Journal of Ophthalmology
Volume 2020 (2020), Article ID 2650873, 9 pages
https://doi.org/10.1155/2020/2650873

Clinical Study

Secondary Vitrectomy with Internal Limiting Membrane Plug due to Persistent Full-Thickness Macular Hole OCT-Angiography and Microperimetry Features: Case Series

Dominika Wrzesińska,¹ Katarzyna Nowomiejska,¹ Dominika Nowakowska,¹ Mario Damiano Toro,1,2 Vincenza Bonfiglio,3,4 Michele Reibaldi,⁵ Teresio Avitabile,⁴ and Robert Rejdak¹

¹Department of General Ophthalmology, Medical University of Lublin, Lublin, Poland
²Faculty of Medicine, Collegium Medicum Cardinal Stefan Wyszyński University, Warsaw, Poland
³Department of Experimental Biomedicine and Clinical Neuroscience, Ophthalmology Section, University of Palermo, Palermo, Italy
⁴Department of Ophthalmology, University of Catania, Catania, Italy
⁵Department of Surgical Sciences, Eye Clinic Section, University of Turin, Turin, Italy

Correspondence should be addressed to Dominika Wrzesińska; dominika_wrzesinska@tlen.pl

Received 15 April 2020; Revised 11 July 2020; Accepted 5 August 2020; Published 22 September 2020

Academic Editor: Masaru Takeuchi

Copyright © 2020 Dominika Wrzesińska et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. To study the features in OCT-angiography and microperimetry in eyes with persistent full-thickness macular hole (FTMH) closed with the secondary plana vitrectomy (PPV) with autologous internal limiting membrane (ILM) plug. Methods. Secondary PPV was performed with closing the persistent FTMH with ILM plug, C₃F₈ tamponade, and face-down positioning. Four patients were followed for 6 months with best corrected visual acuity (BCVA) measurement, SD-OCT and OCT-A, and microperimetry. The results were compared with the fellow eye; in two patients, it was the healthy eye, and in two remaining eyes, successfully closed FTMH after primary PPV. Results. ILM flap was integrated in all cases with V-shape of closure, and atrophy was found in one case, with the largest diameter of FTMH. BCVA improved in two cases and remained the same in two cases. In OCT-A, the area of foveal avascular zone (FAZ) was larger, and foveal vessel density (FVDS) was smaller in eyes after secondary PPV in comparison to fellow eyes. In microperimetry, retinal sensitivity was lower in eyes after secondary PPV, and eccentric fixation was found in 2 of 4 patients. Conclusion. Although the anatomical results of repeated surgeries of FTMH with ILM plug are favorable, visual function results may be limited. Secondary closure of FTMH with ILM plug may lead to atrophy, changes in the macular vasculature, and eccentric fixation. The trial is registered with NCT03701542.

1. Introduction

Pars plana vitrectomy (PPV) is the most effective treatment of full-thickness macular hole (FTMH) [1, 2]. The most untreated FTMHs will progress in size and grade and lead to increasing central visual loss [3]. The classical surgical procedure was first described by Kelly and Wendel in 1991 and consisted of PPV, peeling of epiretinal membranes at the macula, gas tamponade, and face-down positioning for 1 week after surgery [4]. During the next years, as an additional maneuver to macular hole surgery, internal limiting membrane (ILM) peeling was gained and now is routinely used. ILM peeling is a way of making sure no remnant vitreous will exert tangential traction over the macula and provide a support for cell proliferation and the formation of epiretinal membrane [5, 6]. Reported closure rates of macular hole following a primary surgical procedure range from 70% to 100% [3]. Better surgical and functional results are associated with the earlier stage of FTMH, better preoperative visual acuity (VA), shorter duration of symptoms, and younger patient age [7]. There are some cases of persistent macular holes, defined as idiopathic macular holes that underwent vitrectomy but were never observed to close in the postoperative period. There is also the less common condition of reopened or recurrent macular hole, where the hole is observed to close after surgery but subsequently reopens [8]. The failure rate of primary surgery in FTMH is less than 10% [9]. For large macular holes, nonclosure rates as high as 44%, even with adequate ILM peeling, have been reported [10]. The reason of this condition may be a residual epiretinal traction, incomplete removal of posterior hyaloid, insufficient gas tamponade, poor compliance by the patient in keeping prone position, or no obvious cause [9]. Diameter of the FTMH over 500 μm is still at risk for surgery failure and poor vision prognosis [5]. The Manchester study showed that standard MH surgical repair with ILM peeling has very high success rate (94%) up to 650 μm. They suggest that the ILM flap technique for macular holes larger than 650 μm should be reserved [11]. Surgery of persistent and recurrent FTMH remains still a challenge, and there is a number of described surgical techniques, which should be considered after failed primary vitrectomy due to FTMH. Analysis of different flap techniques showed a comparable results, so the technique can be chosen based on the surgeon preference [12]. The results of OCT-A and microperimetry in persistent FTMH closed with secondary PPV have not been published so far.

