Journal of Ophthalmology
Volume 2018 (2018), Article ID 2501325, 16 pages
https://doi.org/10.1155/2018/2501325

Review Article

Changes of Subfoveal Choroidal Thickness after Cataract Surgery: A Meta-Analysis

Shaoxue Zeng,1,2 Chen Liang,¹ Yueqing He,1,2 Yingying Chen,1,2 Qing Zhao,1,2 Shuiping Dai,² Fengrui Cheng,² Junjun Zhang,¹ and Xiaoshuang Jiang¹

¹Department of Ophthalmology, West China Hospital, Sichuan University, Chengdu 610041, China
²West China School of Medicine, Sichuan University, Chengdu 610041, China

Correspondence should be addressed to Xiaoshuang Jiang; jiangxiaoshuang@126.com

Received 28 May 2018; Revised 8 September 2018; Accepted 2 October 2018; Published 12 November 2018

Academic Editor: Michele Figus

Copyright © 2018 Shaoxue Zeng et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. To investigate the effect of cataract surgery on subfoveal choroid thickness (SFCT) using enhanced-depth imaging optical coherence tomography (EDI-OCT). Materials and Methods. Relevant publications were searched systematically through various databases from inception to March 2018. The unit of choroidal thickness measurements is micrometers. Studies comparing SFCT before and after cataract surgery were retrieved. All qualified articles were analyzed using RevMan 5.3. Results. A total of 13 studies with 802 eyes from 646 patients were identified for inclusion. There was a significant increase of SFCT at 1 week (MD = 6.62, 95% CI: 1.20–12.05, , I² = 0%), 1 month (MD = 8.30, 95% CI: 3.20–13.39, , I² = 0%), and 3 months (MD = 8.28, 95% CI: 1.84–14.73, , I² = 0%) after cataract surgery. In subgroup analysis, SFCT in Asians and patients without nonsteroidal anti-inflammatory drugs (NSAIDs) in postoperative medication was significantly thicker (). No statistically significant increase of SFCT was found in diabetic mellitus (DM) patients for 1 day (), 1 week (), 1 month (), and 3 months () after cataract surgery. Conclusions. This meta-analysis suggested that SFCT increased since 1 week after the cataract surgery and the increase lasted for at least 3 months. Asians and patients without NSAIDs in postoperative medication were more likely to have a thicker SFCT after cataract surgery, whereas DM patients were less likely to increase in SFCT.

1. Introduction

Cataract was featured by the opacification of the crystalline lens and was the leading cause of blindness all over the world [1]. According to the World Health Organization (WHO), there was an estimated 180 million visually disabled people worldwide, among which, 46% of them were the result of cataracts [2]. Phacoemulsification and intracapsular lens implantation were the most commonly performed eye surgeries to correct the visual loss and restore the vision for patients with cataract [3]. However, complications of cataract surgery on posterior segment of the eye were estimated in many studies. Pseudophakic macular edema and progression of diabetic retinopathy were the most common adverse effects on retina after cataract surgery [4, 5]. Specifically, studies have also shown the relation between cataract surgery and the onset of age-related macular degeneration (AMD) [6]. In rodent studies, it was reported that lens extraction could trigger proinflammatory gene expression and protein response in the posterior segment of the eyes [7]. An other study in mice has also shown that partial lens extraction resulted in blood-retinal barrier breakdown [8]. These findings implied the possible influence of cataract surgery on posterior segment of eyes.

It was reported that macular or retinal thickness increased after cataract surgery [9]. Choroid was a vascular structure in close relation to the retina in the eye, and changes in choroid thickness might also be predicted. Enhanced-depth imaging (EDI) OCT has become a widely used way for clinical and research applications, and we could use this noninvasive method to detect the full thickness of the choroid in detail [10].

Several studies have been conducted to assess the influence of cataract surgery to subfoveal choroid thickness (SFCT). Studies [11–20] reported that most patients with senile cataract were expected to maintain increased SFCT for several months after cataract surgery, suggesting the inflammatory response of the surgery or the onset of AMD, which was originated from the choroid layer. However, several studies [21–23] hold a different view that no significant increase was detected in SFCT after the surgery. Therefore, we performed this meta-analysis of the available published literatures to explicate the relationship between SFCT and cataract surgery.

