Journal of Powder TechnologyVolume 2014 (2014), Article ID 980416, 6 pageshttp://dx.doi.org/10.1155/2014/980416

Research Article

Choking Affects the Operation Diagram of a CFB Riser

H. L. Zhang,¹ J. Degrève,¹ J. Baeyens,² and R. Dewil³

¹Department of Chemical Engineering, KU Leuven, De Croylaan 46, 3001 Heverlee, Belgium²School of Engineering, University of Warwick, Coventry CV4 7AL, UK³Process and Environmental Technology Laboratory, Department of Chemical Engineering, KU Leuven, 2880 Sint-Katelijne-Waver, Belgium

Received 30 October 2013; Revised 26 December 2013; Accepted 10 January 2014; Published 4 March 2014

Academic Editor: Jürgen Tomas

Copyright © 2014 H. L. Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Experiments in 3 different CFB risers have confirmed that common riser operations can be hampered in a well-defined (U, G) range where choking occurs. Geldart A-type powders were investigated. Experimental results of the choking velocity were empirically correlated, being about 30% lower than predicted by the correlation of Bi and Fan, but largely exceeding other predictions. Introducing the findings into the operation diagram presented by Mahmoudi et al. adds a region where stable riser operation is impossible. The adapted diagram enables CFB designers to better delineate the operating characteristics.

1. Introduction

CFBs are widely used in the chemical, mineral, environmental, and energy process industries. Several authors stressed the need for a clear identification of the different operation regimes in the riser of a CFB, to ensure a better comprehension of the hydrodynamic context and thus correctly design the loop. First approaches to develop a “work map” of the riser operation were presented by, for example, Grace [1], Yerushalmi and Avidan [2], and Bai et al. [3]. It was further developed by Chan et al. [4] and Mahmoudi et al. [5, 6] for both Geldart A- and B-type powders: the operating gas velocity () and the solids circulation flux () jointly delineate different regimes, called, respectively, dilute riser flow (DRF), core-annulus flow (CAF) (possibly with a turbulent fluidized bed at the bottom of the riser (TFBB)), and dense riser upflow (DRU). For a given powder and its associated transport velocity, , the combination of and will determine the flow regime encountered. Common riser operations can, however, be hampered in a specific range where choking occurs, being understood as the phenomenon where a small change in gas or solids flow rate prompts a significant change in the pressure drop and/or solids holdup: the stable riser upflow regime is no longer maintained when values exceed a certain limit for a low-to-moderate gas velocity. Considerable efforts have been made in probing choking in CFBs, and several empirical equations have been proposed, as summarized in the following.

Literature Correlations to Predict Choking Velocities, . The following equations were proposed.

Leung et al. [7]

Matsen [8]

Yousfi and Gau [9]

Bi and Fan [10]

The objective of the present research hence considered (i) the delineation of the choking phenomenon in different riser geometries and using different A-type powders, (ii) the comparison of experimental results with the empirical predictions of (1)–(4), and finally (iii) the adaptation of the proposed operation diagram of Mahmoudi et al. [5, 6] to include the region subject to choking.

2. Materials and Methods

The typical layout is illustrated in Figure 1, with essential dimensions given in the following.

Figure 1: The lab-scale CFBs with riser; cyclone; diverter valve; measuring bed; bag filter; slow bed;   -valve; metal gauge distributor; air from roots blower; (P) pressure tapping.

Three risers, built in transparent polyethylene to enable a visual observation of the solids flow, were used: 0.05, 0.1, and 0.15 m I.D., with respective heights of 2.5, 6.5, and 6.5 m. The exits of the risers are sharp (90°). The riser and all other parts of the CFB are electrically grounded. Filtered air from a compressor is fed both to the riser through a metal gauge distributor plate and to the recycle solids -valve. The air velocities are determined from rotameter readings. The riser exit air passes a high efficiency Stairmand cyclone, followed by a fabric filter. Filter dust is periodically returned to the unit. The cyclone apex discharges the collected solids in the recycle loop, comprising a “slow" fluidized bed, and a bypass measuring bed. The slow bed, constructed as a fluidized bed with a diameter in excess of the other parts of the loop, creates the required pressure build-up to compensate the pressure drop of riser and cyclone: the slow bed has a diameter of 0.15 m (0.05 m I.D. riser) and 0.29 m I.D. for both other risers. The height of the slow bed (fluidized at ~3    ) is between 0.4 and 0.9 m. The fluidizing air from the slow bed is vented to the fabric filter for dust removal. Solids from the cyclone discharge are periodically diverted for a given time to a measuring bed, where the solids circulation flux is measured from the collected volume (for a known Δt) and bulk density of solids. Measured solids are returned into the rig whilst being in operation. The -valves have respective diameters of 0.025 m (small riser) and 0.05 m (both larger risers). The -valve enters the column ~10 cm above the distributor. Pressure tappings (provided with glass wool plug to prevent ingress of powder into the measuring lines) are installed every 0.5 m up the riser height. s were measured by both water manometers and by solid state pressure transducer in the 0.1 and 0.15 m I.D. rigs (with converter and PC logging). Pressure gradients along the height of the riser were measured. Powders used in the experiments are listed in Table 1, with corresponding relevant characteristics. Average particle sizes were measured by laser diffraction analysis (Malvern). 90% of the particle size distribution was situated between the range specified in Table 1. Bulk and absolute densities were separately measured. The terminal velocity was calculated by the method established by Geldart [11]. The transport velocity, , was calculated from Zhang [12]:

Table 1: Powders used in the different rigs.