The aim of this study was to analyse the features of OCT-A and microperimetry in patients who underwent secondary PPV due to persistent FTMH with ILM plug.

2. Methods

This is a retrospective consecutive case series performed at the Department of General Ophthalmology in Lublin, Poland, between May 2018 and December 2019. The study was performed in accordance with the Declaration of Helsinki. Ethics Committee at the Medical University of Lublin approved this study (approval no. NCT03701542). All participants provided their written informed consent to the study.

Eyes of four patients were included in the study. In two patients, the fellow eye was the healthy eye, and in two remaining patients, the fellow eye successfully closed FTMH after primary PPV. The mean age of patients was 73 years (range 69–79 years). There were 2 female and 2 male subjects. The mean time period between primary and secondary PPV was 5 months. Inclusion criteria were nonclosed FTMH with the primary PPV. Exclusion criteria were as follows: myopia, lamellar macular holes, AMD, diabetic retinopathy, and glaucoma.

In all patients, best corrected visual acuity (BCVA) was measured pre- and postoperatively using the decimal Snellen chart.

Spectral domain optical coherence tomography (SD-OCT) (Optovue, Inc) was performed also pre- and postoperatively. The diameter of FTMH was measured in micrometers (µm) as the largest distance between margins of the hole. To evaluate the visual function after vitrectomy, we used microperimetry MAIA (CenterVue, Italy). The following parameters in microperimetry were analysed: sensitivity and the average threshold (AT), macular integrity, and fixation stability.

OCT-angiography (Optovue, Inc) was performed postoperatively in both eyes. The OCT-A measurements (6 × 6) were performed after secondary vitrectomy. The following parameters in OCT-A have been analysed: area of superficial foveal avascular zone (FAZ) and the foveal vessel density (FVDS).

2.1. Surgical Procedure

At first, patients were operated with the standard surgical procedure consisted of 23-gauge PPV (Constellation, Alcon Surgical, Fort Worth, USA), ILM peeling after brilliant blue dying (Brilliant Peel, Fluoron, Germany) or indocyanine green (ICG), SF₆ tamponade, and face-down positioning. All eyes were pseudophakic, as cataract surgery was performed before vitrectomy. During secondary PPV, autologous transplantation of the ILM was performed (Video, Supplemental Digital Content 1). All surgeries were performed by the same surgeon (KN). ILM was stained again with brilliant blue or ICG for 60 seconds. A plug of ILM was peeled from the periphery of the posterior pole. The flap of ILM of a diameter approximately 1DD was transferred to the macular hole prior to the air-fluid exchange and subsequently covered the hole. No viscoelastic nor perfluorocarbon liquid was used to stabilize the plug. Patients received 12% perfluoropropane (C₃F₈) gas as a tamponade and were postured face down after vitrectomy.

3. Results

The mean follow-up period was 6 months (range 3–11 months). ILM flap was integrated in all cases (100%) after secondary PPV with ILM plug, and FTMH was closed with V-shape. BCVA was improved after secondary PPV in 2 of 4 cases. Mean visual acuity before secondary PPV was 0.08 (range 0.05–0.1) and postoperatively 0.16 (range 0.05–0.3) (Table 1).

Table 1: The results of time period before primary PPV, visual acuity (BCVA) in both eyes, diameter of the hole in OCT before and after primary vitrectomy in eyes operated twice (EOT), microperimetry parameters (average threshold (AT) and fixation pattern) and OCT-A parameters (foveal avascular zone (FAZ), and foveal vessel density (FVDS) in EOT with pars plana vitrectomy (PPV) due to persistent full-thickness macular hole (FTMH) and fellow eyes (FE).

Time period from diagnosis to surgery (months)
BCVA
Diameter of the hole (µm)
AT (dB)
Fixation pattern
SD-OCT
FAZ (mm²)
FVDS (%)

EOT
FE
Before first PPV
After first PPV
EOT
FE
EOT
FE
EOT
EOT
FE
EOT
FE

Case 1
8
0.3
0.9 healthy
475
452
24.9
27.0
Stable
Stable
V-shape
0.324
0.180
18.3
28.8

Case 2
8
0.1
0.8 operated once
485
765
17.7
27.9
Unstable, eccentric fixation
Unstable
V-shape
0.316
0.158
21.9
33.6

Case 3
7
0.05
0.1 operated once
760
940
12.7
21.7
Unstable, eccentric fixation
Unstable
V-shape, atrophy
0.461
0.416
7.5
18.5

Case 4
6
0.2
0.9 healthy
588
726
20.0
27.9
Unstable
Stable
V-shape
0.537
0.374
9.8
14.6

The mean time period from the diagnosis to surgery was 7 months (range 6–8 months). The mean diameter of FTMH was 577 µm before first PPV and 720 µm after first unsuccessful PPV. One case (Case 3) presented macular atrophy observed in OCT after the secondary PPV.

