Mediators of Inflammation
Volume 2020 (2020), Article ID 5802435, 11 pages
https://doi.org/10.1155/2020/5802435

Research Article

Role of Oxygen Supply in Macrophages in a Model of Simulated Orthodontic Tooth Movement

Agnes Schröder,¹ Leonie Barschkies,¹ Jonathan Jantsch,² Peter Proff,¹ Lina Gölz,³ James Deschner,⁴ and Christian Kirschneck¹

¹Department of Orthodontics, University Hospital Regensburg, 93053 Regensburg, Germany
²Institute of Clinical Microbiology and Hygiene, University Hospital Regensburg, 93053 Regensburg, Germany
³Department of Orthodontics, University of Erlangen-Nuremberg, 91054 Erlangen, Germany
⁴Department of Periodontology and Operative Dentistry, University of Mainz, 55131 Mainz, Germany

Correspondence should be addressed to Christian Kirschneck; christian.kirschneck@ukr.de

Received 20 April 2020; Revised 22 June 2020; Accepted 20 July 2020; Published 29 July 2020

Academic Editor: Elzbieta Kolaczkowska

Copyright © 2020 Agnes Schröder et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Apart from periodontal ligament fibroblasts, immune cells like macrophages also play an important mediating role in orthodontic tooth movement (OTM). Upon orthodontic force application to malpositioned teeth, macrophages in the periodontal ligament get exposed to both mechanical strain and hypoxic conditions (via a compression of blood vessels). In this study, we assessed the relative impact of orthodontically induced mechanical strain and hypoxic conditions on macrophages for the mediation and regulation of OTM. Macrophages were stimulated with physiological orthodontic compressive forces of 2 g/cm² for 4 h and 24 h on gas-impermeable or gas-permeable cell culture plates under normoxic or hypoxic cell culture conditions. We quantified expression of genes involved in inflammation (Tnf, Il-6, and Cox-2), extracellular remodelling (Mmp-9), and angiogenesis (Vegf) by RT-qPCR. Furthermore, we analysed HIF-1α, prostaglandin-E2, and VEGF protein expression via immunoblotting or ELISA. Mechanical strain and oxygen supply both differentially affected expression of genes and proteins involved in inflammation and angiogenesis. In this context, we found that HIF-1α protein levels were elevated by combined mechanical strain and hypoxic conditions, whereas gas-permeable plates providing sufficient oxygen supply prevented HIF-1α stabilization at the protein level after pressure application on macrophages. Our results thus indicate that macrophages involved in the mediation of OTM are affected by and respond differently to hypoxic conditions and mechanical compressive strain, which occur concomitantly during OTM, than periodontal ligament fibroblasts (PDLF), thus indicating different roles of these cells in the regulation of OTM at the cellular-molecular level. We further observed that contrary to PDLF HIF-1α stabilization in macrophages is rather induced via the decreased oxygen supply associated with OTM than via mechanotransduction by mechanical strain.

1. Introduction

Carl Sandstedt examined tissue remodelling during orthodontic treatments aimed at correcting malocclusions and malpositioned teeth over 100 years ago and found that the alveolar bone adapts to the pressure and tension zones created within the periodontal ligament by the application of therapeutic orthodontic forces to teeth [1]. Since then, cellular responses during orthodontic force application have been researched at the molecular level. It has been reported that a compression of blood vessels within the periodontal ligament occurs during orthodontic tooth movement (OTM) leading to a decreased local perfusion and concomitant reduction in oxygen supply (hypoxia) [2]. Cytokines and other inflammatory markers are secreted into the periodontal tissue by periodontal fibroblasts [3, 4] or immune cells [5] to attract additional leukocytes and macrophages [6, 7] inducing a “pseudoinflammatory process” [1]. This process is characterized by a promotion of inflammation but may also accelerate other noninflammatory processes mediated by periodontal ligament cells [1]. Next to fibroblasts, which make up the main cell population in the periodontal ligament, immune cells like macrophages are also present, which will be exposed to mechanical strain and changing oxygen supply during orthodontic tooth movement [8]. It is now known that macrophages interact with fibroblasts of the periodontal ligament and promote tooth movement by modulating differentiation from osteoclast progenitor cells into bone resorbing osteoclasts [8]. Furthermore, macrophages secrete a variety of cytokines such as tumor necrosis factor (TNF) or interleukin 6 (IL-6) that stimulate bone resorption by increasing receptor activator of NF-κB ligand (RANKL) expression [9, 10]. In order to adapt to the new environmental parameters and reduced oxygen supply, angiogenic factors are increasingly expressed by periodontal ligament cells, so that an adequate blood supply, which is associated with improved oxygen saturation, can be restored [11]. By stabilizing hypoxia inducible factor 1α (HIF-1α) protein, more than 100 different target genes with different functions can be activated [12]. HIF-1α binds to the HIF-responsive elements in the promoter or enhancer region of target genes and thus stimulates transcription. To counteract hypoxia, HIF-1α activates some genes that code for improved oxygen transport, angiogenesis, vasodilatation, and anaerobic glycolysis [13].

