Mathematical Problems in Engineering
Volume 2018 (2018), Article ID 3816594, 1 page
https://doi.org/10.1155/2018/3816594

Corrigendum

Corrigendum to “Blind Source Separation for Complex-Valued Signals Using Generalized Autocorrelation”

Xiaogang Tang,1,2 Sun’an Wang,¹ and Jiong Li²

¹School of Mechanical Engineering, Xi’an Jiaotong University, No. 28, Xianning West Road, Xi’an, Shaanxi 710049, China
²School of Space Information, Space Engineering University of PLA, No.1, Bayi Road, Huairou District, Beijing 101416, China

Correspondence should be addressed to Jiong Li; lij_2015@126.com

Received 25 September 2018; Accepted 25 September 2018; Published 6 December 2018

Copyright © 2018 Xiaogang Tang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Blind Source Separation for Complex-Valued Signals Using Generalized Autocorrelation” [1], there was an error in the first affiliation, where the name of the university should be “Xi’an Jiaotong University”. The correct affiliations’ list is shown above.

References

Xiaogang Tang, Sun’an Wang, and Jiong Li, “Blind Source Separation for Complex-Valued Signals Using Generalized Autocorrelation,” Mathematical Problems in Engineering, vol. 2018, Article ID 8076468, 9 pages, 2018.