2. Methods

2.1. Literature Search

We searched the electronic databases such as PubMed, Embase, Web of Science, and China National Knowledge Infrastructure (CNKI) until March 2018 for all the relevant literatures using the search terms “choroid thickness” and “cataract surgery” or “phacoemulsification” or “cataract extraction”. The computer search was supplemented with manual search by checking the reference lists of all retrieved studies and reviews to include eligible studies. There was no language restriction.

2.2. Inclusion and Exclusion Criteria

The inclusion criteria were as follows: (1) studies recruiting patients who experienced cataract extraction and intraocular lens implant; (2) SFCT before and after cataract surgery was measured; (3) data including mean differences (MDs) with 95% confidence intervals (CIs) were recorded. Abstracts from conferences, editorials, letters, review articles, full texts without raw data available for retrieval, and duplicate publications were excluded. If there were studies with overlapped patients, small sample studies were excluded.

2.3. Quality Assessment of the Studies

The methodological quality of cohort study was assessed using the modified Newcastle–Ottawa Scale (NOS) [24]. A total of eight items were categorized into three dimensions, namely, selection, comparability, and outcome. Each item in selection and outcome was awarded a maximum of one star while the item of comparability could score two stars; thus, the range of NOS is zero to nine. Studies with a score of 6 or higher were considered high quality.

2.4. Data Extraction

Two reviewers screened and extracted the data independently. The third reviewer made the final decision if there was any inconsistency. The following data were extracted from literatures: first author, year of publication, country, ethnicity, number of patients and studied eyes, inclusion and exclusion criteria, characteristics of study subjects, and SFCT with 95% CIs at different time intervals (1 day before the surgery and 1 day, 1 week, 1 month, and 3 months after the surgery). All the measurements of choroidal thickness are in micrometers, and the data of patients with diabetic retinopathy (DR) were also recorded.

2.5. Statistical Analysis

This meta-analysis compared the SFCT at different time intervals after the cataract surgery with the initial baseline value. We used the Cochrane Review Manager (software version 5.3) to analysis the data. The WMD was determined for SFCT at different time intervals with a 95% CI. The I² statistic was applied to assess heterogeneity between studies [25]. A random effects model was used when the heterogeneity ≥ 50%, or a fixed effects model was applied. Subgroup analysis was performed according to ethnicity, surgery machine, sample numbers, medication, OCT machine, and quality control and if patients were diagnosed with diabetes mellitus. Sensitivity analysis was performed by dropping out each study one by one. Funnel plots were used to evaluate the publication bias. If value in our meta-analysis was less than 0.05, the results were thought to be significant.

3. Results

A total of 130 studies were initially identified, of which 27 were duplicates and 77 were rejected based on titles and abstracts. In further full-text reading, we excluded 7 letters, 2 conference papers, and 4 studies without efficient data. At last, a total of 13 studies including 802 eyes from 646 patients were enrolled in the final analysis. The flow diagram of the search procedure and results are shown in Figure 1 and characteristics of included studies are listed in Table 1. The published time of these studies ranges from July 2014 to November 2017. There were 12 prospective cohort studies and 1 retrospective study. The ethnicity of patients in 9 studies was Caucasians, and the ethnicity of the other 4 was Asians. In our meta-analysis, we did not drop out studies that were conducted in patients with diabetic mellitus (DM), we included 67 eyes from patients with DM, and all the other patients were non-DM patients. The surgery methods in these studies were all phacoemulsification. Postoperative treatment consisted of antibiotics in all the studies but differed in the use of nonsteroidal anti-inflammatory drugs (NSAIDs). Of all the patients, no other complications developed except for 3 patients who developed macular edema, who were also included in our study. Distances between the RPE and choroidal-scleral interface were measured manually to be SFCT. However, difference may lie in if the OCT machines were different, if they had used 100 times scans and if the measurements were conducted in the same time of a day (Table 1).

Figure 1: Flow diagram of the selection process in the meta-analysis. SFCT: postoperative 1 d versus preoperative.

Table 1: Characteristics of the included studies and quality scores.