In this work, we focus on the HIF 1 target genes vascular endothelial growth factor (Vegf) and cyclooxygenase-2 (Cox-2). VEGF and COX-2 are important mediators for angiogenesis [14] and inflammation [15] and are upregulated in periodontal ligament cells during mechanical strain as occurring during OTM [4, 16, 17]. Cox-2 is increasingly expressed, particularly during mechanical strain and inflammation in order to catalyse the conversion of arachidonic acid to prostaglandins, most prominently prostaglandin E2 [16, 18], which among others contributes to vasodilatation [11]. Furthermore, prostaglandin E2 promotes osteoclastogenesis and is involved in extracellular matrix remodelling by regulating the expression of matrix metalloproteinases [19], which are required for the degradation of the extracellular matrix [1].

Fibroblasts of the periodontal ligament stabilized HIF-1α protein after compressive force treatment. This stabilization was mainly due to mechanotransductive effects, whereas hypoxia played a minor role [17]. However, effects of compressive force treatment compared to oxygen supply on macrophages are so far unknown. As these immune cells also constitute an important cell population within the periodontal ligament and are involved in the regulation and instigation of OTM at the cellular-molecular level [8], the aim of this work was therefore to clarify the relative impact of orthodontically induced mechanical strain and hypoxic conditions in the periodontal ligament on macrophages for the mediation and regulation of OTM focusing on HIF-1α expression and its stabilization as well as on genes and proteins involved in the inflammatory processes occurring during OTM. To address this question, we used an established in vitro model to simulate orthodontic force application and mechanical strain as well as hypoxic conditions [16–18].

2. Material and Methods

2.1. In Vitro Cell Culture Experiments

Immortalised RAW264.7 macrophages (400319, CLS Cell Lines Service) were cultured in Dulbecco’s modified Eagle’s medium-high glucose (DMEM, D5671, Sigma-Aldrich), enriched with 10% fetal calf serum (FCS, P30-3302, PAN Biotech), 1% L-glutamine (G7513, Sigma-Aldrich), and 1% Antibiotic/Antimycotic Solution 100x (A5955, Sigma-Aldrich). The medium was replaced every two to three days. Cultivation was performed in an incubator (BBD 6220, Thermo Fisher Scientific) at 37°C and 5% CO₂ saturation. All cell culture experiments were carried out under sterile conditions (laminar flow unit, BDK Luft- und Reinraumtechnik).

2.1.1. Experiment 1: Effects of Mechanical Strain (Pressure) and Hypoxia on Macrophages

In this experiment, we aimed to differentiate effects of mechanical strain (pressure) and hypoxia on macrophages. Therefore, approximately 250,000 RAW264.7 macrophages per ml were seeded onto sterile 6-well cell culture plates (353046, Omnilab) and cultivated for 24 h before the start of the experiment. Compressive force application was performed by using glass plates with a defined weight of 2 g/cm² for additional 24 h under normoxic or hypoxic conditions according to an established and published model [7, 16, 17] (Figure 1). Hypoxic conditions were achieved by using a GasPak EZ gas development bag system with an indicator (260683, BD Biosciences) according to the manufacturer’s instructions increasing CO₂ to at least 10% within 24 h. Therefore, we also measured pH (Seven Easy in combination with Inlab Expert pro electrode, Mettler Toledo) and detected a slight, but significant, effect of CO₂ on pH in the cell culture media (Supplemental figure 1). To further elucidate the regulatory role of HIF-1α, we repeated Experiment 1 with the addition of DMOG instead of creating hypoxic conditions via GasPak EZ with compressive force treatment for 4 h, as DMOG effects were only detectable after this time (Experiment 3, Supplemental information and Figures 2-7).

Figure 1: Schematic representation of different experimental settings affecting oxygen supply and mechanical strain (pressure) on adherently growing macrophages.

2.1.2. Experiment 2: Effects of Mechanical Strain (Pressure) versus Hypoxic Conditions on Macrophages

To experimentally separate mechanotransductive and hypoxic effects on macrophages that occur concomitantly during OTM, we used lumox cell culture dishes (94.6077.331, Sarstedt), with oxygen-permeable membranes, so that the adherently growing cells could still be supplied with oxygen under experimental pressure application, as pressure and hypoxic conditions are induced concomitantly by the glass disc applied (Figure 1). Approximately 250,000 RAW264.7 macrophages per ml were seeded either onto conventional polystyrene plates (353046, Omnilab) or on lumox plates. After 24 h of preincubation, macrophages were either compressed using glass plates with a defined weight of 2 g/cm² according to an established and published model [7, 16, 17] or left untreated for further 24 h (Figure 1). To correspond to the results from repeated Experiment 1 with the addition of DMOG, we also repeated this experiment with compressive force treatment for 4 h (Supplemental figures 8-11).

