Journal of Solar EnergyVolume 2013 (2013), Article ID 632364, 10 pageshttp://dx.doi.org/10.1155/2013/632364

Review Article

Development of Solar Electricity Supply System in India: An Overview

Sandeep Kumar Gupta¹ and Raghubir Singh Anand²

¹Department of Industrial & Management Engineering, Indian Institute of Technology Kanpur, Kanpur 208016, India²Department of Electrical Engineering, Indian Institute of Technology Kanpur, Kanpur 208016, India

Received 26 January 2013; Revised 26 March 2013; Accepted 2 April 2013

Academic Editor: Paulo Fernandes

Copyright © 2013 Sandeep Kumar Gupta and Raghubir Singh Anand. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Solar electricity supply system has grown at very rapid pace in India during the last few years. A total of 1047.84 MW of grid connected photovoltaic projects and 160.8 MW of off-grid systems have been commissioned under different policy mechanisms between January 2010 and November 2012. It is observed that solar capacity development has achieved a greater height under state policies (689.81 MW) than others. A study is made in this paper of various national and state level schemes, incentives, packages, instruments, and different mechanisms to promote solar photovoltaics and its effectiveness.

1. Introduction

The changing lifestyle with rapid industrialization has made electricity an indispensable and essential commodity over the years. During the last few decades, increasing prices of electricity with increasing demand and decreasing fossil fuel reserves have raised many concerns for policy makers, investors, and customers. Moreover, existing supply chain also poses a challenge of carbon foot print due to its dependency on fossil fuels like coal and oil for electricity generation [1–3].

To alleviate the concern, policy makers across the world have been looking for some sustainable and feasible alternative input energy sources for electricity generation. They found many options like nuclear, wind, solar, hydro, biomass, tidal, geothermal, and so forth [3, 4]. However, literature supports solar energy as it is the most ready and green option available across the world [5]. The report published by Indian Meteorological Department (IMD), Ministry of Earth Sciences, Government of India (GoI) [6] states that

The solar energy received by the earth is more than 15,000 times the world’s commercial energy consumption and over 100 times the world’s known coal, gas and oil reserves. And this energy is readily available during the day for anyone to tap and that too free and without any constraint.

Initially used to supply electricity to satellites due to its high generation cost, solar technologies and its potential have improved enough to supply electricity not only to remote locations but also to supplement the national grid power at multimegawatt levels [7].

In India, wind- and solar-based systems have been getting good response under the conducive environment created through different policy measures. In this paper, our focus is only on the development of solar-based electricity supply systems. There are different kinds of support measures to promote grid connected and off-grid solar systems. We discuss these in detail in the subsequent sections.

2. India’s Potential for Solar Energy

India is located in the northern hemisphere, lying between latitudes 8°4′N and 37°6′N and longitudes 68°7′E and 97°25′E; the country is divided into almost two equal halves by the Tropic of Cancer (23°30′N). The southern half which coincides with peninsular India lies in the tropical zone, while the northern half belongs to the subtropical zone.

Due to its locational advantage, on average, the country experiences 250 to 300 sunny days per year and receives an average hourly radiation of 200 MW/km². The annual global radiation varies from 1600 to 2200 kWh/m² [6], which is typical of the tropical and subtropical regions. NREL recently released 10 km resolution solar resource maps for India based on the SUNY satellite. Figure 1 shows the annual average direct normal irradiance (DNI) across India, which illustrates that most areas of the country have greater than 5 kWh/m²/day of DNI. This image shows the areas of highest resource occurring in the state of Gujarat, Rajasthan, and the high-elevation Himalayan region. Figure 1 also shows large areas with annual average DNI greater than 5.5 kWh/m²/day in the state of Madhya Pradesh, Chhattisgarh, and Maharashtra and smaller land areas with similar resources in several other states. This area could be further increased by the use of building-integrated PV. Though large-scale CSP has not yet been deployed in India; one study has estimated that this technology alone could generate 11,000 TWh per year for India (Table 1). In addition, it also offers huge potential for decentralized distributed electricity supply system, which can address the problem of electricity to a remote location with less/lower transmission losses.

Table 1: India’s estimated land area suitable for CSP development and generation potential [28].