Powder
(µm)
(kg/m³)
90% range (µm)
Ar
(m/s)
(m/s)
Riser I.D. (m)

Rounded sand
74
2260
45–90
33
0.44
2.20
0.05

Angular sand
72
2660
35–95
36
0.41
1.73
0.1

Spent FCC
70
1630
45–100
20
0.24
1.69
0.1

Rounded sand
84
2260
35–110
48
0.46
2.56
0.1

Angular sand
98
2660
60–130
98
0.77
3.67
0.15

For a given solids flux, , the gas flow was progressively and gradually reduced from ~10 m/s. The initial increase in ΔP over the bottom section of the riser corresponds with forming a turbulent fluidized bed at the bottom of the riser (TFBB), however, with continued solids elutriation. At increased or reduced , it is followed by the collapse of the solids into a slugging state, with its characteristic -fluctuation frequency of 0.7–1 Hz [13]. A further decrease of the gas velocity at the given leads to the formation of a fixed bed, without further upward solids transport. At the given value of slugging, the corresponding gas velocity was selected as choking velocity, , in the present study. Gas velocities were varied between 2 and 10 m/s, for solids circulation fluxes between 10 and 260 kg/m²s.

3. Results and Discussion

Observed choking conditions are presented in Figure 2 with corresponding choking velocities, , at given solids circulation flux (G). Characteristics of powders and the dimensions of the risers they were tested in are given in Table 1. Clearly, (i) the particle size has a significant influence at higher values of G; and (ii) the choking velocity increases when increases. No pronounced effect of the riser I.D. (0.05–0.10 I.D. for sand of 70−84 μm) was noticed.

Figure 2: Experimental choking solids circulation flux, G, versus choking velocity (left of data points: choking; right: stable circulating bed). Characteristics of powders and rigs used are given in Table 1.

The comparison of experimental data and literature predictions (1)–(4) is illustrated in Figure 3 for the 84 μm rounded sand. For all powders, Leung et al. [7] and Matsen [8] underestimate . The Yousfi and Gau [9] prediction is fair at lower and/or values. This is also the case when using the Bi and Fan [10] equation: a fair prediction at low and/or is followed by an overestimation at increasing U values velocity, although the trend of the predictions is fairly parallel with the experimental measurements. This parallelism was further investigated in Figure 4 for all powders.

Figure 3: Illustration of the comparison of experimental data for 84 μm rounded sand, with predictions by different literature equations (1)–(4).

(a)

(b)

(c)

(d)

Figure 4: Comparison of (4)-predicted () values with experimental data.

In view of the overestimation by (4), especially at ≥ 2 m/s, experimental results were correlated with a slightly modified Bi and Fan equation, the only difference being the empirical coefficient: 14.6 in the case of the present study against 21.6 in the original equation. The resulting equation is given as The comparison of all experimental data, with (6), is illustrated in Figure 5(a).

(a)

(b)

Figure 5: (a) Comparison of (6)-predicted values with experimental data for (a) 70 μm FCC; (b) ■72 and 74 μm sand; (c) ●84 μm sand; (d) ▲98 μm sand. (b) Comparison of (6)-predicted values with experimental data from references of (a) ■Du and Fan; (b) ●Du et al.; (c) ▲Bai et al.

The literature data on choking conditions are scarce outside the experimental data that lead to the establishment of the empirical equations of (1)–(4). Additional data were extracted from graphs given in papers by Du and Fan [14], Du et al. [15], and Bai et al. [16]. A comparison of the extracted data and the prediction of (6) is illustrated in Figure 5(b). The prediction is seen to be fair, even beyond the range of our experimental values.

Having established a correlation for in terms of gas and solids properties, the “work” diagram of Mahmoudi et al. [5, 6] can be adapted, as illustrated in Figure 6. Clearly, the occurring choking regime is specifically important at high values of G and/or low values of . An inaccuracy of 0.2 m/s was indicated with respect to predictions from (5).

Figure 6: Operation of a CFB riser as versus (adapted from Mahmoudi et al. [5, 6]). Zone : Zone I: transition zone and/or inaccuracy in prediction; Zone : zone of choking; Zone II: dilute riser flow (DRF); Zone III: core-annulus flow (CAF) only; Zone IV: CAF with turbulent fluidized bed at the bottom (TFBB) of the riser; Zone V: dense riser upflow (DRU). —: transition DRF-CAF: , - - - - -: transition CAF-CAF with TFBB: ,   ........: transition CAF with TFBB-DRU: , and -.-.-.-: 84 μm sand: (6) predicted.

