Mathematical Problems in Engineering
Volume 2016 (2016), Article ID 2562971, 9 pages
http://dx.doi.org/10.1155/2016/2562971

Research Article

Simulation Study on Miscibility Effect of CO₂/Solvent Injection for Enhanced Oil Recovery at Nonisothermal Conditions

Moon Sik Jeong and Kun Sang Lee

Department of Natural Resources and Environmental Engineering, Hanyang University, 222 Wangsimni-ro, Seongdong-gu, Seoul 04763, Republic of Korea

Received 13 October 2015; Revised 8 January 2016; Accepted 13 January 2016

Academic Editor: Chaudry Masood Khalique

Copyright © 2016 Moon Sik Jeong and Kun Sang Lee. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The minimum miscibility pressure (MMP) determines the main mechanism of CO₂ flooding, which is either an immiscible or miscible process. This paper examines the recovery improvements of CO₂ flooding in terms of both the injection temperature and solvent composition. The results show that a lower temperature injection and LPG (liquefied petroleum gas) mixture can considerably improve oil recovery due to the reduced MMP in the swept area caused by the injected solvent. For the pure CO₂ injection at the reservoir temperature, oil recovery is 59% after 1.0 PV CO₂ injection. The oil recoveries by CO₂-LPG mixtures are improved to 73% with 0.1 mole fractions of LPG and 81% with 0.2 mole fractions of LPG. The recovery factor from low-temperature CO₂ injection is 78%, which is 32% higher compared to the isothermal case. The recoveries obtained by low-temperature CO₂-LPG injection increase up to 87% of the initial oil. Heat transfer between the reservoir and the formation of over/underburden should be considered in order to describe the process more accurately. Additionally, the recovery factors from the heat transfer models are decreased by 4–12% in comparison with the original nonisothermal models.

1. Introduction

CO₂ flooding is a common process used to enhance oil recovery for light to medium crude oil and is generally implemented to recover the remaining oil after waterflooding [1, 2]. The performance of CO₂ flooding is mainly affected by the minimum miscibility pressure (MMP). The MMP of CO₂ is known to depend on various parameters including the temperature, pressure, molecular weight of the heavy fraction, and composition of the injecting solvent [3–12]. Generally, high temperature and large mole fractions of the heavy component result in a high MMP [13].

To examine the effects of temperature on the MMP and recovery factor of CO₂ flooding, a number of experimental studies have been conducted. Holm and Josendal [4] defined a simple correlation for the CO₂ MMP versus the reservoir temperature and C₅₊ molecular weight of the oil. Stalkup [5] showed that the CO₂ purity, oil composition, and reservoir temperature determine the MMP. Yellig and Metcalfe [6] stated that the CO₂ MMP is significantly influenced by the reservoir temperature. Johnson and Pollin [8] looked at the molecular weight, oil gravity, reservoir temperature, and injection gas composition in an attempt to improve the accuracy of MMP correlation. Alston et al. [9] analyzed the temperature, C₅₊ molecular weight, volatile oil fraction, intermediate oil fraction, and composition of the injected CO₂.

Low-temperature injection was first applied by Shu [14]. Injection of a coolant decreases the MMP, thereby increasing the recovery. He suggested an equation to calculate the CO₂ MMP reduction in terms of the coolant volume. This equation, however, assumes that the injected fluids are entirely mixed with the reservoir oil. Khanzode [15], Wang [16], and Wang et al. [17] performed numerical simulations to prove the potential of reservoir cooling for enhanced oil recovery from CO₂ injection. They considered temperature gradients in realistic reservoir situations. Although the injection composition, like the injection temperature, is known to affect the MMP, these simulation studies only considered the effect of the injection temperature on the MMP.

CO₂ can be injected in an immiscible or near-miscible process at reservoir conditions. The performance of the immiscible process is generally lower than that of the miscible flood. The recovery in immiscible conditions can be improved by lowering the CO₂ MMP via injection of a LPG (liquefied petroleum gas). Kumar and Von Gonten [19] investigated the recovery by injecting mixtures of CO₂ and LPG. They carried out experiments with Woodruff reservoir oil in Berea sandstone cores. The recovery of the mixture injection was 11% higher than that using only a CO₂ injection. Lee et al. [20] optimized the injection composition for gas injection. Their results stated that an injectant rich in C₃ to C₄ led to a higher oil rate with higher API oil. Delfani et al. [21] simulated the gas injection process in the Iranian field. The performance of LPG injection was better than that of CO₂ flooding.