DNI class  (kWh/m²/year)
Land area suitable for CSP development (km²)
CSP generating potential (TWh/year)

2,000–2,099
83,522
7,893

2,100–2,199
11,510
1,140

2,200–2,299
5,310
550

2,300–2,399
7,169
774

2,400–2,499
3,783
426

2,500–2,599
107
13

2,600–2,699
976
119

2,700–2,800+
120
15

Total
112,497
10,930

Figure 1: India’s DNI resource at 10 km resolution (source: NREL [8]).

In spite of huge solar energy potential, the portfolio of RE has developed in a very unique way in India, though, lately introduced wind power technology has left behind all the traditional RE technologies such as biomass, solar power, and SHP as shown in Figure 2. It also demonstrates that solar power has the maximum untapped potential as 97.9% of estimated potential of 50000 MW. And the overall untapped potential of 81.3% seeks immediate attention of policy makers for exploiting this available RE resource in a very efficient and effective manner to overcome the problem of electricity shortage.

Figure 2: Development of overall RE portfolio as on 31st of August, 2012 (source: MNRE [9]).

3. Development of Solar Electricity System under Different Policy Measures in India

Government of India has recognized the importance of solar energy as one of the sustainable sources of energy under National Action Plan for Climate Change (NAPCC). NAPCC aims to derive 15% of its energy requirements from RE sources by the year 2020 [10]. Various policy measures, such as preferential tariff or fixed tariff or feed-in tariff (FiT), RPO, excise duty exemption, and soft loan, have been implemented to achieve the above-mentioned target.

RPO is one of the tools which have been implemented by many countries to achieve their ambitious RE goals [11, 12]. In India, state electricity regulatory commissions (SERCs) determine the obligated entities, which generally include distribution companies, captive consumers, and any open-access users. Then these SERCs fix a certain proportion of electricity consumption as RPO targets for the above-mentioned obligated entities. Due to significant cost difference in solar and nonsolar RE technologies [13], most of the states have come up with their separate targets for solar electricity, as shown in Table 2. As per the National Tariff Policy, it is envisaged that the targets for solar RPO shall be 0.25% by 2012-2013 extending to 3% by 2022 [14], but only the state of Bihar has followed it in its solar policy the way it is expected.

Table 2: State-wise solar RPO.

State
RPO (%)

FY 2012
FY 2013
FY 2014
FY 2015
FY 2016
FY 2017
FY 2018
FY 2019
FY 2020
FY 2021
FY 2022

Andhra Pradesh
0.25
0.25
0.25
0.25
0.25
0.25

Arunachal Pradesh
No regulation issued for RPO by the power department

Assam
0.10
0.15
0.20
0.25

Bihar
0.25
0.25
0.50
0.75
1.00
1.25
1.50
1.75
2.00
2.50
3.00

Chhattisgarh
0.25
0.50

Delhi
0.10
0.15
0.20
0.25
0.30
0.35

JERC (Goa and UT)
0.30
0.40

Gujarat
0.50
1.00

Haryana
0.00
0.05
0.75

Himachal Pradesh
0.01
0.25
0.25
0.25
0.25
0.25
0.50
0.75
1.00
2.00
3.00

Jammu and Kashmir
0.10
0.25

Jharkhand
0.50
1.00

Karnataka
0.25

Kerala
0.25
0.25
0.25
0.25
0.25
0.25
0.25
0.25
0.25
0.25
0.25

Madhya Pradesh
0.40
0.60
0.80
1.00

Maharashtra
0.25
0.25
0.50
0.50
0.50

Manipur
0.25
0.25

Mizoram
0.25
0.25

Meghalaya
0.30
0.40

Nagaland
0.25
0.25

Orissa
0.10
0.15
0.20
0.25
0.30

Punjab
0.03
0.07
0.13
0.19

Rajasthan
0.50
0.75
1.00

Sikkim
No regulation issued for RPO by the power department

Tamil Nadu
0.05

Tripura
0.10
0.10

Uttarakhand
0.03
0.05

Uttar Pradesh
0.50
1.00

West Bengal

0.25
0.30
0.40
0.50

Source: SERCs order on RPO regulations [29].

