Mathematical Problems in Engineering

Volume 2014 (2014), Article ID 584684, 8 pages

http://dx.doi.org/10.1155/2014/584684

Research Article

System Reliability Evaluation of Data Transmission in Commercial Banks with Multiple Branches

Yi-Kuei Lin¹ and Hsien-Chang Chou²

¹Department of Industrial Management, National Taiwan University of Science and Technology, Taipei 10607, Taiwan

²Institute of Management, National Taiwan University of Science and Technology, Taipei 10607, Taiwan

Received 15 August 2013; Accepted 22 December 2013; Published 9 January 2014

Academic Editor: Cristian Toma

Copyright © 2014 Yi-Kuei Lin and Hsien-Chang Chou. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The main purpose of this paper is to assess the system reliability of electronic transaction data transmissions made by commercial banks in terms of stochastic flow network. System reliability is defined as the probability of demand satisfaction and it can be used to measure quality of service. In this paper, we study the system reliability of data transmission from the headquarters of a commercial bank to its multiple branches. The network structure of the bank and the probability of successful data transmission are obtained through the collection of real data. The system reliability, calculated using the minimal path method and the recursive sum of disjoint products algorithm, provides banking managers with a view to comprehend the current state of the entire system. Besides, the system reliability can be used not only as a measurement of quality of service, but also an improvement reference of the system by adopting sensitivity analysis.

1. Introduction

“The safest building of 99.999% reliability is ruined by a 0.001% small fire—True reason for breakdown of Facebook and Yahoo on February 25.” This is the cover title of the 1320th Taiwan Business Week [1]. At 10:00 am on February 25, 2013, a fire broke out and power was cut on the account of equipment repair. The emergency diesel power supply failed to start due to the safety issue at hand as well as wear and tear. The building, where this incident occurred, was an important generator room for connecting Taiwan to 80% of its external bandwidth. Although the network-switching center passed TruSecure certification, a small fire caused a failure in the power supply, internet, safety, fire control, and air-conditioning areas of the building. This breakdown lasted 17 hours and several businesses, including commercial banks performing network transactions, were seriously affected. This disaster or accident reminds the administrators that stringent safety is critical to the data transmission.

Business enterprises, especially commercial banks, are well aware that accidents like small fires can result in system breakdowns. Therefore, according to the case mentioned above, even if a node (e.g., Internet data center (IDC) or bank branch) is extremely reliable, once the node fails it can have an effect on the normal operation of the whole system. The quality of system is becoming increasingly important to both enterprises and Internet service providers (ISPs). System supervisors strive for safe and stable network transmissions [2–4]. Modern commercial banks provide diversified services, which focus on electronic transaction platforms that are safe, quick, convenient, and simple and are not constrained by time and distance. These electronic transaction platforms provide automated teller machine, personal financial, consumer financial, and business financial services, as well as various other electronic financial commodity services provided by network banks or mobile banks. The real-time services provided by these diversified financial commodities are dependent on the bandwidth of the electronic transaction data.

When the headquarters (HQs) of a commercial bank transmits transaction data electronically to its distant branches, its system should maintain a constant bandwidth to meet the demand of units for each time unit (e.g., bit per second; bps). The ability to transmit data refers to the probability of data being successfully transmitted from a source node to a sink node. The probability that the system can transmit a specified demand is defined as system reliability (SR), which is a performance indicator used for measuring data transmission in service level agreement (SLA) [3, 5–7]. Supervisors of a system often formulate their policies on demand based on past bandwidth use and in accordance with future growth demand in order to determine the expected capacity (i.e., capacity is always greater than throughput). Hence, before evaluating the SR, it is necessary to first ascertain the state of system.