Mean FAZ after secondary PPV was equal to 0.409 mm² and was larger than in the fellow eye (0.282 mm²). Eyes after one PPV also presented larger FAZ measurement (0.287 mm²) than the healthy eye (0.180 mm²). Mean FVDS measured in SCP in eyes operated twice was 14.38% and 23.88% in the fellow eyes.

Overall, functional results of secondary PPV obtained by microperimetry were as follows: mean AT was equal to 18.8 dB, in comparison to 26.1 dB in the fellow eye, fixation was relatively unstable, and eccentric fixation was found in 2 of 4 patients: P1 = 74%, P2 = 96% and P1 = 42%, P2 = 85%.

Detailed results obtained by each of four patients of case series are presented below.

3.1. Case 1

A male patient, 69 years old, presented in the right eye a FTMH, and the fellow eye was normal. The diameter of FTMH at presentation was 475 µm in OCT measurements. BCVA before surgery was 0.1. Eight months later, he underwent vitrectomy, and one month after surgery, BCVA was 0.1, and fundoscopy revealed unclosed FTMH, which was confirmed in OCT. Patient decided for the secondary surgery. Six months later, PPV was again performed, and autologous transplantation of the ILM was performed. It was a successful surgery, and V-shape closure of FTMH was received (Figure 1). We observed improvement in the BCVA 3 months after the surgery to 0.3. In microperimetry, AT was 24.9 dB and classified as suspect (between 23 and 25 dB). Fixation was stable (P1 = 92% and P2 = 100%). Macular integrity was abnormal (99.4). The area of superficial foveal avascular zone (FAZ) was 0.324 mm², and FVDS measured in superficial capillary plexus (SCP) was 18.3%. In the fellow, the normal eye BCVA was 0.9. OCTA parameters were as follows: FAZ equal to 0.180 mm² and FVDS was 28.8%. Microperimetric results were as follows: AT was 27.0 dB and was classified as normal, and fixation was stable (P1 = 96% and P2 = 100%).

Figure 1: (a) Full-thickness macular hole (FTMH) in the right eye before surgery. Hole diameter equal to 475 µm. (b) Unclosed FTMH in the right eye 1 month after vitrectomy. Poor image quality caused by the rest of SF₆ gas. Hole diameter equal to 452 µm. (c) Closed FTMH 3 months after secondary vitrectomy in the right eye. (d) Postoperative microperimetric results of the right eye. (e) OCT image of macula of the healthy, left eye. (f) Normal microperimetry result of the left eye. Postoperative FAZ measurement using a nonflow software. Foveal avascular zone (FAZ) of the right eye (g) twice operated, increased significantly compared to FAZ of the healthy, left eye (h).

3.2. Case 2

A female patient, 72 years old, with diagnosis of FTMH in the right eye. The preoperative BCVA was 0.1. She was operated 5 months later, and 2 months after successful PPV, BCVA of the right eye was 0.5 and 3 years later was 0.8. Microperimetric parameters were as follows: AT was 27.9 dB and was classified as normal, and fixation stability was relatively unstable (P1 = 66% and P2 = 89%). Macular integrity was suspicious (49.8). The results of postoperative OCTA images were as follows: the superficial FAZ was 0.158 mm² and FVDS was 33.6%.

Two years later, the FTMH in the left eye was diagnosed. The preoperative BCVA of the left eye was 0.1 and diameter was 485 µm. The left eye was operated after 8 months from diagnosis. One month after primary vitrectomy, there was no BCVA improvement, and OCT image showed unclosed FTMH with increased diameter equal 765 µm. Two months later, the secondary vitrectomy was performed with anatomical success, and V-shape closure was observed (Figure 2). After 3 months, the BCVA was 0.1. Microperimetric parameters were as follows: AT was 17.7 dB and was classified as suspect, fixation was relatively unstable (P1 = 74% and P2 = 96%), and eccentric fixation was found. The results of postoperative OCTA images present that the superficial FAZ was 0.316 mm² and FVDS was 21.9%.

Figure 2: Left eye of the patient no. 2. (a) FTMH before surgery. Diameter equal to 485 µm. (b) Unclosed FTMH after vitrectomy with diameter 765 µm. (c) Closed FTMH with intraretinal cysts, 6 months after secondary PPV. (d) Postoperative microperimetric results. FTMH of the right eye of patient no. 2 before (e) and after primary, successful pars plana vitrectomy (PPV) (f). (g) Postoperative microperimetric results of the right eye. (h) Postoperative FAZ of left eye, operated twice. Nonflow area: 0.604 mm², BCVA 0.1. (i) Postoperative foveal avascular zone (FAZ) of the right eye after one vitrectomy, nonflow area: 0.363 mm², BCVA equal to 0.8.

