Journal of PregnancyVolume 2012 (2012), Article ID 814987, 7 pagesdoi:10.1155/2012/814987

Clinical Study

Fetal Vibroacoustic Stimulation in Computerized Cardiotocographic Analysis: The Role of Short-Term Variability and Approximate Entropy

Maria Laura Annunziata, Mariamaddalena Scala, Natascia Giuliano, Salvatore Tagliaferri, Olga Carmela Maria Imperato, Francesca Giovanna Esposito, Marta Campanile, and Andrea Di Lieto

Department of Obstetrical-Gynaecological and Urological Science and Reproductive Medicine, Prenatal Care Unit, University “Federico II” of Naples, 80131 Naples, Italy

Received 4 August 2011; Revised 25 September 2011; Accepted 12 October 2011

Academic Editor: R. L. Deter

Copyright © 2012 Maria Laura Annunziata et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The aim of this study was to evaluate the impact of vibroacoustic stimulation (VAS) on computerized cardiotocography short-term variability (STV) and approximate entropy (ApEn) in both low- and high-risk pregnancies. VAS was performed on 121 high- and 95 low-risk pregnancies after 10 minutes of continuous quiet, while their FHR parameters were monitored and recorded by cCTG analysis. Fetal heart rate was recorded using a computer-assisted equipment. Baseline FHR, accelerations, decelerations, STV, long-term irregularity (LTI), ApEn, and fetal movements (FMs) were calculated for defined observational periods before VAS and after 10 minutes. Data were also investigated in relationship with the perinatal outcome. In each group of patients, FHR after VAS remained almost unmodified. Fetal movements significantly increased after VAS in both groups. Results show that only in the high-risk pregnancies, the increase of STV and the decrease of ApEn after VAS were significantly associated with favorable perinatal outcomes.

1. Introduction

Several studies [1–4] showed that fetal sleeping periods can lead to falsely nonreactive tests, therefore, increasing the risk of unnecessary obstetric intervention. Attempts to arouse the fetus while is sleeping or in a rest-activity cycle include a change in maternal position, physical activity, maternal glucose ingestion, sound stimulation, light stimulation, and manual fetal manipulation. However, the only stimuli that have consistently evoked responses in normal fetuses are acoustic and vibrotactile ones. Fetal vibroacoustic stimulation was first noted in 1947 by Bernard and Sontag [5] who observed that the fetal heart rate accelerated after acoustic stimulation [6] correlated fetal movements with fetal well-being.

In modern obstetrics, fetal vibroacoustic stimulation uses an artificial larynx placed on the mother’s abdomen over the fetal head region. This is expected to induce a startle reflex in the fetus, with subsequent fetal movement and FHR acceleration [7]. Many authors have observed an increase in the frequency and size of accelerations after vibroacoustic stimulation during low FHR [8–10]. It is hypothesized that FHR acceleration following VAS provides reassurance of fetal well-being, obviating the need for further intervention [11, 12]. Moreover, acoustic stimulation of the fetus has been suggested to improve the efficiency of antepartum fetal heart rate testing [13, 14]. Some authors in nonrandomized studies [15–17] have reported success using fetal vibroacoustic stimulation to improve the efficiency of antepartum fetal heart rate testing without changing the predictive reliability of the tests. Animal studies have revealed that fetal responses to extrauterine sound depend on the peripheral and central components of the fetus’s auditory system. In lambs with bilateral cochlear ablation, no reactions towards vibroacoustic stimulation could be recorded, not even at high intensities, indicating that the auditory apparatus is necessary for fetal heart rate (FHR) and fetal movement (FM) responses in this animal model [18, 19]. Some authors have conducted studies to evaluate the existence of possible adverse effects caused by the VAS [20]. They concluded that stimulation with the electronic artificial larynx induced excessive fetal movements, a prolonged tachycardia, nonphysiological state changes, and a disorganisation and change in the distribution of fetal behavioural states, therefore, they did not recommend its use routinely. On the other hand, in more recent studies [21], vibroacoustic stimulation has been demonstrated not to cause any cochlea damage in the fetus, and they have shown that the intensity of sound and vibration are 4000 times less than in the amniotic fluid, compared to that produced in air. Moreover, an audiometric and tympanic screening performed on children who had been exposed to vibroacoustic stimulation in utero showed the absence of hearing loss [22].

