Journal of Pathogens
Volume 2018 (2018), Article ID 1462671, 3 pages
https://doi.org/10.1155/2018/1462671

Research Article

Comparing the Yield of Staphylococcus aureus Recovery with Static versus Agitated Broth Incubation

Carol E. Muenks,¹ Patrick G. Hogan,¹ Carey-Ann D. Burnham,1,2 and Stephanie A. Fritz¹

¹Department of Pediatrics, Washington University School of Medicine, St. Louis, MO 63110, USA
²Department of Pathology & Immunology, Washington University School of Medicine, St. Louis, MO 63110, USA

Correspondence should be addressed to Stephanie A. Fritz; fritz.s@wustl.edu

Received 9 March 2018; Accepted 16 July 2018; Published 26 July 2018

Academic Editor: Chrissanthy Papadopoulou

Copyright © 2018 Carol E. Muenks et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Given the lack of standardization of methodologies for microbial recovery from built environments, we sought to compare the yield of Staphylococcus aureus with a broth enrichment method when incubated in agitated versus static conditions. Five unique strains of S. aureus at five different concentrations were cultured to compare direct plating, agitated broth enrichment, and static broth enrichment culture methods. All samples were incubated at 35° in ambient air. The lowest concentration recovered across three replicates and five strains did not differ between culture methods (Fisher’s exact test, p=0.50); notably, recovery of S. aureus was equivalent between static and agitated broth incubation. When broth enrichment was used (both static and agitated), the burden of S. aureus growth was higher (by semiquantitative assessment of 4-quadrant streaking) compared to the direct plating culture method. Optimizing strategies for microbial recovery is essential, particularly in areas of lower biomass, given the paucity of research concerning microbial communities of built environments. The results of this study, in conjunction with other experiments investigating microbiomes of built environments, can help inform protocols for standardizing culturing methods within built environments.

1. Introduction

There is growing interest in the microbiomes and “resistomes” (the conglomeration of resistance genes) [1] of built environments, such as hospitals, schools, and long-term care facilities [2]. Understanding these microbial communities, their transmission dynamics, and their contribution to person-to-person spread of pathogens could reduce the number of hospital-acquired infections [3]. Standardized methodologies for microbial recovery from the built environment have not been established, making it challenging to compare results between investigations [2]. Current accepted methodologies for cultivating Staphylococcus aureus in a laboratory setting recommend broth enrichment but are unclear regarding the necessity of agitated incubation [4, 5]. Incubation with agitation requires specialized equipment, which in high volume studies can be cumbersome. The objective of this study was to determine incubation conditions, specifically whether agitated broth incubation is superior to static broth incubation, yielding the highest recovery of S. aureus.

2. Materials and Methods

Using five unique strains of S. aureus at five specific concentrations, we compared recovery yield with direct plating versus static broth enrichment versus broth enrichment with agitation. Two of the five S. aureus strains were reference strains (ATCC 43300: methicillin-resistant S. aureus [MRSA], staphylococcal cassette chromosome mec (SCCmec) Type II and ATCC 25923: methicillin-susceptible S. aureus [MSSA], SCCmec negative). The remaining three strains of S. aureus were recovered from community-dwelling individuals (abscess drainage specimen: MRSA, SCCmec type IV [6]; a colonizing anterior nares isolate: MRSA, SCCmec type II [7]; and a colonizing inguinal fold isolate: MSSA, SCCmec type IV [7]). Each strain was suspended in normal saline and prepared to a density of 0.5 McFarland Standard. For each strain, five tenfold dilutions were prepared to achieve concentrations ranging from 0 to 10⁴ colony forming units (CFU)/mL. An ESwab (Becton Dickinson, Franklin Lakes, NJ) was submerged in each of the prepared dilutions, then placed into the ESwab transport medium (eluate), and vortexed for 10 seconds. From the eluate, 100 μL of the eluate was then inoculated onto each of three media: trypticase soy agar with 5% sheep blood (blood agar plate [BAP] BBL; Becton Dickinson) and into two tubes of trypticase soy broth (TSB) with 6.5% NaCl (BBL, BD), which were then vortexed for 10 seconds. The BAP and two TSBs (one static, one agitated at 250 rpm) were incubated in an ambient air incubator at 35°C for 24 hours. Following incubation, 100 μL of each TSB suspension was inoculated onto BAPs using the four quadrant streaking method for semiquantitative analysis [8–10] and incubated for an additional 24 hours. Three independent replications of this experiment were performed. Fisher’s exact test was performed using IBM SPSS for Windows v23 (Chicago, IL) to compare recovery yield between the three culture methods.