Practical systems, such as internet, traffic, and power systems, can be constructed as a network consisting of nodes and edges. In these situations, each edge and node in the network may have a certain transmission capacity, and this is typically referred to as a data-flow network. Most data-flow networks consist of components (edges and nodes) with multiple states. Each edge or node may have different capacity states, which may partially be invalid or valid. Such a network is called a stochastic flow network (SFN) [5, 8–15]. It is possible to gain an accurate view of this type of network and evaluate the quality of data transmission. Transmission edges may have several states in a system environment, and the probability distribution for each state capacity of a transmission edge varies due to equipment loss or environmental factors. For instance, in an internet, an edge consists of physical lines, which have several capacity levels ranging from 0 (a complete malfunction) to (the highest level of operation). Therefore, a computer network characterized by such edges and nodes also has stochastic capacities, making it a typical SFN.

The minimal path (MP) method is widely applied to evaluate the SR of an SFN [5, 16–20]. By using the MP concept, we can generate all the minimal capacity vectors (-MP) that satisfy the given demand [8, 17, 19, 21]. The probability distribution of different states for each edge is analyzed and summarized, and the SR is subsequently calculated by using the recursive sum of disjoint product (RSDP) algorithm in terms of -MP [8, 19]. Figure 1 summarizes the SR evaluation procedure.

Figure 1: The system reliability output procedure.

Besides, the number of sink nodes (i.e., branches) also has a major influence on SR. In this paper, the SR of an SFN with a single source to multiple sinks will be discussed in an actual system environment [15, 22, 23]. We mainly address the performance of electronic transaction data transmissions from HQs of the commercial bank to multiple branches.

2. Acronyms, Notations, Problem Description, and Assumptions

Acronyms and notations used in this study are introduced as follows.

2.1. Acronyms

IDC:Internet data centerISP:Internet service providerHQs:HeadquartersSFN:Stochastic flow networkSR:System reliabilityMP:Minimal pathRSDP:Recursive sum of disjoint productSLA:Service level agreementLL:Leased lineVPN:Virtual private networkADSL:Asymmetric digital subscriber lineICC:Information & communication centerNK:IDC at Nankang cityJN:IDC at Jinan city.

2.2. Notations Sections

:Source node (i.e., HQs):Number of sink nodes (i.e., branches):Sink node #, :Number of edges:Edge #, :Number of MP connecting and :th MP connecting and , , :Number of states of :th capacity of , :Current capacity of :(): capacity vector:(): a stochastic flow network:: set of edges:Set of nodes:: maximal capacity vector:Data-flow traveling through MP , and :: data-flow vector:Demand at the th branch, :: demand vector:Set of satisfying :System reliability.

2.3. Problem Description

The main purpose of this paper is to evaluate the SR of the commercial bank in Taiwan. The bank rents telecommunication lines of ISP to transmit data based on its current business demands and future financial services developments. The system supervisor is able to determine the amount of line capacity to rent based on the demand for data transmission.

Due to the aforementioned factors, the capacity of each edge is stochastic according to a given probability distribution observed from the statistics data. Thus, the bank network consisting of such edges and nodes is also stochastic and can be modeled as an SFN. To obtain the probability distribution of edges, we can monitor the failures of each edge in a specified period, such as one day, one month, or one year. Over this time frame, the records of transmission disconnects should be gathered. In this study, we conducted a long-term observation of the system through one year of data collection. We then summarized the capacity probability distribution of the system connections in each state of each edge. The successful data transmission probability refers to the ratio of data successfully transmitted between two connected nodes of each edge in a specified observation period of time. It is one of the most important factors affecting SR.

2.4. Assumptions

The structure of a minimal path is a sequence of nodes and edges from source to sink . For an easier expression, we constrain all edges as , where is the total number of edges. Let be a stochastic flow network, where is the set of edges, is the set of nodes, and with (an integer) being the maximum capacity of each component . The (current) state of each edge takes possible values according to a given probability distribution from historical record. In particular, the value of is determined by the number of transmission lines that operate successfully. In such a , data is transmitted through only one MP; no data flow will disappear or be created during transmission via such an MP. In the entity network, the capacities of each edge will not influence each other because they are different transmission lines physically. Hence, the capacities of different edges (transmission) are statistically independent. Such a is assumed to further satisfy the following assumptions.

