Mathematical Problems in Engineering
Volume 2015 (2015), Article ID 967034, 9 pages
http://dx.doi.org/10.1155/2015/967034

Research Article

Subdivision Error Analysis and Compensation for Photoelectric Angle Encoder in a Telescope Control System

Yanrui Su,1,2,3 Qiang Wang,1,2 Fabao Yan,1,2,4 Xiang Liu,1,2 and Yongmei Huang1,2

¹Institute of Optics and Electronics, Chinese Academy of Sciences, No. 1 Guangdian Road, Chengdu 610209, China
²Key Laboratory of Optical Engineering, Chinese Academy of Sciences, Chengdu 610209, China
³University of Chinese Academy of Sciences, Beijing 100049, China
⁴School of Geosciences and InfoPhysics, Central South University, Changsha 410083, China

Received 19 May 2015; Revised 12 July 2015; Accepted 14 July 2015

Academic Editor: Asier Ibeas

Copyright © 2015 Yanrui Su et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

As the position sensor, photoelectric angle encoder affects the accuracy and stability of telescope control system (TCS). A TCS-based subdivision error compensation method for encoder is proposed. Six types of subdivision error sources are extracted through mathematical expressions of subdivision signals first. Then the period length relationships between subdivision signals and subdivision errors are deduced. And the error compensation algorithm only utilizing the shaft position of TCS is put forward, along with two control models; Model I is that the algorithm applies only to the speed loop of TCS and Model II is applied to both speed loop and position loop. Combined with actual project, elevation jittering phenomenon of the telescope is discussed to decide the necessity of DC-type subdivision error compensation. Low-speed elevation performance before and after error compensation is compared to help decide that Model II is preferred. In contrast to original performance, the maximum position error of the elevation with DC subdivision error compensation is reduced by approximately 47.9% from 1.42″ to 0.74″. The elevation gets a huge decrease in jitters. This method can compensate the encoder subdivision errors effectively and improve the stability of TCS.

1. Introduction

There are increasingly high demands on acquisition, tracking, and pointing (ATP) capabilities of TCS, whose accuracy is required to reach arcsecond scale usually [1–4]. When used for astronomical observations, for example, tracking star, TCS speed needs to be less than /s sometimes. This places great requirements on the precision and accuracy of position measurement of photoelectric angle encoder [5, 6].

The measuring accuracy of angle encoder is mainly affected by encoder output sinusoidal signal period, grating consistency and marginal definition, quality of optical filter, characteristics of optoelectronic detectors, and stability and dynamic property of further analog signal processing [6, 7]. Telescope azimuth and elevation encoders are without integral bearings, which we therefore should take the errors mainly generated by assembly of the scanning head, mounting eccentricity of the grating and radial runout of the shaft into consideration [6, 7]. The impact of these factors on angular measurement is mostly presented by encoder subdivision signal error. To prevent this measuring accuracy, loss of angle encoder, correction, or compensation methods are required.

If the causes, value, and dynamic laws of subdivision errors can be detected, it is possible to avoid the generation of some errors or to directly compensate for the subdivision error to improve the encoder measuring accuracy. Russia, Japan, and Germany are now leading the world’s encoder error detection research [8]. St. Petersburg State Electrotechnical University developed an encoder error detection system with an accuracy of at speeds of up to 10 RPS, which can realize dynamic error detection [9]. A set of encoder error detection lab systems with a resolution of and an uncertainty of has been developed by National Institute of Advanced Industry Science and Technology in Japan [10]. In National Metrology Institute of Japan, an encoder self-calibration system using the equal division averaged method (EDA method) can realize an expanded uncertainty of [11].