3.3. Case 3

A female patient, 79 years old, with FTMH in both eyes. The left eye was operated at first, 5 months after clinical diagnosis, with anatomical success. Preoperative BCVA of the left eye was 0.1. Postoperative BCVA of this eye was still 0.1. The functional results of the left eye were as follows: AT was 21.7, fixation was relatively unstable (P1 = 32% and P2 = 70%), and eccentric fixation was found. Postoperative OCTA images showed that the superficial FAZ was 0.416 mm² and FVDS was 18.5%. 7 months later, the right eye was selected for surgery due to FTMH. Preoperative BCVA of the right eye was 0.05 and the diameter of FTMH in OCT was 765 µm. The primary vitrectomy was unsuccessful, there was no BCVA improvement, and FTMH was still observed in fundoscopy and OCT scans after surgery. Hole diameter postoperatively was 940 µm. Seven months later, secondary vitrectomy was performed and ended with V-shape closure of FTMH (Figure 3). 11 months observation of the right eye showed the macular atrophy and following functional results: BCVA was 0.05, AT in microperimetry was 12.8, fixation was relatively unstable (P1 = 42%, P2 = 85%), and eccentric fixation was found. OCTA images showed after surgery that the superficial FAZ was 0.461 mm² and FVDS was 7.3%.

Figure 3: (a) Preoperative FTMH of the right eye of patient no. 3 with diameter 765 µm. (b) Unclosed FTMH after primary vitrectomy, 940 µm of diameter. (c) After secondary vitrectomy with atrophy. (d) Postoperative microperimetric results, BCVA 0.05. FTMH of the left eye with diameter 660 µm before (e) and after primary, successful vitrectomy (f). (g) Postoperative microperimetric results, BCVA 0.1. (h) Postoperative foveal avascular zone (FAZ) of the right eye, nonflow area: 1.856 mm. (i) Postoperative FAZ of the left eye, nonflow area: 0.557 mm².

3.4. Case 4

A male patient, 72 years old, presented a FTMH in the left eye, and the fellow eye was normal. The diameter of FTMH at presentation was 588 µm in OCT measurements. BCVA before surgery was 0.1. He was operated 6 months after making diagnosis. After vitrectomy with ILM peeling, BCVA was still 0.1. Unclosed FTMH was observed in fundoscopy, and in OCT examination, the hole diameter was 726 µm. Patient decided for the secondary surgery. Four months after primary PPV, the secondary surgery was again performed, and autologous transplantation of the ILM was performed. V-shape closure of FTMH was received, and BCVA was improved to 0.2 (Figure 4). Microperimetry parameters were as follows: AT was 20.0 dB and classified as suspect (between 23 and 25 dB). Fixation was relatively unstable (P1 = 47% and P2 = 89%). Macular integrity was abnormal (99.4). The area of the superficial foveal avascular zone (FAZ) was 0.537 mm², and FVDS measured in superficial capillary plexus (SCP) was 9.8%. In the fellow, healthy eye BCVA was 0.9. OCT-A parameters were as follows: FAZ equal to 0.374 mm² and FVDS 14.6%. Microperimetric results were as follows: AT was 27.9 dB and was classified as normal, fixation was stable (P1 = 96% and P2 = 97%), and macular integrity was normal (27.9).

Figure 4: (a) Preoperative FTMH of the left eye of patient no. 4 with diameter 588 µm. (b) Unclosed FTMH 1 month after vitrectomy, hole diameter equal to 726 µm. (c) V-shaped closure of FTMH after secondary vitrectomy. (d) Postoperative microperimetric results of the left eye. (e) OCT image of macula of the healthy, right eye. (f) Normal microperimetry result of the right eye. (g) Postoperative FAZ of the left eye, nonflow area: 0.818 mm². (h) FAZ of the right eye, nonflow area: 0.653 mm².

4. Discussion

PPV combined with ILM peeling has been a gold surgical standard in the treatment of FTMH for many years. Closure rate is significantly higher (90%) after ILM peeling compared with the non-ILM peeling technique (58%) [5]. It is considered that ILM peeling provides good anatomic and functional results in FTMH by completely releasing the traction forces on the macula and reducing the postoperative epiretinal membrane formation [5]. Four main types of possible macular hole closure after PPV with ILM peeling have been described, which correlate with postoperative outcome. They are distinguished as follows: U-shape closure with the normal foveal contour and central foveal depression, which is associated with the best functional results, V-shape closure, which demonstrates the steep foveal contour, and W-type closure with irregular foveal defect and flat-closed macular holes [13].

Unfortunately, unclosure of the FTMH after primary vitrectomy still can occur, even performed by experienced surgeons. The reasons for no successful primary vitrectomy may be diverse. The diameter of FTMH over 500 μm is considered a risk factor for unclosure after primary vitrectomy [5]. In our case series, the mean diameter of FTMH before primary vitrectomy was 577 µm; thus, it seems to be the main reason for unclosure of the FTMH.

Moreover, Wendel et al. suggest better improvement in visual acuity of patients undergoing FTMH repair with less than 6 months’ duration of visual symptoms [14]. In our patients, the mean time between clinical diagnosis and first unsuccessful vitrectomy was 7 months, so we can suspect that delay from preoperative assessment to surgery may be also the reason of failure of the first vitrectomy due to FTMH.

