Mathematical Problems in Engineering

Volume 2013 (2013), Article ID 875929, 5 pages

http://dx.doi.org/10.1155/2013/875929

Research Article

Noise Source Identification of a Ring-Plate Cycloid Reducer Based on Coherence Analysis

Bing Yang¹ and Yan Liu²

¹School of Mechanical Engineering, Dalian Jiaotong University, Dalian 116028, China

²School of Traffic and Transportation Engineering, Dalian Jiaotong University, Dalian 116028, China

Received 16 November 2012; Revised 8 March 2013; Accepted 8 March 2013

Academic Editor: Valentina E. Balas

Copyright © 2013 Bing Yang and Yan Liu. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A ring-plate-type cycloid speed reducer is one of the most important reducers owing to its low volume, compactness, smooth and high performance, and high reliability. The vibration and noise tests of the reducer prototype are completed using the HEAD acoustics multichannel noise test and analysis system. The characteristics of the vibration and noise are obtained based on coherence analysis and the noise sources are identified. The conclusions provide the bases for further noise research and control of the ring-plate-type cycloid reducer.

1. Introduction

Speed reducers are used in various fields for the purposes of speed and torque conversion. Speed reducers have many kinds such as worm reducer, crane reducer, cycloid reducer, planetary gear reducer, and ring-plate-type reducer. A ring-plate-type cycloid speed reducer is one of the most important reducers owing to its low volume, smooth and high performance, and high reliability. The internal transmission structure of the ring-plate-type cycloid speed reducer is shown in Figure 1 [1–3]. The input shaft equipped with a driving involute gear is supported by the reducer. Two driven gears are mounted on two driven cranks. Four ring plates with pin gears are connected to the two driven cranks. Two cranks have the same length. Thus, ring plate and two cranks become a parallel four-bar mechanism. When the input shaft rotates, it causes the two cranks to rotate. The four ring plates mounted to the cranks rotate. Then the cycloidal gear rotates. The output shaft rotates since the cycloidal gear is mounted to the output shaft [4].

Figure 1: Crank ring-plate-type cycloid speed reducer.

At present, the application of the reducer is limited to some extent because of the noise level. So, it has practical significance to research the vibration and noise of the reducer [5–10]. The vibration and noise tests of the reducer are completed using the HEAD acoustics multichannel noise test and analysis system. The characteristics of the vibration and noise are obtained based on coherence analysis and the noise sources of the double crank ring-plate-type pin-cycloid gear reducer are identified.

2. Noise Source Identification Methods

Mechanical equipment noise control is mainly in three areas: sound source control, transmission route control, and recipient protection. And the control of the noise source is the most fundamental and effective method. The premise is identifying the main sources of the equipment [11–13]. There are many noise source identification methods such as subjective evaluation, respectively run, and lead cover. The following are frequency spectrum and coherence analysis methods.

2.1. Frequency Spectrum

The data measured are time-domain signal in general. In order to obtain the frequency characteristics of the noise source, frequency spectrum analysis is often made. The frequency spectrum can be generated via a Fourier transform of the signal, into a single harmonic component to study, to thereby obtain the frequency structure of the signal, and the amplitude and phase information of the harmonic and the resulting are usually presented as frequency spectrum diagrams [14–16]. The peak values of the frequency spectrum diagrams are closely but not necessarily related to the main source of noise. A peak in the noise and vibration frequency spectrum diagram may come from several noise sources, and sometimes a noise source may produce more than one peak in the frequency spectrum diagram.

2.2. Coherence Analysis

A coherence function is the description of the relevance of the two signals in a system [17, 18]. Let and be the signals; the Autocorrelation function is defined as

The cross-correlation function is defined as

The correlation coefficient between and can be expressed as

The inputs of a system are the noise or vibration; the only linear output is that. is the sum of the linear outputs. The coherence function between an input and the output can be expressed as

3. Vibration and Noise Tests

3.1. Test Equipment

The vibration and noise tests of the reducer prototype are completed using the HEAD acoustics test and analysis system in an ordinary laboratory. The HEAD acoustics multichannel noise test and analysis system is selected for the measurement. The system is made of SQLab II data acquisition recorder, G. R. A. S. microphones and KISTLER acceleration sensors, and Artemis software. The data collection and analysis process of the HEAD acoustics multichannel noise test and analysis system is shown in Figure 2. The signals are collected from reducer through sensors to the front end. The analog signal is converted into a digital signal through SQLab. At last, the digital signals are analyzed by Artemis software with different analysis methods.