2.2. RNA Isolation and cDNA Synthesis

After the appropriate incubation times, cell culture medium was removed and adherent RAW264.7 macrophages were scraped off the plates in 1 ml PBS. Cell number was determined using 100 μl of this suspension with a Beckman Coulter Counter Z2™ (Beckman Coulter GmbH, Krefeld, Germany) according to the manufacturer’s instructions. The remaining 900 μl of cell solution was centrifuged at 2,000 rpm and 4°C for 5 min. PBS supernatant was removed, and the cell pellet was dissolved in 500 μl peqGold Trifast (30-2020, Peqlab) and 100 μl chloroform (102445, Merck) was added. After extensive mixing for 30 s, samples were incubated for 15 min on ice and centrifuged at 13,000 rpm and 4°C for 15 min. The upper aqueous phase was transferred into 500 μl isopropanol (220.842.330, VWR). After incubation at -80°C overnight, samples were centrifuged at 13,000 rpm and 4°C for 30 min. The supernatant was removed, and the pellet was washed twice with 80% ethanol (32205, Sigma-Aldrich). The pellet was resuspended in 20 μl RNAse-free water (T143.5, Carl Roth), and RNA concentration was measured in a NanoPhotometer (N60, Implen). Obtained RNA was transcribed to cDNA. To this aim, a master mix was prepared consisting of 2 μl 5x M-MLV buffer (M531A, Promega), 0.5 μl OligodT18 primer (SO 132, Thermo Fisher Scientific), 0.5 μl Random Hexamer Primer (SO142, Thermo Fisher Scientific), 0.5 μl 10 mM dNTPs (L 785.2, Carl Roth), 0.5 μl 40 μ/μl RiboLock RNase Inhibitor (EO 0382, Thermo Fisher Scientific), and 0.5 μl M-MLV reverse transcriptase (M1701, Promega). A standardized RNA amount of 200 ng was used for cDNA synthesis. The synthesis of cDNA was performed in a thermocycler (VWR) at 37°C for 1 h.

2.3. Quantitative Real-Time Polymerase Chain Reaction (RT-qPCR)

RT-qPCR amplification and quality control was performed as described before [7, 17, 20–22] with the Mastercycler® ep realplex-S Thermocycler (Eppendorf AG, Hamburg, Germany). We constructed all primers (Table 1) according to MIQE quality guidelines and criteria as described before [21]. To minimize technical errors during manual pipetting, we used a mastermix for all reactions consisting of 7.5 μl SYBR Green Jumpstart Taq Readymix (S4438, Sigma-Aldrich), 5.25 μl RNAse-free water (T143.5, Carl Roth), and 0.375 μl forward and reverse primers (MWG eurofins, Table 1) for one reaction. 13.5 μl of this mastermix was mixed with 1.5 μl cDNA into each well of a 96-well TW-MT plate (712282, Biozym). Each sample was analysed in technical duplicate. Amplification was performed in 45 cycles (95°C/5 min, per cycle 95°C/10 s, 60°C/8 s, and 72°C/8 s). SYBR Green I fluorescence was quantified at 521 nm at the end of each extension step. For each primer pair and qPCR run, a no-template-control without cDNA was tested to assess a possible bias in results of primer dimers or contaminating DNA. Relative gene expression, used for statistical analysis, was calculated as 2-ΔCq with , divided by the respective arithmetic 2-ΔCq mean of the normoxic/lumox control group without pressure to set its relative gene expression to 1 [4, 16, 20, 23].

Table 1: RT-qPCR gene and primer specifications for reference (Eef1a1, Sdha) and target genes.

Gene symbol
Gene name
Accession number
5-forward primer-3
5-reverse primer-3

Eef1a1
Eukaryotic translation elongation factor 1 alpha 1
NM_010106.2
AAAACATGATTACAGGCACATCCC
GCCCGTTCTTGGAGATACCAG

Sdha
Succinate dehydrogenase complex, subunit A
NM_023281.1
AACACTGGAGGAAGCACACC
AGTAGGAGCGGATAGCAGGAG

Cox-2
Cyclooxygenase-2
NM_011198.4
TCCCTGAAGCCGTACACATC
TCCCCAAAGATAGCATCTGGAC

Hif-1α
Hypoxia inducible factor 1α
NM_001313919.1
CCAAGGAGCCTTAACCTGTCTG
CGCTTCCTCTGAGCATTCTGC

Il-6
Interleukin-6
NM_031168.2
ACAAAGCCAGAGTCCTTCAGAG
GAGCATTGGAAATTGGGGTAGG

Mmp-9
Matrix metalloproteinase 9
NM_013599.4
GTGGGGTTTCTGTCCAGACC
GCACGCTGGAATGATCTAAGC

Tnf
Tumor necrosis factor
NM_013693.3
TCGAGTGACAAGCCTGTAGCC
CTTTGAGATCCATGCCGTTGGC

Vegf
Vascular endothelial growth factor
NM_001287056.1
ACAAGCCTGTAGCCCACGTC
TTGGTTGTCTTTGAGATCCCATGCC

2.4. Enzyme-Linked Immunosorbent Assay (ELISA)

For the analysis of vascular endothelial growth factor (VEGF) and prostaglandin E2 (PG-E2) secretion into the cell culture supernatant, we used commercially available ELISA kits (VEGF: MBS043195, PG-E2: MBS266212, MyBioSource) according to the manufacturers’ instructions.

2.5. Immunoblot

Proteins were isolated using CelLytic M (C2978, Sigma-Aldrich) in combination with proteinase inhibitors (87786, Thermo Fisher Scientific) on ice. Equal amounts of proteins were separated on 8% polyacrylamide gels and transferred to PVDF membranes (T830.1, Carl Roth). After blocking for 1 h in 5% milk in TBS-T, these membranes were incubated with primary HIF-1α antibody (10006421, Cayman, diluted 1 : 1,000) or ACTIN antibody (E1C602, EnoGene, diluted 1 : 5,000) for 1 h at room temperature. After washing three times in TBS-T, membranes were incubated with a secondary antibody (611-1302, Rockland, diluted 1 : 5,000) for 1 h. Detection was performed with luminata Forte Western HRP Substrate (WBLUF0100, Sigma-Aldrich), and pictures were taken using a Genoplex Chemiluminescence system (VWR). Densitometric analysis was done with ImageJ (ver. 1.47, Wayne Rasband, National Institutes of Health, USA).

