Journal of Spectroscopy

Volume 2014 (2014), Article ID 409508, 6 pages

http://dx.doi.org/10.1155/2014/409508

Research Article

Quasielastic Light Scattering and Structure of Nanodroplets Mixed with Polycaprolactone

Soheil Sharifi

Department of Physics, Faculty of Sciences, Ferdowsi University of Mashhad, Mashhad 91775-1436, Iran

Received 24 September 2013; Revised 10 May 2014; Accepted 12 May 2014; Published 23 June 2014

Academic Editor: Edyta Proniewicz

Copyright © 2014 Soheil Sharifi. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The interaction of polycaprolactone (PCL) with droplets of a microemulsion is studied with quasielastic light scattering and small angle X-ray scattering At constant droplet size we vary the PCL concentration and there is clear evidence for an increasing attractive interaction of the droplets from structural investigations with small-angle X-ray scattering (SAXS). The collective diffusion coefficient () of the droplets is monitored with quasielastic light scattering (QELS). We mainly focus on the variation of the dynamic behavior as a function of the PCL concentration and length scale (M.W. = 5000 and 10000) in microemulsion. With increasing PCL concentration and length scale the dynamics of the system slow down. A hard sphere model with depletion potential can fit well the SAXS experiment of microemulsion mixed with PCL. The results show with increase of PCL on microemulsion the size of droplets is constant at 83Å but the size ratio of polymer to droplets is changing.

1. Introduction

Quasielastic light scattering is a very useful method to characterize the structure of microemulsion, polymers, and nanoparticles in solution [1–9].

If the scattering particles of solutions are moving, fluctuations in the scattered intensity with time are directly reflecting the so-called Brownian particle motion of the scattering particles (caused by thermal density fluctuations of the solvent). This is the case because of a change in the interference pattern with changing interparticle position, and correspondingly a change in the detected scattered intensity were measured at a given scattering angle [10–16].

The microemulsions are a mixture of water oil and surfactant that they can form in different shapes as water droplets to oil solutions or oil droplets to the water solutions phase. The microemulsions are optically transparent and they are good for optical experiments.

The C₁₂E₅ microemulsion consists of nanometer-size oil (decane) nanodroplets in water matrix stabilized by the pentaethylene glycol monododecyl ether (C₁₂E₅). The structure and phase behavior of such microemulsions are well investigated. The mixture of microemulsion with polymer is an interesting topic on soft matter physics [17–20]. The interesting subject in this field is depletion effect [20] and network transition in the polymer/microemulsion mixture [21]. The depletion interaction was observed at 1925 and it is shown by adding soluble polymers to a colloidal mixture which led to the aggregation of the colloids. The first description of this phenomenon was given by Asakura and Oosawa at 1954. The depletion was observed in several polymer/microemulsion mixtures [20].

The PCL is a biopolymer that it is water-soluble and the solubility of PCL in water depends on the molecular weight and concentration of PCL [22]. The QELS is used to study the effect of PCL on motion of nanodroplets of C₁₂E₅ microemulsion. We know that the C₁₂E₅ microemulsion shows spherical oil surfactant to the water nanodroplet phase between 24°C and 30°C [23–25]. The increase of PCL on aqueous phase of C₁₂E₅ microemulsion can change free volume of solutions and the interaction between the nanodroplets (oil surfactant).

In this work, we study the effect of concentration and length scale of polycaprolactone (PCL) on droplets of C₁₂E₅/water/decane by QELS and small angel X-ray scattering (SAXS).

2. Experiment

2.1. Materials and Methods

The pentaethylene glycol monododecyl ether (C₁₂E₅) and n-decane were obtained from Sigma-Aldrich. Polycaprolactone (PCL) with molecular weight (M.W. = 5000 and 10000) was optioned from Polysciences company, Eppelheim, Germany. The microemulsion was prepared by weight, in terms of surfactant-oil mass ratio of 1.08 and the mass fraction of droplets (), which varies by the respective mass of n-decane (), C₁₂E₅ (), and total sample mass (). The samples of microemulsions with polymer were prepared by weight in terms of the mass fraction of triblock polymer () that is the mass of polymer in the sample. The mixed samples were prepared at a constant surfactant-oil mass ratio of 1.08 with the different mass fractions of polycaprolactone (PCL) polymer. All samples were transparent at 25°C.

2.2. Small Angle X-Ray Scattering

Small angle X-ray scattering (SAXS) measurements were performed using the pinhole SAXS instrument at Nanolab company (KNL, Iran). A X’Pert Pro MPD small angle X-ray from PANalytical was employed to obtain SAXS patterns. The experiments were done at a fixed wavelength of  Å and two different sample-detector distances.

