Journal of Spectroscopy

Volume 2013 (2013), Article ID 878234, 7 pages

http://dx.doi.org/10.1155/2013/878234

Research Article

Recognition Preference of Rhodamine Derivative Bearing Phthalimido Gly for by UV-Vis and Fluorescence Spectroscopy

Fanyong Yan, Meng Wang, Donglei Cao, Ning Yang, Bin Ma, and Li Chen

State Key Laboratory of Hollow Fiber Membrane Materials and Processes, Key Lab of Fiber Modification & Functional Fiber of Tianjin, Tianjin Polytechnic University, Tianjin 300387, China

Received 30 June 2012; Accepted 26 August 2012

Academic Editor: María Carmen Yebra-Biurrun

Copyright © 2013 Fanyong Yan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

An effective Hg²⁺-specific probe 1 was designed and prepared based on Phthalimido Gly modified rhodamine B. The sensing behavior of probe 1 was studied by UV-Vis and fluorescence spectroscopy. Probe 1 showed excellent high selectivity and sensitivity towards Hg²⁺ over commonly coexistent metal ions in neutral solution, which could be attributed to the Hg²⁺-triggered ring opening of the spirolactam of the rhodamine moiety and the formation of a 1 : 1 1-Hg²⁺ complex. The limit of detection (LOD) based on was calculated to be 2.8 × 10⁻⁸ M, as well as an excellent linear relationship with the concentration of Hg²⁺ in the range from 0.1 × 10⁻⁶ to 1.0 × 10⁻⁶ mol/L (). In addition, the effects of pH, coexisting metal ions, and the reversibility were investigated in detail.

1. Introduction

The design and development of fluorescent chemosensors for detection of environmentally and biologically important metal cations (such as , , and ) are currently of significant importance [1–5]. More specifically, sensors directed toward the detection and measurement trace amounts of mercury ions which have enjoyed particular attention. The ion is considered highly dangerous because both elemental and ionic mercury can be converted into methyl mercuries by bacteria in the environment, which subsequently bioaccumulates through the food chain. Moreover, the extreme toxicity of mercury and its derivatives result from its high affinity for thiol groups in proteins and enzymes, leading to the dysfunction of cells and consequently causing health problems [6–8]. Current techniques for screening, fluorescence chemosensors offer a nondestructive and prompt detection of by a simple fluorescence enhancement (turn-on) or quenching (turn-off) response in biological, toxicological, and environmental monitoring, due to its simplicity and distinct advantages in sensitivity and selectivity to recognition of [9–14].

Among numerous chemosensors, Rhodamine B and its derivatives are a kind of excellent candidate for the construction of an off/on-type fluorescent chemosensor and well known for their desirable properties, including excellent spectroscopic properties, high extinction coefficient (>75,000 cm−1 M⁻¹), high fluorescence quantum yield, long absorption and emission wavelength elongated to the visible region [15–18]. The mechanism is based on the switch “off-on” of the spirocyclic moiety mediated by guest. On binding guest to the receptor, the spirocyclic form of rhodamine B which is colorless and nonfluorescent, whereas ring opening of the corresponding spirolactam induced by metal ions gives rise to strong fluorescence emission and a pink color [19–22].

Consequently, the design and development of fluorescent chemosensors for monitoring the level of in environmental and biological samples have attracted a great deal of attention. Herein, we introduced a rhodamine B derivative (probe 1) bearing Phthalimido Gly group. In our condition, probe 1 exhibited prominent absorption and fluorescence enhancements to Hg²⁺ ions with a particular selectivity and excellent sensitivity and could be used for naked-eye detection.

2. Experimental Section

2.1. Materials and Instrumentation

All solvents and reagents were purchased from commercial sources and used as received without further purification. Solutions of metal ions were prepared with metal nitrate salts. Doubly-distilled water was used for all experiments. UV-Vis spectra were obtained on a Purkinje General TU-1901 UV/Vis spectrometer. The fluorescence spectra were recorded on a Hitachi F-4500 spectrofluorimeter with a quartz cuvette (path length, 1 cm). IR data were taken in KBr disks on TENSOR37 Fourier-transform infrared spectrometer. NMR spectra were recorded on a Bruker 300 MHz spectrometer with TMS as an internal standard and CDCl₃ as solvent.

The stock solution of 1 (2.0 mmol/L) was prepared by dissolving the requisite amount of it in methanol. Standard test solutions were prepared by appropriate dilution of the stock solution. A solution of the nitrate salts of the respective ions , , , , , , , , , , , , was used to evaluate the metal ion binding properties of 1 (1.0 × 10−5 M) in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES, pH = 7.0. The solution was allowed to stand for 10 min at room temperature (25°C) before the absorption/fluorescence measurement was made. For fluorescence measurements, excitation was provided at 556 nm, and emission was collected from 450 to 700 nm. The excitation and emission slit widths were 5 nm and 10 nm.

