Mobile Information Systems
Volume 2015 (2015), Article ID 473763, 7 pages
http://dx.doi.org/10.1155/2015/473763

Research Article

R²S: Radio Resource Sharing for Wireless Network Reliability in Internet of Things

Kisong Lee¹ and Howon Lee²

¹Department of Information and Telecommunication Engineering, Kunsan National University, Gunsan 573-701, Republic of Korea
²Department of Electrical, Electronic and Control Engineering and IITC, Hankyong National University, Anseong, Gyeonggi 456-749, Republic of Korea

Received 11 April 2015; Revised 24 July 2015; Accepted 27 July 2015

Academic Editor: David Grace

Copyright © 2015 Kisong Lee and Howon Lee. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Internet of Things is a system where people and things with unique identifiers are connected and able to interact with each other over a network without external intervention. To connect things anytime, network reliability is one of the main requirements for the Internet of Things, in which continuous service can be provided to nodes even in the event of a sudden network failure. To serve consistent quality of service for nodes in any case, we propose a radio resource sharing (R²S) method which consists of scheduling and power allocation using an optimization method. By evaluating performances with respect to average cell capacity and outage probability in simulations, we show that the R²S algorithm can solve a coverage hole problem efficiently in Internet of Things.

1. Introduction

The Internet of Things (IoT) is essentially a system of connected things outfitted with data-collecting and data-processing technologies so that those things can interact and communicate among themselves and with the environment [1, 2]. In the IoT, people and things (e.g., RFID tags, sensors, actuators, machine-to-machine devices, and mobile phones) might be connected anytime, anyplace, with anything and anyone. There are several application domains which will be impacted by the emerging IoT such as city administration, education, healthcare, public safety, real estate, and transportation.

In the emerging IoT for the next decade, a new paradigm shift is required to deal with challenges on explosively growing requirements in mobile data traffic volume (1000x), number of connected devices (10~100x), typical end user data rate (10~100x), device/network lifetime (10x), and reduced end-to-end latency (5x) [3]. In order to accommodate these demands, next generation 5G mobile and wireless communication systems need to be further evolved based on fundamental and innovative rethinking of the conventional mobile and wireless communication systems. Although the current 4G systems have been successfully evolving to fulfill current demands up to now, satisfying all the new requirements is still beyond their capacity such as stringent latency, traffic volume density, and reliability. Accordingly, we focus on this new 5G requirement, reliability, in this paper.

In the 3GPP long term evolution, a self-organizing network (SON) is a promising technology that can provide a set of automated mechanisms, including self-configuration, self-optimization, and self-healing [4, 5]. In the case of dynamic removal and installation of an indoor base station (IBS) or its failure, nodes can experience discontinuity in the service. Therefore, self-healing is an important issue to deal with network failures automatically, thereby providing customers with reliable communication services in the 3GPP-LTE system. The processes for managing network failure can be divided into three phases, namely, failure detection, diagnosis, and recovery [6]. However, previous studies have tended to focus on the accuracy of failure detection and diagnosis [6–8], rather than methods for repairing failures.

In order to provide reliable communication services for all users, [9] proposed a cooperative beamforming based self-healing algorithm. This centralized algorithm could resolve the network failure effectively. However unrealistic perfect synchronization, the enormous amount of messages passing, and high computational complexity among base stations are required to operate this algorithm. In [10], a newly defined healing channel and a heuristic resource allocation algorithm based on an opportunistic base station selection were proposed to resolve the abrupt network fault. Because this algorithm utilized an equal power allocation, the network throughput was degraded remarkably as the price for repairing network failure although it could be operated simply. Also, the SOCRATES project under the 7th Framework Program (FP7) proposed a centralized framework for cell outage management in [11, 12]. It consists of cell outage detection with continuous and event-triggered measurements and cell outage compensation (COC) based on adjustment of control parameters such as downlink power, uplink interference level, and antenna tilt. However, COC is basically proposed for the macrocell-type environment, so it is difficult to directly apply to indoor communication systems.