Positive (reactive) VAS tests appeared comparable to standard reactive nonstress tests (NSTs) [23]. Perinatal outcomes following positive VAS appear to be similar to those associated with reactive NSTs, while testing time was shorter with VAS [24].

Since computerized cardiotocography (cCTG) provides an objective analysis of FHR, our aim of this study was to evaluate FHR before and after VAS, in both low- and high-risk pregnancies. Moreover, the cCTG parameters short-term variability (STV) and approximate entropy (ApEn) are considered more closely related to the actual well-being of the fetus, compared to the parameters detectable with the traditional reading [25]. Therefore, in the present study, we decided to consider especially them, in an attempt to provide an even more reliable evidence of fetal well-being.

2. Materials and Methods

A retrospective study was performed in 563 pregnants referring to the “Federico II” University Medical School in Naples, between November 2007 and October 2010. The study was approved by ethics committee of the university and all participants gave their written informed consent.

Patients were selected according to some inclusion criteria: (a) availability of data from maternal medical history, ultrasound parameters, amniotic fluid production, Doppler velocimetry on umbilical cord; (b) computerized cardiotocographic (cCTG) analysis from antepartum FHR tracings before and after fetal vibroacoustic stimulation; (c) availability of data about the newborn baby (kind of delivery, sex, weight, Apgar score, malformations at birth, and the possible need of admission in neonatal intensive care). Moreover, each FHR tracing had to contain (a) a period of 10 minutes of continuous quiet before the stimulus was given and (b) a period of at least 10 minutes after the stimulus was given, both of acceptable quality, according to the analysis criteria [26]. Exclusion criteria for final analysis were (a) FHR tracings before the twenty-eighth week of pregnancy, for which the International Federation of Gynecology and Obstetrics does not provide any standard value for the cCTG parameters; (b) patient withdrawal from the study and/or unavailability of followup. Total population included 216 patients, divided in two groups: low- and high-risk pregnancies. “High-risk” pregnancy is generally thought of as the one in which the mother or the developing fetus has a condition that places one or both of them at a higher-than-normal risk for complications, either during the pregnancy (antepartum), during delivery (intrapartum), or following the birth (postpartum). Instead, low-risk pregnancy is defined for the absence of significant past medical or obstetric history and of fetal anomalies [27, 28]. The characteristics of the population of this study are shown in Tables 1 and 2. Pregnancy care was performed according to routine practice. All patients underwent the cCTG nonstress test in the same conditions, that is, in the same rooms, between 8.30 and 12.00 AM and with the women in semirecumbent position. Fetal heart rate was recorded using a computer-assisted equipment (Corometrics 170, General Electrics). Each FHR tracing was analyzed with the SEA 2CTG2 system that calculated the short term variability throughout this expression. Approximate entropy (ApEn) derives from formulas suggested to estimate the Kolmogorov entropy of a process represented by a time series. It is a measurement of the conditional probability that two vectors that are close to each other for points will remain close at the next point [29, 30].

Table 1: Patients’ characteristics.

Number
%

Gestational age at CTG recording (week):

    28–36 weeks     37–42 weeks
87 129
40.27 59.72

High-risk pregnancy
121
56

Low-risk pregnancy
95
44

Abnormal Doppler velocimetry on umbilical cord
10
4.63

Abnormal AFI, (%):

    <5 cm
6
2.8

    >25 cm
4
1.8

CTG, cardiotocogram; AFI, amniotic flux index.

Table 2: Babies’ characteristics.