For subdivision error compensation, Chenran and his partners from Changchun University of Science and Technology proposed an error compensation method based on a BP neural network. This method reduced the error from to less than in a practical application [12]. Sun proposed a moire triangle subdivision error compensation method capable of integrating compensation for triangular signals. In an actual test, this system reduced the subdivision error to 1/3 of the original error [13]. The American Observatory proposed an adaptive periodic subdivision error compensation method based on a Heidenhain encoder [14]. The Korean company LG applied a shifting grating method for phase error compensation for subdivision signals [15]. Huazhong University of Science and Technology suggested a phase error compensation method using ellipse fitting [16]. Changchun Institute of Optics, Fine Mechanics, and Physics presented an error compensation method for an optical encoder based on a RBF network [17]. Ye and his team from Xi’an Jiaotong University proposed a linearization method with improved robustness for determining the displacement from the sine and cosine signals generated by optical encoders [18]. Alex and his coworkers from Technische Universitat Berlin put forward a dynamic state estimation method based on Poisson spike trains towards optimal encoding to improve the accuracy of optical encoders [19]. However, the requirement of an ideal laboratory environment and an overemphasis on correcting or compensating the subdivision error of the encoder rather than considering the impact of the subdivision error on the overall system continue to limit the implementation of these systems. Therefore, because these subdivision error compensation methods are difficult to adapt for use at work sites, photoelectric encoders are used in practical applications with changing environments.

However, the requirement of an ideal laboratory environment and an overemphasis on correcting or compensating the encoder subdivision error rather than considering the impact of the subdivision error on the overall system continue to limit the implementation of these systems and methods. Therefore, these methods are difficult to adapt for use at work sites, where the encoder application environment is changeable and complex.

To reduce the subdivision error and improve the angle encoder measuring accuracy, as well as the bandwidth, stiffness, response time, load capacity, accuracy, and stability of TCS, we have carried out a compensation method on photoelectric angle encoder subdivision errors. We employ the position value measured by encoder to correct the subdivision error without changing the angle encoder measuring system. This method can be applied in practical settings to improve the angular position measuring accuracy and stability of TCS. And this method has not yet been documented [20].

2. Mathematical Analysis for Subdivision Errors

The ideal encoder output two signals are composed of two quadrature signals of equal amplitude with zero mean value, which need to be further subdivided to achieve high-resolution and high-precision performance [21]. For TCS, the subdividing number typically needs to be larger than 1000 to obtain sufficient and effective information, especially when the servosystem is operating at low speed [6, 7]. At present, graphical or data analysis on features of the sample points is commonly used methods, whereas mathematical analysis is rarely mentioned in subdivision error research [22].

The encoder output signals are obtained by the moire fringe technique in a quasisine waveform. The expressions of the two subdivision signals A and B are as follows [22]:

where A and B consist of four parts. and represent the DC components, which are DC subdivision error sources. and are the amplitudes of the base waves, which are amplitude subdivision error sources. and are the sum of higher harmonics, which are harmonic subdivision error sources. represents the electrical noise, which is the electrical noise subdivision error source. In addition, the analog-to-digital conversion (A/D) of A and B is the quantization subdivision error source and the phase difference between A and B is the phase subdivision error source.

To achieve a high subdividing number, we adopted the arc tangent subdivision method [23], which is expressed as

where and are the real and measured subdivision signal angles, respectively, and is the subdivision error.

Therefore, an analysis will be carried out on the above 6 factors to find out the rules and features of these error sources to improve the subdivision accuracy.

2.1. DC Subdivision Error Analysis

If only DC components exist in A and B without any other error sources, the relation between A and B is

according to which we draw Figure 1.

Figure 1: Lissajous figure of A and B with DC error sources.

In Figure 1, the dashed part represents the Lissajous figure of A and B without error sources. The solid part represents the figure with DC error sources and . is the current measuring point of subdivision angle. is the DC subdivision error. and are the intersections of line and the two circles. And there are , and . InitialAngle is zero phase shift. And the following relationship can be deduced from Figure 1 by trigonometric function:

2.2. Amplitude Subdivision Error Analysis

If only amplitude error sources exist in and , the relationship between and is

according to which we can draw Figure 2 for signature analysis.

Figure 2: Lissajous figure of A and B with amplitude error sources.

In Figure 2, the dashed part represents the Lissajous figure of A and B without subdivision error sources, and the solid part is the figure with amplitude error sources. is the current measuring point. is the amplitude subdivision error. And there are , and .