In case of a classical handover algorithm utilized in current wireless communication systems, the nodes in faulty indoor cells (-nodes) whose SINR value is less than a handover threshold cannot have access to other normal IBSs any more because the normal IBSs do not utilize any algorithms to serve the -nodes especially. As a result, the -nodes have difficulty in receiving a continuous service. This motivates us to investigate the research for the wireless network reliability.

In this paper, we propose a method of maintaining quality of service (QoS) for nodes in the event of a sudden network failure, via a radio resource sharing (R²S) algorithm in OFDMA-based (orthogonal frequency-division multiple accessing) indoor communication systems. The R²S algorithm consists of scheduling and power allocation, which is found using an optimization technique: (i) In scheduling, each IBS assigns subchannels to the node which can achieve the largest rate among nodes which cannot satisfy QoS preferentially. Since IBSs consider -nodes as well as their own nodes for scheduling, -nodes can be also served by one of the normal IBSs, which is called a generous IBS (G-IBS). (ii) In power allocation, each IBS takes account of interference that it causes to the others in accordance with the maximization of system throughput. At the same time, IBSs adjust allocated power by controlling Lagrangian multiplier to guarantee QoS for nodes.

Our main contributions can be summarized as follows:

(i)It is important to serve nodes in faulty cells without degrading the service quality of the nodes included in normal cells. Thus, we propose a practical self-healing algorithm for improving wireless network reliability in consideration of the satisfaction of all nodes in the indoor wireless communications systems.(ii)We reformulate the original problem, a mixed binary integer, and nonconvex problem, as a tractable form, and find the suboptimal solution for scheduling and power allocation by using an optimization technique. Based on the obtained solution, we propose the R²S algorithm based on an iterative method.(iii)We demonstrate that the R²S algorithm reliably supports nodes in faulty cells as well as normal cells through intensive simulations, thereby improving average cell capacity and reducing outage probability simultaneously.

The remainder of the paper is organized as follows. In Section 2, we describe OFDMA-based indoor IoT system. In Section 3, we propose a radio resource sharing algorithm. In Section 4, the performances of the proposed algorithm are evaluated. Finally, we make conclusions in Section 5.

2. System Model

We consider OFDMA-based indoor IoT systems in which some nodes cannot be served due to the failure of the IBS, as shown in Figure 1. If the operation of the IBS is failed suddenly, the nodes covered by that IBS cannot be served any more. When the IBS is disabled, a centralized cloud operator (CCO) becomes aware of the fault by simple signaling based on the Simple Network Management Protocol (SNMP), because the disabled IBS cannot send any message or report on its status. Nodes whose connection is terminated abnormally can find the preamble or pilot of nearby IBSs. Based on the detected signals from normal IBSs, -nodes can access one of the normal IBSs.

Figure 1: System model of OFDMA-based indoor IoT systems.

We assume the following. (i) There are subchannels in each cell, each of which is used by just one node. Thus, there exists intercell interference. (ii) Information on instantaneous channel quality can be acquired perfectly at IBSs. (iii) Nodes in indoor cells are stationary or move slowly [13]; thus channel quality does not vary during the transmission of a packet. (iv) Interference from a macrobase station (MBS) is dominated by path loss, so the fast-fading effect on subchannels is negligible. Therefore, the interference from the MBS is considered as additive white Gaussian noise (AWGN). We use the following parameters to describe the system model.

(i), , and are a set of total, normal, and faulty cells, respectively. Consider . Let , , and .(ii) is a set of total subchannels. Let .(iii), , and are a set of total nodes, a set of nodes in a cell , and a set of nodes in faulty cells. Consider and . Let , , and .(iv) is required rate for node to satisfy the quality of service.(v) and are channel assignment indicator whether an IBS assigns a subchannel to a node or not and the set of for .(vi) and are allocated power for a subchannel in a cell and the set of for .(vii) is maximum power allocated to IBSs.(viii) is channel gain of a subchannel between a node and an IBS .