Number
%

SGA
17
7.8

Adverse perinatal outcome
5 min Apgar score <7
23
10.7

RDS
2
0.93

Perinatal death
2
0.93

NICU admission
6
2.8

Good perinatal outcome
166
76.85

SGA, small for gestational age; RDS, respiratory distress syndrome; NICU, neonatal intensive care unit.

Baseline FHR, accelerations, decelerations, long-term irregularity (LTI), approximate entropy (ApEn), and fetal movements (FMs) were calculated for defined observational periods before and after VAS (Figure 1).

Figure 1: Example of computerized analysis of fetal heart rate tracing.

The cCTG parameters short term variability (STV) and the approximate entropy (ApEn) were analyzed in reference to the standard values proposed by Arduini and associates, for each gestational week [31, 32]. The aim of the study was to evaluate the changes in cCTG analysis before and after an external vibratory acoustic stimulus over the fetal vertex, by an artificial larynx, was produced. The stimulus consisted of 5 seconds of vibration applied to the maternal abdomen, while the fetus is sleeping, in accordance with the literature and the clinical indications [33]. Data were also investigated in relationship with the perinatal outcome. Adverse perinatal outcome included one or more of the following criteria: small for gestational age infant, fetal acidaemia at delivery, 5-minute Apgar score <7, respiratory distress syndrome, perinatal death, hypoxic ischemic encephalopathy, malformations, or other injuries requiring neonatal intensive care.

Statistical analysis was performed using chi-square test for independent samples, and the two-tailed Student’s t-test. A value < 0.05 was considered to be statistically significant.

3. Results

Fetal vibroacoustic stimulation was performed on 121 high-risk and 95 low-risk pregnancies, while their FHR parameters were monitored and recorded by cCTG analysis.

Significant fetal heart accelerations () appeared 10 seconds after the stimulation both in low- and high-risk pregnancies. As many authors argued [34, 35], this event can be related to the sudden change of the fetal state from quiet sleep to activity/weakeness.

In each group of patients, FHR after VAS remained almost unmodified, as differences were not statistically significant (Tables 3 and 4). We considered positive a VAS test if the stimulation is follwed by the increase of STV and the decrease of ApEn. High-risk pregnant women showed an increase of STV in 76 cases (62.8%), a decrease of ApEn in 67 cases (55.37%), and a global positive test in 39 cases (32.23%), including 31 (38.7%) with a favorable perinatal outcome and 8 (20%) with an unfavorable outcome at birth.

Table 3: FHR parameters before and after VAS in low-risk pregnancies ().

Before VAS
After VAS
P*

FHR
137.14
137.33
N.S.

FM
36
72
0.001

N° ACC
2.2
8.6
0.001

DEC
0.01
0.11
N.S.

STV
4.75
5.28
N.S.

ApEn
1.35
1.31
N.S.

Data are expressed as mean.

FHR, fetal heart rate; FM, fetal movements; ACC, accelerations; DEC, deceleration; STV, short-term variability; ApEn, approximate entropy; NS, not significant.

*Student’s t-test, *according to the standard values proposed by Arduini.

Table 4: FHR parameters before and after VAS in high-risk pregnancies ().

Before VAS
After Vas
P*

FHR
136.12
136.33
N.S.

FM
31
75
0.001

N° ACC
2.1
9.7
0.001

DEC
0.02
0.13
N.S.

STV
4.41
5.92
0.005

ApEn
1.36
1.22
0.005

Data are expressed as mean.

FHR, fetal heart rate; FM, fetal movements; ACC, accelerations; DEC, deceleration; STV, short-term variability; ApEn, approximate entropy; NS, not significant.

*Student’s t-test.

In low-risk patients, we found an increase of STV in 72 cases (75.79%) and a decrease of ApEn in 49 cases (51.57%), with a positive VAS test in 36 cases (37.90%), including 32 (37.20%) with a favorable perinatal outcome and 4 (44.4%) with an unfavorable outcome. 50 babies (23.4%) showed adverse conditions at birth: 41 (33.88%) in high-risk pregnancies and 9 (9.47%) in low-risk pregnant women.