3. Results

The range of recovery for each of the three culture methods was the same (10-10⁴ CFU/mL). The lowest concentration recovered across three replicates and five strains did not differ between culture methods (Fisher’s exact test, p=0.50); specifically, recovery of S. aureus was equivalent between static and agitated broth incubation. When broth enrichment was used (both static and agitated), the burden of S. aureus growth was higher (by semiquantitative assessment of 4-quadrant streaking) compared to the direct plating culture method. Both broth enrichment methods recovered S. aureus in all four quadrants at 10⁴ CFU/mL, while direct plating only recovered S. aureus in the first two quadrants at 10⁴ CFU/mL (Table 1).

Table 1: Recovery of Staphylococcus aureus by culture method.

S. aureus strain
Culture method
            Replicate, lowest dilution level of detection
Lowest dilution that was detected for all replicates, CFU/mL

1
2
3

Reference ATCC 25923
MSSA, SCCmec negative
Direct Plate
10²
10²
10²
10²

Static BE
10
10²
10³
≤10³

Agitated BE
10
10²
10³
≤10³

Reference ATCC 43300
MRSA, SCCmec type IV
Direct Plate
10²
10²
10³
≤10³

Static BE
10²
10
10²
≤10²

Agitated BE
10²
10²
10³
≤10³

Clinical infecting isolate MRSA, SCCmec Type IV
Direct Plate
10²
10³
10²
≤10³

Static BE
10²
10³
10²
≤10³

Agitated BE
10²
10²
10²
10²

Clinical colonizing isolate MRSA, SCCmec Type II
Direct Plate
10³
10²
10
≤10³

Static BE
10³
10²
10²
≤10³

Agitated BE
10
10²
10
≤10²

Clinical colonizing isolate MSSA, SCCmec Type IV
Direct Plate
10²
10²
10²
10²

Static BE
10
10³
10
≤10³

Agitated BE
10
10²
10²
≤10²

CFU, colony forming unit; MRSA, methicillin-resistant S. aureus; MSSA, methicillin-susceptible S. aureus; SCCmec, staphylococcal cassette chromosome mec; BE, broth enrichment.

Note. S. aureus was recovered at the 10⁴ dilution for all strains and all culture methods at each replicate.

The range of recovery for both MRSA and MSSA was 10-10⁴ CFU/mL. The lowest concentration recovered for the two reference S. aureus strains was 10 CFU/mL, after incubation in static broth. For the two colonizing strains, the lowest concentration recovered was also 10 CFU/mL, occurring six times: once with direct plating, twice with static broth incubation, and three times with agitated broth incubation. The lowest concentration recovered for the infecting isolate was 10² CFU/mL for each of the culture methods.

4. Discussion and Conclusions

As interest in the microbial communities of built environments grows, optimal strategies for microbial recovery are essential, particularly in areas of lower biomass. Indeed, the National Academy of Sciences extended a call to close the knowledge gap surrounding how to best investigate the microbiomes of built environments [11]. The present study sought to examine different culturing and incubation methods to best isolate S. aureus from built environments. No significant difference in yield of S. aureus was observed between static versus agitated broth enrichment, while both broth enrichment methods recovered a higher abundance of S. aureus than the direct plating method.

The present findings correlate to previous studies which investigated the role of broth enrichment culture methods in recovering S. aureus. Specifically, Mernelius et al. employed both direct plating and agitated broth enrichment incubation culture methods to elucidate the role of broth enrichment in S. aureus cultivation within throats of newborn infants and found a 46% increase of yield when broth enrichment was used compared to direct plating [12]. Additionally, Tsang et al. used a static broth enrichment culture method to query the potential underestimation of S. aureus carriage recovered with standard direct plating techniques, resulting in a 31% increase of S. aureus yield [13].

