Minimally Invasive Surgery
Volume 2018 (2018), Article ID 7646831, 1 page
https://doi.org/10.1155/2018/7646831

Corrigendum

Corrigendum to “A Comparative Study in Learning Curves of Two Different Intracorporeal Knot Tying Techniques”

Manuneethimaran Thiyagarajan and Chandru Ravindrakumar

General Surgery Department, Sri Ramachandra Medical University, Chennai, India

Correspondence should be addressed to Chandru Ravindrakumar; chandru684@gmail.com

Received 16 April 2018; Accepted 22 April 2018; Published 20 May 2018

Copyright © 2018 Manuneethimaran Thiyagarajan and Chandru Ravindrakumar. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Comparative Study in Learning Curves of Two Different Intracorporeal Knot Tying Techniques” [1], Dr. Manuneethimaran Thiyagarajan was incorrectly listed as the corresponding author. The corresponding author is Dr. Chandru Ravindrakumar.

References

M. Thiyagarajan and C. Ravindrakumar, “A comparative study in learning curves of two different intracorporeal knot tying techniques,” Minimally Invasive Surgery, vol. 2016, Article ID 3059434, 7 pages, 2016.