When node is served by IBS through subchannel , its data rate is written as

Also, the signal to interference and noise ratio (SINR), , can be expressed as

Here, is the total interference on subchannel experienced by node served by IBS and contains the effect of interference from the MBS as well as AWGN. Then, the optimization problem whose objective is to maximize system throughput can be formulated as follows:

Here, means that all elements of are greater than or equal to . In (3), -nodes as well as normal nodes are considered for maintaining reliability when IBSs perform a resource allocation. Constraint C1 assures that all nodes including -nodes need to be served with at least the required data rate. In constraint C2, if IBS assigns subchannel to node , . Otherwise, . Constraint C3 indicates that each subchannel is assigned to only one node. Constraint C4 limits the available transmitting power of IBSs by .

3. R²S: A Radio Resource Sharing for Wireless Network Reliability

We relax the constraint C2 by allowing to be a real value, such as , since (3) is a mixed binary integer and nonconvex problem. However, it is nondeterministic polynomial-time (NP) hard to find a global optimal solution because of its nonconvexity. Therefore, we propose an iterative resource allocation algorithm that can be implemented in a centralized manner to find the suboptimal solution efficiently. To find scheduling and power allocation strategy, we consider the Lagrangian function of (3) as in

Here, , , and are the set of nonnegative Lagrangian multipliers. We can find by taking the derivative of (4) with respect to :

Here, is the marginal benefit, which indicates how much can be increased if IBS assigns subchannel to node . Therefore, it is the best way to assign subchannel to the node which has the largest marginal benefit. Scheduling strategy can be represented by

We can denote as the node scheduled by IBS for subchannel and as the set of for . Scheduling strategy has the following interpretations. In (5), is proportional to and . This means that subchannel is assigned to the node which can achieve large preferentially. In addition, is increased if the data rate of node is less than since can be updated according to a gradient algorithm. Thus, the node whose data rate is less than can be scheduled by IBSs with high probability for ensuring . In short, IBSs consider data rate and rate requirement simultaneously for scheduling.

In the case of -nodes, such that , multiple normal IBSs can assign subchannel to the same -node at the same time. In this case, the -node should choose the best G-IBS that sends the strongest signal for subchannel , according to

Next, each IBS performs power allocation for the scheduled nodes . By taking the derivative of (4) with respect to , we can obtain from the Karush-Kuhn-Tucker (KKT) conditions

Here, and a taxation term is defined as

Also, let be the set of for .

In (8), IBS regards interference from other IBSs as noise; thus it can easily measure an inverse SINR value . Based on this value, IBS allocates more power to the subchannel that has a good SINR value. In addition, is related to the guarantee of for node . If the rate of node is lower than , IBS allocates more power to subchannel by increasing according to a gradient algorithm, in order to increase the rate of node for ensuring rate requirement. In addition, the taxation term can be interpreted as the sum of the interference that IBS causes to nodes covered by the other IBSs for subchannel [14]. In view of maximizing sum rates, each IBS reduces the amount of power on subchannel by increasing to reduce the interference that it causes for the other IBSs. As a result, system throughput can be assured to large value.

Based on the obtained and , Lagrangian multipliers can be updated by a bisection algorithm or a gradient algorithm. In the case of using the gradient algorithm, and can be updated as

Here, and are step sizes that are sufficiently small to guarantee the convergence. and are adjusted to guarantee constraints C1 and C4. However, corresponding to constraint C2 does not need to be updated since the relaxed real value returns to integer value in (6). The overall procedures of the R²S algorithm are described in Algorithm 1.

) Initialize and

() repeat

()            

()            Find according to (6),

()            if  

()                Select the generous-IBS (G-IBS) according to (7), for

()            end if

()            Calculate according to (8) and (9)

()            Update Lagrangian multipliers, and

() until   and converge or

Algorithm 1: Radio resource sharing (R²S) algorithm.