A study conducted by MNRE shows that most of the states could not install capacity of solar system as per their RPO compliance requirement for the year 2012-2013 as on 12th of November 2012 (Table 3). The states like Uttar Pradesh (422.7 MW), Haryana (172.2 MW), Maharashtra (151.3 MW), and so forth, are far away from their RPO target. However, states of Gujarat (488.3 MW), Rajasthan (82.3 MW), and Karnataka (61.1 MW) have already surpassed their RPO requirement. Other states like Madhya Pradesh, Orissa, Punjab, and Uttarakhand may soon exceed their targets.

Table 3: Expected solar RPO requirement and compliance for 2012-2013 [30].

State
Projected demand* (MU)
Solar RPO target (2012-2013)
Solar RPO target (2012-2013)
Capacity required for meeting solar RPO
Total capacity tied up as on 31.11.2012*
Installed capacity as on 31.11.2012
Gap to be fulfilled in 2012-2013

2012-2013
%
MU
MW
MW
MW
MW

Andhra Pradesh
98,956
0.25
247.39
148.6
75.5
23.75
73.1

Assam
6,810
0.15
10.21
6.1
5
—
1.14

Bihar
15,272
0.75
114.54
68.8
0
—
68.82

Chhattisgarh
21,174
0.50
105.87
63.6
29
4.00
34.61

Delhi
28,598
0.15
42.90
25.8
2.525
2.53
23.25

JERC (Goa and UT)
12,860
0.40
51.44
30.9
1.7
1.69
29.21

Gujarat
79,919
1.00
799.19
480.2
968.5
689.81
(488.3)

Haryana
40,167
0.75
301.25
181.0
8.8
7.80
172.2

Himachal Pradesh
8,647
0.25
21.62
13.0
0
—
13.0

Jammu and Kashmir
14,573
0.25
36.43
21.9
0
—
21.8

Jharkhand
6,696
1.00
66.96
40.2
36
16.00
4.2

Karnataka
65,152
0.25
162.88
97.9
159
14.00
(61.1)

Kerala
21,060
0.25
52.65
31.6
0.025
0.03
31.6

Madhya Pradesh
53,358
0.60
320.15
192.3
213.21
7.25
(20.9)

Maharashtra
150,987
0.25
377.47
226.8
75.5
21.00
151.3

Manipur
608
0.25
1.52
0.9
0
—
0.9

Mizoram
418
0.25
1.04
0.6
0
—
0.6

Meghalaya
2,154
0.40
8.62
5.2
0
—
5.2

Nagaland
596
0.25
1.49
0.9
0
—
0.9

Orissa
24,284
0.15
36.43
21.9
54
13.00
(32.1)

Punjab
48,089
0.07
33.66
20.2
51.825
9.33
(31.6)

Rajasthan
55,057
0.75
412.93
248.1
330.4
201.15
(82.3)

Tamil Nadu
91,441
0.05
45.72
27.5
18.105
17.05
9.4

Tripura
1,010
0.10
1.01
0.6
0
—
0.6

Uttarakhand
11,541
0.05
5.77
3.5
5.05
5.05
(1.6)

Uttar Pradesh
85,902
1.00
859.02
516.1
93.375
12.38
422.7

West Bengal
41,896
0.25
104.74
62.9
52.05
2.05
10.9

Total
2,537.2
2,179.59
1,047.84

Source: CEA base data for 2011-2012 and escalated for 2012-2013 based on 18th EPS escalation rates for the same period; *based on the data provided by NVVN, state agencies, and project developers. Italic numbers are the surplus capacity built-up.

However, when annual solar capacity requirement for RPO compliance is analyzed (Table 4), it is found that India would need ~34,000 MW of solar capacity to achieve the target of 3% contribution from solar electricity till 2022. It means that set RPO targets are not sufficient to have a solar energy dominant RE development scenario [15]. The policy makers expect to fill this gap with states’ solar energy promotion policies and programmes. Most of the states have come up with their solar energy specific policies which are discussed in detail in subsequent sections.

Table 4: Solar power capacity requirement by 2022 [31] and [15]#.