From Figure 2 and the definition of the arc tangent subdivision (2), we obtain the following expression:

2.3. Harmonic Subdivision Error Analysis

If only harmonic error sources exist in A and B without other error sources, a relationship can be determined according to (1) and (2):

If there are different harmonic error components, the total harmonic subdivision errors equal the sum of subdivision errors brought by all of the harmonic components.

2.4. Electrical Noise Subdivision Error Analysis

If only noise error sources exist in A and B without other error sources, then

where and are the noises carried by signals and , respectively. And there is .

The encoder noise generally comes from strong magnetic fields of the transformer, brake, and motor, as well as stray magnetic fields of high-frequency equipment, pulsers and switching power supplies, and AC power lines and power lines of these devices. Noise can be introduced to the system through the terminals of the signal lines and the input/output lines. The encoder noise is essentially caused by capacitive or inductive conductivity. If the installation and use of matched cables and cable assemblies are applied correctly, the encoder will comply with the provisions of the EMC standard 89/336/EEC. We adopt connectors with metal shells or a terminal box recommended by the encoder company and connect shielding at the cable leads in an attempt to achieve a no-inductance connection. Both and will be controlled in a very small range, which means that the electric noise will have little impact on the subdivision signal, let alone the accuracy of the encoder and TCS [6, 7].

2.5. Quantization Subdivision Error Analysis

The quantization of photoelectric subdivision signals and subdivision angle obeys uniform distribution. So the quantization subdivision error can be expressed as

where is the root mean square error of this uniform distribution as well. is the resolution of the subdivision angle.

If is small enough, the influence of the quantization subdivision error on the encoder measuring precision can be neglected.

2.6. Phase Subdivision Error Analysis

If only phase error sources exist in and without other error sources, we obtain

where refers to the phase difference between and .

From the above 6 mathematical expressions of , we can see that both and subdivision signals A and B are function of . Then, we deduce the following relationship between and subdivision signals as shown in Table 1.

Table 1: The features of subdivision errors.

Number
Subdivision error type

Error can be neglected or not

1
DC
1
No

2
Amplitude

No

3
Harmonic

No

4
Electrical noise
1
Yes

5
Quantization
1
Yes

6
Phase

No

Note: means period of , while means period of subdivision signals and .

3. Subdivision Error Compensation Algorithm Proposed in TCS

A telescope that we use as the experimental platform is shown in Figure 3. And the angle encoder measuring system works as shown in Figure 4.

Figure 3: Experimental platform.

Figure 4: The angle measuring principle of the encoder in TCS.

From Figure 4, we can see that, for upper software operator, coarse code and fine code commonly are the only parameters received from the angle encoder. Coarse code represents the complete period number of subdivision signals and the shaft has rotated. As for representation of the left position expression part that the shaft rotates less than the angle that one subdivision signal space period can be represented, the fine code is needed. The subdivision of and is described by fine code. The fine code carries the subdivision error.

In Figure 4, the shaft movement is converted to optical signals through code disk in absolute angle encoder. The reading heads translate these optical signals into electric signals for subsequent electronics. The electric signals consist of the coarse code sources and fine code sources. N in DSP (digital signal processing) unit means the subdividing number for fine code sources. FineCode and CoarseCode are achieved through the processing of DSP. And CodeAllM consists of FineCode and CoarseCode, which is the total code of the measured shaft position . is the resolution of the angle encoder measuring system [8, 9]. Thus, the measured position is digitalized with the subdivision error brought by and .

The total digits AllBit, as well as the digits of the angle encoder measuring system, are the sum of CoarseBit and FineBit. For code disk, the density of grating increases inside out, and coarse code is obtained from the most sparse grating that we tacitly approve that the position measured by the CoarseCode is accurate and the subdivision error exists in the position represented by FineCode.

The subdivision error compensation scheme combines the angle encoder measuring system with TCS and connects the encoder subdivision error with the shaft position measured by the angle encoder of TCS directly to compensate for the subdivision error while making full use of the excellent properties of TCS. The algorithm diagram is shown in Figure 5.

Figure 5: Subdivision error compensation algorithm in TCS.