Author
Year
Ethnicity
Design
No. of eyes
OCT
Surgery machine
NSAIDs
DM
100 times scans
Same measure time
Quality score

Asena
2017
Caucasians
Retrospective
27
Topcon
Alcon
Yes
0
No
No
8

Bayhan
2016
Caucasians
Prospective
38
RTvue-100
Alcon
No
0
No
Yes
8

Brito
2015
Caucasians
Prospective
35
Heidelberg
Alcon
Yes
35
No
No
8

Celik
2016
Caucasians
Prospective
30
Zeiss
Alcon
Yes
0
No
No
9

Falcao
2014
Caucasians
Prospective
14
Heidelberg
Alcon
Yes
0
Yes
No
8

Ibrahim
2017
Caucasians
Prospective
53
Heidelberg
NA
Yes
0
Yes
No
8

Jiang
2017
Asians
Prospective
100
Heidelberg
Abbott
No
0
Yes
Yes
8

Pierru
2014
Caucasians
Prospective
115
Heidelberg
NA
No
32
Yes
No
8

Shahzad
2017
Caucasians
Prospective
202
Topcon
Alcon
No
0
Yes
Yes
8

Wang
2016
Asians
Prospective
24
Zeiss
AMO
No
0
Yes
No
9

Yang
2017
Asians
Prospective
66
NA
NA
No
0
No
No
9

Yilmaz
2016
Caucasians
Prospective
65
Heidelberg
NA
Yes
0
No
Yes
8

Zheng
2017
Asians
Prospective
32
Heidelberg
NA
No
0
Yes
No
8

OCT indicates the machine used to do optical coherence tomography, NSAIDs indicate nonsteroid anti-inflammatory drugs, DM indicates the number of patients with diabetes mellitus, 100 times scans indicate if the OCT images were obtained from averaged 100 B-scans, same measure time indicates if the patients had OCT during the same period of time, NA indicates not available.

3.1. SFCT: Postoperative 1 d versus Preoperative

A total of 5 studies including 332 eyes provided detailed information on SFCT 1 day after cataract surgery. SFCT before and 1 day after cataract surgery was not significantly different (MD = 4.52, 95% CI: −5.04–14.08, , I² = 0%). Figure 2 shows the detailed information of these 5 studies.

Figure 2: SFCT: postoperative 1 d versus preoperative.

3.2. SFCT: Postoperative 1 w versus Preoperative

A total of 9 studies including 675 eyes provided detailed information on SFCT 1 week after cataract surgery. The SFCT 1 week after the surgery was thicker compared with the baseline value, and the difference was statistically significant (MD = 6.62, 95% CI: 1.20–12.05, , I² = 0%). Subgroup analysis presented that 1 week after cataract surgery, we could also see increase of SFCT in Asians (MD = 11.44, 95% CI: 0.28–22.59, , I² = 0%) and patients without NSAIDs as postoperative medication (MD = 10.29, 95% CI: 0.57–20.01, , I² = 0%). A similar increase of SFCT could also be seen in groups with Alcon surgery machines, big samples, Heidelberg EDI-OCT machines, 100 times B-scans, and fixed scan time. For DM patients, SFCT (MD = 10.30, 95% CI: −26.97–47.57, , I² = 0%) was less likely to increase than patients without DM (MD = 6.52, 95% CI: 1.04–12.00, , I² = 0%). Figure 3 shows the detailed information and subgroup analysis of these 9 studies.

(a)

(b)

(c)

(d)

Figure 3: SFCT and subgroup analysis (ethnicity, if they were DM patients and if NSAIDs were included in the postoperative medication): postoperative 1 w versus preoperative.

3.3. SFCT: Postoperative 1 m versus Preoperative

All of the 13 studies provided detailed information on SFCT 1 month after cataract surgery. We found that SFCT at 1 month postoperatively was ∼8 μm thicker than that of preoperatively, and there was a statistically significant difference (MD = 8.30, 95% CI: 3.20–13.39, , I² = 0%). Subgroup analysis presented that 1 month after cataract surgery, SFCT increased in Asians (MD = 16.32, 95% CI: 5.93–26.72, , I² = 20%), patients without NSAIDs in the postoperative medication (MD = 13.55, 95% CI: 5.47–21.64, , I² = 0%), patients who did not use Alcon as surgery machine (MD = 8.31, 95% CI: 2.87–13.76, , I² = 2%), patients whose averaged scans were 100 times (MD = 9.10, 95% CI: 0.75–17.46, , I² = 0%), and patients whose OCT scans were not obtained in the same time period of a day (MD = 11.60, 95% CI: 4.16–19.03, , I² = 0%) and the differences were statistically significant. Statistically significant results could also be detected in subgroups, no matter the sample capacity was big (>50) (MD = 7.37, 95% CI: 1.14–13.61, , I² = 0%) or small (<50) (MD = 10.16, 95% CI: 1.30–19.03, , I² = 0%). For DM patients, SFCT (MD = 8.92, 95% CI: −17.94–35.77, , I² = 0%) was less likely to increase than patients without DM (MD = 8.25, 95% CI: 3.06–13.44, , I² = 0%). Figure 4 shows the detailed information and subgroup analysis of these 13 studies.