2.6. Statistical Analysis

Prior to statistical analysis, all absolute data values were divided by the respective arithmetic mean of the normoxic/lumox control group without pressure to obtain normalized data values relative to these controls, set to 1. Statistical analyses were performed using GraphPad Prism 8.0. Horizontal lines in graphs represent the of mean, and each symbol represents a data point. All data were tested for normal distribution and homogeneity of variance (Shapiro-Wilk test, Levene test). Datasets passing both conditions were independently compared by ordinary one-way ANOVA followed by Holm Sidak’s multiple comparison tests, whereas the remaining datasets were compared by Welch-corrected ANOVAs followed by Tamhane’s T2 multiple comparison tests for heterogeneous variances. All differences were considered statistically significant at .

3. Results

3.1. Impact of Mechanical Strain (Pressure) and Oxygen Supply on HIF-1α Expression and Stabilization

First, we investigated the impact of oxygen and compressive force treatment on gene expression of Hif-1α. Neither reduced oxygen supply () alone nor compressive force treatment under normoxic () or hypoxic conditions () affected Hif-1α gene expression (Figure 2(a)). Accordingly, we detected no changes in Hif-1α gene expression with pressure on gas-impermeable plates () or gas-permeable plates (, Figure 2(b)). HIF-1α protein was stabilized under normoxic conditions with pressure application (, Figure 2(c)). As expected, more HIF-1α protein was detectable under hypoxic conditions (). Surprisingly, this stabilization of HIF-1α was prevented, when compressive force was applied under hypoxic conditions in macrophages (; Figure 2(c)). In contrast to gas-impermeable plates, where we could detect HIF-1α stabilization (), usage of gas-permeable plates significantly prevented HIF-1α protein stabilization after pressure application (; Figure 2(d)).

(a)

(b)

(c)

(d)

Figure 2: (a) Hif-1α gene expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (b) Hif-1α gene expression on gas-impermeable or gas-permeable plates with or without pressure application. Reference genes: Eef1a1 and Sdha. (c) HIF-1α protein expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. Below: representative immunoblot. (d) HIF-1α protein expression on gas-impermeable or gas-permeable plates with or without pressure application. Below: representative immunoblot. Statistics: ANOVA followed by Holm Sidak’s or Tamhane’s T2 multiple comparison tests; AU = arbitrary units; ; ; .

3.2. Effects of Mechanical Strain (Pressure) and Oxygen Supply on Gene Expression of Inflammatory Genes

Next, we investigated the gene expression of inflammatory genes tumor necrosis factor (Tnf) and interleukin-6 (Il-6), which are known to play an important role during orthodontic tooth movement, but are not common HIF-1α target genes.

Tnf gene expression was enhanced after compressive force treatment under normoxic conditions (). Hypoxia reduced Tnf gene expression under control conditions () and with pressure treatment (; Figure 3(a)). Of note, an inductive effect of compressive force was still detectable under hypoxic conditions (; Figure 3(a)). Accordingly, we observed enhanced Tnf gene expression on gas-impermeable plates (; Figure 3(b)). This effect was not detectable with gas-permeable plates () leading to a significant effect of oxygen supply under compressive force treatment (; Figure 3(b)).

(a)

(b)

(c)

(d)

Figure 3: (a) Tnf gene expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (b) Tnf gene expression on gas-impermeable or gas-permeable plates with or without pressure application. (c) Il-6 gene expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (d) Il-6 gene expression on gas-impermeable or gas-permeable plates with or without pressure application. Reference genes: Eef1a1 and Sdha. Statistics: ANOVA followed by Holm Sidak’s or Tamhane’s T2 multiple comparison tests; AU = arbitrary units; ; ; .

Gene expression of Il-6 was significantly elevated after pressure application in macrophages under normoxic conditions (, Figure 3(c)) and on gas-impermeable plates (, Figure 3(d)). Hypoxia increased Il-6 gene expression without pressure application (), while the pressure-derived effect was no longer observed (; Figure 3(c)). Reduction of oxygen thereby seems to prevent the mechanotransductive effect on Il-6 expression (; Figure 3(c)). Improved oxygen supply due to gas-permeable plates restored the pressure effect on Il-6 gene expression (; Figure 3(d)). Nevertheless, we observed a significantly reduced Il-6 expression after compressive force treatment on gas-permeable plates (; Figure 3(d)).