2.3. Quasielastic Light Scattering

QELS measurements were performed using an ALV single-detector version compact goniometer system, from ALV-GmbH, Langen, Germany. The light source is a He-Ne laser, operating at a wavelength of 632 nm, with vertically polarized light. It has been seen that particles in dispersion are in a constant, random Brownian motion and that this causes the intensity of scattered light to fluctuate as a function of time. The correlator used in a QELS instrument will construct the correlation function of the scattered intensity [1, 2]:

where is decay times. For a large number of particles in Brownian motion, the correlation function is an exponential decaying function of the correlator time delay [1, 2]:

where is the baseline of the correlation function and is an intercept of the correlation function. Consider the following:

where is a translational diffusion coefficient and , where , , and are refractive index of dispersant, wavelength of the laser, and scattering angle.

3. Results and Discussions

Microemulsions were prepared by mixing C₁₂E₅ with n-decane and water at a constant droplet mass fraction (0.2) and . Figures 1 and 2 show the correlation function as a function of decay time for C₁₂E₅ microemulsion mixed with PCL (M.W. = 5000 and 10000). The correlation function of the scattered light intensity as a function of delay time showed a single exponential decay at all concentrations; see Figure 1.

(a)

(b)

Figure 1: First-order field correlation function versus time for a mixture of C₁₂E₅ microemulsion with PCL at droplet mass fraction (0.2) and = 1.08 and different mass fractions of PCL (0.01, 0.03, and 0.05). (a) PCL with M.W. = 5000 and (b) PCL with M.W. = 10000.

Figure 2: The collective diffusion of a mixture of C₁₂E₅ microemulsion with PCL at constant droplet mass fraction (0.2) and = 1.08. The solid points are a mixture of C₁₂E₅ with PCL with M.W. = 5000 and different polymer mass fractions and open points are a mixture of C₁₂E₅ microemulsion with PCL with M.W. = 10000 and polymer mass fraction.

From the inverse decay times, which vary linearly with the square of the momentum transfer, the collective diffusion coefficient () was extracted as a function of the droplet mass fraction from (2) and (3).

The negative slope of collective diffusion coefficient as a function of droplet mass fraction of pure C₁₂E₅ microemulsion and polymer microemulsion shows attractive interaction between nanodroplets at microemulsion; see Figure 2. The decreasing slope of collective diffusion coefficient as a function of mass fraction shows the increasing attractive interaction between the droplets; see Figure 2.

In Figure 2, the mixture of microemulsion with two concentration polymer mass fractions ( up-triangle solid points and down-triangle solid points) of PCL (M.W. = 5000) and the open up- and down-triangle points are microemulsion with PCL (M.W. = 10000). It is clear with the collective diffusion coefficient of droplets decreasing with the increase of molecular weight and concentrations of PCL inside the microemulsion.

A study with QELS shows that the mixture of C₁₂–polyethylene oxide- (PEO-) C12 with C₁₂E₅ microemulsion induces a network between nanodroplets at C₁₂E₅ microemulsion that it is found that the increase of C₁₂–PEO–C₁₂ can produce fast and slow motions (collective diffusion coefficient) in the microemulsion [21], and the origin of those motions comes from connected and nonconnected nanodroplets inside the C₁₂–PEO–C₁₂/C₁₂E₅ microemulsion. These two motions were observed from correlation function [21]. In our samples, the mixture of PCL with C₁₂E₅ microemulsion shows a motion (collective diffusion coefficient), so we can propose that PCL cannot be able to produce a network between the nanodroplets.

The depletion effect was observed in the mixture of polyethylene glycol (PEG) with C₁₂E₅ microemulsion [24, 25], and these results show the increase in PEG concentration lead to increasing depletion effect. The studied depletion effect with QELS shows that the depletion effect can show one single motion (collective diffusion coefficient) and with increase of PEG concentration the collective diffusion is decreasing [24, 25].

In order to characterize the structure of the pure as well as the PCL containing C₁₂E₅ microemulsions we applied small angle X-ray scattering. The scattered intensity as a function of for C₁₂E₅/water/n-decane mixed with PCL is showed in Figure 3.

(a)

(b)

Figure 3: The SAXS experiment of a mixture of C₁₂E₅/water/n-decane PCL at a constant droplet mass fraction (0.2) and = 1.08 with different concentrations of PCL. (a) PCL with M.W. = 5000 and (b) PCL with M.W. = 10000.

The scattered intensity is recorded with a 2-dimensional detector at a distance of 150 cm from the sample leading to an accessible range of scattering vectors .

In order to extract the structural information from the X-ray data, the following model will be employed. For analyzing the SAXS data’s a hard sphere model with an attractive interaction is used. The results of analyzing are presented in Table 1.

Table 1: The results of analyzing the SAXS experiments with hard sphere depletion model that is explained in the text; PDI is polydispersity of PCL/C₁₂E₅ microemulsion.

M.W.