Repeated surgeries for unclosed FTMH have a lower success rate than primary surgery [5]. However, in our case series, the secondary PPV with autologous ILM plug was an effective surgical procedure to receive the closure of persistent FTMH. We achieved the closure of FTMH after secondary surgery in all four cases (100%), although it is a small case series. Two of the described above patients presented bilateral FTMH, one eye was operated with anatomical success, and the second one failed to close after primary surgery, thus secondary PPV was performed. Reported secondary closure rate of revision surgeries was equal 76% [8]. Yek et al. and colleagues observed 85% closure rate of FTMH after secondary vitrectomy [8].

Modern approach for closing persistent FTMH is to use a technique called autologous transplantation of the ILM, introduced by Morizane et al. [15]. A plug of ILM is peeled from the periphery of the posterior pole with a size big enough to insert into the macular hole. It can be applied to eyes with FTMH, in which the initial vitrectomies with ILM peeling fail to achieve closure, or to eyes with secondary macular holes, in which the ILM already has been removed in previous vitrectomies [15]. The flap of ILM is transferred to the macular hole prior to the air-fluid exchange. A challenge of this technique is the handling of the free ILM patch and the risk of dislocation of ILM patch during air-fluid exchange [16]. The other possible intraoperative complication is the damage to the RPE at the base of the macular [5, 17]. Free ILM flap transplantation was also proved by Ma and coauthors in their study to be effective to achieve anatomical and functional improvement for primary treatment of large macular hole [5]. They advise to respect the original orientation of the free ILM flap because of retinal surface, which is rougher than the vitreous surface and potentially providing stronger hold to RPE layer [5]. Chang and colleagues recommend the other surgical technique, first proposed by Grewal, a neurosensory retinal free flap transplantation, as an alternative surgical technique for the repair of large refractory MHs after unsuccessful ILM peeling surgeries [18]. They presented the technique consisted of a neurosensory retinal free flap with a 1.5–2 MH diameter using whole blood or Viscoat and silicone oil to tamponade the vitreous cavity. The Viscoat or blood was used to help fixing the retinal free flap and additionally contain multiple growth factors [18]. Yek et al. achieved a high secondary closure rate of FTMH and good visual outcomes mostly performing PPV with perfluoropropane gas as tamponade, ILM peeling without any additional procedures to close the hole (e.g., inverted flap technique), and face-down positioning [8]. They reported the progressive improvement of VA after secondary vitrectomy, similar to the trend after successful primary surgery [8, 19, 20]. Probably, it is the result of remodeling and regeneration of foveal retina and photoreceptors [8, 21]. Yek et al. demonstrated also a significant increase in diameter of macular hole after failed primary vitrectomy [8]. Our patients also presented larger diameter before revision surgery compared to the size before primary vitrectomy. Some authors to achieve the closure of FTMH have tried alternative endotamponades such as semifluorinated alkane F₆H₈, standard silicone oils, or heavy silicone oils [8]. In recent years, a second operation with transforming growth factor beta 2 application or autologous platelet concentrate inserted inside the macular hole was proposed to obtain the closure of FTMH [8].

ILM peeling performed during vitrectomy can lead to focal intraretinal hemorrhages or retinal edema that might affect retinal vasculature [22]. Investigators hypothesised that changes in the structural integrity of macular capillary plexuses might be associated with the postoperative retinal structural and functional changes in eyes with FTMH [23]. Michalska-Małecka et al. described in their article the OCTA features of FTMH before and after surgical treatment. In their study, OCTA showed enlargement of the superficial foveal avascular zone (FAZ) and increased central retinal thickness (CRT) in foveal area before the surgery. Mean preoperative FAZ area was 0.39 ± 0.07 mm², and mean CRT was 396 ± 62.6 µm. After vitrectomy, both parameters were reduced; mean FAZ area was 0.24 ± 0.07 mm², and mean CRT was 272 ± 30.7 µm. They observed also postoperatively a statistically important increase of fovea vessel density (FVDS) in superficial capillary plexus (SCP). Mean FVDS in SCP was 29.84% ± 4.17% preoperatively and increased to 35.02% ± 3.47% postoperatively. They found a relatively strong correlation between preoperative FAZ and postoperative BCVA [24]. In our patients, the best results in OCTA images presented Case 2 with the lowest FAZ and the highest FVDS. The worst postoperative results we observed in Case 3 with the high FAZ and the lowest FVDS presented as wide ischemic areas in vascular density color perfusion maps. Case 4 presented the highest value of FAZ and low FVDS, although we observed better functional result, BCVA and stable fixation. Some authors have described retinal fibrosis and pigment epithelium dystrophy in the macular area, after internal limiting membrane autologous transplantation, which can affect final visual recovery [8]. We observed postoperative atrophic changes in Case 3. Our patients presented higher value of FAZ in eyes operated twice than to the eyes operated once. Cho et al. compared OCTA features of retinal microvasculature in eyes with surgically closed FTMH with their fellow eyes. They reported that, based on the postoperative OCTA images, the mean FAZ area in both the SCP and deep capillary plexus (DCP) was significantly smaller than those for the fellow eyes. To close the FTMH, tissues are brought centrally, and the FAZ may become smaller [22]. They also found that the vascular density (VD) ratio in the DCP was lower than that for the fellow eyes, suggesting a possible vulnerability to tractional stress in the DCP [11]. Kim et al. concluded the same in their study [23]. In consideration, it should be noted that FAZ area increases on average 1.48% per year and FTMH mostly affects elderly people [25]. Sul et al. analysed the choroidal thickness (CT) in macular holes to determine the association between CT and anatomic success after surgery. The choroid plays the main role in blood supply, metabolic activity of fovea, and changes in the blood flow, which may modify the healing process. They found that CT was significantly lower in eyes with MH than fellow eyes and preoperative subfoveal CT difference between open and closed MHs after vitrectomy. Preoperative subfoveal CT was thinner in open MHs, but there was no association with anatomic success. Authors concluded that choroidal thinning is likely the result of chronic and larger MHs, which have worse prognosis of closure after vitrectomy [26].