Fetal movements significantly increased after VAS in both the groups (). Only in the high-risk pregnancies, the increase of STV and the decrease of ApEn after VAS were significantly associated with favorable perinatal outcomes. Moreover, chi-square test () showed that only between 28th and 36th week of gestation and only when STV increased more than 3.5 ms and ApEn decreased more than 0.5, the relationship with the perinatal outcome was statistically significant (Table 5). The radar graph in Figure 2 summarizes the cutoff values found, offering an immediate visual evaluation about the different relationships between STV and ApEn with the perinatal outcome, respectively.

Table 5: Modifications of STV (a) and ApEn (b) after VAS in high-risk pregnancies between 28th and 36th week of gestation.

(a) Ranges of increase of STV (ms) after VAS

Perinatal outcome
0–0.5
0.6–1
1.1–1.6
1.7–3.5
>3.5

Favorable (number)
2
2
2
1
3

Unfavorable (number)
8
2
3
5
0

(b) Ranges of decrease of ApEn after VAS

Perinatal outcome
0.2–0
0.5–0.3
>0.5

Favorable (number)
2
2
3

Unfavorable (number)
14
2
1

Figure 2: Radar graph representing the cutoff values found for short term variability (STV) and approximate entropy (ApEn).

VAS predictive value was examined through the analysis of sensitivity and specificity. Sensitivity was found to be 37% in low-risk pregnancies, and 39% in high-risk pregnancies. Instead, specificity was 55% and 80%, respectively, in low- and high-risk pregnancies (Table 6).

Table 6: Sensitivity and specificity analysis.

(a) High-risk pregnancies

Positive perinatal outcome
Negative perinatal outcome

Positive VAS Test
31
8

Negative VAS Test
49
33

Sensitivity = 31/(31 + 49) = 0,39 = 39%.

95% confidence interval = 0,39 ± 1,96 √ 0,39 · (1 − 0,39)/(31 + 49) = 0,2831–0,4969.

Specificity = 33/(8 + 33) = 0,8 = 80%.

95% confidence interval = 0,8 ± 1,96 √ 0,8 · (1 − 0,8)/(8 + 33)= 0,6776–0,9224.

(b) Low-risk pregnancies

Positive perinatal outcome
Negative perinatal outcome

Positive VAS Test
32
4

Negative VAS Test
54
5

Sensitivity = 32/(32 + 54) = 0,37 = 37%.

95% confidence interval = 0,37 ± 1,96 √ 0,37 · (1 − 0,37)/(32 + 54) = 0,27–0,47.

Specificity = 5/(4 + 5) = 0,55 = 55%.

95% confidence interval = 0,55 ± 1,96 √ 0,55 · (1− 0,55)/(4 + 5) = 0,23–0,87.

4. Discussion

Vibroacoustic stimulation offers a unique opportunity to assess how the fetus responds to the external environment. Fetal VAS is commonly used for both antepartum and intrapartum testing. It is considered a simple and reliable prognostic evaluation of abnormal FHR detection. A metaanalysis performed by Skupski et al. [36] of reports on intrapartum fetal stimulation tests, analyzed different types of fetal stimulation, including scalp puncture for pH testing, the use of an Allis clamp to pinch the fetal scalp, digital stroking of the fetal scalp, and VAS. All the methods resulted similar. Moreover, methods like fetal scalp blood sampling, fetal electrocardiography, and fetal pulse oximetry are invasive, their benefit can be uncertain, and are not widely available or used routinely [37]. Fetal VAS is a noninvasive technique that does not involve puncture of the amniotic membrane, making it particularly useful in antepartum primary care. Ohel et al. [8] demonstrated that after vibroacoustic stimulation occurs, a statistically significant increase in basal FHR (115 bpm) during periods of low FHR reactivity and a statistically significant increase in the number of fetal movements happen. Bartnicki and Dudenhausen [38] argued that after an acoustic stimulus, fetal movements cause a partial occlusion of the umbilical cord that could be responsible for the reduced fetal pressure and acute hypoxia that would in turn lead to a reflex stimulation of the autonomous nervous system.