Various researchers have explained that both the temperature and injection composition are important factors that influence the recovery efficiency. However, the effect of temperature has been often ignored in most simulations of gas flooding. This study investigates the combined effects of the temperature of the injected fluids and the composition of the CO₂-LPG mixture on oil recovery. A lower temperature solvent and composition of the solvent can impact the MMP, which subsequently affects the oil recovery. The fluid model used for MMP calculation, reservoir model, and injection schemes is indicated. The recovery factors are analyzed with respect to the LPG mole fraction and injection temperature with an integrated model of compositional flow and heat transfer in the reservoir.

2. Methodology

2.1. Model Formulation

Simulations of CO₂ flood were conducted with GEM, which is a 3D, multicomponent, multiphase, compositional simulator considering important mechanisms of miscible gas injection process such as composition changes of reservoir fluids, swelling of oil, viscosity reduction, and the development of a miscible solvent bank through multiple contacts.

The basic mass conservation equation for components can be written as follows:

where is the porosity, the phase index, the total number of phases, the density of phase , and the Darcy velocity of phase .

The phase flux from Darcy’s law is

where is the intrinsic permeability tensor, the vertical depth, the relative permeability, the viscosity, and the specific weight of phase .

To describe nonisothermal conditions and investigate their influence on oil recovery, thermal module was also used. General total energy balance in the reservoir by conduction and convection can be described as follows:

where is the reservoir temperature, is the density of rock, and are the heat capacities of rock and phase at constant volume, is the heat capacity of phase at constant pressure, is the thermal conductivity, and is the heat loss to overburden and underburden formations.

Heat transfer between the reservoir and surrounding formations should be considered to more accurately describe the recovery process. When the injected fluids flow through the reservoir, heat transfer occurs between the reservoir and over/underburden across its boundaries. Vinsome and Weterveld’s semianalytical method [22] is used to calculate the heat loss by linear conduction. It assumes that conduction within surrounding rocks rapidly eliminates any temperature differences and longitudinal heat conduction in the surroundings can be neglected. The temperature profile in the over/underburden can be calculated as function of time and distance from reservoir interface by

where is the over/underburden temperature at time at a distance from the reservoir boundary, and are the time dependent parameters, is the thermal diffusion length, is the temperature in the boundary grid block, and is the initial temperature in the boundary grid block. The diffusion length is represented by

where is the thermal diffusivity defined by

Here, is the rock thermal conductivity, is the rock heat capacity, and is the mass density of the rock. Parameters and are derived as

where

and the heat loss rate is

where is the cross-sectional area for heat loss to the overburden and underburden.

2.2. Crude Oil Characterization

Oil from the Weyburn reservoir [18, 23, 24] is chosen to model the reservoir oil. The saturation pressure is 2.89 MPa at 59°C. The oil composition is shown in Table 1. Table 2 represents PVT properties as a function of dissolved gas mole fraction. The properties include saturation pressure, gas oil ratio (GOR), gas solubility, formation volume factor (FVF), and swelling factor (SF). Fluid characterization, lumping of components, and matching with laboratory data through regression are carried out by fluid modeling with WinProp of CMG. The oil density and viscosity are matched with experimental results [18] through the Peng-Robinson equation of state model (Tables 3 and 4). Table 5 represents viscosity data for the oil and CO₂ mixture. The CO₂ MMP was calculated using the multiple-mixing-cell method [25] over a temperature range of 49–82°C. The predicted MMPs at 82°C are 18.9 MPa for CO₂, 13.2 MPa for 90% CO₂ with 10% LPG, and 9.4 MPa for 80% CO₂ with 20% LPG. The LPG consists of 0.2 mole fractions of propane and 0.8 mole fractions of butane. The MMPs are plotted against temperature in Figure 1. This result explains that the MMP decreases as the temperature decreases and the concentration of LPG increases.