Year
Energy demand (MU)* ()
Solar RPO (%) ()
Solar energy requirement (MU) for RPO compliance ()
Solar capacity requirement for RPO compliance (MW)
Solar capacity requirement for solar dominant scenario (MW)#

2011-2012
953,919
0.25
2,385
1,433
514

2012-2013
1,022,287
0.25
2,556
1,536
2414

2013-2014
1,095,555
0.50
5,478
3,291
5414

2014-2015
1,174,074
0.75
8,806
5,291
8414

2015-2016
1,258,221
1.00
12,582
7,560
12414

2016-2017
1,348,399
1.25
16,855
10,127
17490

2017-2018
1,443,326
1.75
25,258
15,176
22490

2018-2019
1,544,936
2.25
34,761
20,885
28490

2019-2020
1,653,700
2.50
41,343
24,839
35490

2020-2021
1,770,120
2.75
48,678
29,247
—

2021-2022
1,894,736
3.00
56,842
34,152
—

Note: *based on the National Electricity Plan for Generation January 2012.

#Source: WISE, Pune [15].

As far as state-wise installation is concerned, Table 5 clearly demonstrates that states of Gujarat (65.83%) and Rajasthan (19.20%) have major share in total installed capacity (1047.87 MW). Other states like Andhra Pradesh (23.75 MW) and Maharashtra (21.00 MW) also have significant contribution. However, it is quite remarkable that out of 26 states 19 have shown their presence in the class of solar India in spite of relatively high generation cost (Table 5). It is expected that when cost will reduce with increasing capacity, states which have low or no capacity may contribute significantly.

Table 5: State-wise distribution of installed solar capacity as on 31st of November, 2012 [32].

Sr. no.
States
Installed capacity (MW)

JNNSM
State policy
RPSSGP/GBI scheme
REC
Other
Total
% of total

1
Andhra Pradesh
12.00
—
9.75
—
2.00
23.75
2.27

2
Arunachal Pradesh
—
—
—
—
0.03
0.03
0.00

3
Chhattisgarh
—
—
4.00
—
—
4.00
0.38

4
Delhi
—
—
—
—
2.53
2.53
0.24

5
Goa and UT
—
—
—
—
1.69
1.69
0.16

6
Gujarat
—
689.81
—
—
—
689.81
65.83

7
Haryana
—
—
7.80
—
—
7.80
0.74

8
Jharkhand
—
—
16.00
—
—
16.00
1.53

9
Karnataka
5.00
—
—
—
9.00
14.00
1.34

10
Kerala
—
—
—
—
0.03
0.03
0.00

11
Madhya Pradesh
—
—
5.25
2.00
—
7.25
0.69

12
Maharashtra
11.00
—
5.00
—
5.00
21.00
2.00

13
Orissa
5.00
—
7.00
—
1.00
13.00
1.24

14
Punjab
2.00
—
6.00
—
1.33
9.33
0.89

15
Rajasthan
137.50
—
10.00
2.75
50.90
201.15
19.20

16
Tamil Nadu
5.00
—
5.00
—
7.05
17.05
1.63

17
Uttarakhand
—
—
5.00
—
0.05
5.05
0.48

18
Uttar Pradesh
5.00
—
7.00
—
0.38
12.38
1.18

19
West Bengal
—
—
—
—
2.05
2.05
0.20

Total
182.50
689.81
87.80
4.75
83.01
1047.87

Moreover, Table 6 shows that the installed capacity (1047.87 MW) under various policy measures is dominated by state policies (65.83%) which is in particular the success mantra of state of Gujarat (689.81 MW). The peculiarity of theses installation scenarios should be taken into account while devising the policy for future.

Table 6: Policy-wise distribution of installed solar capacity as on 31st of November, 2012 [32].

Projects
Capacity (MW)
% of total

Projects under JNNSM
182.5
17.42

Projects under the state policy
689.81
65.83

Projects under RPSSGP/GBI scheme
87.8
8.38

Projects under REC scheme
4.75
0.45

Other projects
83.01
7.92

Total
1047.87

3.1. Development under JNNSM

To achieve the long-term goal of NAPCC, Jawaharlal Nehru National Solar Mission (JNNSM) was launched on 11th January, 2010, with an objective to maximize generation of power from solar energy. Thus, it also constitutes a major contribution by India to the global effort to meet the challenges of climate change. The immediate aim of the mission is to focus on setting up an enabling environment for solar technology penetration in the country both at a centralized and decentralized level [16].