Previous studies have reported characteristics of OCTA images in eyes with FTMH or comparison of OCTA images before and after surgery [22–24]. Analysis of OCTA images in eyes after secondary vitrectomy due to FTMH should be performed in a bigger sample of patients and compared with the group of patients with successful first surgery.

The secondary closure of FTMH may be associated with the prolonged proliferation of glial tissues in the fovea with fibrotic and depigmentation phenomena [27].

To evaluate functional outcomes of FTMH surgery, microperimetry is very useful as rapid, safe, noninvasive examination [21, 28]. Tarita Nistor et al. suggest that the closure of FTMH could lead to a complex reorganization of fixation behaviour [29]. Sborgia et al. in their article proposed that parameters such as preoperative macular sensitivity (MS) and bivariate contour ellipse area (BCEA) have a predictive role on postsurgical VA [30]. BCEA is more accurate estimation of the fixation pattern, which is calculated as an ellipse that covers fixation eye positions and takes into account 1 or 2 times the standard deviation, including consequently 95% (BCEA95) and 63% (BCEA63) of points [18]. In FTMH, a lower sensitivity at the central 4° of the macula (CMS) can be observed as an absolute scotoma and caused by the neurosensory defect. The higher sensitivity at 12° (MS) is observed in the region of the retina around the hole. Analysis of changes in MS showed that both CMS and MS significantly improved after surgery. Authors suggest that retinal sensitivity at 12° (MS) is less influenced by foveal microstructure recovery after macular hole closure than CMS at central 4° [29]. Results shown by Bonnabel et al. prove the correlations between MS and postoperative VA. They also concluded that postoperative outer retinal layer integrity is associated with better final retinal sensitivity [31]. In our patients, the best functional result was presented in Case 1, with improvement of BCVA and stable fixation, probably because of the small diameter of FTMH. Postoperatively, the visual acuity and microperimetric results were the poorest in Case 3, which presented preoperatively the largest diameter of FTMH. BCVA was 0.04, and we observed the absolute scotomas, which correspond to the atrophy of neurosensory retina. This is probably a reason of eccentric fixation. Eccentric fixation was also found postoperatively in Case 2, despite the better BCVA than Case 3. Unfortunately, we do not have preoperative microperimetric data to compare the pattern of fixation, as microperimetry was not performed in our case study before vitrectomy due to FTMH. It is difficult to assess if the eccentric fixation is a result of surgical trauma or was presented before the vitrectomy as a result of FTMH. In the fellow eyes operated once, the fixation was unstable, but there was no eccentric fixation. It is already known that ILM peeling in normal retina will not decrease the retinal function in a short-term after surgery, and we suppose that eccentric fixation is the effect of closure of the hole with ILM plug during secondary vitrectomy [32]. Sometimes, it needs many attempts to put the ILM plug directly to the macular hole during the secondary vitrectomy; thus, we suppose that the contact of the instrument with the retina may lead to atrophy and poorer visual outcomes.

The usability of microperimetry is proved in many articles, and authors put effort to find potential predictive factors for assessment of future and existing treatment [33, 34], so it seems reasonable to perform it before vitrectomy. In a recent study of Kunikata and colleagues, microperimetry was performed preoperatively and 1, 3, and 6 months postoperatively in 21 patients with primary FTMH. Lower recovery of retinal sensitivity was found in the superior sector of the macula [35]. It was also already shown that the preoperative retinal sensitivity is related to the diameter of the FTMH and retinal architecture (the width of the perifoveal cystic cavities and the area of choroidal transparency) [36].

In the longer follow-up period, we could observe how macular sensitivity and fixation stability change and assess the surgical efficacy and find the best surgical technique; thus, further prospective long-lasting studies with preoperative assessment are needed to assess the visual function after secondary vitrectomy with ILM plug.