In Figure 5, is the corrected shaft position. CodeAll is the total code of the real measured shaft position . ACoarseCode is the coarse code part in CodeAll. NCFineCode is the uncorrected fine code. FineCodeCorrected is the corrected fine code and CodeAllCorrected is the corrected total code.

The algorithm is composed of Module A and Module B. Module A converts the measured shaft position into a code-form value. Module B modifies the position measured by the fine code and outputs CodeAllCorrected.

The implementation steps for Module A are as follows.

Step 1. Through mathematical analysis of the subdivision error, error source type can be determined combined with the encoder measuring system and the encoder application environment. If the influence of the subdivision error on the accuracy of TCS is weak enough to be neglected, Module A ends and Module B will not be performed. Otherwise, Module A continues.

Step 2. Calculate the following initial parameters:
(a) encoder measuring system resolution: , (b) angle resolution represented by coarse code: , and (c) electronic subdivision resolution: .

Step 3. Given that can be calculated as then .

Step 4. Calculate the real electronic subdivision angle according to .

Step 5. Judge whether the subdivision signals have zero phase deviation InitialAngle. If there is an InitialAngle, we regard the current zero point as starting point and the real measured subdivision angle can be expressed as . is the measured subdivision angle obtained by and (1), according to the error source type. If there is no offset, then .

Step 6. Calculate the fine code according to . CodeAll can then be expressed as . Module A is complete.

The core idea of Module A is calculating and its fine code with the help of angle to obtain CodeAll of the real measured shaft position . In this way, the encoder subdivision error will be fed to Module B in the form of code values.

Module B is divided into two parts. Module B-1 operates as follows.

Step 1. According to and , . ACoarseCode and CodeAll are from different sources. The former comes from the input total code of Module B. The latter is acquired by . They are theoretically equivalent. The purpose of this step is to purify the coarse code and make it more accurate.

Step 2. Obtain the uncorrected fine code NCFineCode according to . Module B-1 is complete.

Module B-2 operates as follows.

Step 1. Calculate the electrical subdivision angle represented by the unmodified fine code according to . FinePhaseOrigin and are from different sources. The former comes from the uncorrected fine code, whereas the latter is acquired by the measured position. The former is generally less than the latter because of roundness.

Step 2. If there is an InitialAngle, the measured subdivision angle is . Otherwise, .

Step 3. Calculate the subdivision error , which is the correction value, according to the error source type.

Step 4. Count the modified subdivision angle according to .

Step 5. Obtain the corrected fine code according to and calculate the corrected total code according to to complete Module B-2.
Next, calculate the corrected shaft position value according to .
Take into TCS through feedback loop. TCS usually owns both the speed loop and position loop. To ensure the real-time and rapid-response capability of TCS, its algorithms should be as simple as possible and the error compensation algorithm should be applied in as few loops as possible. Therefore, two control models are adopted, which are shown as Figures 6(a) and 6(b), respectively. Model I is the subdivision error compensation algorithm being applied to the speed loop and Model II is applied to both speed loop and position loop. If the shaft working performance of Model II is very close to that of Model I, we will choose Model I to relieve the burden of TCS operation.

(a)

(b)

Figure 6: (a) Model I: subdivision error compensation algorithm is applied only to the speed loop. (b) Model II: compensation algorithm is applied to both the speed loop and the position loop.

4. Algorithm Verification

Jittering is ubiquitous and brings bad influence on the performance of TCS, especially when the elevation operates in low-speed mode compared with the azimuth performance. Thus, we take elevation as the control target. And the low-speed shaft characteristics of a telescope are shown in Figure 7.

Figure 7: The low-speed characteristics of the shafts.

Angle encoders of TCS have already passed quality and accuracy test before installing them. As for the accuracy test, a rhomb with twenty-three faces is fixed on the shaft where the encoder being applied in. And compare the reading of collimator with the angle measured from the encoder to calculate the measuring error of TCS. Through fitted curves of these two groups of data, we add modified values to the control system to eliminate the measuring error as much as possible. After the modification the coincidence property of these two curves is excellent no matter the shaft rotates positively or reversely.

