Hindawi Publishing Corporation
Journal of Transplantation
Volume 2009 (2009), Article ID 379082
doi:10.1155/2009/379082

Clinical Study

FGF-23 Levels before and after Renal Transplantation

Domniki Economidou, Spyros Dovas, Aikaterini Papagianni,  Panagiotis Pateinakis, and Dimitrios Memmos

University Department of Nephrology, Hippokration General Hospital, 54642 Thessaloniki, Greece

Correspondence should be addressed to Aikaterini Papagianni, aikpapag@otenet.gr

Received 3 February 2009; Accepted 26 April 2009

Recommended by Bruce Kaplan

Phosphatonin fibroblast growth factor-23 (FGF-23) is involved in phosphate (P) excretion and vitamin D metabolism. Recently, FGF-23 has been suggested to be responsible for the hypophosphatemia and inappropriately low calcitriol levels observed after renal transplantation. We performed a prospective study to investigate FGF-23 levels in patients with end-stage renal disease before and after renal transplantation and their probable association with markers of bone and mineral metabolism. Intact FGF-23 levels were determined before and at 3, 6, and 12 months posttransplantation in 18 renal transplant recipients. Intact parathyroid hormone (iPTH), calcium (Ca), P, 25(OH)VitD, and 1,25VitD levels were measured at the same time periods. Renal threshold phosphate concentration (/GFR) was also calculated at 3, 6, and 12 months posttransplantation. The results showed that FGF-23 levels decreased by 89% 3 months posttransplantation (346 146 versus 37 9 pg/mL, ) and remained stable throughout the study period. iPTH and P levels also decreased significantly after renal transplantation, while Ca and 1,25VitD increased. Pretransplantation FGF-23 was significantly correlated with P levels at 3 months posttransplantation (). In conclusion, FGF-23 levels decrease dramatically after successful renal transplantation. Pre-transplantation FGF-23 correlate with P levels 3 months posttransplantation.

Copyright © 2009 Domniki Economidou et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

1. Introduction

Phosphatonin fibroblast growth factor-23 (FGF-23) is involved in phosphate (P) excretion and vitamin D metabolism. FGF-23 induces phosphaturia and inhibits renal 1-a hydroxylase leading to decreased calcitriol synthesis [1]. As a result disorders of FGF-23 excess are characterized by hypophosphatemia with increased renal phosphate wasting and inappropriately low calcitriol levels for the degree of hypophosphatemia [2]. Recently, FGF-23 has been suggested to be responsible for the hypophosphatemia and inappropriately low calcitriol levels observed after renal transplantation [3–6]. Still though, its role in the hypophosphatemia observed after renal transplantation remains largely unknown. The aim of the present prospective study was therefore to investigate FGF-23 levels in patients with end-stage renal disease before and after a successful renal transplantation and their probable association with markers of bone and mineral metabolism.

2. Patients and Methods

Eighteen renal transplant recipients (M/F 9/9, mean age 31 ± 11 years) consecutively entered the study. Primary diseases were chronic glomerulonephritis , vesicureteral reflux , hereditary/cystic kidney disease (), tubulointerstitial disease , and unknown etiologies . Fifteen patients (83%) received a living related and three a deceased donor kidney transplants. Sixteen patients received a first transplant and two a second one. Fourteen patients had been on dialysis before transplantation (median [interquartile range] dialysis duration 16 [11–42] months) and four patients had a pre-emptive transplantation. Maintenance immunosuppression consisted of corticosteroids (100%), a calcineurin inhibitor (cyclosporine , 94% or tacrolimus , 6%) and mycophenolate mofetil (MMF) (, 89%) or everolimus (, 11%). Two doses of 500 mg intravenous methylprednisolone were administered in 11 patients, one on the day before and the other on the day of renal transplantation. In the remaining 7 patients the same dose was administered once, on the day of renal transplantation. A mean dose of  mg was administered on the first postoperative day. Then methylprednisolone was gradually tapered to a dose of 4–6 mg daily by the end of the first year. Cyclosporine and tacrolimus concentrations were controlled according to standard protocols. MMF dosage was adjusted in case of intolerance. The majority of the patients (, 78%) received induction therapy with basiliximab. All rejection episodes (five in total) were treated successfully with corticosteroid pulse therapy.

Six patients (33%) had a history of parathyroidectomy prior to transplantation. Thirteen patients (83%) were receiving alfacalcidol (One-Alpha, Leo, Princes Risborough, Buckinghamshire, UK) after transplantation, 6 of them in combination with alendronate (Fosamax, Merck & Co., Inc., USA). Alfacalcidol was administered for osteoporosis prophylaxis to all patients except those with hypercalcemia (Serum Ca 10,5 mg/dL) and those with 1,25(OH)₂VitD levels greater than 54 pg/mL. Six patients (33%) were receiving calcium salts.