(i)The capacity of each edge is an integer-valued random variable which takes values according to a given probability distribution.(ii)Data flow in the system must satisfy the flow-conservation law [24].(iii)The capacities of different edges are statistically independent.

3. Network Model Construction

Based on the SFN theory proposed by Lin [5], a network model is constructed to describe the relationship between data flow, capacity, demand, and SR formulation.

3.1. Data-Flow Vector and Capacity Vector

According to the SFN model proposed by Lin [5], MP is used for the flow assignment. Notation is a data flow traveling through MP , and . The data-flow vector needs to satisfy the following three constraints. The maximal capacity vector with (an integer) being the maximum capacity of each component . Any data-flow vector is said to be feasible under if and only if it satisfies the following constraint:

where is the total data flow through edge . Constraint (1) signifies that the total data flow through cannot exceed the maximal capacity of for . For convenience, let be the set of feasible under . Similarly, any is said to be feasible under if and only if it satisfies the following constraint:

Hence, the notation denotes the set of feasible under .

3.2. System Reliability Formulation for Demand

Any fulfills the exact demand vector if it satisfies the following constraint:

where is the total data flow from HQs to branch . Constraint (3) signifies that the data-flow vector must satisfy the demand .

A capacity vector is said to meet the demand if and only there exists at least one that satisfies the exact . Let be the set of such . The SR denoted by is defined as the probability that the data transmission can successfully transmit units of data from the source to each sink . That is, .

4. Theory of Minimal Capacity Vector for Demand

Enumerating all and then summing up their probabilities to get the SR is an inefficient way [5]. Instead, this paper adopts the concept of minimal capacity vector for the demand vector to improve the computational efficiency for the SR evaluation. For convenience, let -MP denote such a minimal capacity vector for .

4.1. Definition of -MP

Definition 1. : if and only if for each .

Definition 2. : if and only if and for at least one .

Definition 3. A -MP is defined as a minimal capacity vector in . That is, if is a -MP, then for any capacity vector with .

Suppose that there are a total of   -MP: ; then . Thus, the SR . Such a probability can be calculated by inclusion-exclusion method [5, 9, 10], disjoint subset method [9, 18], state-space decomposition method [17, 24], or RSDP. The RSDP algorithm proposed by Zuo et al. [19] has been proven to be superior to the inclusion-exclusion rules, disjoint subset rules, and state-space decomposition rules. RSDP algorithm is an efficient recursive algorithm for probability evaluation based on the sum of disjoint products (SDP). This method is more efficient than the existing algorithm when the number of components of a system is large. RSDP algorithm provides an efficient, systematic, and simple approach for evaluating SFN system reliability [8, 19, 20, 23, 25]. Thus, the RSDP is used to calculate the SR in this paper.

4.2. The Property of the -MP

Let be the set of such satisfying the demand (i.e., meets constraints (1) and (3). The following lemma states the important relationship between a -MP and an .

Lemma 4. If X is a -MP, then there exists a feasible under such that

Proof. Let be a -MP and an be feasible under . Suppose to the contrary that there exists an edge such that . Set , where and for all . That is, . Because of for each , is feasible under . This signifies that and that contradicts the fact that is a -MP. The proof is completed.

Based on the lemma, each transformed from an is treated as a -MP candidate. Hence, each -MP candidate must be checked whether it is a -MP or not.

5. System Reliability Algorithm Development

According to the above-proposed model and theory, the following algorithm is developed to evaluate the SR.

Step 1. Find all data-flow vector satisfying the following constraints:

If there is no satisfying the constraints, then and quit the algorithm.

Step 2. Transform each feasible from Step 1 into the corresponding capacity vector via the following equation:

Step 3. Utilize the following process to check which -MP candidates from Step 2 are -MP.

