Journal of Parasitology Research
Volume 2019 (2019), Article ID 8915314, 6 pages
https://doi.org/10.1155/2019/8915314

Research Article

Effect of Cellulase Enzyme Treatment on Cyst Wall Degradation of Acanthamoeba sp.

Tisha Lazuana,¹ Hendri Astuty,² and Ika Puspa Sari²

¹Master Program in Biomedical Sciences, Faculty of Medicine Universitas Indonesia, Indonesia
²Department of Parasitology, Faculty of Medicine Universitas Indonesia, Indonesia

Correspondence should be addressed to Ika Puspa Sari; ika.puspa@ui.ac.id

Received 26 November 2018; Revised 22 January 2019; Accepted 11 February 2019; Published 28 March 2019

Academic Editor: Kwang Poo Chang

Copyright © 2019 Tisha Lazuana et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Aim. The goal of this study is to know the potential of cellulase in the degradation of cyst wall Acanthamoeba sp. Methods. Sample of Acanthamoeba sp. obtained from isolate collection of Department of Parasitology FKUI of which two samples come from patient and one sample is from environment. All three samples were cultured using non-nutrient agar (NNA) media and identified by PCR and sequencing. The concentration of cellulase concentration used was 50 U, 100 U, 150 U, 200 U, 250 U, and 300 U with the incubation time used being 2 hours, 4 hours, 6 hours, 8 hours, and 24 hours. Furthermore, treatment results with the most optimum concentration and incubation time were observed by using SEM to see changes in the surface of the walls of the cyst. A cysticidal test was performed to determine the effectiveness cysticidal action of disinfectant solution, cellulase, and the combination of disinfectant solution and cellulase in killing Acanthamoeba sp. cyst assessed by their viability value. Results. The most optimal cellulase concentration in killing Acanthamoeba sp. cysts was 300 U with an incubation time of 24 hours. Percentage of viability of Acanthamoeba sp. which was exposed to a disinfectant solution for 24 hours was 95%, cellulase alone for 24 hours 75%, and the combination of cellulase and disinfectant solution for 24 hours 25%. Conclusions. Cellulase is capable of degrading Acanthamoeba sp. cyst wall. Optimal cellulase concentration in degrading Acanthamoeba sp. cyst wall is 300 U with an optimal incubation time being 24 hours. The addition of cellulase to the disinfectant solution has the potential to increase the effectiveness of the disinfectant solution because cellulase is capable of degrading the cyst wall allowing the disinfectant solution to enter and kill Acanthamoeba sp. cysts.

1. Introduction

Acanthamoeba sp. is one of free-living amoeba (FLA), which is an opportunistic pathogen widely spread in the environment [1]. According to 18s rRNA sequence, Acanthamoeba sp. genus can be divided into 20 genotypes, T1-T20 [2]. Recent studies showed that Acanthamoeba T4 genotypes are the main cause of Acanthamoeba keratitis (AK), a severe progressive corneal inflammation which can lead to blindness [3].

Acanthamoeba keratitis is often associated with contact lenses misuse [4]. According to the survey, complications towards contact lenses use have arisen with the increase of contact lenses user over time; around 4-10% of contact lens users underwent mild irritation to blindness [5]. Each year around 80.000 people suffer from eye disease due to contact lens use [6]. Contact lens users have increased by around 15% each year in Indonesia. However the keratitis occurrence was rarely reported, because of undistinguishable clinical manifestation between fungal and bacterial infection [7].

Studies were performed to evaluate the effectiveness of contact lens disinfectant solution on eliminating contaminant from bacteria or parasites. Siddiqui R et al. (2014) have shown that none out of 9 disinfectant solutions tested was effective in killing Acanthamoeba sp. cysts [8]. Similar result was brought by Padzik M et al. in the same year in Poland: none out of 4 disinfectant solutions tested has amoebicidal effect towards Acanthamoeba sp. [9]. In addition, Abjani F et al. (2016) discover that chlorhexidine alone or mixed with disinfectant solution was still ineffective in eliminating Acanthamoeba sp. cysts [10].