We selected 11 representative speeds (0.05°/s, 0.1°/s, 0.2°/s, 0.3°/s, 0.4°/s, 0.5°/s, 0.6°/s, 0.8°/s, 1.0°/s, 1.2°/s, and 1.5°/s) as the leading speeds of the elevation in low-speed working mode. As an example, the performance (shown in Figure 8) of the elevation at 0.5°/s is analyzed. And we can see that there is an obvious jitter with an amplitude of approximately at 22.76 Hz in frequency domain. We recorded the elevation position error, its guide speed, and the frequency of jitter points. To acquire the effective position error of the elevation leading operation Error, we set v as the leading speed first. Then the leading position can be expressed as at the time of . Make represent the feedback position acquired by the angle encoder. The error at the time of can be calculated according to . Then Error can be expressed by RMS (root mean square) of the according to . And the jitter period in space domain can be determined according to .

Figure 8: Elevation works at 0.5°/s.

The 24-bit encoder measuring system resolution of TCS is . 16-bit fixed-point TMSC5416 chip produced by TI (Texas Instruments) is chosen as the processor of TCS. In order to avoid unnecessary loss of processor resources and guarantee the angle measuring precision, we choose the angle measuring accuracy to be at 0.000001°, which has up to four digits after the decimal point in the arcsecond scale expression as .

The statistical results are shown in Table 2.

Table 2: The position error, jitter frequency, and jitter period in space domain.

Number
Leading speed
Position error (RMS)
Jitter frequency

(°/s)
(′′)
(Hz)
(′′)

1
0.05
0.2484
2.2767
79.0628

2
0.1
0.2698
4.5478
79.1593

3
0.2
0.3989
9.1000
79.1211

4
0.3
0.5977
13.6490
79.1247

5
0.4
0.8247
18.2075
79.0883

6
0.5
1.0488
22.7552
79.1029

7
0.6
1.4164
27.3118
79.0868

8
0.8
1.2695
36.4032
79.1138

9
1.0
1.0474
45.5145
79.0956

10
1.2
0.9612
54.6069
79.1109

11
1.5
0.9388
68.2534
79.1169

Although all six subdivision error sources can affect the accuracy and the stability of the control system, the impact ability of each error source is various in different systems. To save the system resources and guarantee the good real-time ability of the control system, only the main subdivision errors are modified or compensated generally.

From Figure 8 and Table 2, we can see that obvious jitter exists in each frequency domain of the elevation performance in constant speed leading working mode, which can be transformed into angular value in space domain according to shown in Table 2 (column 3). The TCS employs a 24-bit photoelectric absolute angle encoder, of which there are 14 bits for the coarse code. Through coarse code, the shaft position corresponding to one-period length of subdivision signals A and B can be calculated as . So the angular value corresponding to the jitters is equal to the space period of subdivision signals A and B, which means in the acceptable degree of accuracy. Comparing this result with Table 1, whose parameters are deduced through mathematical and theoretical analysis, we can see that the DC subdivision errors and the second harmonic subdivision errors are just in line with the comparison.

A sinusoidal leading operation to the elevation is done, which sets 60° as center position, defines its period as 10000 seconds, and gives a maximum velocity of 1.5 rad/s, a maximum acceleration of 0.094 rad/s², and a maximum motion of 23.873°. The elevation status detected by the encoder is shown in Figure 9. Given that the sinusoidal purity of measuring results is excellent, we choose to neglect the influence of the second harmonic subdivision error on the encoder measuring accuracy. After comprehensive analysis, we chose the DC subdivision error for compensation according to the proposed subdivision error compensation algorithm.

Figure 9: Sinusoidal leading operation to the elevation.

To compensate for the DC subdivision error, we first take the initial parameters and into the algorithm. Because of the existence of the DC subdivision error, we need to solve for the phase offset first.

We suppose that the influence of the DC subdivision error source on elevation is far stronger than other error sources. The DC offsets and are assumed to be approximately equal. Thus, the DC offset can be calculated from

where is the sampling number in one period of . As long as the sampling number is large enough, and are perceived as correct.