(3.1) ( is the stack which stores the indexes of -MP. Initially, is empty).(3.2)For to & . //There are -MP candidates.(3.3)For to , & .(3.4)If , then is not a -MP, , and go to step (3.7). Else if , then is not a -MP, and .(3.5)Next .(3.6) is a -MP.(3.7)Next .(3.8)End.

Step 4. Suppose that are all -MP from Step 3. Use the RSDP to calculate system reliability .

6. Case Study and Analyses

Developments in information technology, the growing presence of global communication systems, and improvements in information security have driven frequent and regular electronic transactions by banks. To satisfy the demands of diversified financial commodities, banks have to depend on additional hardware and software. The bank’s cores systems, branch terminal systems, and mobile systems, as well as financial service items like account openings, account transfer, remittance, inquiries, loans, security, insurance, and financial management can all be performed by bank staff and customers all over the world.

In this paper, one commercial bank of Taiwan is studied in order to investigate the quality of its data transmission in the absence of time and distance constraints, as modern commercial banks provide diversified, round-the-clock financial services. Because the banking industry holds “information security” in the highest regard, connection failure or data-flow monitoring records related to the study are highly confidential and are controlled by the company. We first focus on collecting real data related to the capacity probability distribution for each edge. The data was collected from January 1, 2012 to December 31, 2012, which is a time span that is rather valuable for this paper and for further research related to this topic. Hence, a network structure diagram of the bank is constructed. The probability distributions of each edge capacity are subsequently defined according to the collected data. Finally, utilize these materials to assess the performance of electronic transaction data transmissions among HQs of the commercial bank with multiple branches.

6.1. Network Structure of the Bank in the Case Study

The bank studied in this paper has been established for more than 20 years and has over 100 branches. It is chosen above other banks because of the fact that it rents a multitype bandwidth from an ISP. The administrator of information department takes information security, business requirements, cost considerations, bandwidth management, and backup system seriously. As long as the banking system remains connected, banking staff and customers are able to carry out electronic transaction services at any time and from anywhere. According to the collected information of the studied bank and attempt to describe the network structure concept graphs (Figure 2 shows an illustrative structure), it is evident that the bank employs three distinct methods for transmitting data: point-to-point leased line (LL), point-to-multipoint virtual private network (VPN), and asymmetric digital subscriber line (ADSL).

Figure 2: An illustrative network structure of the studied bank.

The LL is mainly used for connecting the symmetric bandwidth to two important nodes. The ISP provides an optical backbone bandwidth to administer a safe, stable, and high-quality private system. The bank uses LLs to link HQs to the information & communication center (ICC), HQs to JN, and the ICC to NK or regional IDC to . This transmission design offers a bandwidth of 80 Mbps, with two states (successful or failure).

The second design of transmitting data is through a VPN. The bank rents Ethernet system for use in its intranet. For example, the data transmission between local branches and NK are linked through regional IDC of ISP, the regional IDC and NK are linked through a VPN at 20 Mbps to 40 Mbps, and local branches and the regional IDC are linked by 4 Mbps2 lines. VPN connections include three separate states: complete success, partial success, and complete failure.

The final connection design employed by the bank is ADSL. This is used to link JN to all branches. ADSL offers guaranteed 4 Mbps bandwidth to connect JN with all the branches of the bank.

The network structure concept of the bank is clearly outlined in Figure 2. However, in order to obtain the SR of single source to multiple sinks, we observe the case that data from HQs to five branches are transmitted simultaneously. In order to aid in the understanding of SR and calculate it more easily, we design a new network structure chart (Figure 3) to show the case with a single source to multiple sinks.

Figure 3: Data transmission from HQs to five branches.

6.2. Capacity and Probability Distribution

Edge capacity refers to the data transmission capacity between two nodes of each edge. Different states of data transmission capacity can exist on each edge. For example, the studied bank has a typical SFN and it is possible for each edge to have several states. How is the probability distribution of each edge obtained for its different states? This involves calculating the invalid probability distribution of each edge by using bank’s disconnection and data-flow monitoring records from 2012 to obtain the total number of hours that each edge was disconnected in various states. These values were then divided by the total number of hours in one year (8, 760). We call this the probability distribution of the edge capacity. The valid probability distribution was finally obtained through statistics. Based on previous descriptions, we suppose for our study that the bank HQs wants to transmit data to five critical branches. The probability of a successful transmission by each edge is summarized and listed in Table 1, which shows the probability distribution of each edge capacity.