Acanthamoeba sp. cyst wall consists of ectocyst (laminar, fibrous outer layer) and endocyst (fibrillar layer) [11]. Ectocyst itself contains protein and complex polysaccharides, while endocyst contains cellulose, a polymer of glucose with β1⟶4 glycosidic bonds. Cellulase is an enzyme that can damage this glycosidic bond, which can be the target in eliminating Acanthamoeba sp. cyst [12].

Cellulose degradation is a potential therapy in targeting trophozoite wrapped by cyst wall effectively. Thus cellulase can damage the Acanthamoeba cyst wall [13]. The morphological change between normal cyst and cellulase treated cyst was observed with a fluorescent microscope and Scanning Electron Microscopy (SEM) method.

2. Method

Three samples used in this study were obtained from 2 patients Acanthamoeba keratitis (AK) and 1 sample from the environmental water in Department of Parasitology, Faculty of Medicine, University of Indonesia.

2.1. Culture and Identification

Acanthamoeba sp. from Department of Parasitology collection were regrown in pages-salt agar media and stored at 30°C for 14 days to form a cyst. Total cysts formed were counted with hemocytometer [10]. Acanthamoeba sp. DNA extraction was performed with Qiagen kit, followed by Polymerase Chain Reaction (PCR) targeted to 18s rRNA with primers JDP1 (5’GGCCCAGATCGTTTACCGTGAA-3’) and JDP2 (5’TCTCACAAGCTGCTAGGGGAGTCA-3’) to yield a 423-551 bp specific amplicon [14].

2.2. Cellulase Concentration Optimization

The cellulase used is commercial cellulase obtained from MP Biomedicals (Santa Ana, USA) and originating from Aspergillus niger. One unit (U) will liberate 1 μm of glucose from cellulose in one hour at pH 5. Cellulase enzyme preparation was carried out by dissolving the cellulase enzyme in acetate buffer with a pH of 4.5-5.5.

Six tubes were filled with 100μL of the sample with 5x10³ of total cysts in each tube. To each tube, cellulase was added with serial concentration as follows: 50U, 100U, 150U, 200U, 250U, and 300U, and then incubated in room temperature for 24h. Trypan blue 0.1% was added to the cysts for quantification with a hemocytometer.

2.3. Cellulase Incubation Time Optimization

Five tubes were prepared with 100μL of a sample containing 5x10³ of total cysts in each tube. Cellulase was added to each tube with the optimum concentration, followed by incubation for 2h, 4h, 6h, and 24h, respectively, to each tube. Remaining cysts were counted with hemocytometer Trypan blue in 0.1%.

2.4. Acanthamoeba sp. Cyst Morphological Examination with SEM

In this study, Scanning Electron Microscope used was JSM-6510LA. Morphological examination is done by dividing Acanthamoeba sp. into 2 tubes; one contains 300 U of cellulase. Samples were incubated for 24h, followed by morphological examination by SEM. To observe the sample with SEM, the sample was fixed with glutaraldehyde 2% in 0.1 M cacodylate buffer with pH between 6.8 and 7.4. The sample was centrifuged at 500 g for 2 minutes. Then the pellets were fixed again with 2% osmium tetroxide, dehydrated with ethanol and propylene oxide, filtered with a millipore filter (diameter 22 mm), dried for 24 hours, then stained with contrast uranyl acetate and citrate, and then observed under SEM.

2.5. Cellulase, Disinfectant Solution, and a Mixture of Cellulase and Disinfectant Solution Effectivity Assay

Effectivity assay was assessed to compare the cysticidal activity of cellulase, disinfectant solution, and a mixture of both in discarding Acanthamoeba sp. cyst. Three tubes were prepared with 100μL of a sample containing 5x10³ of total cysts. 100μL of cellulase 300U was added to the first and third tube, while 100μL of disinfectant solution was added to the second and third tube. Each tube was then incubated in room temperature for 24h. Surviving cysts were counted with hemocytometer in 0.1% Trypan blue. Acridine orange staining was also performed to evaluate the different cyst wall morphology among treatments.