3.3. Effects of Mechanical Strain (Pressure) and Oxygen Supply on the Expression of HIF-1α Target Genes Involved in Orthodontic Tooth Movement

Matrixmetalloproteinase-9 (Mmp-9) is involved in extracellular matrix reorganization, which takes place during orthodontic tooth movement, and its expression is known to be controlled by HIF-1α. Therefore, we tested if Mmp-9 expression is affected by pressure or oxygen supply. Mmp-9 gene expression was elevated after compressive force application under normoxic conditions (; Figure 4(a)) and on gas-impermeable plates (; Figure 4(b)). As expected, hypoxia increased Mmp-9 gene expression without additional compressive force treatment (), while no additional effect of pressure was detectable under hypoxic conditions (; Figure 4(a)). On gas-permeable plates, compressive force enhanced Mmp-9 gene expression (), while improved oxygen supply did not impact on Mmp-9 expression under control () or pressure conditions (; Figure 4(b)).

(a)

(b)

Figure 4: (a) Mmp-9 gene expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (b) Mmp-9 gene expression on gas-impermeable or gas-permeable plates with or without pressure application. Reference genes: Eef1a1 and Sdha. Statistics: ANOVA followed by Holm Sidak’s or Tamhane’s T2 multiple comparison tests; AU = arbitrary units; ; ; .

Next, we investigated gene expression of cyclooxygenase-2 (Cox-2), which is regulated by HIF-1α under hypoxia and involved in orthodontic tooth movement by enhancing production of prostaglandin E2 (PG-E2). Cox-2 expression was increased after pressure application under normoxic () and hypoxic conditions (; Figure 5(a)). As expected, Cox-2 expression was elevated under hypoxic conditions without () and with additional mechanical strain (; Figure 5(a)). According to the gene expression data, we detected enhanced PG-E2 secretion after compressive force treatment under normoxic () and hypoxic conditions (; Figure 5(b)). Hypoxia elevated PG-E2 secretion without () and with additional compressive force treatment (; Figure 5(b)). Pressure application increased Cox-2 gene expression even on gas-permeable plates with improved oxygen supply (; Figure 5(c)). In line with that, improved oxygen supply during compressive force treatment did not impact on increased PG-E2 secretion (; Figure 5(d)).

(a)

(b)

(c)

(d)

Figure 5: (a) Cox-2 gene expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (b) PG-E2 secretion under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (c) Cox-2 gene expression on gas-impermeable or gas-permeable plates with or without pressure application. (d) PG-E2 secretion on gas-impermeable or gas-permeable plates with or without pressure application. Reference genes: Eef1a1 and Sdha. Statistics: ANOVA followed by Holm Sidak’s or Tamhane’s T2 multiple comparison tests; AU = arbitrary units; ; ; .

One main purpose of HIF-1α is to improve oxygen supply during hypoxic conditions. Therefore, the expression of vascular endothelial growth factor (VEGF), which is responsible for angiogenesis, is controlled among others by HIF-1α. Under normoxic conditions, pressure application was associated with enhanced Vegf gene expression (). Hypoxia increased Vegf under control conditions without compressive force application (; Figure 6(a)). Under hypoxic conditions, pressure application failed to induce Vegf gene expression (; Figure 6(a)).

(a)

(b)

(c)

(d)

Figure 6: (a) Vegf gene expression under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (b) VEGF secretion under normoxic or hypoxic cell culture conditions with or without compressive force treatment. (c) Vegf gene expression on gas impermeable or gas permeable plates with or without pressure application. (d) VEGF secretion on gas-impermeable or gas-permeable plates with or without pressure application. Reference genes: Eef1a1 and Sdha. Statistics: ANOVA followed by Holm Sidak’s or Tamhane’s T2 multiple comparison tests; AU = arbitrary units; ; .

Accordingly, VEGF protein secretion was increased after pressure application under normoxic () and hypoxic conditions (; Figure 6(b)). Hypoxia itself increased VEGF secretion without () and with compressive force treatment (; Figure 6(b)). We detected elevated Vegf gene expression on gas-impermeable plates after pressure treatment (). This effect was circumvented on gas-permeable plates (; Figure 6(c)). Improved oxygen supply showed no effect on VEGF secretion, as we detected an inductive pressure effect on gas-impermeable () and gas-permeable plates (; Figure 6(d)).

4. Discussion

The aim of this study was to examine the effects of oxygen supply versus mechanical strain (pressure) occurring during orthodontic tooth movement (OTM) on macrophages. Therefore, we investigated stabilization of HIF-1α in macrophages and expression of genes involved in OTM and of common HIF-1α target genes and proteins.

Normally, HIF-1α is stabilized under hypoxia to counteract these hypoxic conditions and to improve cell survival [2, 24]. Due to the constant expression of the Hif-1α mRNA, HIF-1α protein is continuously formed [12]. Depending on the surrounding oxygen content, it is degraded under normoxic conditions and stabilized under hypoxia. HIF-1α degradation is initiated by an oxygen-dependent hydroxylation of its proline and asparagine amino acids, whereupon the Von Hippel Lindau protein can bind to HIF-1α. Subsequent ubiquitination then enables degradation of HIF-1α in the proteasome [12]. In line with that, we found no changes in Hif-1α gene expression under hypoxic conditions or during pressure application, although we detected more HIF-1α protein upon both tested conditions with a combination of hypoxia and compressive force treatment preventing HIF-1α stabilization. Next to oxygen content, HIF-1α degradation was reported to be controlled by other mechanisms [25, 26]. These authors found that with the withdrawal of glucose, less HIF-1α was stabilized than in an ischemia control group, despite ischemia. The authors also hypothesize that the transcriptional activity of HIF-1α is less induced by severe ischemia than by a slight lack of oxygen [25]. Furthermore, it was reported that enhanced Na⁺ levels under inflammatory conditions were accompanied by HIF-1α protein stabilization [26]. The usage of gas-permeable plates prevented the stabilizing effect of compressive force treatment, indicating that stabilization of HIF-1α protein after pressure application in macrophages was rather triggered by the reduced oxygen supply than via mechanotransduction by the mechanical strain (pressure) applied. These results were contrary to data obtained with periodontal ligament fibroblasts [17]. Using a similar setup with gas-permeable plates, these were found to stabilize HIF-1α protein mainly via mechanotransduction due to the mechanical strain (pressure) applied with oxygen supply playing only a minor role on HIF-1α stabilization [17].