The limitation of our study is small number of patients included, but they were collected during the long period, as the rate of unclosed FTMH is quite small, and these are rare cases.

In conclusion, the secondary PPV with autologous ILM plug was an effective surgical procedure to receive the closure of persistent FTMH, although visual function results may be limited. Characteristics of OCTA images in eyes with FTMH or comparison of OCTA images before and after PPV have not been done so far, but they should be performed in a bigger sample of cases.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Supplementary Materials

Video showing surgery. (Supplementary Materials)

References

D. Wrzesińska, K. Nowomiejska, D. Nowakowska et al., “Vertical and horizontal m-charts and microperimetry for assessment of the visual function in patients after vitrectomy with ilm peeling due to stage 4 macular hole,” Journal of Ophthalmology, vol. 2019, Article ID 4975973, 2019.

M. Reibaldi, S. Rizzo, T. Avitabile et al., “Iatrogenic retinal breaks in 25-gauge vitrec to my under air compared with the standard 25-gauge system for macular diseases,” Retina, vol. 34, no. 8, pp. 1617–1622, 2014.

G. A. Reid, N. McDonagh, D. M. Wright, J. T. O. Yek, R. W. Essex, and N. Lois, “First failed macular hole surgery or reopening of a previously closed hole,” Retina, vol. 40, no. 1, pp. 1–15, 2020.

N. E. Kelly and R. T. Wendel, “Vitreous surgery for idiopathic macular holes,” Archives of Ophthalmology, vol. 109, no. 5, pp. 654–659, 1991.

F. Y. Ma, R. J. Xi, P. F. Chen, and Y. H. Hao, “Free autologous internal limiting membrane transplantation in the treatment of large macular hole,” International Journal of Ophthalmology, vol. 12, no. 5, pp. 848–851, 2019.

A. Russo, M. Ragusa, C. Barbagallo et al., “MiRNAs in the vitreous humor of patients affected by idiopathic epiretinal membrane and macular hole,” PLoS One, vol. 22, Article ID e0174297, 2017.

T. M. Jenisch, F. Zeman, M. Koller, D. A. Märker, H. Helbig, and W. A. Herrmann, “Macular hole surgery: an analysis of risk factors for the anatomical and functional outcomes with a special emphasis on the experience of the surgeon,” Clinical Ophthalmology, vol. 11, pp. 1127–1134, 2017.

J. T. O. Yek, A. P. Hunyor, W. G. Campbell et al., “Outcomes of eyes with failed primary surgery for idiopathic macular hole,” Ophthalmology Retina, vol. 2, no. 8, pp. 757–764, 2018.

F. Giansanti, R. Tartaro, and T. Caporossi, “An internal limiting membrane plug and gas endotamponade for recurrent or persistent macular hole,” Journal of Ophthalmology, vol. 2019, Article ID 6051724, 2019.

Y. Dai, F. Dong, X. Zhang, and Z. Yang, “Internal limiting membrane transplantation for unclosed and large macular holes,” Graefe’s Archive for Clinical and Experimental Ophthalmology, vol. 254, no. 11, pp. 2095–2099, 2016.

F. Bottoni, S. Parrulli, M. Mete et al., “Large idiopathic macular hole surgery: remodelling of outer retinal layers after traditional internal limiting membrane peeling or inverted flap technique,” Ophthalmologica, vol. 243, no. 5, p. 334, 2020.

F. Ghassemi, H. Khojasteh, A. Khodabande et al., “Comparison of three different techniques of inverted internal limiting membrane flap in treatment of large idiopathic full-thickness macular hole,” Clinical Ophthalmology, vol. 13, pp. 2599–2606, 2019.

K. Bonińska, J. Nawrocki, and Z. Michalewska, “Mechanism of “flap closure” after the inverted internal limiting membrane flap technique,” Retina, vol. 38, no. 11, pp. 2184–2189, 2018.

R. T. Wendel, A. C. Patel, N. E. Kelly, T. C. Salzano, J. W. Wells, and G. D. Novack, “Vitreous surgery for macular holes,” Ophthalmology, vol. 100, no. 11, pp. 1671–1676, 1993.

Y. Morizane, F. Shiraga, S. Kimura et al., “Autologous transplantation of the internal limiting membrane for refractory macular holes,” American Journal of Ophthalmology, vol. 157, no. 4, pp. 861–869, 2014.

P. Ichhpujani, L. G. Spaeth, and M. Yanoff, Expert Techniques in Ophthalmic Surgery, Jaypee Brothers Medical Publishers (P) Ltd, New Delhi, India, 2nd edition, 2019.

M. Reibaldi, T. Avitabile, A. Longo et al., “Correlation of preoperative retinal pigment epithelium status with foveal microstructure in repaired macular holes,” Ophthalmologica, vol. 232, no. 4, pp. 194–199, 2014.