(a)

(b)

(c)

(d)

Figure 4: SFCT and subgroup analysis (ethnicity, if they were DM patients and if NSAIDs were included in the postoperative medication): postoperative 1 m versus preoperative.

3.4. SFCT: Postoperative 3 m versus Preoperative

A total of 6 studies including 423 eyes provided detailed information on SFCT 3 months after cataract surgery. We found that SFCT at 3 months postoperatively was ∼8 μm thicker than that of preoperatively (MD = 8.28, 95% CI: 1.84–14.73, , I² = 0%). In subgroup analysis, there was statistically significant difference in the SFCT between Asians (MD = 15.39, 95% CI: 1.17–29.61, , I² = 0%) and Caucasians (MD = 5.45, 95% CI: −1.79–12.69, , I² = 0%). Statistically significant results could also be found in non-DM patients (MD = 7.22, 95% CI: 0.66–13.77, , I² = 0%), whereas in DM patients (MD = 15.20, 95% CI: −21.56–51.96, ), SFCT was not statistically significant. SFCT in patients who used the postoperative medication without NSAIDs (MD = 15.39, 95% CI: 1.17–29.61, , I² = 0%) was statistically thicker than those with NSAIDs. Figure 5 shows the detailed information and subgroup analysis of these 6 studies.

(a)

(b)

(c)

(d)

Figure 5: SFCT and subgroup analysis (ethnicity, if they were DM patients and if NSAIDs were included in the postoperative medication): postoperative 3 m versus preoperative.

3.5. SFCT: Subgroup Analysis in Non-DM Patients

Detailed information comparing the SFCT 1 day postoperatively with that of preoperatively in non-DM patients was found in 5 studies. No heterogeneity was found in any subgroup analysis. However, in the 9 studies which compare SFCT 1 week postoperatively and that of preoperatively, SFCT in Asians (MD = 11.44, 95% CI: 0.28–22.59, , I² = 0%) and patients who did not apply NSAIDs as postoperative medication (MD = 10.29, 95% CI: 0.57–20.01, , I² = 0%) was statistically thicker.

Similar statistically significant results can be found in the 1 month subgroup analysis in Asians (MD = 16.32, 95% CI: 5.93–26.72, , I² = 0%) and patients who used the postoperative medication without NSAIDs (MD = 13.55, 95% CI: 5.47–21.64, , I² = 0%). In the 3 months subgroup, statistically significant results were also demonstrated in Asians (MD = 15.39, 95% CI: 1.17–29.61, , I² = 0%) and patients who did not apply NSAIDs as postoperative medication (MD = 15.39, 95% CI: 1.17–29.61, , I² = 0%). Figure 6 shows the detailed information on subgroup analysis of all non-DM patients.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 6: Subgroup analysis (ethnicity and if NSAIDs were included in the postoperative medication) in non-DM patients: postoperative 1 w versus preoperative, postoperative 1m versus preoperative, and postoperative 3 m versus preoperative.

3.6. SFCT: Subgroup Analysis in the Different Use of NSAIDs

In the 6 studies with the use of NSAIDs, detailed information about the medication time was found in 5 studies, containing 2 weeks in 1 study (MD = 12.21, 95% CI: −2.76–27.18, , I² = 0%), 3 weeks in 2 studies (MD = 3.82, 95% CI: −4.19–11.82, , I² = 0%), and 4 weeks in 2 studies (MD = –3.42, 95% CI: –42.74–35.90, , I² = 0%). No statistically significant difference was found among the 3 groups (Figure 7).

3.7. Publication Bias and Sensitivity Analysis

No publication bias was found through the inverted funnel plot. As shown in Figure 8, the results were of stability because the results did not change significantly when dropping out each study one by one. Further sensitivity analyses were not conducted in the subgroup analysis because of the small sample sizes.