Tumor necrosis factor (Tnf) and interleukin 6 (Il-6) belong to the group of proinflammatory cytokines, which are, among others, produced by macrophages [27]. The inflammatory response that occurs during orthodontic tooth movement (OTM) usually takes place under sterile conditions [1]. Damage-associated molecular patterns are released by necrotic cell death so that the inflammatory cascade can begin [28]. As an initial reaction, cytokines such as TNF and IL-6 are secreted [7]. Both inflammation markers are significantly involved in OTM but are not known classical HIF-1α target genes [29]. Both HIF-1α and TNF were increased in gingival crevicular fluid both in chronic and in aggressive forms of periodontitis [30]. In this study, pressure application increased Tnf and Il-6 gene expression, while reduction of oxygen reduced gene expression of both genes in macrophages. Of note, compressive force still enhanced Tnf, but not Il-6 mRNA even under hypoxic conditions. Surprisingly, improved oxygen supply during mechanical strain prevented an upregulation of Tnf gene expression, while Il-6 gene expression was still elevated, indicating a regulatory role of oxygen supply or HIF-1α stabilization in the regulation of Tnf. It is already known that TNF stabilizes HIF-1α in tubular cells [31]. Judging from the results, proinflammatory cytokine secretion would be mainly due to mechanical compression, which could be partially compensated by improved oxygenation. Periodontal ligament fibroblasts and dental pulp cells were reported to react to mechanical compression by upregulating IL-6 [29, 32] documenting an important role in tooth movement and bone remodelling.

Matrix metalloproteinases (MMPs) are also involved in these remodelling processes and are mainly responsible for the breakdown of the extracellular matrix during orthodontic tooth movement [1, 33, 34]. Macrophages react to pressure application and hypoxia with an upregulation of Mmp-9 gene expression, which is known to be regulated by HIF-1α [35]. As Mmp-9 remained increased even with improved oxygen supply upon compressive force treatment, it seemed unlikely that upregulation is mediated via HIF-1α in the context of pressure application. Next to HIF-1α, Mmp-9 expression could also be regulated by reactive oxygen species and TNF [36].

Another HIF-1α target gene is cyclooxygenase-2 (Cox-2), which in contrast to the constitutively expressed COX-1 is produced during inflammation and catalyses the formation of prostaglandins from arachidonic acid [27]. Prostaglandin-E2 (PG-E2) can increase vascular permeability on site and has a chemotactic effect. It can also promote bone resorption by promoting the formation of osteoclasts via the RANKL/OPG cascade [17, 27]. Cox-2 gene expression was rapidly enhanced after 2 h of pressure application [7]. Here, we detected an increase of Cox-2 and PG-E2 with compressive force, which was even potentiated by hypoxic conditions. An improved oxygen supply nevertheless showed pressure induction in both gene and protein expression, although HIF-1α was not stabilized. Next to HIF-1α, Cox-2 gene expression can also be controlled by NF-κB [32]. In line with the data obtained in macrophages, Cox-2 gene expression was not affected by improved oxygen supply during compressive force treatment [17].

The main purpose of HIF-1α is to improve oxygen supply in tissues [24]. Therefore, HIF-1α controls expression of vascular endothelial growth factor (VEGF), which is described in the literature as the most important mediator of angiogenesis and vascular permeability [2, 12, 14, 24]. In this study, VEGF gene and protein expression was increased by pressure induction as well as by hypoxia, with a potentiating effect, when combining both factors. These results were also associated with HIF-1α stabilization. In spite of an improved oxygen supply, a significant pressure effect on the protein level could be shown, which was, however, less pronounced than on gas-impermeable plates.

5. Conclusions

With our study, we were able to further elucidate the complex multicellular pseudoinflammatory processes and their regulation within the periodontal ligament enabling therapeutic orthodontic tooth movement (OTM). Mechanical compressive strain as occurring during OTM in pressure zones of the periodontal ligament has a mechanotransductive effect on compressed cells and reduces oxygen supply by compression of blood vessels. In this study, we separated and uncoupled both effects by using gas-permeable compared to gas-impermeable plates and by inducing hypoxia compared to normoxia. HIF-1α was not stabilized by compressive force treatment on gas-permeable plates, which provide sufficient oxygen supply. This indicates that in macrophages HIF-1α stabilization is rather induced via the decreased oxygen supply associated with OTM than via mechanotransduction by mechanical strain. As the opposite is true in periodontal ligament fibroblasts, as reported before, our results thus indicate that both cell types involved in the mediation of orthodontic tooth movement are affected and respond differently to hypoxic conditions and mechanical compressive strain, which occur concomitantly during OTM, thus indicating different roles in the regulation of OTM at the cellular-molecular level.

