, “Kinematic study of Ozurdex injection in balanced salt solution: modeling the behavior of an injectable drug delivery device in vitrectomized eyes,” Journal of Ocular Pharmacology and Therapeutics, vol. 31, no. 3, pp. 174–178, 2015.

A. Zheng, E. K. Chin, D. R. P. Almeida, S. H. Tsang, and V. B. Mahajan, “Combined vitrectomy and intravitreal dexamethasone (Ozurdex) sustained-release implant,” Retina, vol. 36, no. 11, pp. 2087–2092, 2016.

S. B. Bressler, M. Melia, A. R. Glassman et al., “Ranibizumab plus prompt or deferred laser for diabetic macular edema in eyes with vitrectomy before anti-vascular endothelial growth factor therapy,” Retina, vol. 35, no. 12, pp. 2516–2528, 2015.