Intact FGF-23 levels were determined by enzyme-linked immunosorbent assay (ELISA) (Immutopics, San Clemente, CA, USA) before and 3, 6, and 12 months posttransplantation. The intra- and interassay precision was 4.4% and 6.1% coefficient of variation. Intact parathyroid hormone (iPTH), calcium (Ca), P, 25(OH)VitD, and 1,25VitD levels were measured at the same time periods. iPTH was determined by IRMA (IMMUNOTECH, Marseilles, France), and 25(OH)VitD, and 1,25VitD were determined by RIA (BioSource S.A., Brussels, Belgium). Serum creatinine (), Ca, P, and urine creatinine, and P were measured by standard techniques using an automated analyzer (Olympus AV 560, Hamburg, Germany). The renal threshold of P concentration standardized to glomerular filtration rate (/GFR) was used as a measure of renal P handling [7]. All patients had satisfactory renal function at month 3 posttransplantation and remained stable until the end of the study ( mg/dL). Glomerular filtration rate (GFR) was estimated using MDRD formula and measured with ⁵¹Cr-EDTA between 6 and 12 months posttransplantation when was stable. Mean eGFR(MDRD) was  mL/min/1.73 , and mean ⁵¹Cr-EDTA GFR was mL/min/1.73 .

Statistical analysis was performed using SPSS 15.0 for Windows (SPSS Inc., Chicago, Illinois). Data are expressed as mean ± SD (parametric parameters) or median with interquartile range (non-parametric parameters), as appropriate. Differences between study periods in different parameters were analyzed using paired t-test. Comparisons between groups were analyzed using unpaired t-test. Correlations between different parameters were analyzed by Spearman's rank correlation. Two-sided was considered statistically significant.

3. Results

Compared with FGF-23 levels before transplantation, FGF-23 levels at the end of 3, 6, and 12 months were significantly decreased (Figure 1). At the same time periods, P as well as iPTH levels were also decreased. In addition, a significant increase was noted in Ca and 1,25VitD levels. No significant changes were noted in 25(OH)VitD levels. /GFR tended to increase, but the difference did not reach statistical significance. A statistically significant increase in /GFR was noted between months 1 and 12 posttransplantation ( versus ). The evolution of the aforementioned parameters over the first 12 months following kidney transplantation is shown in Table 1.

Table 1: Evolution of studied parameters over the first 12 months following kidney transplantation.

pre-Tx
3 months
6 months
12 months

Phosphate (mg/dL)

.005

(2.5–4.5)#

Calcium (mg/dL)

.01

(8.8–10.4)#

25(OH)VitD (ng/mL)

NS

(7.6–75)#

1,25(OH)₂VitD (pg/mL)

.05

(29.6–65.1)#

iPTH (pg/mL)

.05

(10–65)#

FGF-23 (pg/mL)

.01

(8.2 –54.3)#$

/GFR

NS&

(2.5–4.2)#

ALP (IU/L)

.05

(30–120)#

Serum creatinine (mg/dL)

(0.66–1.1)#

Values are expressed as means ± SD.
§Paired -test between pre-Tx and post-Tx values.
&Paired -test between 3 and 12 months post-Tx.
#Normal values.
$Yamashita H et al. European Journal of Endocrinology, 2004.

Figure 1: FGF-23 levels before and after successful renal transplantation (Tx: renal transplantation).

At 12 months posttransplantation all patients had normal FGF-23 levels (50 pg/mL). 25(OH)VitD insufficiency (30 ng/mL) was noted in 8 patients (44%) while 3 patients (17%) had 1,25VitD deficiency (20 pg/mL). iPTH levels 65 pg/mL were observed in 72%   and 17%   of the patients at the time of transplantation and at month 12, respectively. Patients with a history of parathyroidectomy had lower iPTH levels before transplantation and at month 12 posttransplantation compared to patients without parathyroidectomy ( versus and versus  pg/mL, , resp.). At 12 months posttransplantation, Ca levels were higher and P levels were lower in patients without parathyroidectomy ( versus  mg/dL, and versus  mg/dL, , resp.). /GFR was also lower in patients without parathyroidectomy ( versus  mg/dL, ) at 12 months posttransplantation. Patients receiving alfacalcidol tended to have lower iPTH values ( versus  pg/mL, ) at 12 months posttransplantation. FGF-23 levels also tended to be higher in patients receiving alfacalcidol ( versus  pg/mL, , at 3 months posttransplantation).

A significant correlation was observed between /GFR and P levels at 3, 6, and 12 months after transplantation (, and , resp.) (Figure 2). In addition, pretransplantation FGF-23 levels were significantly correlated with P levels 3 months posttransplantation . Pretransplantation FGF-23 levels were also correlated with /GFR 3 months posttransplantation . No correlations were observed between FGF-23 and vitamin D levels before or after renal transplantation.