3. Results

3.1. Cellulase Concentration and Incubation Time Optimization

Both samples from AK patients were identified as Acanthamoeba castellani T4 genotype, and sample from biosphere was identified as Acanthamoeba lenticulata T5 genotype. According to cellulase optimization step, Acanthamoeba castellani T4 was found to be the most pathogenic genotype. Optimal cellulase concentration to discard Acanthamoeba sp. was 300U with 24h of incubation time (Figures 1 and 2).

Figure 1: Cellulase concentration optimization.

Figure 2: Incubation time optimization.

Acanthamoeba sp. cyst morphological examination using SEM. Different morphological structure in cyst surface between control and 300U, 24h cellulase treated was shown in Figure 3. On the control sample, cyst surface was found to be granulated, while on the treated sample the cyst surface was discovered to be smooth and impaired.

Figure 3: A control sample (a) and treated sample with cellulase enzyme 300 U (b) after 24 hours incubation morphological structure in SEM examination.

Result of cellulase, disinfectant solution, and a mixture of cellulase and disinfectant solution effectivity assay. Killing effectivity was stipulated based on Acanthamoeba sp. viability after treatment. Disinfectant solution treatment showed intact cyst, with double layer cyst wall and perfectly round shape of cyst after 24h treatment. Cellulase treatment for 24h caused cysts shrinkage and dwindled cytoplasm. However cyst exterior still looked round. A mixture of cellulase and disinfectant solution 24h treatment lead to cysts shrinkage, reduced cytoplasm volume, and irregular wrinkled cysts (Figure 4).

Figure 4: Microscopic structure of Acanthamoeba cysts (40x10 magnification) after 24h incubation with a disinfectant solution (a), cellulase enzyme 300 U (b), and a mixture of cellulase 300 U and disinfectant solution (c).

Acanthamoeba sp. viability after 24h incubation with disinfectant solution, cellulase 300U, and a mixture of both is 95%, 75%, and 25%, respectively (Figure 5). Cellulase 300U addition to disinfectant solution was discovered to reduce the Acanthamoeba sp. cyst viability to 25%.

Figure 5: The viability of Acanthamoeba sp. after 24h incubation in a disinfectant solution, cellulase enzyme (300U), and a mixture of disinfectant solution and cellulase 300 U.

There was a morphological difference on cyst wall after treatment. Disinfectant solution treatment for 24h showed that the cyst still has its round shape and intact with normal cyst size (10-14μm) (Figure 6(a)). Cellulase 300U 24h treatment resulted in smaller cyst size (12μm) with imperfect round shape (Figure 6(b)). Meanwhile, mixture of cellulase 300U and disinfectant solution resulted in shrunk (8-11μm) and irregular cyst shape (Figure 6(c)).

Figure 6: Fluorescent Microscopic examination with acridine orange staining. Acanthamoeba sp. Incubated with disinfectant solution (a), cellulase 300 U (b), and a mixture of disinfectant solution and cellulase 300 U (c).

4. Discussion

Acanthamoeba keratitis (AK) is a corneal infection caused by a microscopical organism, a Free-Living Amoeba (FLA) known as Acanthamoeba, and normally found in the waterbody (lake, ocean, and river) as well as tap water, swimming pool, tub, soil, and air. Acanthamoeba has 20 genotypes identified so far which are T1-T20 [15]. T4 genotype is the most common and dominant among all genotypes. In addition, T4 genotype was reported as the most pathogenic genotype and most common to be found in AK disease among other genotypes [16].

In this study, we identified 2 samples from AK patients and 1 sample from the environment. All DNA samples were amplified with PCR technique, yielded a ~450 bp amplicon length, followed by gene sequencing to reveal its genotype. Sequencing result from B, W, and S samples showed 432bp, 433bp, and 424bp amplicon length, respectively. These sequences were compared to Acanthamoeba sp. sequence published in GeneBank to calculate the percentage of similarity through NCBI BLAST.

B and W samples which came from AK patients have 100% sequence similarity to Acanthamoeba castellani strain T4, and S sample obtained from the environment has 100% sequence similarity to Acanthamoeba lenticulata strain T5. This result is similar to the previous study which stated that Acanthamoeba T4 was the main cause of AK [17]. Conversely, it is not simply said that Acanthamoeba lenticulate T5 was incapable of causing AK. Spanakos G et al. in 2006 discovered the AK cases with Acanthamoeba lenticulata T5 as the main cause of this disease [18].