(a)

(b)

(c)

Figure 7: Subgroup analysis of different medication time of NSAIDs (4 w NSAIDs versus 3 w NSAIDs, 4 w NSAIDs versus 2 w NSAIDs, and 3 w NSAIDs versus 2 w NSAIDs): postoperative 1m versus preoperative.

Figure 8: Publication bias.

4. Discussion

In this meta-analysis, we reviewed 13 relevant studies, including a total of 802 eyes from 646 patients. The results from the group comparisons clearly demonstrated that the SFCT of patients was thicker at 1 week, 1 month, and 3 months postoperatively compared to the SFCT before the surgery. At 1 day postoperatively, the SFCT was not statistically significant comparing to baseline values because of the need of reaction time. At 1 week postoperatively, we could observe statistically significant difference, and the difference was even more obvious at 1 month after the surgery. The difference lasted to 3 months after the surgery. These results were statistically significant in accordance with some subgroup analyses.

The development of enhanced-depth imaging (EDI) OCT made it possible for doctors to detect choroid thickness [10]. Also, studies [26–28] held the idea that OCT was of good reliability, repeatability, and reproducibility to assess the choroid in detail. Studies have shown that SFCT has a greater chance to increase in male sex or patients with a thicker baseline SFCT [29].

Cataract surgery was capable of affecting the posterior segments of eyes in rodents and humans; especially, pseudophakic cystoid macular edema (PCME) was a common complication of cataract surgery [7, 30, 31]. Studies [11–20] showed an increase in SFCT after cataract surgery in humans, though the mechanism for the increase in the choroid thickness after cataract surgery remained unknown. What are the possible mechanisms? Animal study showed that extracapsular lens extraction could upregulate the expression of IL-1 and CCL2 genes in the neurosensory retina of C57BL/6 mice 30 minutes postoperatively and maintained for at least 2 weeks, which suggested that the surgery caused the acute inflammatory/injury response in posterior segments [7]. What is more, massive studies have observed that inflammatory disorders could increase the choroidal thickness in focal or systematical diseases such as uveitis, evanescent white dot syndrome, and chronic hepatitis C virus (HCV) infection [32–34]. With the inflammatory theory, we can explain that after cataract surgery, SFCT was significantly greater compared with baseline values.

Our study demonstrated that Asians had a thicker postoperative SFCT than Caucasians. Just as former study showed that the black had thinner SFCT compared to the white and South Asian, the difference in ethnicities may cause this phenomenon [35].

However, in our study, DM patients were less likely to have an increase in choroid thickness. Former studies showed that diabetic patients had a thicker SFCT than normal people; even diabetic patients could have an increase in choroid thickness after intensive diabetic control, whereas no difference was observed in nonintensive diabetic control group, as choroid blood vessel circulation may be influenced by acute reduction of glycemia, which is consistent with our results [36, 37]. We could speculate that choroid thicknesses in diabetic retinopathy patients were less likely to be affected by surgery or other stimulations than choroid blood vessel circulation resulting from DM. The variation in diabetic patients was greater in absolute value than nondiabetic patients. Diabetics have a less predictable response, and therefore, the change was not statistically significant. However, choroid thickness in nondiabetic patients could be affected by cataract surgery.

The former study suggested that after surgeries, topical NSAIDs should be used in a standard way (4 to 5 times daily) for 12 weeks. If complications of cataract surgery have not been resolved, we should change the frequency of NSAIDs to a more frequent way (q1h) [38]. In our included studies, NSAIDs formulations were applied in a standard way in conjunction with corticosteroids though NSAIDs varied from flurbiprofen for 2 or 3 weeks to nepafenac for 3 weeks or 1 month. Our meta-analysis showed that differences of SFCT between preoperatively and postoperatively were not statistically significant with the use of NSAIDs, while the difference was statistically significant without the use of NSAIDs as postoperative medication. Studies also observed the complications such as keratopathy, corneal melts, and severe allergic reactions after the use of NSAIDs [39, 40]. However, these complications were really scarce, and more studies claimed that NSAIDs and corticosteroid functioned in synergy to reduce complications and increase the speed of visual recovery [41, 42].