Table 1: Composition of simulated oil.

Component
Mole fraction

N₂
0.0096

CO₂
0.0058

H₂S
0.0030

C₁
0.0449

C₂
0.0299

C₃
0.0475

IC₄
0.0081

NC₄
0.0192

IC₅
0.0127

NC₅
0.0219

C₆ to C₉
0.2573

C₁₀ to C₁₇
0.2698

C₁₈ to C₂₇
0.1328

C₂₈₊
0.1375

Sum
1

Table 2: PVT properties of the reservoir fluid and CO₂ mixtures at 59°C [18].

Dissolved gas mole fraction
Saturation pressure (MPa)
GOR (sm³/m³)
Gas solubility (sm³/m³)
FVF (m³/m³)
SF (m³/m³)

0.0058
2.9
19
0
1.087
1.074

0.158
4.5
42
23
1.143
1.130

0.412
8.0
113
94
1.308
1.292

0.439
8.4
125
106
1.336
1.320

0.521
9.9
158
139
1.409
1.392

0.595
11.4
221
202
1.546
1.527

0.641
12.6
263
244
1.634
1.614

0.826
19.7
875
856
2.694
2.668

Table 3: Density and viscosity data of simulated oil at 0.1 MPa.

Temperature (°C)
Density (kg/m³)
Viscosity (mPa·s)

15
878.1
—

20
876.8
5.2

59
836.7
3.2

Table 4: Density and viscosity data of simulated oil at 59°C.

Pressure (MPa)
Density (kg/m³)
Viscosity (mPa·s)

0.1
836.1
3.2

3.54
843.4
4.5

6.99
847.6
4.8

10.44
851.5
5.1

17.33
858.5
5.6

Table 5: Viscosity data for simulated oil and CO₂ mixtures at 59°C.

Dissolved gas mole fraction
Viscosity (mPa·s)

0.0058
3.15

0.158
2.45

0.412
1.44

0.439
1.34

0.521
1.05

0.595
0.79

0.641
0.65

0.826
0.18

Figure 1: Variation of the MMP with temperature.

2.3. 2D Homogeneous Reservoir Model

A 2D hypothetical model is illustrated in Figure 2 and its properties are shown in Table 6. The length and width are both 60 m and the thickness is 3 m with a Cartesian grid of 20 × 20 × 1 grid blocks. The porosity (0.2) and permeability (2.96 × 10⁻⁷ m²) are constant. Relative permeability curves are obtained from waterflooding in Weyburn field (Figure 3) [26]. The initial water and oil saturations are set at 0.2 and 0.8, respectively. The reservoir assumes an initial pressure of 13.8 MPa and an initial temperature of 82°C. The producer operates at a constant pressure condition of 11 MPa. 1.0 PV (pore volume) of water is injected, followed by the injection of 1.0 PV of CO₂ or solvent. In the three cases of the isothermal model, the injection temperature is the same as the reservoir temperature. Fluids are injected at 49°C during the three other cases for the nonisothermal model. Table 7 lists the injection scenarios.

Table 6: Reservoir properties for the 2D, homogeneous, five-spot reservoir model.

Reservoir property
Value

Number of grid blocks
20 20 1

Thickness (m)
3

Grid block size (m)
3 3 3

Porosity
0.2

Permeability (m²)
2.96 10⁻⁷

Initial water saturation
0.2

Initial oil saturation
0.8

Initial reservoir temperature (°C)
82

Initial reservoir pressure (MPa)
13.8

Table 7: Temperature and composition data of the injected fluids.

Case
Temperature (°C)
Injection composition

1
82
CO₂ 100%

2
82
CO₂ 90% + LPG 10%

3
82
CO₂ 80% + LPG 20%

4
49
CO₂ 100%

5
49
CO₂ 90% + LPG 10%

6
49
CO₂ 80% + LPG 20%

Figure 2: One-fourth of the 2D, five spot reservoir model.

(a)

(b)

Figure 3: Relative permeability curves in Weyburn field: (a) oil-water relative permeability and (b) oil-gas relative permeability.