4. Simulation Results and Discussions

For the simulations, we assumed that there are four indoor cells, each of which had a radius of 10 m. We set , , ,  GHz, and  bits/s/Hz. We also defined as the ratio of node density between a normal and a faulty indoor cell in order to evaluate the performances in various environments. When , nodes were equally distributed in all indoor cells. When , twice as many nodes were generated in a faulty indoor cell asymmetrically. The bandwidth was 10 MHz and the thermal noise density was −174 dBm/Hz. The transmission powers of an IBS and an MBS were 15 dBm and 43 dBm, respectively. For the wireless channel, we utilized frequency selective Rayleigh fading generated by a Jakes fading model, and each subchannel experienced a frequency flat fading. The pathloss model for a macrocell was a modified Okumura-Hata model [15] and the pathloss model for an indoor cell was a modified COST-231 multiwall model [16]. The average cell capacity and the outage probability, , were used as performance metrics.

We compared the performance of the following algorithms:

(i)R²S is proposed algorithm.(ii)R²-NS (nonsharing): normal IBSs do not take any actions for serving -nodes, but they use the proposed scheduling and power allocation to support their own nodes.(iii)EPA: normal IBSs serve their own nodes and -nodes by using the proposed scheduling and equal power allocations. This is the modified version of the EPA-OIS algorithm [10] to consider constraint C1 about the requirement ensuring for the minimum data rate.(iv)EPA-NS: normal IBSs do not take any actions for serving -nodes, but they use the proposed scheduling and equal power allocations to support their own nodes.

The R²S and EPA algorithms utilize the same scheduling but different power allocation. Thus, we demonstrated the performance gain achieved by power allocation by comparing the R²S algorithm with the EPA algorithm in this paper. Figures 2 and 3 show the average cell capacity and outage probability versus the total number of nodes , respectively. In all algorithms, as increases, increases due to multiuser diversity. This multiuser diversity can be achieved by using opportunistic user scheduling and power allocation in consideration of instantaneous channel state information of nodes in multinode systems. At the same time, the rate achieved by each node decreases as subchannels are shared by multiple nodes; in consequence, increases. Normal IBSs try to guarantee the minimum data rate () for the nodes who have bad channel gains while allocating the remaining resources intensively to the nodes who have good channel gains in the R²S algorithm. As a result, system throughput can be improved and more nodes can be served with data rates larger than in the R²S algorithm, compared with the EPA algorithm. In particular, in symmetric node distribution where , the use of the R²S algorithm improves by 20% and reduces by 0.1 compared to the EPA algorithm. The power control gain of the R²S algorithm is more effective in asymmetric node distribution where ; as a result, the performance gains of the R²S algorithm greatly increase in both and . In addition, the R²S algorithm and the EPA algorithm show good performances on network reliability by serving nodes in faulty cells, even though those algorithms achieve relatively smaller than the R²-NS algorithm and the EPA-NS algorithm, respectively. The R²S algorithm especially improves by 0.3 with degradation of less than 5%, compared with the R²-NS algorithm.

Figure 2: Average cell capacity versus total number of nodes.

Figure 3: Outage probability versus total number of nodes.

Figures 4 and 5 show the average cell capacity and outage probability versus distance between an IBS and nodes when , respectively. In all algorithms, as increases, decreases since nodes experience serious interference from neighbor cells. In addition, channel quality between the IBS and nodes is degraded because of high path loss; as a result, increases. This tendency becomes more severe in asymmetric node distribution. Unlike other algorithms, normal IBSs consider the constraint of the required data rate as well as the interference terms when they perform the scheduling and power allocations in the R²S algorithm. Therefore, the R²S algorithm obtains higher gain from its resource allocation as nodes are located in the edge of cells. In consequence, the R²S algorithm achieves good performances on both and as increases. Particularly, the R²S algorithm achieves almost the same as that of the R²-NS algorithm in the edge of cells. On the other hand, the difference of between the R²S algorithm and the R²-NS algorithm becomes larger when increases.

Figure 4: Average cell capacity versus distance between an IBS and nodes when .

Figure 5: Outage probability versus distance between an IBS and nodes when .