Also, we have conducted subgroup analysis in different cataract surgery machines (Alcon and non-Alcon), different sample sizes (>50 and <50), and different OCT machines (Heidelberg and others), if OCTs were obtained with 100 times scans were used to and if OCTs were conducted in patients in the same time of a day. In Asians, for patients without NSAIDs in the postoperative medication, patients who did not use Alcon as surgery machine, patients whose averaged scans were 100 times, and patients whose OCT scans were not obtained in the same time period of a day, SFCT increased significantly at 1 month after surgery. However, SFCT was not statistically significant at 3 months. It may result from the short-term inflammatory response peaks at 1 month and data deficiencies at 3 months after surgery.

It should be noted that there were also several limitations. First, comparing with baseline values, the choroid thickness could increase in some regions or at certain timepoints after cataract surgery [3], but we only analyzed the SFCT because of the insufficiency of data measured at the temporal and nasal part. Second, the measurements of the choroid (the lines of the RPE and choroidal-scleral interface) were determined manually, which could cause errors. Third, although we had subgroup analysis in patients with variable types of OCT instruments, surgery machines, and different scan methods, we still could not control the confounding factors when we conducted some other subgroup analyses.

In conclusion, the development of OCT has helped us to understand the choroid in detail [10], and EDI-OCT has good reproducibility among choroidal thickness measurements of images [26–28, 43]. Our study demonstrated the relationship between choroid thickness and cataract surgery. Further studies are also needed to investigate if the choroidal thickness measured by EDI-OCT could reflect choroid circulation, inflammatory status, or even provide prognosis for visual acuity.

5. Conclusions

Our meta-analysis indicated that SFCT increased since 1 week after the cataract surgery, and the increase lasted for at least 3 months. Asians and patients without NSAIDs in postoperative medication were more likely to have a thicker SFCT after cataract surgery, whereas DM patients were less likely to increase in SFCT.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this article.

Acknowledgments

This work was supported by the National Natural Science Foundation of China (No. 81500728).

References

J. Thompson and N. Lakhani, “Cataracts,” Primary Care: Clinics in Office Practice, vol. 42, no. 3, pp. 409–423, 2015.

C. Wang, Q. Lai, S. Zhang, and J. Hu, “Senile cataract and genetic polymorphisms of APE1, XRCC1 and OGG1,” International Journal of Clinical and Experimental Pathology, vol. 8, no. 12, pp. 16036–16045, 2015.

H. Ohsugi, Y. Ikuno, Z. Ohara et al., “Changes in choroidal thickness after cataract surgery,” Journal of Cataract and Refractive Surgery, vol. 40, no. 2, pp. 184–191, 2014.

E. Y. Chew, W. E. Benson, N. A. Remaley et al., “Results after lens extraction in patients with diabetic retinopathy: early treatment diabetic retinopathy study report number 25,” Archives of Ophthalmology, vol. 117, no. 12, pp. 1600–1606, 1999.

J. D. M. Gass and E. W. D. Norton, “Cystoid macular edema and papilledema following cataract extraction: a fluorescein fundoscopic and angiographic study,” Retina, vol. 23, no. 6 Suppl, pp. 646–661, 2003.

R. Klein, B. E. Klein, T. Y. Wong, S. C. Tomany, and K. J. Cruickshanks, “The association of cataract and cataract surgery with the long-term incidence of age-related maculopathy: the Beaver Dam Eye Study,” Archives of Ophthalmology, vol. 120, no. 11, pp. 1551–1558, 2002.

H. Xu, M. Chen, J. V. Forrester, and N. Lois, “Cataract surgery induces retinal pro-inflammatory gene expression and protein secretion,” Investigative Opthalmology and Visual Science, vol. 52, no. 1, pp. 249–255, 2011.

H. Liu, A. M. Demetriades, W. H. Xiao, P. A. Campochiaro, and S. A. Vinores, “Mouse model of post-surgical breakdown of the blood-retinal barrier,” Current Eye Research, vol. 28, no. 6, pp. 421–426, 2004.

K. Šiško, N. K. Knez, and D. Pahor, “Influence of cataract surgery on macular thickness: a 6-month follow-up,” Wiener Klinische Wochenschrift, vol. 127, no. 5, pp. 169–174, 2015.

R. F. Spaide, H. Koizumi, and M. C. Pozoni, “Enhanced depth imaging spectral-domain optical coherence tomography,” American Journal of Ophthalmology, vol. 146, pp. 496–500, 2008.