3. Results

3.1. Effects of Injection Temperature and Composition

When the reservoir pressure is higher than the MMP, the injected fluids and crude oils are under the miscible condition. Figure 4(a) shows the pressure distribution versus distance for CO₂ injection at 82°C (Case  1). CO₂ injection starts on the 730th day and finishes on the 2,557th day. The reservoir pressure varies from 11 to 13 MPa. According to Figure 1, the MMP is 18.9 MPa for pure CO₂ injection at 82°C. In this circumstance, the injected fluids behave under the immiscible condition. Figure 4(b) illustrates the pressure profiles of CO₂ injection at 49°C (Case  4). The range of pressure distribution for this scenario is the same as in Case  1.

(a)

(b)

Figure 4: Pressure profiles between the injector and producer: (a) pure CO₂ injection at 82°C and (b) pure CO₂ injection at 49°C.

Figure 5 depicts the substantial improvement of oil recovery obtained by low-temperature CO₂ injection. For the immiscible case (Case  1), oil recovery is 59% at 1.0 PV CO₂ injection. The recovery factor of Case  4 is 78%, which is improved by 32% compared with Case  1. Figure 6 describes the temperature distributions from the injector to the producer as a function of time. Near the injector, CO₂ is always miscible with oil due to the temperature drop to 49°C. The area cooled by the low-temperature CO₂ injection has high CO₂ miscibility and low CO₂ MMP. This area becomes broader with time and a miscible region develops. According to Figure 7, more than 48% of CO₂ has dissolved into the oil phase in the miscible condition compared with the immiscible condition. The miscible condition, caused by the injected CO₂, leads to an improved displacement efficiency of the reservoir oil.

Figure 5: Oil recovery factors for the pure CO₂ injection case under isothermal (Case  1) and nonisothermal (Case  4) conditions.

Figure 6: Temperature profiles from the injector to producer for Case  4.

Figure 7: Mole fraction of CO₂ dissolved into the oil phase in the miscible and immiscible conditions.

To examine the effect of CO₂ and LPG mixtures on oil recovery, two injection scenarios are implemented using two types of CO₂-LPG mixtures with proportions of 9 : 1 and 8 : 2 (Figure 8). If the concentration of LPG is above 10%, miscibility is achieved at 82°C; this is caused by the fact that the average pressure for all of the cases is under 13.8 MPa. In Case  2, a 1.0 PV slug mixture of CO₂ and LPG (9 : 1) is used, followed by waterflooding. The oil recovery by this mixture is 73% of the initial oil, which is about 22% higher than that of CO₂ flooding alone. In Case  3, the amount of LPG in the mixture is increased to 0.2 mole fractions and the amount of CO₂ is reduced to 0.8 mole fractions. Using this mixture, 81% of the initial oil is recovered, which is about 35% more than the recovery obtained by CO₂ flooding.

Figure 8: Oil recovery factors for all of the cases in the isothermal and nonisothermal conditions.

Case  5 applies a 9 : 1 CO₂/LPG mixture injection at 49°C. The recovery obtained by this mixture is 82% of the initial oil. The recovery for this scenario is increased by as much as 5% compared with Case  4. When a CO₂-LPG mixture with a proportion of 8 : 2 is used at 49°C, the recovery is 87% of the initial oil. The increase in recovery obtained by this mixture is 12% higher than the recovery of Case  4. These improvements are caused by the considerable extension of the miscible areas due to the LPG mixture injection. The miscible zones of Cases  4 to 6 are illustrated in Figure 9. If the pressure is fixed at each grid block, the temperature is the main parameter that determines whether the conditions are miscible or immiscible. In the nonisothermal cases, the block pressures are close to 11 MPa after 1 PV CO₂ (or solvent) injection. At this pressure, miscible zones are developed under 54°C during pure CO₂ flooding and under 66°C during injection of the 10% LPG mixture. As a result, the miscible state occurs in 18% of the reservoir in Case  4 and 41% of the reservoir in Case  5. The whole reservoir becomes miscible in Case  6 due to the lower MMP caused by the mixture with 20% LPG.

(a)

(b)

(c)

Figure 9: Miscible zones for nonisothermal cases after 1.0 PV CO₂ or CO₂/LPG injection: (a) Case  4, (b) Case  5, and (c) Case  6.