Because the photoelectric angle encoder outputs subdivision signals, we make . The zero shift of the subdivision signal angle can be obtained by . According to the definition of subdivision signals and Figure 1, we obtain the following:

We plug the above parameters into the subdivision error compensation algorithm and apply Model I and Model II in elevation control system. Compared with Figure 8, from Figure 10 we can see that the jitter has been obviously weakened to approximately and the elevation error has been decreased by approximately 42.2% from to 0.6 when elevation works at 0.5°/s. The measured low-speed working performance of the elevation is shown in Figure 11.

Figure 10: Elevation works at 0.5°/s after Model II being applied.

Figure 11: The measured low-speed working performance of elevation.

The tracking performance of elevation is obviously enhanced after the two control models are applied compared with the performance without DC subdivision error compensation. Thus, the proposed subdivision error compensation algorithm can improve the encoder measuring accuracy and suppress the tracking error to ensure the low-speed stability of TCS. Model II provides superior error compensation in the elevation control system, especially elevation working at the speed of 0.05–0.3°/s. It also provides a relatively stable working stage when the elevation rotational speed is larger than 0.8°/s. In addition, the test results of Model II are closer to the working performance of the azimuth control system, which usually provides excellent performance. The subdivision error compensation algorithm is simple and easy to implement, placing little burden on TCS operation. Thus, Model II is more appropriate for use in TCS. Compared with the elevation control system without DC subdivision error compensation, the maximum corrected elevation position error was reduced by approximately 47.9% from 1.4 to 0.7. The low-speed and overall performance of the elevation control system was enhanced significantly.

5. Conclusion

Based on a TCS platform, a mathematical analysis on the angle encoder subdivision error was performed to find relationships between subdivision errors and subdivision signals. And the error compensation algorithm was put forward. Then, two control models were proposed based on the compensation algorithm. As for jitter seriously affecting the elevation when it works in low-speed mode in practical engineering, the DC subdivision error compensation was determined to be done by analyzing the jittering period feature. Then the DC subdivision error compensation algorithm was applied to elevation in the two control models. And Model II that the algorithm is applied to both speed loop and position loop was adopted finally.

We provide a subdivision error compensation method with the help of control system. Six types of subdivision errors can be compensated following the concrete analysis and compensation procedures that the method has described in detail based on actual situation. The method is suitable for complex devices that have high-accuracy and strong real-time requirements. And it can be adaptable to the changing environment and does not require any expensive error detection equipment. This method avoids bringing large delay to the control system. Moreover, because it requires only the position information of the shafts rather than the complete information about the TCS, the angle encoder measuring system, and the software and hardware structure of the whole system, it is with good portability and has superiority in saving time and labor.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

This work was supported by the Telescope System for Satellite-to-Ground Quantum Communication of Chinese Academy of Sciences (Grant no. KX-02), the National Natural Science Funds of China (Grant no. 61205007), and the Fundamental Research Funds for the Central Universities of Central South University (Grant no. 2015zzts065).

References

H. Tao, L. Zhu-lian, Z. Hai-tao et al., “Design and implementation for control system of 53 cm binocular laser ranging telescope,” Modern Electronics Technique, vol. 37, no. 16, pp. 1–7, 2014.

B. S. May and N. P. Jones, “Next generation space telescope. II: proposed pointing control system,” Journal of Aerospace Engineering, vol. 7, no. 4, pp. 375–397, 1994.

Z. Jian and F. Du, “The servo control system of KDUST telescope,” in Advances in Optical and Mechanical Technologies for Telescopes and Instrumentation, vol. 9151 of Proceedings of SPIE, pp. 112–117, Montréal, Canada, June 2014.

M. Dindar, S. Helhel, H. Esenoğlu, and M. Parmaksızoğlu, “A new software on TUG-T60 autonomous telescope for astronomical transient events,” Experimental Astronomy, vol. 39, no. 1, pp. 21–28, 2015.

