Mathematical Problems in Engineering

Volume 2013 (2013), Article ID 145396, 5 pages

http://dx.doi.org/10.1155/2013/145396

Research Article

Control Theory Using in the Air Pollution Control System

Tingya Yang,¹ Zhenyu Lu,² and Junhao Hu³

¹Jiangsu Meteorological Observatory, Nanjing 210008, China

²College of Electrical and Information Engineering, Nanjing University of Information Science and Technology, Nanjing 210044, China

³College of Mathematics and Statistics, South-Central University for Nationalities, Wuhan 430074, China

Received 5 August 2013; Accepted 23 September 2013

Academic Editor: Bo-chao Zheng

Copyright © 2013 Tingya Yang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

In recent years, air pollution control has caused great concern. This paper focuses on the primary pollutant SO₂ in the atmosphere for analysis and control. Two indicators are introduced, which are the concentration of SO₂ in the emissions (PSO₂) and the concentration of SO₂ in the atmosphere (ASO₂). If the ASO₂ is higher than the certain threshold, then this shows that the air is polluted. According to the uncertainty of the air pollution control systems model, control theory for the air pollution control systems is used in this paper, which can change the PSO₂ with the method of improving the level of pollution processing or decreasing the emissions, so that air pollution system can maintain robust stability and the indicators ASO₂ are always operated within the desired target.

1. Introduction

The main feature of the control theory is based on the frequency design method of using the state-space model, and this theory presents an effective method to solve the uncertainty problem of external disturbance to the system. In order to overcome the drawbacks of the classical control theory and the modern control theory, control theory established technology and method of the loop shaping in the frequency domain, which combines the classic frequency-domain and the modern state-space method. The design problem of the control system is converted to the control problem, which made the system closer to the actual situation and meet the actual needs. So it gives the robust control system design method, which obtains controller by solving two Riccati equations. This method fully considered the impact of system uncertainty, which not only can ensure the robust stability of the control system, but also can optimize some performance indices. It is the optimal control theory in frequency domain, and the parameters design of controller is more effective than optimal regulator [1].

So the control theory for the air pollution control systems can solve the uncertainty of the air pollution control systems model, which can get the control strategy to change the PSO₂, so that air pollution system can maintain robust stability and the indicators ASO₂ are always operated within the desired target.

2. Standard Control Problem

2.1. Problem Description

The standard control problem is shown in Figure 1, which consists of and . is a generalized control target which is a given part of the system. is controller, and it needs to be designed.

Figure 1: The diagram of the standard control problem.

It is supposed that and are described as the transfer function matrix of the linear time invariant system [2]. Then, and are proper rational matrices, Decomposing as

Its state-space realization is

It is denoted as:

where is the state vector, is the external input, is the control input, is the controlled output, and is the measured output. They are all vector signals. To compare (1) and (3), we can obtain

Obviously, the closed-loop transfer function matrix from to can be expressed as

The problem of optimal control theory is to find a proper rational controller for closed-loop control system, and make the closed-loop control system internally stabile, and then minimize the norm of closed-loop transfer function matrix [3]:

2.2. State-Space Output-Feedback Control

We assume that the state-space representation of the generalized controlled object state-space representation is (2), where , , , , , , , , , , and are the corresponding dimension of the real matrix, and controller is dynamic output feedback compensator [4].

Consider that have a special form:

which satisfies the following conditions:

(1) is stabilizable, and is detectable;(2) is stabilizable;(3).

Obviously, ; that is, the state of generalized control object and the external input signal could be measured; then, it can be directly used to constitute control law.

As the result, we can obtain Theorem 1.

Theorem 1. If and only if , , there exists controller

That is,

where , , which is made to stabilize the closed-loop control system, and the closed-loop transfer function matrix from to is satisfied as .

Proof. If Hamilton matrix was considered, there exist , and then the derivative of can be achieved, such that

Substituting (2) into (10) and considering Riccati equation (11) and orthogonality condition

So the following formula can be achieved:

If , , to integral above equation from to , then

According to the equivalence relation,

Form (12) and (13), we can get that

where represent Euclidean norm.

Hence, ; the proof is completed.

is the input to ensure , where is the output of the transfer system by the input . From (12), the decay of is the slowest when . Then for this kind of disturbance, we can stabilize (12) by using control strategy .

3. Analysis and Synthesis of Air Pollution Control System

Atmospheric quality management is essentially the process of the analysis and synthesis to the air pollution control system. So-called atmospheric system analysis is qualitative and quantitative research for an atmospheric area system or facilities system, which include that to evaluate the current situation, to find out the main environment problems, to put a series of optional target projects, and to establish the quantitative relation between emission and the quality of the permissive atmosphere [5]. The systems synthesis means the plan and design of an air pollution control system on the basis of system analysis to determine the target and to determine a management method of a system, in other words, in order to achieve certain environmental goal to select the optimal planning scheme, to optimal design, to find the optimal management method, and so forth. So the process of the synthesis should include three main steps: determine the target, form better feasibility scheme of system, and optimization decision [6].

Usually, the atmosphere has certain self-purification ability; namely, the atmospheric environment has a certain capacity. It refers to the permissible pollutant emissions within the natural purification capacity, which reach the limiting quantity in order not to destruct the nature material circulation [7]. We can make the quantity of pollutant discharged that meets a certain environmental goal to be permissible total emission. Only when the pollutant emissions beyond atmospheric self-purification ability, namely, exceeds the environmental capacity, there may be air pollution [8].