AK disease is often related to the contact lens utilization. Incorrect usage and upkeep become the main risk factor of AK [19]. Previous studies have shown that disinfectant solution with PHMB active ingredients was not effective in eliminating Acanthamoeba, especially in cyst stadium. Acanthamoeba cyst has 2 layers of cyst walls which is difficult for the disinfectant solution to penetrate [8]. Cellulose is the most abundant component in Acanthamoeba cyst wall. Cellulase addition has a high chance in degrading Acanthamoeba cyst wall and hence will allow the disinfectant solution to penetrate to the cyst [13].

In this research, optimum cellulase concentration to degrade Acanthamoeba cyst wall was gained by optimization. The sample used in this step was B sample, which was the Acanthamoeba T4 genotype, due to its pathogenicity, and the most common cause of AK. B sample was chosen over W sample because B sample contains more cysts than W sample. Total cyst used for cellulase concentration and incubation time optimization was 5 x 10³.

Series of concentration tested for optimization was 50U to 300U, incubated for 24h, with 5 x 10³ of total cyst in 100 μL. Results of concentration optimization are as follows: 0,75 x 10³, 1 x 10³, 1 x 10³, 1,5 x 10³, 1,5 x 10³, and 1,75 x 10³ cysts were eliminated in 50U, 100U, 150U, 200U, 250U, and 300U, respectively. Other than cellulase concentration, the incubation time was also determined in this research. Series of incubation time as follows: 2h, 4h, 6h, 8h, and 24h, was performed to discover the optimum incubation time. 24h was found to be the optimum incubation time as it eliminated 1,75 x 10³ of the cysts. These combined results showed that cellulase alone (300U) for 24h was still ineffective in banishing Acanthamoeba cyst. Only 1,75 x 10³ cysts were eliminated, out of 5 x 10³ of the total cysts.

Next step was to observe the Acanthamoeba morphological change after cellulase treatment. Untreated and 24h cellulase 300U-treated Acanthamoeba were noted and compared. SEM result revealed that untreated Acanthamoeba has granulated surface while cellulase-treated Acanthamoeba has smooth, degranulated, and impaired surface.

A further step was to determine the cysticidal capability of cellulase and disinfectant solution. Samples were incubated with cellulase, disinfectant solution, and a mixture of both for 24h. Results showed that 95%, 75%, and 25% of cyst were viable after incubation with disinfectant solution, cellulase, and a mixture of both, respectively. It was clear that a mixture of cellulase and disinfectant solution is more effective in eliminating Acanthamoeba cyst until 25% of viability.

Cyst morphology after cellulase; disinfectant solution; and a mixture of both cellulase and disinfectant solution-treatment was observed. Disinfectant solution treatment for 24h showed that the cyst morphology was similar to normal cyst: 10-14μm size and a round shape. Cellulase 300U for 24h treatment did reduce cyst size to 12μm and yield to irregular cyst shape, while a mixture of cellulase 300U and disinfectant solution treatment for 24h caused the cyst size reduction to 8-11μm and irregular cyst shape.

Acanthamoeba cyst was more susceptible to antiamoeba compared to trophozoite, due to a double layer of cyst wall in Acanthamoeba, mainly consisting of cellulose [20]. Hence, inhibition in cellulose synthesis may be potential in preventing Acanthamoeba encystation. In other words, cellulase may rise as a useful additional treatment in eliminating Acanthamoeba [21].

Cellulose was synthesized in certain organisms, including vascular plant, major algae, fungi, and certain bacterial species. Mammal, on the other hand, does not synthesize cellulose, thus bringing cellulase as a suitable antimicrobial candidate. Cellulose 2,6-bichlorobenzonitrile synthesis inhibitor was mentioned to be able to prevent Acanthamoeba encystation [22]. Targeting precursor in cellulose biosynthesis was also proven to be useful. Acanthamoeba stored glycogen as the building block of cellulose synthesis. Previous studies have shown that glycogen was drained along the encystation process, resulting in interference of glycogen phosphorylase mRNA expression and eventually blocking encystation process [23].