3.2. Heat Transfer to/from Over/Underburden

Figure 10 compares the temperature profiles at 1.0 PV CO₂ injection. The temperature distribution varies with the effect of heat transfer between the reservoir and over/underburden. The average reservoir temperature drops to 81°C and 67°C in the models with and without heat transfer, respectively. In the heat transfer model, the temperature of the reservoir is maintained near the initial temperature.

(a)

(b)

Figure 10: Temperature profiles at 1.0 PV CO₂ injection: (a) without heat transfer and (b) with heat transfer.

The oil recovery factors for Cases  4 to 6 are demonstrated in Figure 11. This shows that the recovery factors from the simulations with the heat transfer model are lower than those of the original model without heat transfer. If pure CO₂ flooding is implemented with heat transfer, recovery is decreased by 12%. The recovery factors for the other two heat transfer models, which implemented CO₂-LPG mixture flooding, are also decreased by 4-5% compared with the original cases.

Figure 11: Oil recovery factors in the nonisothermal models with and without heat transfer.

4. Conclusions

This study aims to examine the effects of CO₂ injection on oil recovery with respect to the temperature and composition. The MMP decreases in the cases of low-temperature and CO₂-LPG mixture injection. Miscibility is achieved within the swept zone despite the relatively low reservoir pressure. Performing a low-temperature injection provides significant improvements in terms of oil recovery. Even at elevated temperatures, the addition of LPG into the injected CO₂ is able to guarantee the reservoir performance by achieving miscibility. If heat transfer exists between the reservoir and surrounding formations, little change in the average temperature is obtained despite the injection of cool fluids. However, in this model, recovery is enhanced in comparison to the isothermal models. This is caused by the fact that the area near the injector zone becomes miscible due to the cooling effects on the reservoir.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgment

This work was supported by Energy & Mineral Resources Development Association of Korea (EMRD).

References

B. Du and L. Cheng, “Experimental study of enhanced oil recovery with CO₂ slug+N₂ flood in low permeability reservoir,” Geosystem Engineering, vol. 17, no. 5, pp. 279–286, 2014.

W. Hu, Z. Wang, J. Ding, Z. Wang, Q. Ma, and Y. Gao, “A new integrative evaluation method for candidate reservoirs of hydrocarbon gas drive,” Geosystem Engineering, vol. 18, no. 1, pp. 38–44, 2015.

A. L. Benham, W. E. Dowden, and W. J. Kunzman, “Miscible fluid displacement—prediction of miscibility,” Petroleum Transactions, AIME, vol. 219, pp. 229–237, 1960.

L. W. Holm and V. A. Josendal, “Mechanisms of oil displacement by carbon dioxide,” Journal of Petroleum Technology, vol. 26, no. 12, pp. 1427–1438, 1974.

F. I. Stalkup, “Carbon dioxide miscible flooding: past, present, and outlook for the future,” Journal of Petroleum Technology, vol. 30, no. 8, pp. 1102–1112, 1978.

W. F. Yellig and R. S. Metcalfe, “Determination and prediction of CO₂ minimum miscibility pressures,” Journal of Petroleum Technology, vol. 32, no. 1, pp. 160–180, 1980.

N. Mungan, “Carbon dioxide flooding—fundamentals,” Journal of Canadian Petroleum Technology, vol. 20, no. 1, pp. 87–92, 1981.

J. P. Johnson and J. S. Pollin, “Measurement and correlation of CO₂ miscibility pressures,” in Proceedings of the SPE/DOE Enhanced Oil Recovery Symposium, SPE-9790-MS, pp. 269–281, Society of Petroleum Engineers, Tulsa, Okla, USA, April 1981.

R. B. Alston, G. P. Kokolis, and C. F. James, “CO₂ minimum miscibility pressure: a correlation for impure CO₂ streams and live oil systems,” Society of Petroleum Engineers journal, vol. 25, no. 2, pp. 268–274, 1985.

O. S. Glaso, “Generalized minimum miscibility pressure correlation,” Society of Petroleum Engineers Journal, vol. 25, no. 6, pp. 927–934, 1985.