Data Availability

All datasets are publically available upon request from the corresponding author.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this paper.

Authors’ Contributions

C.K. and A.S. conceived the idea of the study and study design. J.J., P.P., L.G., and J.D. contributed to the study design and interpretation of results. L.B. and A.S. performed the experiments. C.K. and A.S. analysed the results. A.S. and C.K. wrote the manuscript and created the figures, tables, and the supplementary material. All authors reviewed the manuscript.

Acknowledgments

The authors thank medical technical assistant Mrs. Eva Zaglauer for her technical support in performing the cell culture experiments. The authors also thank the German Research Foundation (DFG) for their financial support and funding of this study (grant number KI2105/1-2).

Supplementary Materials

Material and methods in vitro cell culture experiments. (Supplementary Materials)

References

M. C. Meikle, “The tissue, cellular, and molecular regulation of orthodontic tooth movement: 100 years after Carl Sandstedt,” The European Journal of Orthodontics, vol. 28, no. 3, pp. 221–240, 2005.

A. Niklas, P. Proff, M. Gosau, and P. Römer, “The Role of Hypoxia in Orthodontic Tooth Movement,” International Journal of Dentistry, vol. 2013, 841847 pages, 2013.

M. Wolf, S. Lossdörfer, P. Römer et al., “Short-term heat pre-treatment modulates the release of HMGB1 and pro-inflammatory cytokines in hPDL cells following mechanical loading and affects monocyte behavior,” Clinical Oral Investigations, vol. 20, no. 5, pp. 923–931, 2016.

A. Schröder, E. C. Küchler, M. Omori, G. Spanier, P. Proff, and C. Kirschneck, “Effects of ethanol on human periodontal ligament fibroblasts subjected to static compressive force,” Alcohol, vol. 77, pp. 59–70, 2019.

M. Wolf, S. Lossdörfer, J. Marciniak et al., “CD8+ T cells mediate the regenerative PTH effect in hPDL cells via Wnt10b signaling,” Innate Immunity, vol. 22, no. 8, pp. 674–681, 2016.

Z. Davidovitch, “Tooth movement,” Critical Reviews in Oral Biology and Medicine, vol. 2, pp. 411–450, 2016.

A. Schröder, P. Käppler, U. Nazet et al., “Effects of compressive and tensile strain on macrophages during simulated orthodontic tooth movement,” Mediators of Inflammation, vol. 2020, Article ID 2814015, 2814010 pages, 2020.

D. He, X. Kou, R. Yang et al., “M1-like macrophage polarization promotes orthodontic tooth movement,” Journal of Dental Research, vol. 94, no. 9, pp. 1286–1294, 2015.

G. A. Duque and A. Descoteaux, “Macrophage cytokines: involvement in immunity and infectious diseases,” Frontiers in Immunology, vol. 5, p. 491, 2014.

M. Tsukasaki and H. Takayanagi, “Osteoimmunology: evolving concepts in bone-immune interactions in health and disease,” Nature Reviews. Immunology, vol. 19, no. 10, pp. 626–642, 2019.

S. Cox and A. N. Prasad, Molecular Level Reactions to Orthodontic Force: A Guide to Unravel the Complexities in the Biology of Tooth Movement,, LAP LAMBERT Academic Publishing, Saarbrücken, 2019.

Q. Ke and M. Costa, “Hypoxia-inducible factor-1 (HIF-1),” Molecular Pharmacology, vol. 70, no. 5, pp. 1469–1480, 2006.

T. Hellwig-Bürgel, D. P. Stiehl, A. E. Wagner, E. Metzen, and W. Jelkmann, “Review:hypoxia-inducible factor-1 (HIF-1): a novel transcription factor in immune reactions,” Journal of Interferon & Cytokine Research, vol. 25, no. 6, pp. 297–310, 2005.

A. Zagórska and J. Dulak, “HIF-1: the knowns and unknowns of hypoxia sensing,” Acta Biochimica Polonica, vol. 51, no. 3, pp. 563–585, 2004.

Y. S. Bakhle and R. M. Botting, “Cyclooxygenase-2 and its regulation in inflammation,” Mediators of Inflammation, vol. 5, no. 5, Article ID 502304, 323 pages, 1996.

A. Schröder, K. Bauer, G. Spanier, P. Proff, M. Wolf, and C. Kirschneck, “Expression kinetics of human periodontal ligament fibroblasts in the early phases of orthodontic tooth movement,” Journal of Orofacial Orthopedics, vol. 79, no. 5, pp. 337–351, 2018.

N. Ullrich, A. Schröder, J. Jantsch, G. Spanier, P. Proff, and C. Kirschneck, “The role of mechanotransduction versus hypoxia during simulated orthodontic compressive strain–an in vitro study of human periodontal ligament fibroblasts,” International Journal of Oral Science, vol. 11, no. 4, p. 33, 2019.

H. Kanzaki, M. Chiba, Y. Shimizu, and H. Mitani, “Periodontal ligament cells under mechanical stress induce osteoclastogenesis by receptor activator of nuclear factor κB ligand up-regulation via prostaglandin E₂ synthesis,” Journal of Bone and Mineral Research, vol. 17, no. 2, pp. 210–220, 2002.