A. Pierru, M. Carles, P. Gastaud, and S. Baillif, “Measurement of subfoveal choroidal thickness after cataract surgery in enhanced depth imaging optical coherence tomography,” Investigative Opthalmology and Visual Science, vol. 55, no. 8, pp. 4967–4974, 2014.

S. A. Bayhan, H. A. Bayhan, E. Muhafiz, K. Kırboğa, and C. Gürdal, “Evaluation of choroidal thickness changes after phacoemulsification surgery,” Clinical Ophthalmology, vol. 10, no. 1, pp. 961–967, 2016.

R. Wang, Q. Fan, B. Guo, D. Ren, and J. Xia, “Changes of subfoveal choroid thickness after cataract surgery,” Journal of Clinical Ophthalmology, vol. 24, no. 2, pp. 109–112, 2016.

L. Yang and N. Li, “Research of subfoveal choroid thickness change after phacoemulsification surgery,” World Latest Medicine Information (Electronic Version), vol. 55, 2017.

M. Zheng and Q. Li, “Changes of subfoveal choroid thickness after cataract surgery in 21 senile cataract patients,” Fujian Medical Journal, vol. 39, no. 2, pp. 36–40, 2017.

H. Jiang, Z. Li, R. Sun, D. Liu, and N. Liu, “Subfoveal choroidal and macular thickness changes after phacoemulsification using enhanced depth imaging optical coherence tomography,” Ophthalmic Research, 2017.

B. S. Asena, E. Karahan, and M. Kaskaloglu, “Retinal and choroidal thickness after femtosecond laser-assisted and standard phacoemulsification,” Clinical Ophthalmology, vol. 11, pp. 1541–1547, 2017.

E. Celik, B. Cakır, E. B. Turkoglu, E. Doğan, and G. Alagoz, “Effect of cataract surgery on subfoveal choroidal and ganglion cell complex thicknesses measured by enhanced depth imaging optical coherence tomography,” Clinical Ophthalmology, vol. 10, pp. 2171–2177, 2016.

A. M. Ibrahim, S. M. Elgouhary, M. K. Nassar, and A. H. El Batanony, “Changes in choroidal thickness after cataract surgery,” Seminars in Ophthalmology, vol. 26, no. 5, pp. 664–670, 2017.

R. Shahzad, S. Mar, S. Zafar, F. Kausar, and M. H. Shahzad, “Choroidal thickness changes following cataract surgery using swept source optical coherence tomography,” Canadian Journal of Ophthalmology, vol. 53, no. 1, pp. 60–64, 2018.

M. S. Falcão, N. M. Gonçalves, and P. Freitas-Costa, “Choroidal and macular thickness changes induced by cataract surgery,” Clinical Ophthalmology, vol. 8, p. 55, 2014.

P. N. Brito, V. M. Rosas, L. M. Coentrão et al., “Evaluation of visual acuity, macular status, and subfoveal choroidal thickness changes after cataract surgery in eyes with diabetic retinopathy,” Retina, vol. 35, no. 2, pp. 294–302, 2015.

T. Yılmaz, A. A. Karci, İ. Yilmaz, A. Yılmaz, Y. Yıldırım, and Y. B. Sakalar, “Long-term changes in subfoveal choroidal thickness after cataract surgery,” Medical Science Monitor International Medical Journal of Experimental and Clinical Research, vol. 22, pp. 1566–1570, 2016.

A. Stang, “Critical evaluation of the Newcastle-Ottawa scale for the assessment of the quality of nonrandomized studies in meta-analyses,” European Journal of Epidemiology, vol. 25, no. 9, pp. 603–605, 2010.

J. P. T. Higgins, S. G. Thompson, J. J. Deeks, and D. G. Altman, “Measuring inconsistency in meta-analyses,” British Medical Journal, vol. 327, no. 7414, pp. 557–560, 2003.

D. A. Sim, P. A. Keane, H. Mehta et al., “Repeatability and reproducibility of choroidal vessel layer measurements in diabetic retinopathy using enhanced depth optical coherence tomography,” Investigative Ophthalmology and Visual Science, vol. 54, no. 4, pp. 2893–2901, 2013.

T. Fiore, S. Androudi, B. Iaccheri et al., “Repeatability and reproducibility of retinal thickness measurements in diabetic patients with spectral domain optical coherence tomography,” Current Eye Research, vol. 38, no. 6, pp. 674–679, 2013.