Figure 2: Correlation between /GFR and P levels at 3 months postrenal transplantation.

Moderate hypophosphatemia (2.5 mg/dL) was observed relatively infrequently after the first month posttransplantation. Up to 28% of kidney transplant recipients developed P levels 2.5 mg/dL transiently between 1 and 3 months posttransplantation. /GFR was significantly lower in these patients ( versus ). Posttransplantation 1,25VitD levels were higher in hypophosphatemic patients ( versus ). At month 12, only 1 patient (6%) still had hypophosphatemia. There was a tendency toward higher pretransplantation FGF-23 levels in patients that developed hypophosphatemia ( versus  pg/mL, ). Furthermore, patients that developed hypophosphatemia tended to have higher pre- and posttransplantation iPTH levels, but the difference did not reach statistical significance ( versus  pg/mL and versus  pg/mL, resp.).

Mean iPTH levels decreased by 64% at 3 months posttransplantation and remained stable thereafter. Pretransplantation iPTH correlated significantly with Ca and P levels 12 months posttransplantation ( and , resp.). During the first 6 months posttransplantation 3 patients (17%) temporarily developed Ca levels 10.4 mg/dL. At month 12 only 1 patient (6%) had mild hypercalcemia (Ca levels 12.5 mg/dL). Patients with posttransplantation hypercalcemia tended to have higher pretransplantation iPTH levels ( versus  pg/mL, ).

4. Discussion

The major findings of the present study are the following: (i) intact FGF-23 levels decrease dramatically after successful renal transplantation and remain within normal limits when graft function is good, (ii) /GFR and P levels at month 3 correlate significantly with FGF-23 levels before transplantation, and (iii) no association between FGF-23 and 1,25VitD levels was found.

In this prospective study, FGF-23 levels were determined in renal transplant recipients with stable renal function for a one year period. Intact FGF-23 was measured in order to avoid measurement of fragments that accumulate in end-stage renal disease and do not probably reflect endogenous FGF-23 production. In addition, FGF-23 levels before and after renal transplantation would be more comparable with the measurement of intact FGF-23 because in patients with good renal function fragment accumulation is not observed. We observed a significant reduction, already from the first trimester posttransplantation that reached 90% of pretransplant values. In the following measurements, at 6 and 12 months, there was a small further decline, and FGF-23 levels were within normal limits in all patients at month 12 posttransplantation. Phosphate levels and /GFR at month 3 significantly correlated with FGF-23 levels before transplantation. Bones, and in particular osteoblasts, are considered the possible site of FGF-23 production [8]. In patients with chronic renal failure and secondary hyperparathyroidism that have undergone renal transplantation, it is expected that there is a greater production in the first trimester after transplantation, until osteoblasts become inactive and bone metabolism is suppressed. It has been reported that corticosteroids, calcineurin inhibitors, and mTOR inhibitors stimulate FGF-23 production [9, 10], even though in the first months after transplantation, with the use of higher doses of these drugs we as well as others observed the greater reduction [3–6]. Furthermore, hypophosphatemia which is the major stimulant for FGF-23 secretion is resolved. Phosphaturia in other solid organ transplantation is not observed, which points toward its relation either with secondary hyperparathyroidism or tubular damage. Intact FGF-23 contributes to the hypophosphatemia observed in the first month after transplantation, but after the first 6 months possible causes are persistent secondary hyperparathyroidism, tubular damage, and/or immunosuppressive drugs.

Our results are in agreement with those of Pande et al., who also observed FGF-23 level reduction as early as the fifth posttransplant day [5]. In the aforementioned study, not only FGF-23 was determined but also C-terminal fragments. For this reason, the excessive and rapid reduction could be due to increased urinary excretion. In the study by Evenepoel et al., the results also showed a significant reduction of FGF-23 levels. In this study, there are patients in the first trimester after transplantation with higher than normal intact FGF-23 levels but with lower glomerular filtration rate [6].

iPTH concentrations decrease progressively after renal transplantation. However, resolution of secondary hyperparathyroidism (SHPT) is incomplete 1 year after transplantation in about 50% of the recipients [11]. In our study, mean iPTH levels decreased by 64% at 3 months posttransplantation and remained low, but at the higher end of normal by month twelve. A significant correlation was observed between pretransplantation iPTH and Ca and P levels at 12 months posttransplantation, suggesting a role for SHPT in the development of postrenal transplantation hypercalcemia and hypophosphatemia. Patients that developed hypophosphatemia tended to have higher pre- and posttransplantation iPTH levels as well as higher pretransplantation FGF-23 levels. These findings suggest that FGF-23 and iPTH could act synergistically to cause phosphaturia, as has been previously suggested [4]. The role of iPTH in posttransplantation hypophosphatemia is further supported by the observation that renal transplant recipients that had undergone parathyroidectomy before transplantation had lower Ca and higher P levels 12 months posttransplantation. /GFR was also higher in patients with a history of parathyroidectomy.