P. A. Heasman, D. T. Millett, and N. E. Carter, “Orthodontic treatment in adults with periodontally involved labial segments,” Dental Update, vol. 21, no. 3, pp. 122–128, 1994.

V. Koretsi, C. Kirschneck, P. Proff, and P. Römer, “Expression of glutathione peroxidase 1 in the spheno-occipital synchondrosis and its role in ROS-induced apoptosis,” European Journal of Orthodontics, vol. 37, no. 3, pp. 308–313, 2015.

C. Kirschneck, S. Batschkus, P. Proff, J. Köstler, G. Spanier, and A. Schröder, “Valid gene expression normalization by RT-qPCR in studies on hPDL fibroblasts with focus on orthodontic tooth movement and periodontitis,” Scientific reports, vol. 7, no. 1, p. 14751, 2017.

C. Kirschneck, P. Proff, J. Fanghänel, M. Wolf, J. C. Roldán, and P. Römer, “Reference genes for valid gene expression studies on rat dental, periodontal and alveolar bone tissue by means of RT-qPCR with a focus on orthodontic tooth movement and periodontitis,” Annals of Anatomy, vol. 204, pp. 93–105, 2016.

K. J. Livak and T. D. Schmittgen, “Analysis of Relative Gene Expression Data Using Real-Time Quantitative PCR and the 2−ΔΔ _C_ T Method,” Methods, vol. 25, no. 4, pp. 402–408, 2001.

A. A. Tirpe, D. Gulei, S. M. Ciortea, C. Crivii, and I. Berindan-Neagoe, “Hypoxia: overview on hypoxia-mediated mechanisms with a focus on the role of HIF genes,” International Journal of Molecular Sciences, vol. 20, no. 24, p. 6140, 2019.

A. Serra-Pérez, A. M. Planas, A. Núñez-O'Mara et al., “Extended ischemia prevents HIF1α degradation at reoxygenation by impairing prolyl-hydroxylation,” The Journal of Biological Chemistry, vol. 285, no. 24, pp. 18217–18224, 2010.

P. Neubert, A. Weichselbaum, C. Reitinger et al., “HIF1A and NFAT5 coordinate Na⁺-boosted antibacterial defense via enhanced autophagy and autolysosomal targeting,” Autophagy, vol. 15, no. 11, pp. 1899–1916, 2019.

M. Yamaguchi and K. Kasai, “Inflammation in periodontal tissues in response to mechanical forces,” Archivum Immunologiae et Therapiae Experimentalis, vol. 53, no. 5, pp. 388–398, 2005.

G. Y. Chen and G. Nuñez, “Sterile inflammation: sensing and reacting to damage,” Nature Reviews. Immunology, vol. 10, no. 12, pp. 826–837, 2010.

N. Alhashimi, L. Frithiof, P. Brudvik, and M. Bakhiet, “Orthodontic tooth movement and de novo synthesis of proinflammatory cytokines,” American Journal of Orthodontics and Dentofacial Orthopedics, vol. 119, no. 3, pp. 307–312, 2001.

B. Afacan, V. Ö. Öztürk, Ç. Paşalı, E. Bozkurt, T. Köse, and G. Emingil, “Gingival crevicular fluid and salivary HIF-1α, VEGF, and TNF-α levels in periodontal health and disease,” Journal of Periodontology, vol. 90, no. 7, pp. 788–797, 2018.

J. Zhou, J. Fandrey, J. Schümann, G. Tiegs, and B. Brüne, “NO and TNF-alpha released from activated macrophages stabilize HIF-1alpha in resting tubular LLC-PK1 cells,” American Journal of Physiology-Cell Physiology, vol. 284, no. 2, pp. C439–C446, 2003.

P. Römer, M. Wolf, J. Fanghänel, C. Reicheneder, and P. Proff, “Cellular response to orthodontically-induced short-term hypoxia in dental pulp cells,” Cell and Tissue Research, vol. 355, no. 1, pp. 173–180, 2014.

R. A. Nichols, F. D. Niagro, J. L. Borke, and M. F. Cuenin, “Mechanical stretching of mouse calvarial osteoblasts in vitro models changes in MMP-2 and MMP-9 expression at the bone-implant interface,” The Journal of Oral Implantology, vol. 42, no. 2, pp. 138–144, 2016.

R. C. Almeida, J. Capelli, and R. P. Teles, “Levels of gingival crevicular fluid matrix metalloproteinases in periodontally compromised teeth under orthodontic forces,” The Angle Orthodontist, vol. 85, no. 6, pp. 1009–1014, 2015.

W. Liu, S.-M. Shen, X.-Y. Zhao, and G.-Q. Chen, “Targeted genes and interacting proteins of hypoxia inducible factor-1,” International Journal of Biochemistry and Molecular Biology, vol. 3, no. 2, pp. 165–178, 2012.

A. Yabluchanskiy, Y. Ma, R. P. Iyer, M. E. Hall, and M. L. Lindsey, “Matrix metalloproteinase-9: many shades of function in cardiovascular disease,” Physiology, vol. 28, no. 6, pp. 391–403, 2013.