Figure 2: Signal collection and analysis process.

3.2. Test Point Position

The ring-plate cycloid reducer noise comes mainly from structural noise. Structural noise is generated by the imbalance, the mechanical collision, and structural resonance and propagates to the space propagation through the shaft, the bearing, and the block. Structural noise mainly comes from the following two sections. The first, section, machinery parts produces sound when they rotate. Such as shaft, gear, motor and so on. The other section comes from components engagement and sound.

The main noise sources of the ring-plate cycloid reducer are the following aspects through experiences: (1) the noise generated by ring plates and cycloidal gear when they mesh, (2) the noise generated by involute spur gears when they mesh, (3) the noise caused by driving motor, and (4) the noise caused unbalanced installation of ring plates. According to the possible noise sources, three vibration test points and one noise test point were positioned in the test procedure Figure 3. The location of the test points is shown in Figure 4. The detailed information of test points is shown in Table 1.

Table 1: Test point location explanation.

Point name
Test point location

1
Vibration test point, near the input shaft, on the surface of the reducer

2
Vibration test point, near the cycloid gear, on the surface of the reducer

3
Vibration test point, near the output shaft, on the surface of the reducer

5
Noise test point, 1 meter above the reducer

Figure 3: Test points position.

Figure 4: Multi-input single-output linear system.

4. Noise Source Identification

The double-crank four ring-plate-type cycloid reducer internal-noise-source-related parameters can be expressed as

where is the main frequency and is the shaft frequency, and the shaft frequency can be expressed as

where is the rotation speed of the gears.

The data collected from three vibrations test points are supposed as , , , and the signal received from the noise test point is . The multi-input single-output linear system model is shown in Figure 4. The collected vibration acceleration signals , , are the inputs of the system; the collected sound pressure level signal is the output of the linear outputs. The four test point data are collected synchronously through the front end. The collected data are analyzed through the Artemis software.

In order to grasp the noise distributing laws of the reducer, three different speeds and three different loads were selected. They are 750 rotations per minute, 1000 rotations per minute, and 1250 rotations per minute. The three different loads are 40%, 60%, and 80% of the full load. Figure 5 shows the vibration acceleration spectrum diagram of test point 1 with the input shaft rotation of 1250 rpm. The frequency spectrum diagrams of the other speeds are not given here due to limited space.

Figure 5: Vibration acceleration of test point 1.

Figure 5 shows that the vibration acceleration of test point 1 shakes a little bit in the low frequency range. Figure 6 shows the noise frequency spectrum diagram of test point 5 with the input shaft rotation of 1250 rpm. Figure 6 shows that the sound pressure lever of test point 5 is 86.4 dB. The frequencies corresponding to the four peaks are 584 Hz, 1168 Hz, 1744 Hz, and 2360 Hz, respectively.

Figure 6: SPL of test point 5.

Figure 7 shows the Autocorrelation frequency spectrum diagram of test point 1. The frequencies corresponding to the three peaks are 584 Hz, 1768 Hz, and 2320 Hz, respectively. Figure 8 shows the Autocorrelation frequency spectrum diagram of test point 2. The frequencies corresponding to the peaks are 1752 Hz and 2336 Hz.

Figure 7: Autocorrelation of test point 1.

Figure 8: Autocorrelation of test point 2.

Figure 9 shows the cross-spectrum analysis diagram of between test point 5 and test point 1. Figure 10 shows the cross-spectrum analysis diagram of between test point 5 and test point 2. From the analysis we know the following conclusions. The contribution of the noise from the position of the ring plates is the biggest. The involute spur gears’ contribution to the noise is not too high. So the noise reduction measures should be taken.

Figure 9: Cross-spectrum between 5 and 1.

Figure 10: Cross-spectrum between points 5 and 2.

5. Conclusions

Double-crank four ring-plate cycloid speed reducer is one of the most important reducers owing to its low volume, smooth and high performance, and high reliability. In this paper, the characteristics of the vibration and noise are obtained after the vibration and noise tests. The noise sources are identified as the ring plates. To reduce the noise of the reducer, the structure of the ring plates or the unbalance of installation may be taken into consideration.