2.2. Determination of Binding Constants

The binding constant was calculated from the absorption intensity titration curves according to Benesi-Hildebrand equation as follows [23]:

where and represent the absorbance of 1 in the presence and absence of , respectively, is the saturated absorbance of 1 in the presence of excess amount of ; [c] is the concentration of ion added (mol/L).

2.3. Synthesis of Probe 1

(See Scheme 1). RhE was synthesized from rhodamine B by reaction with ethylenediamine in ethanol following a published procedure in a yield of 70% [24]. 1 was prepared by one-step of rhodamine ethylenediamine with Phthalimido Gly chloride at 0–5°C. Briefly, rhodamine ethylenediamine (1.88 g, 4 mmol) was dissolved in 20 mL dichloromethane in a 100 mL flask. An excess of triethylamine was added and 15 mL dichloromethane solution of PhthalimidoGlychloride (0.89 g, 4 mmol) was added to this solution. The reaction mixture was stirred 2 h at 0–5°C. After drying under reduced pressure, and pale yellow solid was observed. The target compound was further purified by column chromatography with CH₃OH/CH₂Cl₂ (1 : 5 v : v) to give 1.5 g of 1 in 78% yield. ¹H NMR (CDC, 300 MHz): (dd, 2H), 7.80 (dd, 2H), 7.39–7.49 (m, 3H), 7.07 (dd, 1H), 6.30–6.37 (m, 6H), 4.29 (s, 2H), 3.29–3.34 (m, 12H), 1.16 (t, 12H). ¹³C NMR (CDCl₃, 75 MHz): , 167.87, 166.16, 153.79, 153.17, 148.96, 133.96, 132.84, 132.55, 130.11, 128.43, 128.04, 123.86, 123.47, 122.68, 108.46, 104.49, 97.74, 65.67, 44.38, 41.55, 40.76, 39.29, 12.57. IR (KBr, ν/cm⁻¹): 3396, 3001, 2863, 1632, 1613, 1546, 1221, 1117, 996.

Scheme 1: Synthetic routes of the probe 1.

3. Results and Discussion

3.1. UV-Vis Spectral Characteristics

Like most of the spirocycle rhodamine B derivatives, due to its spirolactam form, the absorption spectra of free 1 (1.0 × 10⁻⁵ M) remained colorless and exhibited very weak absorbance from 450 to 650 nm and found to be very stable in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES pH = 7.0 solution system for more than one week. Upon incremental addition of (0–2.0 × 10⁻⁵ M) to probe 1 solution (1.0 × 10⁻⁵ M), the peak around 561 nm was formed and its intensity increased gradually with increasing concentrations (Figure 1), suggesting the formation of the ring-opened form of 1. Moreover, the titration solution exhibited an obvious and visual color change from colorless to pink, which could be easily detected by the “naked-eye” (Figure 1, inset (a)).

Figure 1: UV-vis absorption spectra of probe 1 (10.0 M) in the presence of (0–2 equiv.) in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES solution at room temperature. Inset: (a) showing the change in the color of 1 (10 μM) upon addition of ions (2 equiv.); (b) Job’s plot for determining the stoichiometry of probe 1 and ion by absorbance at 561 nm, the total concentration of [] + [1] was 10 μM.

For further determination the stoichiometry between and 1, Job’s plot analyses were also used. According to the continuous variations with a total concentration of [] + [1] as 1.0 × 10⁻⁵ M. (Figure 1, inset (b)). When the molar fraction of Hg²⁺ was 0.5, the absorbance exhibited a maximum, which demonstrates the 1 : 1 complex between 1 and Hg²⁺.

When assuming a 1 : 1 stoichiometry for the probe 1- complexation, the association constant () of the probe 1 with Hg²⁺ was determined using the Benesi-Hildebrand equation. Plotting of 1/() versus 1/[] showed a linear relationship (Figure 2), which indicates that probe 1 is bounded with in a 1 : 1 binding stoichiometry, and association constant () is being calculated as 6.78 × 10⁴ M⁻¹.

Figure 2: Benesi-Hildebrand plot (absorbance at 561 nm) of probe 1, assuming 1 : 1 stoichiometry for association between 1 and Hg²⁺.

