Mathematical Problems in Engineering
Volume 2016 (2016), Article ID 5762502, 1 page
http://dx.doi.org/10.1155/2016/5762502

Corrigendum

Corrigendum to “Observer-Based Sliding Mode Control for Stabilization of a Dynamic System with Delayed Output Feedback”

Bo Wang,1,2 Peng Shi,3,4 Hamid Reza Karimi,⁵ and Cheng Chew Lim³

¹School of Electrical and Information Engineering, Xihua University, Chengdu 610096, China
²School of Applied Mathematics, University Electronic Science and Technology of China, Chengdu 610054, China
³School of Electrical and Electronic Engineering, The University of Adelaide, Adelaide, SA 5005, Australia
⁴College of Engineering and Science, Victoria University, Melbourne, VIC 8001, Australia
⁵Department of Engineering, Faculty of Engineering and Science, University of Agder, 4898 Grimstad, Norway

Received 23 October 2016; Accepted 25 October 2016

Copyright © 2016 Bo Wang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Observer-Based Sliding Mode Control for Stabilization of a Dynamic System with Delayed Output Feedback” [1] the order of the first and second affiliations was incorrect. The correct order of affiliations is shown above.

References

B. Wang, P. Shi, H. R. Karimi, and C. Lim, “Observer-based sliding mode control for stabilization of a dynamic system with delayed output feedback,” Mathematical Problems in Engineering, vol. 2013, Article ID 537414, 6 pages, 2013.