Table 7 shows JNNSM’s targets with time line. The first phase (up to March 2013) focuses on promoting off-grid systems including hybrid systems to serve the population which is located in remote areas. For the first phase modest targets were set under the expectation that this development would bring down costs under enabling framework and support for entrepreneurs to develop markets. This cost reduction would help in creating conducive environment to achieve the ambitious targets of the second phase (2013–17) and third phase (2017–2022).

Table 7: JNNSM targets with timeline [16].

2010–2013
2013–2017
2017–2022

Utility grid power including roof top (MW)
1000–2000
4000–10000
20000

Off-grid solar applications (MW)
200
1000
2000

Solar collectors (sq. m)
7 million
15 million
20 million

To attract the investors, JNNSM devises various incentive instruments such as RE Voucher/Stamp, Capital Subsidy, Interest Subsidy, Viability Gap Funding (VGF), and Green Energy Bonds. However, the capacity built is only 182.5 MW which is concentrated around few states like Rajasthan (137.5 MW), Andhra Pradesh (12 MW), Maharashtra (11 MW), and so forth (refer: Table 5) under first phase (as on 31st of November, 2012). This seeks immediate attention of policy makers for reviewing their implementation strategy.

Recently announced JNNSM second phase policy mandate [17] includes the learning from the initial setback. It gives more weightage to state scheme (5400 MW) than central scheme (3600 MW) for target capacity installation (Table 8). It also focuses more on VGF for incentivizing the projects.

Table 8: Technology-wise capacity targets under JNNSM Phase II (MW) [17].

Segment
Share (%)
Capacity
Central scheme
State scheme

Solar PV
70
6300
2520
3780

Solar thermal
30
2700
1080
1620

Total

10000
3600
5400

To make the efforts more concentrated and specific, in a recent initiative, MNRE has given approval to the development of 54 solar cities [18]. As of now (January 21, 2013), 8 master plans have been approved for eight cities—Agra and Moradabad from Uttar Pradesh; Thane and Kalyan-Dombivli from Maharashtra; Indore from Madhya Pradesh; Kohima from Nagaland; and Aizawl from Mizoram and Chandigarh [18]. Thus by reducing scale, MNRE expects better solar capacity development in the near future.

3.2. Development under REC

The REC mechanism is a market-based instrument to promote renewable sources of energy and development of market in electricity, leading to the sustainable development of the country. REC mechanism has been designed to address the mismatch between availability of renewable electricity and the requirement of the obligated entities to meet their RPO by purchasing green attributes of RE remotely located in the form of REC. The implementation issues as well as institutional framework for India have been discussed in detail by Singh [19, 20] and MNRE [21]. Goyal and Jha [22] discussed in detail the framework to promote RE through a framework which puts into place Renewable Purchase Obligation (RPO) mechanism.

In India, RECs trading began in March 2011, on the platform of Indian Energy Exchange (IEX) and Power Exchange of India (PXI). Though during initial period it could not perform as per expectation, but the performance has been improving during the last few months, as shown in Table 10. But still due to large unmet demand, solar REC price has been hovering around the forbearance price (Table 9) of Rs. 13400/REC. However, a recent notification by MNRE [23] which clarified state agencies for allowing use of solar REC to nonsolar RPO if it is above its minimum prescribed limit may increase the liquidity of solar REC market which is expected to decrease the price of it.

Table 9: Floor and forbearance prices for RECs (Rs.²/REC)*.

REC prices till 2011
REC prices for 2012–2015

Forbearance price
17000
13400

Floor price
12000
9300

1 REC = 1 MWh.

21 USD = INR 54.5 as of September 20, 2012.

Table 10: Solar REC trading details from IEX [33].