Table 1: The probability distributions of each edge capacity.

Edge
Capacity
Probability

80
0.999708

0
0.000292

80
0.998202

0
0.001798

80
0.998240

0
0.001760

80
0.999105

0
0.000895

40
0.999240

0
0.000760

8
0.998381

4
0.000630

0
0.000989

4
0.992248

0
0.007752

8
0.997975

4
0.000089

0
0.001936

4
0.995668

0
0.004332

8
0.997700

4
0.002213

0
0.000087

4
0.999616

0
0.000384

20
0.999453

0
0.000547

8
0.998490

4
0.000178

0
0.001332

4
0.999451

0
0.000549

10
0.999346

0
0.000654

8
0.999382

4
0.000597

0
0.000021

4
0.999580

0
0.000420

6.3. Analysis of the Case Study

In this study, we focus on five critical branches, as other branches are not listed temporarily because their capacity was low with respect to the top five. The SR of individual branches when HQs transmits data to the five branches and the overall SR when HQs transmits data to the five branches are compared based on their differences. Two measurements, single source to single sink and single source to multiple sinks, are both addressed here to evaluate the SR of the bank.

6.3.1. Single Source to Single Sink

We first intend to transmit data from bank’s HQs to a single branch (e.g., ). In this case, single source to single sink can help administrators to understand the transmission quality provided by the HQs to each branch. A representation of the data-flow network is shown in Figure 4. To satisfy the guaranteed bandwidth of 4 Mbps for each branch, the demand is denoted as . In this example, three 4-MP, say , , and , are generated by the proposed algorithm. Each derived 4-MP can provide a minimal capacity to meet the required demand. The SR is calculated to be 0.9999697106 in terms of the 4-MP by using the RSDP algorithm. In the same method, we calculate the corresponding SR of HQs to each of the five critical branches. Given that the demand of each branch is 4 Mbps, the SR of the data transmitted to each branch is not the same because the probability distribution of each edge is different. The results of data transmission can be seen in Figure 5. When data is transmitted from the HQs to each branch, it is obviously affected by the probability of successful transmission of each edge. Generally, when the successful transmission probability of an edge is higher, the SR of the entire system is also increased. For example, the SR from HQs to is 0.9999767555 and the SR from HQs to is 0.9999967998.

Figure 4: Data transmission from HQs to branch .

Figure 5: The SR of data transmission from HQs to different branches. The computer model: Lenovo ThinkPad Edge notebook. The computer allocates: Intel(R) Corei5 CPU U470 @ 1.33 GHZ4 core, 8.0 GB RAM.

6.3.2. Single Source to Multiple Sinks

We have a clear understanding of the data transmission from the HQs to each branch. The SR of single source to single sink, however, does not provide sufficient information to understand the transmission quality of the entire system. It is necessary to canvass a further understanding by evaluating the SR of single source to multiple sinks. Given that HQs need to transmit data to five branches simultaneously, to satisfy the guaranteed bandwidth of 4 Mbps for all branches, the demand vector is denoted as . The SR of the entire system is calculated to be 0.9999424761 by utilizing the proposed algorithm. In a straightforward concept, the SR of data transmitted from HQs to its five branches simultaneously should be equal to the system reliabilities of the transmission lines from HQs to each of the five branches multiplied together. However, multiplying the SRs from each of the branches resulted in an overall SR of 0.9999346872. This value differs from the SR calculated from transmissions made from HQs to the all five branches simultaneously. This is mainly because each branch has a different transmission line, but the main lines ( to ) are shared. When HQs simultaneously transmits data to its five branches, the bandwidth required by the main line ( to ) is 20 Mbps, which is clearly higher than the demand (4 Mbps) by the main line when HQs transmits data to each branch separately. Clearly, SR is affected. As a result, we chose to use the single source to multiple sinks mode because it could reflect the true SR of the entire system. According to the results analysis of the SR, not only could we ascertain the transmission quality of the entire system, but it could also provide ISP with the SLA level stipulated in its contracts (e.g., golden level: transmit rate ≥).