From the current literature, we know that changes in the beat-to-beat interval are mainly mediated by the regulation mechanisms and by the synergic action elicited by the autonomic nervous system (ANS) activity, through its sympathetic and parasympathetic branches. As the activities of the ANS are closely related with those of the central nervous system, and their contributions are usually quantified through parameters obtained from the spectral analysis of HRV signal [39, 40]. Therefore, the analysis of FHR signals of fetuses submitted to a vibroacoustic stimulation may provide information about the functional aspects of the autonomic nervous system and of the central nervous system, making possible diagnosis, prognosis, and monitoring of major pathologies of the central or peripheral nervous system.

Cardiotocography (CTG) provides a noninvasive monitoring of fetal heart rate (FHR). It is the most popular analysis method in clinical practice allowing the recording and the analysis of FHR, via ultrasonographic techniques. Indices obtained from the cardiotocographic FHR signals have been adopted to study the autonomic nervous system activity of the fetus during the intrauterine life both in physiologic and pathologic conditions [41]. Gonçalves et al. [42] showed a significant relationship between FHR linear and nonlinear parameters and fetal state, as linear indices increased significantly with rising fetal activity whereas the opposite occurred with nonlinear indices. D’Elia et al. [43] used the computerized cardiotocography to assess the fetal heart rate in healthy term fetuses subjected to VAS. He found a statistically significant increase not only for FM and number of FHR accelerations, but also in STV. Moreover, they showed that the response was influenced by fetus’ behavioural state at the time of the stimulus.

Interestingly, a study [44] performing a linear and nonlinear fetal heart rate analysis in normal and acidemic fetuses before delivery showed that, with the progression of the labor, a significant increase in linear frequency domain indices and a significant decrease in nonlinear indices became evident. Bernardes et al. [45] hypothesized that fetal sex differences could affect the FHR response to VAS.

From our results, we can state that fetuses respond to vibroacoustic stimulation accelerating their FHR. However, the analysis of STV and ApEn after VAS shows that the difference is significant only in high-risk pregnancies. This result make these cCTG parameters a useful tool in the evaluation of fetal neuronal response. Especially noteworthy is the significant association of a positive VAS test with perinatal conditions in high-risk pregnancy, between the 28th and the 36th week of gestation. This result could be explained with the development of the auditory apparatus, which occurs in that period. Indeed, vibroacoustic stimulation elicits a neural response in the fetus, from the auditory sensory system to the central level, whose response is able to trigger the autonomic mechanisms responsible for the regulation of the FHR. The identification of cutoff values of STV and ApEn for the association with the perinatal outcome in high-risk pregnancies could provide useful tools for better understanding and management of pathophysiological neural development of the fetus. In addition, the sensitivity and the specificity of the results of the present study were analyzed. The low sensitivity values found, both in low- and high-risk pregnancies, show that Vas test was positive only in a small number of patients delivering healthy babies. On the other hand, the difference between the two groups, found in the specificity analysis, is very meaningful. The high percentage of specificity found for high-risk pregnancies (80%) suggested that a negative Vas test was observed in a large percentage of patients whose babies show negative outcome at birth, in contrast with the lower specificity (55%) found in low-risk pregnancies. This is to confirm the importance of the use of Vas test inside the cCTG analysis as a predictive tool of conditions at birth. Moreover, our findings can be seen as a confirmation of what Gonçalves et al. [44] hypothesized, that is, an increase in the autonomic nervous system activity and a decrease in the central nervous system activity, when a stress condition occurs (the final minutes of labor in Gonçalves’ study and the vibroacoustic stimulation in the present study), even if we found differences between low- and high-risk pregnancies.