Year
Month
Buy bids (REC)
Sell bids (REC)
Cleared volume (REC)
Cleared price (Rs/REC)
No. of participants

February
11
—
—
—
1

March
30,001
—
—
—
3

April
—
—
—
—
—

May
—
—
—
—
—

June
—
—
—
—
—

2011
July
—
—
—
—
—

August
1
—
—
—
1

September
7
—
—
—
4

October
1
—
—
—
1

November
43
—
—
—
2

December
495
—
—
—
—

January
2,635
—
—
—
10

February
582
—
—
—
9

March
5,782
—
—
—
26

April
289
—
—
—
9

May
1,637
149
5
13,000
16

2012
June
9,489
541
336
12,750
17

July
8,554
419
93
12,800
11

August
1,728
310
129
12,850
13

September
1,317
1,094
735
12,500
23

October
1,263
864
820
12,680
19

November
1,458
758
733
12,720
21

December
1,608
977
931
12,620
36

Though the capacity installed under this mechanism is only 4.75 MW (Table 6), but capacity registered under this mechanism has reached close to 20 MW [24]. And the present high price of REC holds bright prospects for this newly launched incentive scheme.

3.3. Development under RPSSGP/GBI Scheme

Rooftop Photovoltaic (PV) and Small Solar Power Generation Programme (RPSSGP) is a Generation-Based Incentives (GBIs) programme of the Ministry of New and Renewable Energy (MNRE) under the JNNSM for rooftop and other small solar plants. As of now, the installed capacity of 87.8 MW, which is well distributed across many states (Table 5), has been developed under this scheme. Due to limited access to smart grid/net metering connectivity, this incentive has not yet been harnessed to its fullest by the developers.

3.4. Development under the State Policy

Most of the states have been using preferential tariffs as a tool to promote solar energy in their states (Table 11). But, due to huge financial burden, states of Gujarat and Andhra Pradesh have switched their focus from preferential tariff to REC market in their recently announced solar policies [25, 26]. Moreover, state of Gujarat has also made provision for sharing Clean Development Mechanism (CDM) benefits to developers, starting from 100% in first year after commissioning, and thereafter reducing it by 10% every year till the sharing becomes equal (50 : 50) between the developers and the consumers [25].

Table 11: Compilation of recently declared preferential tariffs for solar PV and solar thermal technologies [27].

State/centre
Solar PV
Solar thermal

Tariff (Rs/kWh)
Control period
Tariff (Rs/kWh)
Control period

CERC
Lev-10.39 AD-1.04 After AD-9.35
FY 2012-2013
Lev-12.46 AD-1.24 After AD-11.22
FY 2012-2013

Andhra Pradesh
17.91 (without AD) 14.95 (with AD)
2010-2011 and 2011-2012
15.31 (without AD) 12.85 (with AD)
2010-2011 and 2012-2013

Bihar
10.9 (without AD) 09.85 (with AD)
Up to March 31, 2015 commissioning
13.11 (without AD) 11.87 (with AD)
Up to March 31, 2015 commissioning

Gujarat
For MW scale plants:  Jan 2012–March 2013: 10.37 (without AD), 09.28 (with AD), FY 2013-2014: 9.64 (without AD), 8.63 (with AD), FY 2014-2015: 8.97 (without AD), 8.03 (with AD) For kW scale plants  Jan 2012–March 2013: 12.44 (without AD), 11.14 (with AD), FY 2013-2014: 11.57 (without AD), 10.36 (with AD), FY 2014-2015: 10.76 (without AD), 9.63 (with AD)
Jan 29, 2012 to March 31, 2015
12.91 (without AD) 11.55 (with AD)
Jan 29, 2012 to March 31, 2015

Haryana
9.18 (SPV crystalline) 8.90 (SPV thin film)
3 years (till FY 2013–FY 2015)
12.17
3 years (till FY 2013–FY 2015)

Karnataka
14.5 (including rooftop and small solar PV plants)
Up to March 31, 2013 commissioning
11.35
Up to March 31, 2013 commissioning

Kerala
15.18 (including incentives)
For projects commissioned before Dec. 31, 2009

Madhya Pradesh
10.44 (capacity > 2 MW), 10.70 (capacity up to 2 MW)
Aug 2012 to March 2014
12.65
Aug 2012 to March 2014

Maharashtra
Lev-11.16 (11.66-RT and SSPGP) AD-1.65 (1.65) After AD-9.51 (10.01)
FY 2010–2014 (5 years from the date of commencement)
Lev-13.44 AD-1.97 After AD-11.47
FY 2010–2014 (5 years from the date of commencement)