6.4. Discussion of the Case Study

In this paper we research the case study by commercial banks. The result of the real example validates the proposed model can be applied to other commercial banks that have big data to be transmitted among branches. That is, we extend the original model with single sink to multiple sinks. The method is suitable in other enterprise with similar network or multiple branches such as the stock exchange network, and electronic ticket network, the E-business network. It can not only apply to the inside network in the enterprise, but also even more apply to the network environments of B2B, B2C and C2C. According to the research method of this paper we can calculate the system reliability fast.

7. Conclusion

This paper examines a case study of the Taiwan commercial bank to evaluate its data transmission performance. The corresponding SFN is constructed to calculate the SR in order to assess the demand satisfaction of the data the bank transmitted. Based on the resulting assessment and analysis of the SR, we now not only understand the existing system environment, but also can use the results as an important reference indicator for future system structure planning and signing SLA agreements. Obtaining a comprehensive view of the bank’s entire system is crucial in this case study. If we only judge the transmission demands of specific branches, this could lead to an infrastructure that only meets the demands of a specific branch and neglects the transmitting capacity of the entire system. By evaluating the SR for the entire system, we are able to gain clear and full comprehension of the system’s structural transmitting capacity and use it as a key indicator for making management decisions. According to the proposed method, when HQs transmits data to each branch, calculating the resulting SR is relatively simple. That is, the proposed SR calculation method for commercial banks is workable and effective. Business organizations modeled by an SFN can also utilize the proposed method to quickly calculate their SR and use it as a reference to help improve their system environment improvement and aid in future planning.

This study opens up several avenues for future research for example, by examining cases, where the IDC is subject to a failure, by studying the effects on an entire system environment when the backup line is added, or by further adding to the sensitivity analysis method to observe changes in SR. The sensitivity analysis is mainly based on assuming that the capacity of an edge is perfectly reliable (i.e., with probability 1.0) at a time; then recalculate the system reliability. According to the recalculated system reliability, we can find the most important edges that improve the system reliability most. The sensitivity analysis will become one for reference of decision maker. These varying conditions can all be used as references for further research, as it would be interesting to see whether they will directly affect SR or not.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

H. D. Lin, “True reason for breakdown of Facebook and Yahoo,” Business Weekly, vol. 1320, pp. 70–71, 2013.

T. Luo, V. Srinivasan, and M. Motani, “A metric for DISH networks: analysis, implications, and applications,” IEEE Transactions on Mobile Computing, vol. 9, no. 3, pp. 376–389, 2010.

C. Lozano-Garzon, C. Ariza-Porras, S. Rivera-Diaz, H. Riveros-Ardila, and Y. Donoso, “Mobile network QoE-QoS decision making tool for performance optimization in critical web service,” International Journal of Computers Communications & Control, vol. 7, no. 5, pp. 892–899, 2012.

R. K. Dash, N. K. Barpanda, P. K. Tripathy, and C. R. Tripathy, “Network reliability optimization problem of interconnection network under node-edge failure model,” Applied Soft Computing Journal, vol. 12, no. 8, pp. 2322–2328, 2012.

Y.-K. Lin, “A simple algorithm for reliability evaluation of a stochastic-flow network with node failure,” Computers and Operations Research, vol. 28, no. 13, pp. 1277–1285, 2001.

R. Yarlagadda and J. Hershey, “Fast algorithm for computing the reliability of a communication network,” International Journal of Electronics, vol. 70, no. 3, pp. 549–564, 1991.