Differently from previous studies [4, 5, 8–10], our aim was not to study only the role of Vas in relationship with the modifications of fetal biophysical profile, but we wanted to analyze how its cardiotocographic effect relates with the perinatal outcome, in order to verify its predictive value. Moreover, the present study tried to find, for the first time, values of STV and ApEn from which it is possible to define a statistical significance of the relationship found. Further randomized trials are surely needed to determine reliable quantitative indices that could help a nearly recognition of central and peripheral pathologies. For this purpose, computerized cardiotocography analysis proves to be a reliable noninvasive method.

References

L. R. Leader, P. Baillie, and B. Martin, “Fetal responses to vibrotactile stimulation, a possible predictor of fetal and neonatal outcome,” Australian and New Zealand Journal of Obstetrics and Gynaecology, vol. 24, no. 4, pp. 251–256, 1984.

C. V. Smith, J. P. Phelan, R. H. Paul, and P. Broussard, “Fetal acoustic stimulation testing: a retrospective experience with the fetal acoustic stimulation test,” American Journal of Obstetrics and Gynecology, vol. 153, no. 5, pp. 567–568, 1985.

K. A. Keegan, “The nonstress test,” Clinical Obstetrics and Gynecology, vol. 30, no. 4, pp. 921–935, 1987.

I. Ingemarsson and S. Arulkumaran, “Reactive fetal heart rate response to vibroacoustic stimulation in fetuses with low scalp blood pH,” British Journal of Obstetrics and Gynaecology, vol. 96, no. 5, pp. 562–565, 1989.

J. Bernard and L. W. Sontag, “Fetal reactivity to acoustic stimulation: a preliminary report,” Journal of Genetic Psychology, vol. 70, pp. 205–210, 1947.

E. Sadovsky, “Fetal movements and fetal health,” Seminars in Perinatology, vol. 5, no. 2, pp. 131–143, 1981.

J. A. D. Spencer, A. Deans, P. Nicolaidis, and S. Arulkumaran, “Fetal heart rate response to vibroacoustic stimulation during low and high heart rate variability episodes in late pregnancy,” American Journal of Obstetrics and Gynecology, vol. 165, no. 1, pp. 86–90, 1991.

G. Ohel, A. Birkenfeld, R. Rabinowitz, and E. Sadovsky, “Fetal response to vibratory acoustic stimulation in periods of low heart rate reactivity and low activity,” American Journal of Obstetrics and Gynecology, vol. 154, no. 3, pp. 619–621, 1986.

R. Gagnon, C. Hunse, and L. Carmichael, “Effects of vibratory acoustic stimulation on human fetal breathing and gross fetal body movements near term,” American Journal of Obstetrics and Gynecology, vol. 155, no. 6, pp. 1227–1230, 1986.

R. Gagnon, C. Hunse, and L. Carmichael, “External vibratory acoustic stimulation near term: fetal heart rate and heart rate variability responses,” American Journal of Obstetrics and Gynecology, vol. 156, no. 2, pp. 323–327, 1987.

American Academy of Pediatrics and American College of Obstetricians and Gynecologists, Guidelines for Perinatal Care, American Academy of Pediatrics, Washington, DC, USA, 6th edition, 2000.

M. Umstad, C. Bailey, and M. Permezel, “Intrapartum fetal stimulation testing,” Australian and New Zealand Journal of Obstetrics and Gynaecology, vol. 32, no. 3, pp. 222–224, 1992.

P. Serafini, M. B.J. Lindsay, and D. A. Nagey, “Antepartum fetal heart rate response to sound stimulation: the acoustic stimulation test,” American Journal of Obstetrics and Gynecology, vol. 148, no. 1, pp. 41–45, 1984.

B. J. Trudinger and P. Boylan, “Antepartum fetal heart rate monitoring: value of sound stimulation,” Obstetrics & Gynecology, vol. 55, no. 2, pp. 265–268, 1980.

M. Nyman, S. Arulkumaran, J. Jakobsson, and M. Westgren, “Vibro-acoustic stimulation in high-risk pregnancies; Maternal perception of fetal movements, fetal heart rate and fetal outcome,” Journal of Perinatal Medicine, vol. 20, no. 4, pp. 267–274, 1992.