Neither disinfectant solution nor cellulase alone was effective in eliminating Acanthamoeba, as disinfectant solution alone could not penetrate the double cyst wall, and cellulase alone is not capable of inhibiting encystation but still depends on amoebicidal activity to banish Acanthamoeba. Cellulase and disinfectant solution together allowed the cellulase to degrade the cyst wall and disinfectant solution to target the trophozoite cell membrane. Overall, Acanthamoeba trophozoite is extremely sensitive to the disinfectant solution, as well as a mixture of cellulose and disinfectant, which has proven to eliminate both trophozoite and cysts. Although we still have to discover the toxicity effect of this new formulation on the host; however, this finding showed that the addition of cyst wall degrading molecule in disinfectant solution would increase the Acanthamoeba elimination effectivity [10].

This research is limited but unable to observe the morphological change on Acanthamoeba sp. cell component after treatment, due to inadequate equipment, where SEM was only able to observe the cell wall surface. Thus, this research was unable to further analyze the potency of cellulase and the effectivity of cellulase addition to the Acanthamoeba sp. disinfectant solution.

Data Availability

The data (study result such as figures) used to support the findings of this study are included in the article. Additional data are available from the corresponding author upon request.

Disclosure

An earlier version of this work was presented as an abstract at The 3rd International Conference of Medical and Health Sciences, 2018.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This work is supported by Hibah PITTA 2018 funded by DRPM Universitas Indonesia No.5000/UN2.R3.1/HKP.05.00/2018.

References

J. Nagington, P. G. Watson, T. J. Playfair, J. Mcgill, B. Jones, and A. D. M. Steele, “Amoebic infection of the eye,” The Lancet, vol. 304, no. 7896, pp. 1537–1540, 1974.

D. Corsaro, J. Walochnik, M. Köhsler, and M. B. Rott, “Acanthamoeba misidentification and multiple labels: redefining genotypes T16, T19, and T20 and proposal for Acanthamoeba micheli sp. nov. (genotype T19),” Parasitology Research, vol. 114, no. 7, pp. 2481–2490, 2015.

R. Dudley, S. Alsam, and N. A. Khan, “Cellulose biosynthesis pathway is a potential target in the improved treatment of Acanthamoeba keratitis,” Applied Microbiology and Biotechnology, vol. 75, no. 1, pp. 133–140, 2007.

C. M. Martín-Navarro, J. Lorenzo-Morales, M. G. Cabrera-Serra et al., “The potential pathogenicity of chlorhexidine-sensitive Acanthamoeba strains isolated from contact lens cases from asymptomatic individuals in Tenerife, Canary Islands, Spain,” Journal of Medical Microbiology, vol. 57, no. 11, pp. 1399–1404, 2008.

K. Griggs, “Contact Lenses Care,” Diunduh dari http://proquest.umi.com downloaded on 17 December 2016.

J. Beljan, K. Beljan, and Z. Beljan, “Complications caused by contact lens wearing,” Collegium Antropologicum, vol. 37, no. 1, pp. 179–187, 2013.

G. C. Booton, G. S. Visvesvara, T. J. Byers, D. J. Kelly, and P. A. Fuerst, “Identification and distribution of Acanthamoeba species genotypes associated with nonkeratitis infections,” Journal of Clinical Microbiology, vol. 43, no. 4, pp. 1689–1693, 2005.

R. Siddiqui, S. Lakhundi, and N. A. Khan, “Status of the effectiveness of contact lens solutions against keratitis-causing pathogens,” Contact Lens & Anterior Eye, vol. 38, no. 1, pp. 34–38, 2015.

M. Padzik, B. Starościak, J. P. Szaflik, A. Pietruczuk-Padzik, P. Siczek, and L. Chomicz, “Assessment of in vitro dynamics of pathogenic Acanthamoeba strains originating from contact lens wearers with infectious keratitis,” Annals of Parasitology, vol. 62, no. 4, pp. 331–336, 2016.