Size ratio
Core
Core + shell
PDI

5000
0.2
0.008
0.43
72
83
0.2

0.2
0.012
0.38
72
83
0.2

0.2
0.025
0.31
72
83
0.2

0.2
0.05
0.27
72
83
0.2

0.2
0.08
0.24
72
83
0.2

10000
0.2
0.007
0.51
72
83
0.2

0.2
0.01
0.48
72
83
0.2

0.2
0.02
0.46
72
83
0.2

0.2
0.051
0.44
72
83
0.2

0.2
0.08
0.41
72
83
0.2

The results of analyzing show the droplets size of microemulsion is constant at  nm for different concentrations and molecular weights of PCL.

The size ratio (size ratio of nanodroplet over polymer) is changing from 0.43 to 0.24 with increase of polymer concentration with low molecular weight (M.W. = 5000) and it changes from 0.51 to 0.41 for high molecular weight of polymer (M.W. = 10000). For both cases with the increase of concentration the length scale is decreasing.

One possibility to obtain information about internal structure of the particles is the indirect Fourier transformation (IFT) technique, resulting in the pair density distribution function, PDDF. This calculation is performed completely model-free and requires only a rough estimate of the maximum dimension of the particle. This method is useful for dilute systems.

The influence of the interaction effects can be computed by simultaneous calculation of the form factor and the structure factor, leading to a PDDF limited to intraparticle contributions. This can be achieved by the generalized indirect Fourier transformation (GIFT) technique [26].

The GIFT with a model with a depletion potential is used to extract the structure factor (Figure 4). The as a function of for a mixture of C₁₂E₅ microemulsion with different concentrations of PCL shows a peak at  Å (Figure 4). This peak does not change with changing weight length and concentration of PCL but the value of the structure factor at low () increases with increasing of PCL concentration (Figure 5). The different molecular weights of PCL (5000 and 10000) have similar effect on intensity of low (Figure 5).

(a)

(b)

Figure 4: The structure factor of a mixture of C₁₂E₅/water/n-decane PCL at a constant droplet mass fraction (0.2) and = 1.08 with different concentrations of PCL. (a) PCL with M.W. = 5000 and (b) PCL with M.W. = 10000.

Figure 5: The structure factor of a mixture as a function of polymer mass fraction of C₁₂E₅/water/n-decane at at a constant droplet mass fraction (0.2) and = 1.08. The circle points are PCL with M.W. = 5000 and up-triangle is PCL with M.W. = 10000.

This behavior is similar to the mixture of PEG with C₁₂E₅ microemulsion [24, 25]. In general, increasing of structure factor at low can explain type of interaction between droplets. The increasing of structure factor at low shows increase of attractive interaction between droplets. So, in our case we can propose that increase of PCL concentration can increase attractive interaction between nanodroplets. A study on the mixture of end-capped polymer with microemulsion shows that the narrow peck at structure factor describes the increase of order in systems [21]; in the case of our system the first peck is constant at PCL/C₁₂E₅ microemulsion which explains the order of droplets does not change with increase of PCL concentration.

4. Conclusions

SAXS and QELS have been used to study the mixture of different weight lengths and concentrations of PCL mixed with C₁₂E₅/water/n-decane microemulsion. The results show a depletion interaction due to the fact that the increase of amount of PCL can decrease the motion of nanodroplets inside microemulsion. The different molecular weights of PCL (5000 and 10000) have similar effect on attractive interaction. The SAXS data’s could describe the depletion model quantitatively. The result of SAXS with data’s shows the size of nanodroplets is constant but the size ratio is decreasing with increase of PCL in the microemulsion that it is due to aggregation of PCL in the solutions. The depletion effect can describe well the behavior of collective diffusion coefficient with increase of PCL concentrations.

Conflict of Interests

The author declares that there is no conflict of interests regarding the publication of this paper.

References

B. J. Berne and R. Pecora, Dynamic Light Scattering: With Applications to Chemistry, Biology, and Physics, John Wiley & Sons, 1976.

C. S. Johnson and D. A. Gabriel, Lasers Light Scattering, John Wiley & Sons, 1957.

B. Chu, Laser Light Scattering: Basic Principles and Practice, American Press, 1974.

J. Cieśla, A. Bieganowski, J. Narkiewicz-Michałek, and M. Szymula, “Use of a dynamic light scattering technique for SDS/water/pentanol studies,” Journal of Dispersion Science and Technology, vol. 34, no. 4, pp. 566–574, 2013.

C. J. Doran, “Photon correlation spectroscopy and velocimetry,” Optica Acta: International Journal of Optics, vol. 25, no. 3, pp. 271–272, 1978.

A. M. Bellocq, G. Fourche, P. Chabrat, L. Letamendia, J. Rouch, and C. Vaucamps, “Dynamic light scattering study of concentrated W/O microemulsions,” Optica Acta: International Journal of Optics, vol. 27, no. 12, pp. 1629–1639, 1980.