S. R. Inglis, M. L. Druzin, W. E. Wagner, and E. Kogut, “The use of vibroacoustic stimulation during the abnormal or equivocal biophysical profile,” Obstetrics & Gynecology, vol. 82, no. 3, pp. 371–374, 1993.

C. Sarinoglu, J. Dell, B. M. Mercer, and B. M. Sibai, “Fetal startle response observed under ultrasonography: a good predictor of a reassuring biophysical profile,” Obstetrics & Gynecology, vol. 88, no. 4, part 1, pp. 599–602, 1996.

K. J. Gerhardt, “Characteristics of the fetal sheep sound environment,” Seminars in Perinatology, vol. 13, no. 5, pp. 362–370, 1989.

M. J. Parkes, P. J. Moore, D. R. Moore, N. M. Fisk, and M. A. Hanson, “Behavioral changes in fetal sheep caused by vibroacoustic stimulation: the effects of cochlear ablation,” American Journal of Obstetrics and Gynecology, vol. 164, no. 5, part 1, pp. 1336–1343, 1991.

G. H. A. Visser, H. H. Mulder, H. P. Wit, E. J. H. Mulder, and H. F. R. Prechtl, “Vibro-acoustic stimulation of the human fetus: effect on behavioural state organization,” Early Human Development, vol. 19, no. 4, pp. 285–296, 1989.

S. Arulkumaran, D. Talbert, T. S. Hsu, S. Chua, C. Anandakumar, and S. S. Ratnam, “In-utero sound levels when vibroacoustic stimulation is applied to the maternal abdomen: an assessment of the possibility of cochlea damage in the fetus,” British Journal of Obstetrics and Gynaecology, vol. 99, no. 1, pp. 43–45, 1992.

S. Arulkumaran, B. Skurr, H. Tong, L. P. Kek, K. H. Yeoh, and S. S. Ratnam, “No evidence of hearing loss due to fetal acoustic stimulation test,” Obstetrics & Gynecology, vol. 78, no. 2, pp. 283–285, 1991.

D. Marden, R. S. McDuffie, R. Allen, and D. Abitz, “A randomized controlled trial of a new fetal acoustic stimulation test for fetal well-being,” American Journal of Obstetrics and Gynecology, vol. 176, no. 6, pp. 1386–1388, 1997.

C. V. Smith, J. P. Phelan, and L. D. Platt, “Fetal acoustic stimulation testing. II. A randomized clinical comparison with the nonstress test,” American Journal of Obstetrics and Gynecology, vol. 155, no. 1, pp. 131–134, 1986.

A. Di Lieto, M. Campanile, M. De Falco, G. Magenes, and M. G. Signorini, “Nuovo sistema di telecardiotocografia convenzionale e computerizzata e di telecografia,” Telemeditalia—tecnologie sanitaria, sanità, salute 2009, http://www.telemeditalia.it/

M. G. Signorini, G. Magenes, S. Cerutti, and D. Arduini, “Linear and nonlinear parameters for the analysis of fetal heart rate signal from cardiotocographic recordings,” IEEE Transactions on Biomedical Engineering, vol. 50, no. 3, pp. 365–374, 2003.

E. S. Gilbert, et al., Manual for High-Risk Pregnancy and Delivery, Mosby, St. Louis, Mo, USA, 2002.

High-Risk Pregnancy: A Medical Dictionary, Bibliography, and Annotated Research Guide to Internet References, Icon Group International, San Diego, Calif, USA, 2004.

S. M. Pincus and R. R. Viscarello, “Approximate entropy: a regularity measure for fetal heart rate analysis,” Obstetrics & Gynecology, vol. 79, no. 2, pp. 249–255, 1992.

J. S. Richman and J. R. Moorman, “Physiological time-series analysis using approximate and sample entropy,” American Journal of Physiology, vol. 278, no. 6, pp. H2039–H2049, 2000.