A. M. Elsharkawy, F. H. Poettmann, and R. L. Christiansen, “Measuring minimum miscibility pressure: slim-tube or rising-bubble method?” in Proceedings of the SPE/DOE Enhanced Oil Recovery Symposium, Paper no. SPE24114, pp. 107–116, Society of Petroleum Engineers, Tulsa, Oklahoma, April 1992.

H. Yuan, R. T. Johns, A. M. Egwuenu, and B. Dindoruk, “Improved MMP correlations for CO₂ floods using analytical gas flooding theory,” in Proceedings of the SPE/DOE Symposium on Improved Oil Recovery, SPE-89359-MS, pp. 1–16, Society of Petroleum Engineers, Tulsa, Okla, USA, April 2004.

L. W. Lake, Enhanced oil Recovery, Prentice Hall, New Jersey, NJ, USA, 1989.

W. R. Shu, “Lowering CO₂ MMP and recovering oil using carbon dioxide,” Patent US4513821A, USA, 1985

A. Khanzode, A parametric study of reservoir cooling for enhanced recovery by CO₂ flooding [M.S. thesis], The Pennsylvania State University, State College, Pa, USA, 2012.

Z. Wang, A parametric study on reservoir cooling for enhanced oil recovery from CO₂ injection [M.S. thesis], Pennsylvania State University, State College, Pa, USA, 2013.

Z. Wang, A. Khanzode, and R. T. Johns, “A parametric study of reservoir cooling for enhanced recovery by CO₂ flooding,” in Proceedings of the SPE Annual Technical Conference and Exhibition, Paper no. SPE170626, pp. 1–28, Amsterdam, The Netherlands, October 2014.

R. K. Srivastava, S. S. Huang, and M. Dong, “Laboratory investigation of Weyburn CO₂ miscible flooding,” Journal of Canadian Petroleum Technology, vol. 39, no. 2, pp. 41–51, 2000.

N. Kumar and W. D. Von Gonten, “An investigation of oil recovery by injecting CO₂ and LPG mixtures,” in Proceedings of the Annual Fall Meeting of the Society of Petroleum Engineers of AIME, SPE-4581-MS, pp. 1–8, Society of Petroleum Engineers, Las Vegas, Nev, USA, September-October 1973.

S. T. Lee, T. P. Moulds, R. Narayanan et al., “Optimizing miscible injectant (MI) composition for gas injection projects,” in Proceedings of the SPE Annual Technical Conference and Exhibition, Paper no. SPE71606, pp. 1–9, New Orleans, La, USA, October 2001.

S. Delfani, A. Mortezapour, A. Q. Firouz et al., “Evaluation of miscible and immiscible gas injection in one of the Iranian fields,” in Proceedings of the Abu Dhabi International Petroleum Exhibition and Conference, Paper no. SPE 117905, pp. 1–13, Abu Dhabi, United Arab Emirates, November 2008.

P. K. W. Vinsome and J. D. Westerveld, “A simple method for predicting cap and base rock heat losses in thermal reservoir simulators,” Journal of Canadian Petroleum Technology, vol. 19, no. 3, pp. 87–90, 1980.

S. S. Huang and S. B. Dyer, “Miscible displacement in the Weyburn reservoir—a laboratory study,” in Proceedings of the Technical Meeting/Petroleum Conference of the South Saskatchewan Section, Paper no. PETSOC-SS-92-20, pp. 1–21, Regina, Canada, October 1992.

R. K. Srivastava and S. S. Huang, “Laboratory investigation of Weyburn CO₂ miscible flooding,” in Proceedings of the Technical Meeting/Petroleum Conference of The South Saskatchewan Section, PETSOC-97-154, pp. 1–20, Petroleum Society of Canada, Regina, Canada, October 1997.

K. Ahmadi and R. T. Johns, “Multiple-mixing-cell method for MMP calculations,” SPE Journal, vol. 16, no. 4, pp. 733–742, 2011.

G. Zhao and S. Tian, “CO₂ flooding performance monitoring and forecasting in the Weyburn oil field,” Tech. Rep., Petroleum Research Technology Center (PTRC) Research, 2003.