Orissa
Lev-17.80 AD-3.03 After AD-14.77
Plant commissioned in FY (2012-2013) onwards
Lev-14.73 AD-2.41 After AD-12.32
Plant commissioned in FY (2012-2013) onwards

Punjab
Lev-10.39 AD-1.04 After AD-9.35
FY 2012–2016 (5 years from the notification of order)
Lev-12.46 AD-1.24 After AD-11.22
FY 2012–2016

Rajasthan
9.63 (plant commissioned by 31st of March 2014) with AD-10.45 9.63 (roof top and SSPG commissioned by 31st March 2014)

11.95 (without AD) With AD-10.45 11.95 (small solar thermal power gen commissioned by 31st of March 2015)
FY 2012-2013

Tamil Nadu
Lev-18.45 AD-4.11 After AD-14.34
FY 2010-2011 (till 31/05/12)
Lev-15.51 AD-3.35 After AD-12.16
FY 2010-2011 (till 31/05/12)

Uttarakhand
Lev-17.70 AD-1.65 After AD-16.05
FY 2009–2012 (3 years from the commencement of these regulations)
Lev-12.95 AD-1.15 After AD-11.80
FY 2009–2012 (3 years from the commencement of these regulations)

Uttar Pradesh
15 (commissioned by Dec 2011, not covered under GOI incentive scheme)
FY 2010–2014 (5 years)
13 (commissioned by Dec 2011, not covered under GOI incentive scheme)
FY 2010–2014 (5 years)

West Bengal
10 (capacity ranging 100 KW to 2 MW availing GBI) 10 (grid connected plant not eligible for any incentive and commissioned up to 2012-2013) 10 (projects commissioned after FY 2012 till FY 2015)
FY 2013–2017 (5 years)
NA
NA

Likewise several states have also come up with many other encouraging policies like Accelerated Depreciation (AD) on capital investment, soft loan for financing, reduced or no transmission and wheeling charges, no cross subsidy surcharge for open-access transactions, reduced or no intra-state Availability-Based Tariff (ABT), nonapplicability of merit order dispatch principles, exemption from electricity tax, tax concessions, refund of stamp duty and registration charges paid for land purchase, single window clearance, faster power evacuation approval, and so forth [25–27].

4. Conclusion

The study concludes that though JNNSM first phase could not perform up to the expectations, the state level policies have been doing well to fill the gap. The recently announced JNNSM Phase II target composition of 3600 MW for central and 5400 MW for states, changes in policies and schemes in light of the experience of Phase I, and development of 54 solar cities are likely to impact the National Solar Mission performance and enhance the overall visibility of solar-based electricity generation and utilization.

Abbreviations

CDM: | Clean development mechanism
CSP: | Concentrated solar power
DNI: | Direct normal irradiance
FiT: | Feed-in tariff
GBIs: | Generation-based incentives
GoI: | Government of India
IEX: | Indian energy exchange
IMD: | Indian meteorological department
JNNSM: | Jawaharlal Nehru national solar mission
MNRE: | Ministry of new and renewable energy
NAPCC: | National action plan for climate change
NREL: | National renewable energy laboratory
PV: | Photovoltaic
PXI: | Power exchange of India
RE: | Renewable energy
REC: | Renewable energy certificate
RPO: | Renewable purchase obligation
RPSSGP: | Rooftop photovoltaic and small solar power generation programme
SERC: | State electricity regulatory commission
SHP: | Small hydropower
VGF: | Viability gap funding.

References

IEA, World Energy Outlook, International Energy Agency, Paris, France, 2011.

GEA, Global Energy Assessment: Toward a Sustainable Future, Cambridge University Press, Cambridge, UK, 2012.

REN21, “Renewables 2012,” Global Status Report, REN21 Secretariat, Paris, France, 2012.

IPCC, “Special Report on Renewable Energy Sources and Climate Change Mitigation,” Cambridge University Press, Cambridge, UK, 2007

IEA, Energy Technology Perspectives, International Energy Agency, Paris, France, 2008.