J. P. Boon and S. Yip, “Correlated dynamics and light scattering in microemulsions,” Optica Acta: International Journal of Optics, vol. 29, no. 9, pp. 1167–1169, 1982.

D. Caroline, “Measurement of suspended particles by quasi-elastic light scattering,” Optica Acta: International Journal of Optics, vol. 31, no. 3, pp. 276–277, 1984.

M. Weinberg, “Light scattering: iandau-placzek ratio and total intensity,” Physics and Chemistry of Liquids, vol. 4, no. 2-3, pp. 163–170, 1974.

P. R. Berman, “Light scattering,” Contemporary Physics, vol. 49, no. 5, pp. 313–330, 2008.

A. Cao, “Light scattering. Recent applications,” Analytical Letters, vol. 36, no. 15, pp. 3185–3225, 2003.

E. J. Derderian and T. B. MacRury, “Quasielastic light scattering on standard poly(styrene) latices,” Journal of Dispersion Science and Technology, vol. 2, no. 2-3, pp. 345–358, 1981.

N. B. Behzadi and S. Sharifi, “Light scattering and SAXS of spherical to cylindrical transition of AOT/H₂O/cyclohexane/PI,” Physics and Chemistry of Liquids, vol. 52, no. 3, pp. 428–435, 2014.

N. Karimi, S. Sharifi, and M. Aliahma, “Photon correlation spectroscopy and SAXS study of mixture of NaCl with AOT Microemulsion at X = 6.7,” Optics and Photonics Journal, vol. 2, no. 1, pp. 54–58, 2012.

K. Nikjoo, M. Aliahmad, S. Sharifi, and M. Sargazi, “Photon correlation spectroscopy and SAXS study of cylindrical to spherical transition in the AOT microemulsion by changing solvent,” Soft Nanoscience Letters, vol. 2, no. 2, pp. 17–21, 2012.

S. Sharifi, M. R. Mohammadi, M. Aliahmad, O. Marti, and M. Amirkhani, “The effect of TBAC on the collective diffusion coefficient and morphology of AOT microemulsion at X = 6.7,” Physics and Chemistry of Liquids, vol. 51, no. 4, pp. 469–479, 2013.

C.-A. Peng and F. Huang, “Formation of perfluorocarbon microemulsion by fluorinated polyethylene glycol,” Journal of Dispersion Science and Technology, vol. 29, no. 1, pp. 46–51, 2008.

M. Bisceglia, D. H. Kurlat, J. P. Chéret, and B. Ginzberg, “Measurements of the Kerr effect in W/O microemulsions up to the proximity of a → transition,” Physics and Chemistry of Liquids, vol. 25, no. 2, pp. 127–134, 1993.

S. Sharifi, G. V. Jensen, J. S. Pedersen, O. Marti, and M. Amirkhani, “The mixture of poly(propylene-glycol)-block-poly(ethylene-glycol)-block-PPG with C₁₂E₅ microemulsion,” Physics and Chemistry of Liquids, vol. 52, no. 1, pp. 113–121, 2014.

S. Sharifi, O. Marti, S. S. Funari, and M. Amirkhani, “The effect of different polymer length on water droplets of reverse AOT microemulsion,” Physics and Chemistry of Liquids, vol. 51, no. 5, pp. 586–594, 2013.

M. Amirkhani, S. Sharifi, and O. Marti, “The effect of simultaneous size reduction and transient network formation on the dynamics of microemulsions,” Journal of Physics D: Applied Physics, vol. 45, no. 36, Article ID 365302, 2012.

C. Bordesa, V. Fréville, E. Ruffin et al., “Determination of poly(ɛ-caprolactone) solubility parameters: application to solvent substitution in a microencapsulation process,” International Journal of Pharmaceutics, vol. 383, pp. 236–243, 2010.

M. Nayeri, M. Zackrisson, and J. Bergenholtz, “Scattering functions of core-shell-struct ured hard spheres with Schulz-distributed radii,” Journal of Physical Chemistry B, vol. 113, no. 24, pp. 8296–8302, 2009.

M. Zackrisson, R. Andersson, and J. Bergenholtz, “Depletion interactions in model microemulsions,” Langmuir, vol. 20, no. 8, pp. 3080–3089, 2004.

S. Sharifi and M. Amirkhani, “Light scattering study of mixture of polyethylene glycol with C₁₂E₅ microemulsion,” Soft Nanoscience Letters, vol. 1, no. 3, pp. 76–80, 2011.

J. Brunner-Popela and O. Glatter, “Small-angle scattering of interacting particles. I. Basic principles of a global evaluation technique,” Journal of Applied Crystallography, vol. 30, no. 4, pp. 431–442, 1997.