5. Conclusions

In this paper, we focused on network reliability as a means of managing a sudden network failure in OFDMA-based indoor IoT systems. To achieve reliable support for nodes in faulty as well as normal indoor cells, we proposed an R²S algorithm using a joint optimization problem. In the R²S algorithm, each IBS allocates subchannels and power to nodes by considering rate maximization and the minimum rate requirement for all nodes at the same time. As a result, system throughput can be maximized with guaranteeing the required node rate. In simulation results, we could show that the R²S algorithm can resolve network failure effectively from the improvements of average cell capacity and outage probability.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the Basic Science Research Program through the National Research Foundation of Korea funded by the Ministry of Science, ICT and Future Planning under Grant 2014R1A1A1008705.

References

C. Perera, A. Zaslavsky, P. Christen, and D. Georgakopoulos, “Context aware computing for the internet of things: a survey,” IEEE Communications Surveys & Tutorials, vol. 16, no. 1, pp. 414–454, 2014.

J. Gubbi, R. Buyya, S. Marusic, and M. Palaniswami, “Internet of things (IoT): a vision, architectural elements, and future directions,” Future Generation Computer Systems, vol. 29, no. 7, pp. 1645–1660, 2013.

A. Osseiran, F. Boccardi, V. Braun et al., “Scenarios for 5G mobile and wireless communications: the vision of the METIS project,” IEEE Communications Magazine, vol. 52, no. 5, pp. 26–35, 2014.

H. Hu, J. Zhang, X. Zheng, Y. Yang, and P. Wu, “Self-configuration and self-optimization for LTE networks,” IEEE Communications Magazine, vol. 48, no. 2, pp. 94–100, 2010.

3GPP TS 32.500, “Self-organizing networks (SON); Concepts and requirements,” V8.0.0, 2008

M. Yu, H. Mokhtar, and M. Merabti, “Fault management in wireless sensor networks,” IEEE Wireless Communications, vol. 14, no. 6, pp. 13–19, 2007.

M. H. Lee and Y. H. Choi, “Fault detection of wireless sensor networks,” Computer Communications, vol. 31, no. 14, pp. 3469–3475, 2008.

P. Yu, S. Jia, and P. Xi-Yuan, “A self detection technique in fault management in WSN,” in Proceedings of the IEEE International Instrumentation and Measurement Technology Conference (I2MTC '11), pp. 1–4, May 2011.

K. Lee, H. Lee, Y. Jang, and D. Cho, “CoBRA: cooperative beamforming based resource allocation for self-healing in SON-based indoor mobile communication system,” IEEE Transactions on Wireless Communications, vol. 12, no. 11, pp. 5520–5528, 2013.

H. Lee, H. Kim, and K. Lee, “Collaborative self-healing with opportunistic IBS selection in indoor wireless communication systems,” IEEE Communications Letters, vol. 18, no. 12, pp. 2209–2212, 2014.

M. Amirijoo, L. Jorguseski, R. Litjens, and R. Nascimento, “Effectiveness of cell outage compensation in LTE networks,” in Proceedings of the IEEE Consumer Communications and Networking Conference (CCNC '11), pp. 642–647, IEEE, Las Vegas, Nev, USA, January 2011.

M. Amirijoo, L. Jorguseski, R. Litjens, and L. C. Schmelz, “Cell outage compensation in LTE networks: algorithms and performance assessment,” in Proceedings of the IEEE Vehicular Technology Conference (VTC '11), pp. 1–5, May 2011.

V. Chandrasekhar, J. Andrews, and A. Gatherer, “Femtocell networks: a survey,” IEEE Communications Magazine, vol. 46, no. 9, pp. 59–67, 2008.

W. Yu, “Multiuser water-filling in the presence of crosstalk,” in Proceedings of the Information Theory and Applications Workshop, pp. 414–420, IEEE, La Jolla, Claif, USA, January-February 2007.

3GPP, “Physical layer aspects of UTRA high speed downlink packet access, V4.0.0,” 3GPP TS 25.848, 2001.

E. Damosso, “Digital mobile radio towards future generation systems,” Final Report Cost 231, 1999.