3.2. Fluorescence Spectral Characteristics

The sensing behavior was investigated by the fluorescence measurement in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES pH = 7.0 solution upon excitation at 556 nm. As shown in Figure 3(a), upon the gradual addition of Hg²⁺ (0–2 × 10⁻⁵ mol/L), an emission band peaked at 581 nm significantly increased in fluorescence intensity. The titration reaction curve showed a steady and smooth increase until a plateau was reached (15.0 μM ), The chemosensor exhibited very efficient fluorescence responding, which is attributed to the formation of 1- complex as a result of which the nonfluorescent spirocyclic form of the receptor get opened leading to the formation of strongly fluorescent ring-opened amide form.

Figure 3: Fluorescence emission spectra of 1 (10.0 M) in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES pH = 7.0 solution in the presence of increasing concentration of (0–2 equiv.) with an excitation of 556 nm. Inset: (a) fluorescence intensity of solution 1 versus the concentration of Hg²⁺ in the low concentration range (0.1 × 10⁻⁶ to 1.0 × 10−6 mol/L); (b) Job’s plot according to the method for continuous variations, indicating the 1 : 1 stoichiometry for 1-, the total concentration of [] + [1] was 10 M.

In addition, to see its practical applicability, the detection limit of 1 for was evaluated. The fluorescence intensity of 1 (1.0 × 10⁻⁵ mol/L) at 581 nm was found to increase linear relationship with the concentration of in the range of 0.1 × 10⁻⁶ to 1.0 × 10⁻⁶ mol/L (.98927) (Figure 3. inset(a)). The detection limit is then calculated to be 2.8 × 10⁻⁸ M based on 3/ [25], where is the standard deviation of the blank measurements, is the slope between fluorescence intensity versus sample concentration. The results indicated that probe 1 is sensitive enough to detection of trace mercury ion in the environment.

Probe 1 coordinates with Hg²⁺ in a 1 : 1 stoichiometry. This is confirmed by a Job’s plot (Figure 3, inset (b)). A maximum emission intensity was showed when the molecular fraction of was close to 0.5, which indicated the 1 : 1 complex formation between 1 and with a total concentration of 1.0 × 10⁻⁵ M.

3.3. Effect of pH Value

To study the practical applicability, the sensitivity of the fluorescent probe 1 toward variations in the sample pH was examined in the absence and presence of the Hg²⁺ ion. Figure 4 clearly indicates that the free 1, which has weak fluorescence between pH 7.0 and 12.0. However, the fluorescence intensity become strong when pH value below 7.0. It is due to that the ring opening of rhodamine took place for the strong protonation. Under identical condition, while addition of the ion, 1 showed a meaningful response between pH 5.0 and 9.0, because it can lead to a remarkable increase of fluorescence. Finally, in order to eliminate the influence of pH, the HEPES buffer system, at a physiological pH value 7.0, was chosen for the fluorescence intensity determination.

Figure 4: The effect of pH on the fluorescence (557 nm) of 1 in C₂H₅OH-water (4 : 6, v/v) solution, the pH was modified by adding 75% HClO₄ or NaOH (10%). Excitation: 556 nm, emission: 581 nm.

3.4. Selectivity and Completion

Selectivity is an important parameter to evaluate the performance of a chemosensor. As shown in Figure 5, the absorbance and fluorescence spectra changes of Rh-G caused by and various competitive metal ions, such as , , , , , , , , , , , , and .From UV-vis spectra of probe 1 (10 M), the free 1 remained colorless and did not exhibit apparent absorption above 561 nm in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES pH = 7.0 solution. Upon addition of 1.0 equiv. of , we can clearly observe a new absorption band centered at 561 nm. The fluorescence spectra were obtained by excitation of the rhodamine fluorophore at 556 nm. Among various competitive metal ions, 1 showed significant fluorescence enhancements with only. In contrast, other metal ions developed no significant absorption and fluorescence intensity changes under the identical conditions. These results indicate that probe 1 has a remarkable selectivity towards and could serve as a “naked-eye” chemosensor selective for in the aforementioned buffer solution.

(a)

(b)

Figure 5: UV-vis spectra (a) and fluorescent spectra (b) of 1 (10.0 μM) in the presence of 1.0 equiv. Hg²⁺ and 10 equiv. other metal ions (, , , , , , , , , , , and ) in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES pH = 7.0 solution.

Moreover, in order to verify the high selectivity of 1 toward , competition experiments in the presence of miscellaneous competitive metal ions (above mentioned) were conducted. The enhancement in fluorescence intensities resulting from the addition of the was hardly influenced by the subsequent addition of excess metal ions (Figure 6). It is likely that the addition of Hg²⁺ induces the carbonyl oxygen atom of spirolactam to coordinate with Hg²⁺ resulting in the opening of spirolactam ring that leads to the development of pink colour and enhancement in fluorescence intensity.