F. Abjani, N. A. Khan, F. A. Yousuf, and R. Siddiqui, “Targeting cyst wall is an effective strategy in improving the efficacy of marketed contact lens disinfecting solutions against Acanthamoeba castellanii cysts,” Contact Lens & Anterior Eye, vol. 39, no. 3, pp. 239–243, 2016.

L. Lemgruber, P. Lupetti, W. De Souza, R. C. Vommaro, and B. Da Rocha-Azevedo, “The fine structure of the Acanthamoeba polyphaga cyst wall,” FEMS Microbiology Letters, vol. 305, no. 2, pp. 170–176, 2010.

S. Lakhundi, N. A. Khan, and R. Siddiqui, “Inefficacy of marketed contact lens disinfection solutions against keratitis-causing Acanthamoeba castellanii belonging to the T4 genotype,” Experimental Parasitology emphasizes, vol. 141, no. 1, pp. 122–128, 2014.

S. Lakhundi, R. Siddiqui, and N. A. Khan, “Cellulose degradation: A therapeutic strategy in the improved treatment of Acanthamoeba infections,” Parasites & Vectors, vol. 8, no. 1, article no. 23, 2015.

J. M. Schroeder, G. C. Booton, J. Hay et al., “Use of subgenic 18S ribosomal DNA PCR and sequencing for genus and genotype identification of Acanthamoebae from humans with keratitis and from sewage sludge,” Journal of Clinical Microbiology, vol. 39, no. 5, pp. 1903–1911, 2001.

M. F. Landell, J. Salton, K. Caumo, L. Broetto, and M. B. Rott, “Isolation and genotyping of free-living environmental isolates of Acanthamoeba spp. from bromeliads in Southern Brazil,” Experimental Parasitology emphasizes, vol. 134, no. 3, pp. 290–294, 2013.

F. Arnalich-Montiel, B. Lumbreras-Fernańdez, C. M. Martín-Navarro et al., “Influence of Acanthamoeba genotype on clinical course and outcomes for patients with Acanthamoeba keratitis in Spain,” Journal of Clinical Microbiology, vol. 52, no. 4, pp. 1213–1216, 2014.

F. Marciano-Cabral and G. Cabral, “Acanthamoeba spp. as agents of disease in humans,” Clinical Microbiology Reviews, vol. 16, no. 2, pp. 273–307, 2003.

G. Spanakos, K. Tzanetou, D. Miltsakakis, E. Patsoula, E. Malamou-Lada, and N. C. Vakalis, “Genotyping of pathogenic Acanthamoebae isolated from clinical samples in Greece-report of a clinical isolate presenting T5 genotype,” Parasitology International, vol. 55, no. 2, pp. 147–149, 2006.

J. Lorenzo-Morales, C. M. Martín-Navarro, A. López-Arencibia, F. Arnalich-Montiel, J. E. Piñero, and B. Valladares, “Acanthamoeba keratitis: an emerging disease gathering importance worldwide?” Trends in Parasitology, vol. 29, no. 4, pp. 181–187, 2013.

J. L. Potter and R. A. Weisman, “Correlation of cellulose synthesis in vivo and in vitro during the encystment of Acanthamoeba,” Developmental Biology, vol. 28, no. 3, pp. 472–477, 1972.

J. L. Potter and R. A. Weisman, “Differentiation in acanthamoeba: β-glucan synthesis during encystment,” Biochimica et Biophysica Acta (BBA) - General Subjects, vol. 237, no. 1, pp. 65–74, 1971.

R. Dudley, A. Matin, S. Alsam, J. Sissons, A. H. Maghsood, and N. A. Khan, “Acanthamoeba isolates belonging to T1, T2, T3, T4 but not T7 encyst in response to increased osmolarity and cysts do not bind to human corneal epithelial cells,” Acta Tropica, vol. 95, no. 2, pp. 100–108, 2005.

M. J. Lorenzo, J. Kliescikova, C. E. Martinez et al., “Glycogen phosphorylase in Acanthamoeba spp.: Determining the role of the enzyme during the encystment process using RNA interference,” Eukaryotic Cell, vol. 7, no. 3, pp. 509–517, 2008.