Journal of Thyroid Research
Volume 2017 (2017), Article ID 4324130, 1 page
https://doi.org/10.1155/2017/4324130

Corrigendum

Corrigendum to “Challenges in Interpretation of Thyroid Function Tests in Pregnant Women with Autoimmune Thyroid Disease”

Ulla Feldt-Rasmussen,¹ Sofie Bliddal,¹ Åse Krogh Rasmussen,¹ Malene Boas,² Linda Hilsted,³ and Katharina Main²

¹Department of Medical Endocrinology, Rigshospitalet, Blegdamsvej 9, 2100 Copenhagen, Denmark
²Department of Growth and Reproduction, Rigshospitalet, Blegdamsvej 9, 2100 Copenhagen, Denmark
³Department of Clinical Biochemistry, Rigshospitalet, Blegdamsvej 9, 2100 Copenhagen, Denmark

Correspondence should be addressed to Ulla Feldt-Rasmussen; ufeldt@rh.dk

Received 26 September 2017; Accepted 9 October 2017; Published 25 October 2017

Copyright © 2017 Ulla Feldt-Rasmussen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Challenges in Interpretation of Thyroid Function Tests in Pregnant Women with Autoimmune Thyroid Disease” [1], the name of the second author was given incorrectly as Anne-Sofie Bliddal Mortensen. The author’s name should have been written as Sofie Bliddal. The revised authors’ list is shown above.

References

U. Feldt-Rasmussen, A.-S. B. Mortensen, Å. K. Rasmussen, M. Boas, L. Hilsted, and K. Main, “Challenges in interpretation of thyroid function tests in pregnant women with autoimmune thyroid disease,” Journal of Thyroid Research, vol. 2011, Article ID 598712, 7 pages, 2011.