Figure 6: Competition of 1 (10.0 M) for (1.0 equiv.) upon addition of other metal ions (10.0 equiv.) in C₂H₅OH-water (4 : 6, v/v) buffered with HEPES pH = 7.0 solution. , ( and were the fluorescence intensity of 1 in the absence and presence of ). Excitation: 556 nm, emission: 581 nm.

3.5. The Reaction Mechanism and Reversible

The chemosensor is the most likely to chelate with Hg²⁺ via its three oxygen on the three carbonyl groups (Scheme 2). To test whether the proposed complex could be reversed, we added Na₂S to the solutions of 1- species. Upon addition of Na₂S, fluorescent emission intensity of the system was quenched (Figure 7), and the color of the mixture of 1 and changed from pink to almost colorless, indicating that Na₂S replaced the receptor 1 to coordinate . Thus, these findings indicated that probe 1 can be classified as a reversible chemosensor for Hg²⁺.

Scheme 2: Proposed possible binding mode of probe 1 with Hg²⁺.

Figure 7: The emission spectra of 1 (10.0 μM C₂H₅OH-water solution 4 : 6, v/v pH = 7.0) in the presence of 1 equiv. of and 5 equiv. of Na₂S.

4. Conclusions

In summary, we have synthesized a new rhodamine-based probe 1 linked with PhthalimidoGly for the detection of ions, which displayed Hg²⁺ via a 1 : 1 binding mode enabled the spirolactam ring (nonfluorescence) to the ring-opened amide (fluorescence), a desirable “off-on” mode. Moreover, its fluorescence intensity was enhanced in a linear fashion with a concentration from 0.1 × 10⁻⁶ to 1.0 × 10⁻⁶ mol/L, with a detection limit of 2.8 × 10⁻⁸ M. Thus, probe 1 also enables the “naked-eye” detection of over other commonly coexistent metal ions (even those that exist in high concentration).

Acknowledgments

The authors thank the financial support from the National Natural Science Foundation of China (50973084) and Science and Technical Development Foundation of Colleges and Universities, Tianjin, China (20071214).

References

D. W. Domaille, E. L. Que, and C. J. Chang, “Synthetic fluorescent sensors for studying the cell biology of metals,” Nature Chemical Biology, vol. 4, no. 3, pp. 168–175, 2008.

L. J. Fan, Y. Zhang, C. B. Murphy et al., “Fluorescent conjugated polymer molecular wire chemosensors for transition metal ion recognition and signaling,” Coordination Chemistry Reviews, vol. 253, no. 3-4, pp. 410–422, 2009.

E. L. Que, D. W. Domaille, and C. J. Chang, “Metals in neurobiology: probing their chemistry and biology with molecular imaging,” Chemical Reviews, vol. 108, no. 5, pp. 1517–1549, 2008.

Z. Q. Hu, Y. C. Feng, H. Q. Huang et al., “Fe³⁺-selective fluorescent probe based on rhodamine B and its application in bioimaging,” Sensors and Actuators B, vol. 156, no. 1, pp. 428–432, 2011.

F. Y. Yan, D. L. Cao, N. Yang, Q. Yu, M. Wang, and L. Chen, “A selective turn-on fluorescent chemosensor based on rhodamine for Hg ²⁺ and its application in live cell imaging,” Sensors and Actuators B, vol. 162, no. 1, pp. 313–320, 2012.

M. Korbas, T. C. MacDonald, I. J. Pickering, G. N. George, and P. H. Krone, “Chemical form matters: differential accumulation of mercury following inorganic and organic mercury exposures in zebrafish larvae,” ACS Chemical Biology, vol. 7, no. 2, pp. 411–420, 2012.

M. Korbas, J. L. Odonoghue, G. E. Watson et al., “The chemical nature of mercury in human brain following poisoning or environmental exposure,” ACS Chemical Neuroscience, vol. 1, no. 12, pp. 810–818, 2010.

M. Vinken, L. Ceelen, T. Vanhaecke, and V. Rogiers, “Inhibition of gap junctional intercellular communication by toxic metals,” Chemical Research in Toxicology, vol. 23, no. 12, pp. 1862–1867, 2010.

Y. Zhao, B. Zheng, J. Du, D. Xiao, and L. Yang, “A fluorescent “turn-on” probe for the dual-channel detection of Hg(II) and Mg(II) and its application of imaging in living cells,” Talanta, vol. 85, no. 4, pp. 2194–2201, 2011.

