Journal of Renewable Energy
Volume 2016 (2016), Article ID 1964046, 1 page
http://dx.doi.org/10.1155/2016/1964046

Corrigendum

Corrigendum to “Propagation of Shock on NREL Phase VI Wind Turbine Airfoil under Compressible Flow”

Mohammad A. Hossain,1,2 Ziaul Huque,1,2 and Raghava R. Kommalapati2,3

¹Department of Mechanical Engineering, Prairie View A&M University, Prairie View, TX 77446, USA
²Center for Energy and Environmental Sustainability, Prairie View A&M University, Prairie View, TX 77446, USA
³Department of Civil and Environmental Engineering, Prairie View A&M University, Prairie View, TX 77446, USA

Received 7 March 2016; Accepted 7 March 2016

Copyright © 2016 Mohammad A. Hossain et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Propagation of Shock on NREL Phase VI Wind Turbine Airfoil under Compressible Flow,” [1] the name of the third author was incorrectly written as Raghava R. Kammalapati, while the correct name is Raghava R. Kommalapati. The correct author list is shown above.

References

M. A. Hossain, Z. Huque, and R. R. Kammalapati, “Propagation of shock on NREL phase VI wind turbine airfoil under compressible flow,” Journal of Renewable Energy, vol. 2013, Article ID 653103, 9 pages, 2013.