In this paper, the objective of applying the control theory in air pollution control system is to find out regularity, to make full use of atmospheric environmental self-purification ability; we cannot only develop production but also protect the environment.

4. Control of Air Pollution

In recent years, air pollution control has caused great concern. This paper focuses on primary pollutant SO₂ in the atmosphere for analysis and control, which is mainly pollutant of the PM2.5. We introduced two indicators, which are the concentration of SO₂ in the emissions (PSO₂) and the concentration of SO₂ in the atmosphere (ASO₂). Meanwhile, we can change the content of SO₂ in the emissions (with the method of improving the methods of processing), with the aim of returning atmospheric quality back to the desired value.

4.1. The Mathematical Model of Air Pollution

A certain volume of air mainly accepted the controlled pollutants which discharged from certain purification equipments. In addition, considering that the atmospheric self-purification ability is mainly affected by wind and other meteorological factors, a certain volume of air can be defined as atmospheric section. Thus, we can put forward a second order state-space equation; it describes the relationship between PSO₂ and ASO₂ on an average point of the atmospheric section [9]. The basic idea of modeling is to consider each section as ideal stirred reactor, as shown in Figure 2. So, the parameters and variables of the whole section are consistent, and the output concentration of PSO₂ and ASO₂ is equal to the counterpart concentration in this section. Hence, from the point of view of the mass balance, we can get the following equation.

Figure 2: The stirred reactor model of an ideal atmosphere section.

PSO₂ balance equation:

ASO₂ balance equation:

where are the PSO₂ of Section and Section (mg/m³), is the atmospheric capacity of Section (m³); is PSO₂ gas flow rate of Section (m³/d), are ASO₂ of Section and Section (mg/m³), are daily decay rate of PSO₂ of Section and supply rate of ASO₂ of Section , are atmosphere gas flow rates of Section and Section (m³/d), and is saturating capacity of SO₂ of Section (mg/m³).

From [5], we can conclude that it is advisable to take the following values as the coefficients in above equations:

Thus, the mathematical model of Section air pollution is

where is control strategy.

4.2. Simulation of Air Pollution Control

control problem of air pollution is basically how to control emissions of pollutants in the best way, in order to properly handle the cost of cleaning and the price we pay for too much atmospheric pollution. Using control theory can better achieve this goal, which not only saves investment but also is easy to be realized [10].

In this paper, the simulation object is two sections of the control of atmospheric pollution, the state-space equation is described as

Using the MATLAB to simulate [11], we can conclude the step response curve of the air pollution control system. We have

which is the transfer function and the state-space expression of robust control strategy.

It could be seen from Figure 3, that the response time of the original system is 3.6 s, while the response time of closed loop system is 0.026 s by using control strategy. It means that control strategy makes the step response of the atmosphere system with an improvement; the response time is greatly reduced. Therefore, control strategy is a practical control strategy, which can ensure that air pollution control system is operating steadily within the desired target [12].

(a)   The original closed-loop system

(b) The closed-loop system with control strategy

Figure 3: The system step response.

5. Conclusion

In this paper, the control theory and methods have a great application value on air pollution control system. It can help the environmental protection departments at various levels to analyze the air pollution system, which can ensure the atmosphere quality steady work within the desired target value. Of course, the analysis and control of a large-scale air pollution system that introduced other influencing factors will be very complicated, which will be the focus of the study in this field.

Acknowledgments

This work was supported by National Natural Science Foundation of China (Grants nos. 61104062, 61374085, and 61174077), Jiangsu Qing Lan Project, and PAPD.

References

H. Akashi and H. Kumamoto, “Optimal sulfur dioxide gas discharge control for Osaka City, Japan,” Automatica, vol. 15, no. 3, pp. 331–337, 1979.

G. R. Cass, “Sulfate air quality control strategy design,” Atmospheric Environment A, vol. 15, no. 7, pp. 1227–1249, 1981.

E. J. Croke and S. G. Booras, “The design of an air pollution incident control plan,” in Proceedings of the Air Pollution Control Assoc 62nd APCA Annual Meeting, Paper No. 69-99, New York, NY, USA, 1969.

P. J. Dejax and D. C. Gazis, “Optimal dispatch of electric power with ambient air quality constraints,” IEEE Transactions on Automatic Control, vol. AC-21, no. 2, pp. 227–233, 1976.

R. E. KaHN, “A mathematical programming model for air pollution control,” School Science and Mathematics, pp. 487–494, 1969.

R. E. Kohn, A Linear Programming Model for Air Pollution Control, MIT Press, Cambridge, Mass, USA, 1978.

C. P. Kyan and J. H. Seinfeld, “Determination of optimal multiyear air pollution control policies,” Journal of Dynamic Systems, Measurement and Control, Transactions of the ASME, vol. 94, no. 3, pp. 266–274, 1972.

C. P. Kyan and J. H. Seinfeld, “Real-time control of air pollution,” AIChE Journal, vol. 19, no. 3, pp. 579–589, 1973.

M. Wu and W. Gui, Modern Robust Control, The Press of Central South University, 1998.

W. Jiang, W. Cao, and R. Jiang, The Meteorology of the Air Pollution, The Meteorology Press, 1993.

M. B. Beck, The application of control and system theory to problems of river pollution control [Ph.D. thesis], Cambridge University, New York, NY, USA, 1974.

Z. Lu and D. Xiao, “The most optimum means of controlling the vehicle exhaust pollution in municipal,” The Journal of Hubei University, vol. 7, pp. 104–107, 2001.