“Solar radiant Energy over India,” India Meteorological Department, Ministry of Earth Sciences, Government of India, 2009

M. Pipattanasomporn, A study of remote area internet access with embedded power generation [Ph.D. thesis], Virginia Polytechnic Institute and State University, Alexandria, VA, USA, 2004.

NREL, http://www.nrel.gov/international/ra_india.html, 2010

http://mnre.gov.in, 2012

GOI, “National Action Plan on Climate Change,” Prime Minister's Council on Climate Change, Government of India (GOI), New Delhi, India, 2008, http://www.forumofregulators.gov.in/Data/study/TOR_Incentive%20structure%20for%20fulfillment%20of%20RPO.pdf

M. Ringel, “Fostering the use of renewable energies in the European Union: the race between feed-in tariffs and green certificates,” Renewable Energy, vol. 31, no. 1, pp. 1–17, 2006.

P. Menanteau, D. Finon, and M. L. Lamy, “Prices versus quantities: choosing policies for promoting the development of renewable energy,” Energy Policy, vol. 31, no. 8, pp. 799–812, 2003.

Global Trends in Renewable Energy Investment, Frankfurt School—UNEP Collaborating Centre for Climate & Sustainable Energy Finance, 2012.

http://www.mnre.gov.in/information/solar-rpo/, 2013

WISE, “Achieving 12% green electricity by 2017,” Tech. Rep., World Institute of Sustainable Energy, Pune, India, 2010.

MNRE, Jawaharlal Nehru National Solar Mission (JNNSM), Ministry of New and Renewable Energy (MNRE), Government of India, New Delhi, India, 2010, http://www.mnre.gov.in/file-manager/UserFiles/mission_document_JNNSM.pdf

http://mnre.gov.in/file-manager/UserFiles/draft-jnnsmpd-2.pdf, 2013

http://www.pv-magazine.com/news/details/beitrag/india-identifies-54-solar-cities-releases-jnnsm-figures_100009617/#axzz2J5UVafsH, 2013

A. Singh, “Economics, regulation and implementation strategy for renewable energy certificates in India,” India Infrastructure Report, Infrastructure Development in a Low Carbon Economy, Oxford University Press, New Delhi, India, 2010.

A. Singh, “A market for renewable energy credits in the Indian power sector,” Renewable and Sustainable Energy Reviews, vol. 13, no. 3, pp. 643–652, 2009.

MNRE, “Report on development of conceptual framework for renewable energy certificate mechanism for India,” Tech. Rep., Ministry of New and Renewable Energy (MNRE), New Delhi, India, 2009, Prepared by ABPS Infrastructure Advisory Private Limited.

M. Goyal and R. Jha, “Introduction of renewable energy certificate in the Indian scenario,” Renewable and Sustainable Energy Reviews, vol. 13, no. 6-7, pp. 1395–1405, 2009.

MNRE, MNRE, Government of India (GoI), New Delhi, India, http://mnre.gov.in/file-manager/UserFiles/solar-rpo.pdf, 2012

http://mnre.gov.in/file-manager/UserFiles/september_month_2012_rerf.pdf, 2013

http://geda.gujarat.gov.in/policy_files/GERC%20order%20Solar%20Energy.pdf, 2012

http://bridgetoindia.com/archive/policy/Andhra-Pradesh-Solar-Policy-2012-Abstract.pdf, 2013

http://mnre.gov.in/information/renewable-energy-regulatory-framework, 2013

http://www.dlr.de/tt/desktopdefault.aspx/tabid-2893/httpstatus-404/, 2011

MNRE, MNRE, Government of India (GoI), New Delhi, India, http://mnre.gov.in/file-manager/UserFiles/Solar%20RPO/state-wise-solar-RPO-targets.pdf, 2012

http://www.mnre.gov.in/file-manager/UserFiles/mission_document_JNNSM.pdf, 2013

http://mnre.gov.in/file-manager/UserFiles/Solar%20RPO/solar-RPO-requirement-by-2022.pdf, 2013

http://mnre.gov.in/file-manager/UserFiles/Solar%20RPO/State%20-%20wise%20solar%20installed%20capacity%20break-up.xlsx, 2013

http://www.iexindia.com/Reports/RECData.aspx, 2013