Mathematical Problems in Engineering
Volume 2015 (2015), Article ID 302153, 1 page
http://dx.doi.org/10.1155/2015/302153

Corrigendum

Corrigendum to “Cubic Bezier Curve Approach for Automated Offline Signature Verification with Intrusion Identification”

Arun Vijayaragavan,¹ K. L. Shunmuganathan,² and J. Visumathi³

¹Department of Computer Science and Engineering, Sathyabama University, Chennai, Tamil Nadu, India
²Department of Computer Science and Engineering, R.M.K Engineering College, Chennai, Tamil Nadu, India
³Department of Computer Science and Engineering, Jeppiaar Engineering College, Chennai, Tamil Nadu, India

Received 9 July 2015; Accepted 15 September 2015

Copyright © 2015 Arun Vijayaragavan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Cubic Bezier Curve Approach for Automated Offline Signature Verification with Intrusion Identification” [1], the ordering of the authors was incorrect as it is corrected above. Also, the affiliation of the first author was “Department of Information Technology, R.M.D. Engineering College, Chennai, Tamil Nadu, India” and it is corrected as above.

References

A. Vijayaragavan, J. Visumathi, and K. L. Shunmuganathan, “Cubic bezier curve approach for automated offline signature verification with intrusion identification,” Mathematical Problems in Engineering, vol. 2014, Article ID 928039, 7 pages, 2014.