K. Gulez, A. A. Adam, and H. Pastaci, “A novel direct torque control algorithm for IPMSM with minimum harmonics and torque ripples,” IEEE/ASME Transactions on Mechatronics, vol. 12, no. 2, pp. 223–227, 2007.

S. Srinivasan and A. S. Raja, “New direct torque control algorithm for high performance induction motor,” in Power Electronics and Renewable Energy Systems, vol. 326 of Lecture Notes in Electrical Engineering, pp. 523–533, Direct Torque Control Algorithm for High Performance Induction Motor Lecture Notes in Electrical Engineering. 326 523-533, New, 2015.

Heidenhain, Encoders for Servo Driversو 2013

H. Yu, Q. Wan, S. Wang, and F. Huang, “Error detection development of photoelectric encoders,” Optoelectronic Technology, vol. 33, no. 3, pp. 145–150, 2013.

Y. V. Filatov, M. Y. Agapov, M. N. Bournachev, D. P. Loukianov, and P. A. Pavlov, “Laser goniometer systems for dynamic calibration of optical encoders,” in Optical Measurement Systems for Industrial Inspection III, vol. 5144 of Proceedings of SPIE, pp. 381–390, Munich, Germany, June 2003.

W. Tsukasa, F. Hiroyuki, N. Kan, M. Tadashi, and K. Makoto, “Automatic high precision calibration system for angle encoder,” in Recent Developments in Traceable Dimensional Measurements, vol. 4401 of Proceedings of SPIE, pp. 267–274, Munich, Germany, June 2001.

T. Watanabe, H. Fujimoto, and T. Masuda, “Self-calibratable rotary encoder,” Journal of Physics: Conference Series, vol. 13, no. 13, pp. 240–245, 2005.

L. Chenran, C. Guohua, and D. Hongchang, “Encoder error compensation and calibration,” Journal of Changchun University of Science and Technology (Natural Science Edition), vol. 3, pp. 20–22, 2013 (Chinese).

Y. Sun, Study on the Interpolation Error Correction Method for the Minitype Spsceflight Photoelectrical Encoder, University of Chinese Academy of Sciences, 2010 (Chinese).

M. Warner, V. Krabbendam, and G. Schumacher, “Adaptive periodic error correction for Heidenhain tape encoders,” in Ground-based and Airborne Telescopes II, vol. 7012 of Proceedings of SPIE, Marseille, France, June 2008.

J.-H. Song, K.-C. Kim, and S. H. Kim, “Reducing tilt errors in moiré linear encoders using phase-modulated grating,” Review of Scientific Instruments, vol. 71, no. 6, pp. 2296–2300, 2000.

X. Wang, J. Guo, and T. Xie, “Ellipse fit algorithm and subdivision revision method of precision diffraction grating,” Tool Technology, vol. 37, no. 12, pp. 47–49, 2003.

X. Hong, Z.-J. Xu, and N. Yang, “Error compensation of optical encoder based on RBF network,” Optics and Precision Engineering, vol. 16, no. 4, pp. 598–604, 2008.

G. Ye, S. Fan, H. Liu et al., “Design of a precise and robust linearized converter for optical encoders using a ratiometric technique,” Measurement Science & Technology, vol. 25, no. 12, Article ID 125003, 2014.

S. Alex, M. Ron, and O. Manfred, “Dynamic state estimation based on Poisson spike trains towards a theory of optimal encoding,” Journal of Statistical Mechanics: Theory and Experiment, vol. 13, pp. 1742–5468, 2013.

Y. Su, Q. Wang, Y. Huang et al., “A subdivision signal error compensation method of photoelectric encoder applied on tracking control platform,” Chinese patent 2015100005368, 2015

J. Lopez and M. Artes, “A new methodology for vibration error compensation of optical encoders,” Sensors, vol. 12, no. 4, pp. 4918–4933, 2012.

X.-J. Wang, “Errors and precision analysis of subdivision signals for photoelectric angle encoders,” Optics and Precision Engineering, vol. 20, no. 2, pp. 379–386, 2012.

Z. Ma, Research of subdivision and compensation of sine-cosine encoder signal, Huazhong University of Science and Technology, Hubei, China, 2012, (Chinese).