Both and the delineation curve separating zone from zone V should be calculated for the specific particle-gas system under scrutiny. For Zone V (DRU) operation, U values commonly exceed 10 m/s with G values in excess of 800 kg/m²s. This operation is certainly beyond the region where choking is likely to occur. Choking should be considered in the transition regime between Zones IV and V whenever lower excess gas velocities are selected.

The resulting operation diagram of a CFB riser better delineates operating characteristics. Choking does not affect the CAF operation mode but delays a stable DRU mode to higher velocities than predicted by . The use of equations from (1) to (4) will either overpredict (4) or underestimate (1)–(3) the excess gas velocity needed to avoid choking.

4. Conclusions

The choking velocity was measured for different powders in different riser geometries. Equation (6) predicts for a specific gas-solid system. The existence of a distinct choking region in the operation of the riser implies that a previously presented operation diagram is extended with an additional region, especially at low values of () and higher values of G, where choking will prevent a stable riser operation.

Abbreviations

: | Archimedes number,
| Solids circulation flux, [kg/m²s]
: | Average particle size of the powder, [m]
: | Pressure drop in the riser, [Pa]
: | Time, [s]
: | Superficial gas velocity in the riser, [m/s]
: | Minimum fluidization velocity and terminal particle velocity, respectively, [m/s]
: | Transport velocity (onset of fast fluidization) [m/s]
: | Choking velocity, [m/s]
: | Absolute particle density, [kg/m³]
: | Density of gas, [kg/m³]
: | Gravitational acceleration, [m/s²]
: | Viscosity of gas [kg/ms].

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

J. R. Grace, “High-velocity fluidized bed reactors,” Chemical Engineering Science, vol. 45, no. 8, pp. 1953–1966, 1990.

J. Yerushalmi and A. Avidan, “High velocity fluidization,” in Fluidization, J. F. Davidson, R. Clift, and D. Harrison, Eds., pp. 225–289, Academic Press, New York, NY, USA, 2nd edition, 1985.

D. Bai, E. Shibuya, Y. Masuda, K. Nishio, N. Nakagawa, and K. Kato, “Distinction between upward and downward flows in circulating fluidized beds,” Powder Technology, vol. 84, no. 1, pp. 75–81, 1995.

C. W. Chan, J. P. K. Seville, D. J. Parker, and J. Baeyens, “Particle velocities and their residence time distribution in the riser of a CFB,” Powder Technology, vol. 203, no. 2, pp. 187–197, 2010.

S. Mahmoudi, J. Baeyens, and J. Seville, “The solids flow in the CFB-riser quantified by single radioactive particle tracking,” Powder Technology, vol. 211, no. 1, pp. 135–143, 2011.

S. Mahmoudi, C. W. Chan, A. Brems, J. Seville, and J. Baeyens, “Solids flow diagram of a CFB riser using Geldart B-type powders,” Particuology, vol. 10, no. 1, pp. 51–61, 2012.

L. S. Leung, R. J. Wiles, and D. J. Nicklin, “Correlation for predicting choking flowrates in vertical pneumatic conveying,” Industrial and Engineering Chemistry Process Design and Development, vol. 10, no. 2, pp. 183–189, 1971.

J. M. Matsen, “Mechanisms of choking and entrainment,” Powder Technology, vol. 32, no. 1, pp. 21–33, 1982.

Y. Yousfi and G. Gau, “Aerodynamique de l'ecoulement vertical de suspensions concentrees gaz-solides—I. Regimes d'ecoulement et stabilite aerodynamique,” Chemical Engineering Science, vol. 29, no. 9, pp. 1939–1946, 1974.

H. T. Bi and L. S. Fan, “Regime transitions in gas-solid circulating fluidized beds,” in Proceedings of the AIChE Annual Meeting, pp. 17–22, AIChE, Los Angeles, Calif, USA, 1991.

D. Geldart, “Particle entrainment and carry-over,” in Gas Fluidization Technology, D. Geldart, Ed., pp. 123–153, John Wiley & Sons, New York, NY, USA, 1986.

H. L. Zhang, Powder circulation systems for heat storage [Ph.D. thesis], KU Leuven, 2013.

J. Baeyens and D. Geldart, “An investigation into slugging fluidized beds,” Chemical Engineering Science, vol. 29, no. 1, pp. 255–265, 1974.

B. Du and L. S. Fan, “Characteristics of choking behavior in circulating fluidized beds for group B particles,” Industrial and Engineering Chemistry Research, vol. 43, no. 18, pp. 5507–5520, 2004.

B. Du, W. Warsito, and L. Fan, “Imaging the choking transition in gas-solid risers using electrical capacitance tomography,” Industrial and Engineering Chemistry Research, vol. 45, no. 15, pp. 5384–5395, 2006.

D. Bai, A. S. Issangya, and J. R. Grace, “A novel method for determination of choking velocities,” Powder Technology, vol. 97, no. 1, pp. 59–62, 1998.