Y.-C. Chang, P.-K. Liu, T.-E. Kao et al., “Management of refractory large macular hole with autologous neurosensory retinal free flap trans,” Retina, 2019.

S. H. Kim, H. K. Kim, J. Y. Yang, S. C. Lee, and S. S. Kim, “Visual recovery after macular hole surgery and related prognostic factors,” Korean Journal of Ophthalmology, vol. 32, no. 2, pp. 140–146, 2018.

H. Shinoda, K. Shinoda, S. Satofuka et al., “Visual recovery after vitrectomy for macular hole using 25-gauge instruments,” Acta Ophthalmologica, vol. 86, no. 2, pp. 151–155, 2008.

M. Reibaldi, M. Parravano, M. Varano et al., “Foveal microstructure and functional parameters in lamellar macular hole,” American Journal of Ophthalmology, vol. 154, no. 6, pp. 974–980, 2012.

J. H. Cho, H. C. Yi, S. H. Bae, and H. Kim, “Foveal microvasculature features of surgically closed macular hole using optical coherence tomography angiography,” BMC Ophthalmology, vol. 17, 217 pages, 2017.

Y. J. Kim, J. Jo, J. Y. Lee, Y. H. Yoon, and J.-G. Kim, “Macular capillary plexuses after macular hole surgery: an optical coherence tomography angiography study,” British Journal of Ophthalmology, vol. 102, no. 7, pp. 966–970, 2018.

T. Wilczyński, A. Heinke, A. Niedzielska-Krycia, D. Jorg, and K. Michalska-Małecka, “Optical coherence tomography angiography features in patients with idiopathic full-thickness macular hole, before and after surgical treatment,” Clinical Interventions in Aging, vol. 14, pp. 505–514, 2019.

A. Shahlaee, E. Rahimy, J. Hsu, O. P. Gupta, and A. C. Ho, “Preoperative and postoperative features of macular holes on en face imaging and optical coherence tomography angiography,” American Journal of Ophthalmology Case Reports, vol. 5, pp. 20–25, 2016.

S. Sul, G. Gurelik, Ş. Korkmaz, and C. Ozsaygili, “Choroidal thickness in macular holes,” International Ophthalmology, vol. 39, no. 11, pp. 2595–2601, 2019.

J. Pires, J. Nadal, and N. L. Gomes, “Internal limiting membrane translocation for refractory macular holes,” The British Journal of Ophthalmology, vol. 101, no. 3, pp. 377–382, 2017.

D. Borowicz, K. Nowomiejska, D. Nowakowska et al., “Functional and morphological results of treatment of macula-on and macula-off rhegmatogenous retinal detachment with pars plana vitrectomy and sulfur hexafluoride gas tamponade,” BMC Ophthalmology, vol. 19, no. 1, p. 118, 2019.

L. Tarita-Nistor, E. G. Gonza´lez, M. S. Mandelcorn, L. Lillakas, and M. J. Steinbach, “Fixation stability, fixation location, and visual acuity after successful macular hole surgery,” Investigative Opthalmology & Visual Science, vol. 50, no. 1, pp. 84–89, 2009.

G. Sborgia, A. Niro, and A. Sborgia, “Inverted internal limiting membrane-flap technique for large macular hole: a microperimetric study,” International Journal of Retina and Vitreous, vol. 5, no. 44, 2019.

A. Bonnabel, A. M. Bron, R. Isaico, B. Dugas, F. Nicot, and C. Creuzot-Garcher, “Long-term anatomical and functional outcomes of idiopathic macular hole surgery: the yield of spectral-domain OCT combined with microperimetry,” Graefe’s Archive for Clinical and Experimental Ophthalmology, vol. 251, no. 11, pp. 2505–2511, 2013.

Y. Qi, Z. Wang, S. M. Li et al., “Effect of internal limiting membrane peeling on normal retinal function evaluated by microperimetry-3,” BMC Ophthalmology, vol. 20, no. 1, 2020.

M. Laishram, K. Srikanth, A. R. Rajalakshmi, S. Nagarajan, and G. Ezhumalai, “Microperimetry—a new tool for assessing retinal sensitivity in macular diseases,” Journal of Clinical and Diagnostic Research, vol. 11, no. 7, pp. 8–11, 2017.

C. Leisser, S. Palkovits, N. Hirnschall et al., “One-year results after internal limiting membrane flap transposition for surgical repair of macular holes with respect to microperimetry flap transposition for surgical repair of macular holes with respect to microperimetry,” Ophthalmic Research, vol. 61, no. 2, pp. 83–87, 2019.

H. Kunikata, M. Yasuda, N. Aizawa et al., “Retinal sensitivity and vessel density after macular hole surgery with the superior inverted internal limiting membrane flap technique,” Retina, 2020.

D. Bacherini, M. C. Savastano, F. Dragotto et al., “Morpho-functional evaluation of full-thickness macular holes by the integration of optical coherence tomography angiography and microperimetry,” Journal of Clinical Medicine, vol. 9, no. 1, 2020.