I. Pinilla, E. Garcia-Martin, S. Fernandez-Larripa, L. Fuentes-Broto, A. I. Sanchez-Cano, and E. Abecia, “Reproducibility and repeatability of Cirrus and Spectralis Fourier-domain optical coherence tomography of healthy and epiretinal membrane eyes,” Retina, vol. 33, no. 7, pp. 1448–1455, 2013.

Y. Noda, A. Ogawa, T. Toyama, and T. Ueta, “Long-term increase in subfoveal choroidal thickness after surgery for senile cataracts,” American Journal of Ophthalmology, vol. 158, no. 3, pp. 455–459, 2014.

A. Mittal, S. B. Velaga, K. G. Falavarjani, M. G. Nittala, and S. R. Sadda, “Choroidal thickness in non-ocular Behçet's disease - a spectral-domain OCT study,” Journal of Current Ophthalmology, vol. 29, no. 3, p. 210, 2017.

J. R. Do, J. H. Oh, R. S. Chuck et al., “Transient corneal edema is a predictive factor for pseudophakic cystoid macular edema after uncomplicated cataract surgery,” Korean Journal of Ophthalmology, vol. 29, no. 1, pp. 14–22, 2015.

Z. Géhl, K. Kulcsár, H. J. Kiss, J. Németh, O. A. Maneschg, and M. D. Resch, “Retinal and choroidal thickness measurements using spectral domain optical coherence tomography in anterior and intermediate uveitis,” BMC Ophthalmology, vol. 14, no. 1, p. 103, 2014.

R. Aoyagi, T. Hayashi, A. Masai et al., “Subfoveal choroidal thickness in multiple evanescent white dot syndrome,” Clinical and Experimental Optometry, vol. 95, no. 2, pp. 212–217, 2012.

E. Strobbe, M. Cellini, and E. C. Campos, “Aqueous flare and choroidal thickness in patients with chronic hepatitis C virus infection: a pilot study,” Acta Ophthalmologica, vol. 90, no. s249, pp. 2258–2263, 2012.

R. Bafiq, R. Mathew, E. Pearce et al., “Age, sex, and ethnic variations in inner and outer retinal and choroidal thickness on spectral-domain optical coherence tomography,” American Journal of Ophthalmology, vol. 160, no. 5, pp. 1034–1043, 2015.

L. Shao, Y. Wang, J. Xu et al., “Subfoveal choroidal thickness of Chinese aged over 50 years and patients with diabetes mellitus and glaucoma,” Chinese journal of ophthalmology, vol. 50, no. 6, pp. 4–20, 2014.

Y. Jo, Y. Ikuno, R. Iwamoto, K. Okita, and K. Nishida, “Choroidal thickness changes after diabetes type 2 and blood pressure control in a hospitalized situation,” Retina, vol. 34, no. 6, pp. 1190–1198, 2014.

P. A. Campochiaro, Y. S. Han, T. A. Mir et al., “Increased frequency of topical steroids provides benefit in patients with recalcitrant postsurgical macular edema,” American Journal of Ophthalmology, vol. 178, pp. 163–175, 2017.

S. J. Kim, A. J. Flach, and L. M. Jampol, “Nonsteroidal anti-inflammatory drugs in ophthalmology,” Survey of Ophthalmology, vol. 55, pp. 108–133, 2010.

J. Polachek and P. Shvartzman, “Acute bronchial asthma associated with the administration of ophthalmic indomethacin,” Israel Journal of Medical Sciences, vol. 32, no. 11, pp. 1107–1109, 1996.

S. J. Kim, A. J. Flach, and L. M. Jampol, “Nonsteroidal anti-inflammatory drugs in ophthalmology,” Survey of Ophthalmology, vol. 55, pp. 108–133, 2010.

J. Polachek and P. Shvartzman, “Acute bronchial asthma associated with the administration of ophthalmic indomethacin,” Israel Journal of Medical Sciences, vol. 32, pp. 1107–1109, 1996.

L. Branchini, C. V. Regatieri, I. Flores-Moreno, B. Baumann, J. G. Fujimoto, and J. S. Duker, “Reproducibility of choroidal thickness measurements across three spectral domain optical coherence tomography systems,” Ophthalmology, vol. 119, no. 1, pp. 119–123, 2012.