D. Arduini, G. Rizzo, G. Piana, A. Bonalumi, P. Brambilla, and C. Romanini, “Computerized analysis of fetal heart rate. I. Description of the system (2CTG),” Journal of Maternal and Fetal Investigation, vol. 3, pp. 159–163, 1993.

A. Di Lieto, U. Giani, M. Campanile, M. De Falco, M. Scaramellino, and R. Papa, “Prenatal telemedicine: clinical experience with conventional and computerised antepartum telecardiotocography,” European Journal of Obstetrics Gynecology and Reproductive Biology, vol. 103, no. 2, pp. 114–118, 2002.

M. Pietrantoni, J. L. Angel, M. T. Parsons, L. McClain, H. A. Arango, and W. N. Spellacy, “Human fetal response to vibroacoustic stimulation as a function of stimulus duration,” Obstetrics & Gynecology, vol. 78, no. 5, part 1, pp. 807–811, 1991.

R. Gagnon, K. Campbell, C. Hunse, and J. Patrick, “Patterns of human fetal heart rate accelerations from 26 weeks to term,” American Journal of Obstetrics and Gynecology, vol. 157, no. 3, pp. 743–748, 1987.

J. P. Lecanuet and B. Schaal, “Fetal sensory competencies,” European Journal of Obstetrics Gynecology and Reproductive Biology, vol. 68, no. 1-2, pp. 1–23, 1996.

D. W. Skupski, C. R. Rosenberg, and G. S. Eglinton, “Intrapartum fetal stimulation tests: a meta-analysis,” Obstetrics & Gynecology, vol. 99, no. 1, pp. 129–134, 2002.

C. E. East, R. Smyth, L. R. Leader, N. E. Henshall, P. B. Colditz, and K. H. Tan, “Vibroacoustic stimulation for fetal assessment in labour in the presence of a nonreassuring fetal heart rate trace,” Cochrane Database of Systematic Reviews, no. 2, Article ID CD004664, 2005.

J. Bartnicki and J. W. Dudenhausen, “Antepartum vibroacoustic stimulation in patients with low fetal heart rate variability,” International Journal of Gynecology and Obstetrics, vol. 48, no. 2, pp. 173–177, 1995.

Task Force of the Europ Soc of Cardiol & North Am Soc.of Pacing and Electrophys, “Heart rate variability, standard of measurement, physiological interpretation and clinical use,” Circulation, vol. 93, pp. 1043–1065, 1996.

G. Magenes, M. G. Signorini, D. Arduini, and S. Cerutti, “Fetal heart rate variability due to vibroacoustic stimulation: linear and nonlinear contribution,” Methods of Information in Medicine, vol. 43, no. 1, pp. 47–51, 2004.

H. P. Van Geijn, “Developments in CTG analysis,” Bailliere's Clinical Obstetrics and Gynaecology, vol. 10, no. 2, pp. 185–209, 1996.

H. Gonçalves, J. Bernardes, A. Paula Rocha, and D. Ayres-de-Campos, “Linear and nonlinear analysis of heart rate patterns associated with fetal behavioral states in the antepartum period,” Early Human Development, vol. 83, no. 9, pp. 585–591, 2007.

A. D'Elia, M. Pighetti, F. Vanacore, G. Fabbrocini, and L. Arpaia, “Vibroacoustic stimulation in normal term human pregnancy,” Early Human Development, vol. 81, no. 5, pp. 449–453, 2005.

H. Gonçalves, A. P. Rocha, D. Ayres-de-Campos, and J. Bernardes, “Linear and nonlinear fetal heart rate analysis of normal and acidemic fetuses in the minutes preceding delivery,” Medical and Biological Engineering and Computing, vol. 44, no. 10, pp. 847–855, 2006.

J. Bernardes, H. Gonçalves, D. Ayres-de-Campos, and A. P. Rocha, “Linear and complex heart rate dynamics vary with sex in relation to fetal behavioural states,” Early Human Development, vol. 84, no. 7, pp. 433–439, 2008.