J. Yuan and K.-L. Ko, “A factoring method to calculate reliability for systems of dependent components,” Reliability Engineering and System Safety, vol. 21, no. 2, pp. 107–118, 1988.

Y. K. Lin and L. C. Louis Yeng, “Evaluation of network reliability for computer networks with multiple sources,” Mathematical Problems in Engineering, vol. 2012, Article ID 737562, 18 pages, 2012.

J. C. Hudson and K. C. Kapur, “Reliability bounds for multistate systems with multistate components,” Operations Research, vol. 33, no. 1, pp. 153–160, 1985.

J. Xue, “On multistate system analysis,” IEEE Transactions on Reliability, vol. 34, no. 4, pp. 329–337, 1985.

P. K. Kapur, S. Anand, S. Yamada, and V. S. S. Yadavalli, “Stochastic differential equation-based flexible software reliability growth model,” Mathematical Problems in Engineering, vol. 2009, Article ID 581383, 15 pages, 2009.

Y. Ge, T. Li, and S. Fei, “Master-slave synchronization of stochastic neural networks with mixed time-varying delays,” Mathematical Problems in Engineering, vol. 2012, Article ID 730941, 18 pages, 2012.

C.-C. Hsieh and M.-H. Lin, “Simple algorithms for updating multi-resource allocations in an unreliable flow network,” Computers and Industrial Engineering, vol. 50, no. 1-2, pp. 120–129, 2006.

C.-C. Hsieh and M.-H. Lin, “Reliability-oriented multi-resource allocation in a stochastic-flow network,” Reliability Engineering and System Safety, vol. 81, no. 2, pp. 155–161, 2003.

Y.-K. Lin and J. Yuan, “Flow reliability of a probabilistic capacitated-flow network in multiple node pairs case,” Computers and Industrial Engineering, vol. 45, no. 3, pp. 417–428, 2003.

G. Levitin, “Reliability of acyclic multi-state networks with constant transmission characteristics of lines,” Reliability Engineering and System Safety, vol. 78, no. 3, pp. 297–305, 2002.

T. Aven, “Reliability evaluation of multistate systems with multistate components,” IEEE Transactions on Reliability, vol. 34, no. 5, pp. 473–479, 1985.

J. S. Lin, C. C. Jane, and J. Yuan, “On reliability evaluation of a capacitated-flow network in terms of minimal pathsets,” NETWORKS, vol. 25, pp. 131–138, 1995.

M. J. Zuo, Z. Tian, and H.-Z. Huang, “An efficient method for reliability evaluation of multistate networks given all minimal path vectors,” IIE Transactions, vol. 39, no. 8, pp. 811–817, 2007.

Y.-K. Lin and P.-C. Chang, “Evaluation of system reliability for a cloud computing system with imperfect nodes,” Systems Engineering, vol. 15, no. 1, pp. 83–94, 2012.

M. Fotuhi-Firuzabad, R. Billinton, T. S. Munian, and B. Vinayagam, “A novel approach to determine minimal tie-sets of complex network,” IEEE Transactions on Reliability, vol. 53, no. 1, pp. 61–70, 2004.

B. K. Thapalia, T. G. Crainic, M. Kaut, and S. W. Wallace, “Single-commodity network design with stochastic demand and multiple sources and sinks,” Information Systems and Operational Research, vol. 49, no. 3, pp. 193–211, 2011.

Y. K. Lin and L. L. C. Yeng, “Network reliability based decision of Internet with multiple sources and multiple sinks,” Decision Support Systems, vol. 54, no. 3, pp. 1477–1487, 2013.

C. Alexopoulos, “Note on state-space decomposition methods for analyzing stochastic flow networks,” IEEE Transactions on Reliability, vol. 44, no. 2, pp. 354–357, 1995.

Y. K. Lin and P. C. Chang, “A novel reliability evaluation technique for stochastic-flow manufacturing networks with multiple production lines,” IEEE Transactions on Reliability, vol. 62, no. 1, pp. 92–104, 2013.