Hyposphosphatemia occurs early following renal transplantation and resolves almost completely at 1 year after transplantation [12]. Temporary mild hyposphosphatemia was observed in 28% of our patients at 3 months posttransplantation. In accordance with previous reports, only 1 patient (6%) remained hypophosphatemic at 12 months posttransplantation. Phosphate levels and /GFR were strongly correlated indicating that low P levels after renal transplantation are the result of renal phosphate wasting. Pretransplantation but not posttransplantation FGF-23 levels correlated with P levels as well as /GFR at 3 months posttransplantation. This finding is consistent with previous studies that implicate FGF-23 in postrenal transplantation hyposphosphatemia [3–6].

Up to 91% of our patients had sufficient 1,25VitD levels between 3 and 12 months after renal transplantation. No association was found between FGF-23 and 1,25VitD levels.

Our study has some advantages. One is that FGF-23 levels were determined with an assay that does not detect C-terminal fragments. Another is that serial measurements of FGF-23 after renal transplantation were conducted. Possible limitations, on the other hand, are the small number of patients and the use of activated vitamin D analogs and calcium salts, which may have confounded our results.

In conclusion, FGF-23 levels decrease dramatically after successful renal transplantation and remain within normal limits when graft function is good. iPTH and P levels also decrease significantly after renal transplantation, while Ca and 1,25VitD increase. Pretransplantation FGF-23 levels correlate with /GFR and P levels 3 months posttransplantation. Pretransplantation iPTH also correlate with Ca and P levels 12 months posttransplantation. No association was found in this study between FGF-23 and 1,25VitD levels. Further studies are needed to elucidate the role of FGF-23 in P and 1,25VitD metabolism after renal transplantation.

References

T. Shimada, H. Hasegawa, Y. Yamazaki, et al., “FGF-23 is a potent regulator of vitamin D metabolism and phosphate homeostasis,” Journal of Bone and Mineral Research, vol. 19, no. 3, pp. 429–435, 2004.

M. Fukagawa, T. Nii-Kono, and J. J. Kazama, “Role of fibroblast growth factor 23 in health and in chronic kidney disease,” Current Opinion in Nephrology and Hypertension, vol. 14, no. 4, pp. 325–329, 2005.

I. Bhan, A. Shah, J. Holmes, et al., “Post-transplant hypophosphatemia: tertiary ‘Hyper-Phosphatoninism’?” Kidney International, vol. 70, no. 8, pp. 1486–1494, 2006.

P. Evenepoel, M. Naesens, K. Claes, D. Kuypers, and Y. Vanrenterghem, “Tertiary ‘hyperphosphatoninism’ accentuates hypophosphatemia and suppresses calcitriol levels in renal transplant recipients,” American Journal of Transplantation, vol. 7, no. 5, pp. 1193–1200, 2007.

S. Pande, C. S. Ritter, M. Rothstein, et al., “FGF-23 and sFRP-4 in chronic kidney disease and post-renal transplantation,” Nephron Physiology, vol. 104, no. 1, pp. p23–p32, 2006.

P. Evenepoel, M. Bjorn, M. Naesens, et al., “Mineral metabolism and renal phosphate handling in renal transplant recipients and patients with chronic kidney disease matched for eGFR [abstract],” Journal of the American Society of Nephrology, vol. 18, p. 749A, 2007.

R. J. Walton and O. L. M. Bijvoet, “Nomogram for derivation of renal threshold phosphate concentration,” The Lancet, vol. 306, no. 7929, pp. 309–310, 1975.

F. Saji, K. Shiizaki, S. Shimada, et al., “Regulation of fibroblast growth factor 23 production in bone in uremic rats,” Nephron Physiology, vol. 111, no. 4, pp. 59–66, 2009.

M. Mirams, B. G. Robinson, R. S. Mason, and A. E. Nelson, “Bone as a source of FGF23: regulation by phosphate?” Bone, vol. 35, no. 5, pp. 1192–1199, 2004.

D. Krocker, C. Perka, J. Tuischer, et al., “Effects of tacrolimus, cyclosporin A and sirolimus on MG63 cells,” Transplant International, vol. 19, no. 7, pp. 563–569, 2006.

A. Torres, V. Lorenzo, and E. Salido, “Calcium metabolism and skeletal problems after transplantation,” Journal of the American Society of Nephrology, vol. 13, no. 2, pp. 551–558, 2002.

H. Ghanekar, B. J. Welch, O. W. Moe, and K. Sakhaee, “Post-renal transplantation hypophosphatemia: a review and novel insights,” Current Opinion in Nephrology and Hypertension, vol. 15, no. 2, pp. 97–104, 2006.