A. J. Weerasinghe, C. Schmiesing, S. Varaganti, G. Ramakrishna, and E. Sinn, “Single- and multiphoton turn-on fluorescent Fe³⁺ sensors based on Bis(rhodamine),” Journal of Physical Chemistry B, vol. 114, no. 29, pp. 9413–9419, 2010.

Y. Zhou, C. Y. Zhu, X. S. Gao, X. Y. You, and C. Yao, “Hg²⁺-selective ratiometric and “off-on” chemosensor based on the azadiene-pyrene derivative,” Organic Letters, vol. 12, no. 11, pp. 2566–2569, 2010.

W. Huang, D. Y. Wu, and C. Y. Duan, “Conformation-switched chemosensor for selective detection of Hg²⁺ in aqueous media,” Inorganic Chemistry Communications, vol. 13, no. 2, pp. 294–297, 2010.

Q. J. Ma, X. B. Zhang, X. H. Zhao et al., “A highly selective fluorescent probe for Hg²⁺ based on a rhodamine-coumarin conjugate,” Analytica Chimica Acta, vol. 663, no. 1, pp. 85–90, 2010.

Y. Zhou, X. Y. You, Y. Fang, J. Y. Li, K. Liu, and C. Yao, “A thiophen-thiooxorhodamine conjugate fluorescent probe for detecting mercury in aqueous media and living cells,” Organic and Biomolecular Chemistry, vol. 8, no. 21, pp. 4819–4822, 2010.

J. H. Huang, Y. F. Xu, and X. H. Qian, “A rhodamine-based Hg²⁺ sensor with high selectivity and sensitivity in aqueous solution: a NS2-containing receptor,” Journal of Organic Chemistry, vol. 74, no. 5, pp. 2167–2170, 2009.

H. Wang, Y. Li, S. Xu et al., “Rhodamine-based highly sensitive colorimetric off-on fluorescent chemosensor for Hg²⁺ in aqueous solution and for live cell imaging,” Organic and Biomolecular Chemistry, vol. 9, no. 8, pp. 2850–2855, 2011.

Y. Zhao, Y. Sun, X. Lv, Y. Liu, M. Chen, and W. Guo, “Rhodamine-based chemosensor for Hg²⁺ in aqueous solution with a broad pH range and its application in live cell imaging,” Organic and Biomolecular Chemistry, vol. 8, no. 18, pp. 4143–4147, 2010.

X. J. Xie, X. Li, Y. F. Ge, Y. Qin, and H. Y. Chen, “Rhodamine-based ratiometric fluorescent ion-selective bulk optodes,” Sensors and Actuators B, vol. 151, no. 1, pp. 71–76, 2010.

M. L. Zhao, X. F. Yang, S. He, and L. Wang, “A rhodamine-based chromogenic and fluorescent chemosensor for copper ion in aqueous media,” Sensors and Actuators B, vol. 135, no. 2, pp. 625–631, 2009.

N. Wanichacheva, K. Setthakarn, N. Prapawattanapol, O. Hanmeng, V. Sanghiran Lee, and K. Grudpan, “Rhodamine B-based “turn-on” fluorescent and colorimetric chemosensors for highly sensitive and selective detection of mercury (II) ions,” Journal of Luminescence, vol. 132, no. 1, pp. 35–40, 2011.

F. Y. Yan, D. L. Cao, M. Wang et al., “A new rhodamine-based “Off-On” fluorescent chemosensor for Hg (II) Ion and its application in imaging Hg (II) in living cells,” Journal of Fluorescence, vol. 22, no. 5, pp. 1249–1256, 2012.

J. J. Du, J. L. Fan, X. J. Peng et al., “A new fluorescent chemodosimeter for Hg²⁺: selectivity, sensitivity, and resistance to Cys and GSH,” Organic Letters, vol. 12, no. 3, pp. 476–479, 2010.

L. J. Tang, F. F. Li, M. H. Liu, and R. Nandhakumar, “Single sensor for two metal ions: colorimetric recognition of Cu²⁺ and fluorescent recognition of Hg²⁺,” Spectrochimica Acta A, vol. 78, no. 3, pp. 1168–1172, 2011.

X. Zhang, Y. Shiraishi, and T. Hirai, “Cu(II)-selective green fluorescence of a rhodamine-diacetic acid conjugate,” Organic Letters, vol. 9, no. 24, pp. 5039–5042, 2007.

L. Dong, ChongWu, X. Zeng et al., “The synthesis of a rhodamine B schiff-base chemosensor and recognition properties for Fe³⁺ in neutral ethanol aqueous solution,” Sensors and Actuators B, vol. 145, no. 1, pp. 433–437, 2010.