Although there are limitations to this study including the small sample size and inclusion of only one species (albeit five distinct strains), the insights gathered provide valuable information to the field of study concerning the microbiomes of built environments. This study, in conjunction with the studies outlined above, can contribute to the response to the National Academy of Sciences call [11] to help elucidate protocols for standardized culturing methods within built environments.

Data Availability

Access to the data underlying the findings of the study will be considered by the corresponding author upon request.

Disclosure

These funding sources had no role in the design and conduct of the study; collection, management, analysis, and interpretation of the data; preparation, review, or approval of the manuscript; or decision to submit the manuscript for publication. The content is solely the responsibility of the authors and does not necessarily represent the official views of the National Institutes of Health or the Agency for Healthcare Research and Quality.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

Acknowledgments

Funding for this project was provided by the Children’s Discovery Institute of Washington University and St. Louis Children’s Hospital; National Institutes of Health [Grants K23-AI091690 and UL1-TR000448]; and the Agency for Healthcare Research and Quality [Grants R01-HS021736 and R01-HS024269].

References

G. D. Wright, “The antibiotic resistome: the nexus of chemical and genetic diversity,” Nature Reviews Microbiology, vol. 5, no. 3, pp. 175–186, 2007.

R. I. Adams, A. C. Bateman, H. M. Bik, and J. F. Meadow, “Microbiota of the indoor environment: a meta-analysis,” Microbiome, vol. 3, p. 49, 2015.

American Academy of Microbiology, Microbiology of Built Environments, American Society for Microbiology, 2015.

N. P. Vitko and A. R. Richardson, “Laboratory maintenance of methicillin-resistant Staphylococcus aureus (MRSA),” Current Protocols in Microbiology, no. Chapter 9: Unit 9C 2., 2013.

J. S. Weese, “Environmental surveillance for MRSA,” Methods in Molecular Biology, vol. 391, pp. 201–208, 2007.

S. A. Fritz, P. G. Hogan, G. Hayek et al., “Household versus individual approaches to eradication of community-associated Staphylococcus aureus in children: A randomized trial,” Clinical Infectious Diseases, vol. 54, no. 6, pp. 743–751, 2012.

S. A. Fritz, P. G. Hogan, L. N. Singh et al., “Contamination of environmental surfaces with Staphylococcus aureus in households with children infected with methicillin-resistant S. aureus,” JAMA Pediatrics, vol. 168, no. 11, pp. 1030–1038, 2014.

N. A. Cox, L. J. Richardson, D. E. Cosby, M. E. Berrang, J. L. Wilson, and M. A. Harrison, “A four-quadrant sequential streak technique to evaluate Campylobacter selective broths for suppressing background flora in broiler carcass rinses,” Journal of Food Safety, vol. 37, no. 2, 2017.

D. F. M. Riboli, J. C. Lyra, E. P. Silva et al., “Diagnostic accuracy of semi-quantitative and quantitative culture techniques for the diagnosis of catheter-related infections in newborns and molecular typing of isolated microorganisms,” BMC Infectious Diseases, vol. 14, no. 1, article no. 283, 2014.

V. Baselski and J. S. Klutts, “Quantitative cultures of bronchoscopically obtained specimens should be performed for optimal management of ventilator-associated pneumonia,” Journal of Clinical Microbiology, vol. 51, no. 3, pp. 740–744, 2013.

National Academies of Sciences, Engineering, and Medicine, Microbiomes of the built environment: a research agenda for indoor microbiology, human health, and buildings, National Academies Press, Washington, DC, USA, 2017.

S. Mernelius, S. Löfgren, P.-E. Lindgren, and A. Matussek, “The role of broth enrichment in Staphylococcus aureus cultivation and transmission from the throat to newborn infants: Results from the Swedish hygiene intervention and transmission of S. aureus study,” European Journal of Clinical Microbiology & Infectious Diseases, vol. 32, no. 12, pp. 1593–1598, 2013.

S. T. Tsang, M. P. McHugh, D. Guerendiain et al., “Underestimation of Staphylococcus aureus (MRSA and MSSA) carriage associated with standard culturing techniques,” Bone & Joint Research, vol. 7, no. 1, pp. 79–84, 2018.