Acknowledgment

This work is supported by Key Laboratory of Modern Acoustics, Ministry of Education, China (Project no. 1108).

References

W. D. He, X. Li, and L. Li, “Study on double crank ringplate-type cycloid drive,” Journal of Mechanical Engineering, vol. 36, no. 5, pp. 84–88, 2000.

W. D. He, X. Li, L. Li, and B. Wen, “Optimum design and experiment for reducing vibration and noise of double crank ring-plate-type pin-cycloid planetary drive,” Jixie Gongcheng Xuebao/Journal of Mechanical Engineering, vol. 46, no. 23, pp. 53–60, 2010.

W. D. He, Q. Lu, et al., “Study on pin cycloid planetary gear reducer used in propeller pitch variator for 1.5 MW wind turbine,” Journal of Mechanical Transmission, vol. 36, no. 7, pp. 1–4, 2012.

X. Li, W. D. He, L. Li, and L. C. Schmidt, “A new cycloid drive with high-load capacity and high efficiency,” ASME Journal of Mechanical Design, vol. 126, no. 4, pp. 683–686, 2004.

N. B. Roozen, J. Van den Oetelaar, A. Geerlings, and T. Vliegenthart, “Source identification and noise reduction of a reciprocating compressor; A case history,” International Journal of Acoustics and Vibrations, vol. 14, no. 2, pp. 90–98, 2009.

F. Payri, A. Broatch, X. Margot, and L. Monelletta, “Sound quality assessment of Diesel combustion noise using in-cylinder pressure components,” Measurement Science and Technology, vol. 20, no. 1, Article ID 015107, 2009.

P. Simon, “Retrieving the three-dimensional matter power spectrum and galaxy biasing parameters from lensing tomography,” Astronomy and Astrophysics, vol. 543, no. 1, p. 1, 2012.

C. C. Zhu, D. T. Qin, and S. Hong, “Study on surface noise distribution of three-ring reducer,” Journal of Chongqing University, vol. 4, pp. 18–21, 2000.

T. J. Lin, Y. J. Liao, R. F. Li, and W. Liu, “Numerical simulation and experimental study on radiation noise of double-ring gear reducer,” Journal of Vibration and Shock, vol. 29, no. 3, pp. 43–47, 2010.

J. Prezelj and M. Čudina, “Quantification of aerodynamically induced noise and vibration-induced noise in a suction unit,” Proceedings of the Institution of Mechanical Engineers C, vol. 225, no. 3, pp. 617–624, 2011.

Z. Chu, W. Wang, and X. Xiao, “Noise source identification and noise abatement of truck under idle speed condition,” Transactions of the Chinese Society of Agricultural Engineering, vol. 26, no. 5, pp. 153–158, 2010.

A. Ramachandran, M. C. Reddy, and R. Moodithaya, “Minimization and identification of conducted emission bearing current in variable speed induction motor drives using PWM inverter,” Indian Academy of Sciences, vol. 33, no. 5, pp. 615–628, 2008.

R. S. Magalhães, C. H. O. Fontes, L. A. L. Almeida, and M. Embiruçu, “Identification of hybrid ARXneural network models for three-dimensional simulation of a vibroacoustic system,” Journal of Sound and Vibration, vol. 330, no. 21, pp. 5138–5150, 2011.

X. D. Wu, S. G. Zuo, and Y. Lu, “Identifying noise source based on application to partial coherence analysis in fuel cell car,” Journal of Noise and Vibration, vol. 3, pp. 81–84, 2008.

M. L. Chen and S. M. Li, “Coherence functions method for signal source identification,” China Mechanical Engineering, vol. 1, pp. 95–100, 2007.

K. S. Oh, S. K. Lee, and S. J. Kim, “Identification and reduction of noise from axles in a passenger vehicle,” Noise Control Engineering Journal, vol. 56, no. 5, pp. 332–341, 2008.

F. Deželak, “Effective noise control through identification and ranking of incoherent noise sources,” Noise Control Engineering Journal, vol. 58, no. 2, pp. 212–221, 2010.

H. E. Camargo, P. A. Ravetta, R. A. Burdisso, and A. K. Smith, “Application of phased array technology for identification of low frequency noise sources,” Journal of Low Frequency Noise Vibration and Active Control, vol. 28, no. 4, pp. 237–244, 2009.